内容

概要

前提条件

要件

使用するコンポーネント

表記法

CatOS と Cisco IOS システム ソフトウェアの違い

Catalyst 6500/6000 の CatOS と Cisco IOS ソフトウェアのイメージ

CatOS と Cisco IOS ソフトウェアでのソフトウェア イメージの命名規則について

CatOS と Cisco IOS ソフトウェア間のデフォルト システムの違い

Cisco IOS システム ソフトウェアのインターフェイスについて

Cisco IOS ソフトウェアのインターフェイス（ポート）モード

L2 イーサネット インターフェイスの設定

ポート設定と状態に関する CatOS/Cisco IOS コマンド マトリクス

Cisco IOS ソフトウェアでの range コマンドの使用方法について

Cisco IOS ソフトウェアの設定

Cisco IOS ソフトウェアでのトランクの設定

Cisco IOS ソフトウェアでの EtherChannel の設定

Cisco IOS ソフトウェアでの VLAN の設定

Cisco IOS ソフトウェアでの VTP の設定

CatOS/Cisco IOS ソフトウェアのコマンド マトリクス

関連情報

概要

このドキュメントでは、Catalyst OS（CatOS）のユーザに対して、Cisco IOS(R) システム ソフトウェアで使用するレイヤ 2（L2）設定について説明します。このドキュメントでは、ポート/インターフェイス、トランク、チャネル、VLAN、仮想トランクプロトコル(VTP)などのコマンドと概念に関するCatOSとCisco IOSソフトウェアの類似点と相違点について説明します。 このドキュメントには、最も一般的なコマンドを簡単に参照できる CatOS/Cisco IOS ソフトウェアのコマンド マトリックスが収録されています。

前提条件

要件

このドキュメントに特有の要件はありません。

使用するコンポーネント

このドキュメントの内容は、特定のソフトウェアやハードウェアのバージョンに限定されるものではありません。

表記法

ドキュメント表記の詳細は、『シスコ テクニカル ティップスの表記法』を参照してください。

CatOS と Cisco IOS システム ソフトウェアの違い

スーパバイザ エンジン上の CatOS と MSFC 上の Cisco IOS ソフトウェア（ハイブリッド）：CatOS イメージをシステム ソフトウェアとして使用し、Catalyst 6500/6000 スイッチ上でスーパバイザ  エンジンを稼働させることができます。オプションの MSFC が取り付けられている場合、MSFC を稼働させるために、別途、Cisco IOS ソフトウェア イメージを使用します。

スーパーバイザ エンジンおよび MSFC 上の Cisco IOS  ソフトウェア（ネイティブ）:単一の Cisco IOS ソフトウェア イメージをシステム ソフトウェアとして使用し、スーパバイザ  エンジンおよび MSFC を Catalyst 6500/6000 スイッチ上で稼働させることができます。

注：詳細は、ドキュメント『Cisco Catalyst 6500シリーズスイッチ用Cisco CatalystおよびCisco IOSオペレーティングシステムの比較』を参照してください。

Catalyst 6500/6000 の CatOS と Cisco IOS ソフトウェアのイメージ

Catalyst 6500/6000 スイッチには、次の 2 種類のソフトウェアのいずれかを実行する選択肢があります。

CatOS：この実装は、Route Switch Module（RSM; ルート スイッチ モジュール）を搭載している Catalyst 5500/5000 シリーズ スイッチと論理的には同じです。 CatOS モードで実行する場合には、2 つの別個のソフトウェア イメージがあります。MSFC では従来からの Cisco IOS ソフトウェア イメージを実行し、またスーパーバイザ エンジンでは従来からの CatOS を実行します。各デバイスには、それぞれの設定ファイルがあります。

Cisco IOS ソフトウェア：この実装は、単一で「ルータのような」インターフェイスを提供します。ルータ（Route Processor（RP; ルート プロセッサ）と呼ばれる）とスイッチのスーパーバイザ エンジン（Switch Processor（SP; スイッチ プロセッサ）と呼ばれる）の境界は、ユーザが意識することはありません。コンソール接続、コンフィギュレーション ファイル、ソフトウェア イメージは 1 つずつです。

注：MSFC1を正しくロードするには、常にMSFC1ブートイメージが必要です。ハードウェア サポートには、このブート イメージが必要で、さらにこのブート イメージにより、緊急の回復が必要となる状況でのバックアップ機能が提供されます。ソフトウェア イメージは、ルータの完全な機能に実際に必要なソフトウェアをロードします）。

MSFC の他に Policy Feature Card（PFC; ポリシー フィーチャ カード）が必要です。

CatOS と Cisco IOS ソフトウェアでのソフトウェア イメージの命名規則について

CatOS では、スイッチのスーパーバイザ エンジンと MSFC で別々のソフトウェア イメージが実行されます。

スーパーバイザエンジンに関しては、次の2種類のイメージがあります。1つはSupervisor Engine Is用、もう1つはSupervisor Engine II用です。プレフィクスである cat6000-sup に続く数値は、イメージの違いを表します。

プレフィクス cat6000-sup の後に 2 が続いている場合は、Catalyst スーパーバイザ エンジン II 用のイメージです。720がcat6000-supプレフィックスに続く場合、イメージはCatalyst Supervisor Engine 720用です。2も720もcat6000-supプレフィックスに続かない場合、イメージははCatalyst Supervisor Engine Iになります。たとえば、「cat6000-sup.6-2-3.bin」という名前のファイルはスーパーバイザエンジンI用です。「cat6000-sup2.6-2-3.bin」という名前のファイルはスーパーバイザエンジンII用です。これらのイメージをダウンロードするには、『ソフトウェアのダウンロード – Catalyst 6500/6000 CatOSシステムソフトウェア』(登録ユーザ専用)を参照してください。

MSFC1、MSFC2、または MSFC3 の Cisco IOS ソフトウェアと一緒に CatOS を実行する場合は、各タイプの MSFC で別個のイメージを実行します。Download Software Area(登録ユーザ専用)には、これらのイメージが組み込まれています。MSFC1、MSFC2、またはMSFC3用のイメージをダウンロードするには、Cisco Software Downloadページに移動します。

Cisco IOS システム ソフトウェアでは、スーパーバイザ エンジンと MSFC ドーター カードの両方に対応する複合型のソフトウェア イメージを実行します。ユーザにとっては、フラッシュに読み込むイメージは 1 つだけです。各イメージは、スーパーバイザ エンジンと MSFC の装着のタイプによってカテゴリ化されています。Download Software Area（登録ユーザ専用）のイメージカテゴリは次の通りです。

- スーパーバイザ エンジン 720/MSFC3（CAT6000-SUP720/MSFC3）

- スーパーバイザ エンジン 2/MSFC2（CAT6000-SUP2/MSFC2）

- スーパーバイザ エンジン 1/MSFC2（CAT6000-SUP1/MSFC2）

- スーパーバイザ エンジン 1/MSFC1（CAT6000-SUP1/MSFC1）

Cisco IOSシステムソフトウェアイメージをダウンロードするには、『ソフトウェアのダウンロード – Catalyst 6500/6000 Cisco IOSシステムソフトウェア』(登録ユーザ専用)を参照してください。

注：スーパバイザエンジンIIはMSFC2ドーターカードを使用する必要があります。スーパーバイザエンジンIIでは、元のMSFCドーターカードを使用できません。

現在実行されているイメージを調べるには、show version コマンドを発行します。

注：ハイブリッド モードで現在実行中のイメージを調べるには、個々のモジュールに対して show version コマンドを発行します。

次の例では、MSFC2 を搭載した Catalyst 6500 において、スーパーバイザ エンジンでは CatOS が稼働し、MSFC では Cisco IOS ソフトウェアが稼働していることが、show version コマンドで示されています。

Hybrid_Cat6500>(enable) show version

WS-C6509 Software, Version NmpSW: 7.6(4)

Copyright (c) 1995-2003 by Cisco Systems

NMP S/W compiled on Nov  4 2003, 19:22:09

System Bootstrap Version: 5.3(1)

System Boot Image File is 'bootflash:cat6000-supk8.7-6-4.bin'

System Configuration register is 0x2102

Hardware Version: 2.0  Model: WS-C6509  Serial #: SCA043500S2

PS1  Module: WS-CAC-1300W    Serial #: SON04340836

PS2  Module: WS-CAC-1300W    Serial #: SNI05470791

Mod Port Model               Serial #    Versions

--- ---- ------------------- ----------- --------------------------------------

1   2    WS-X6K-SUP1A-2GE    SAD04500AFW Hw : 7.4

Fw : 5.3(2)

Fw1: 5.4(2)

Sw : 7.6(4)

Sw1: 7.6(4)

WS-X6K-SUP1A-2GE    SAD04500AFW Hw : 7.4

Sw :

2   2    WS-X6K-SUP1A-2GE    SAL0549F477 Hw : 7.1

Fw : 5.3(1)

Fw1: 5.4(2)

Sw : 7.6(4)

Sw1: 7.6(4)

WS-X6K-SUP1A-2GE    SAL0549F477 Hw : 7.1

Sw :

3   48   WS-X6148-GE-TX      SAD0746052K Hw : 4.0

Fw : 7.2(1)

Sw : 7.6(4)

4   48   WS-X6248-RJ-45      SAD04281CZY Hw : 1.2

Fw : 5.1(1)CSX

Sw : 7.6(4)

5   48   WS-X6248-RJ-45      SAD042608NZ Hw : 1.2

Fw : 5.1(1)CSX

Sw : 7.6(4)

6   48   WS-X6248-RJ-45      SAD04170CG9 Hw : 1.2

Fw : 5.1(1)CSX

Sw : 7.6(4)

7   48   WS-X6248-RJ-45      SAD04270N9U Hw : 1.2

Fw : 5.1(1)CSX

Sw : 7.6(4)

15  1    WS-F6K-MSFC2        SAD04520C65 Hw : 1.7

Fw : 12.1(19)E1

Sw : 12.1(19)E1

16  1    WS-F6K-MSFC2        SAL0548F2TE Hw : 2.0

Fw : 12.1(19)E1

Sw : 12.1(19)E1

DRAM                    FLASH                   NVRAM

Module Total   Used    Free    Total   Used    Free    Total Used  Free

------ ------- ------- ------- ------- ------- ------- ----- ----- -----

2      130944K  50017K  80927K  16384K  10857K   5527K  512K  389K  123K

Uptime is 142 days, 4 hours, 27 minutes

CatOS と Cisco IOS ソフトウェア間のデフォルト システムの違い

機能

CatOS

Cisco IOS ソフトウェア

コンフィギュレーション ファイル

2つの設定ファイルは次のとおりです。1つはスーパーバイザエンジン(NMP^1)用、もう1つはMSFC用

1つの設定ファイル

ソフトウェア イメージ

2つのイメージは次のとおりです。1つはスーパーバイザエンジン用、もう1つはMSFC用です

1つのソフトウェアイメージ。MSFCを正しくロードするには、MSFCブートイメージも必要です

デフォルトのポート モード

すべてのポートが L2 スイッチド ポート

すべてのポートが L32 ルーテッド ポート（インターフェイス）

デフォルト ポート ステータス

全てのポートはenable状態です。

ポート（インターフェイス）はすべてシャットダウン状態にあります。

設定コマンドの形式

各設定コマンドの前にコマンドのキーワードとして set が付く

グローバル レベルおよびインターフェイス レベルのコマンドでの Cisco IOS コマンド構造

設定モード

set, clear, show コマンドを使用します。

コンフィグターミナル、VLANデータベースからのコマンドが設定モードを有効にします。

コンフィギュレーションの削除/変更

clear、set、あるいは enable/disable コマンドを使用

Cisco IOSコマンド構造と同じ。キーワードnoはコマンドを無効にする

1 NMP = ネットワーク管理プロセッサ

2 L3 = レイヤ 3

Cisco IOS システム ソフトウェアのインターフェイスについて

Cisco IOS ソフトウェアのインターフェイス（ポート）モード

Cisco IOS ソフトウェアではポートをインターフェイスと呼びます。Cisco IOS ソフトウェアには次の 2 種類のインターフェイス モードがあります。

- L3 ルーテッド インターフェイス

- L2 スイッチ インターフェイス

注：デフォルトはL3ルーテッドインターフェイスです。

L2 イーサネット インターフェイスの設定

ポート/インターフェイスを L2 スイッチ インターフェイスにするには、次の例に示すように、そのインターフェイスの基で switchport コマンドを追加します。

Cat6500# show running-config interface fastethernet 5/10

Building configuration...

Current configuration:

!

interface FastEthernet5/10

no ip address

switchport

end

L2 スイッチ ポートのデフォルトのインターフェイス設定は CatOS の場合とは異なります。たとえば、ポートにL2ポート構成がある場合、トランクモードはautoではなくdesirableになります。show interface interface switchport コマンドを実行すると、L2 スイッチ ポートの現在の設定の詳細が表示されます。以下が一例です。

Cat6500# show interfaces fastethernet 5/10 switchport

Name: Fa5/10

Switchport: Enabled

Administrative Mode: dynamic desirable

Operational Mode: down

Administrative Trunking Encapsulation: negotiate

Negotiation of Trunking: On

Access Mode VLAN: 1 ( default)

Trunking Native Mode VLAN: 1 (default)

Trunking VLANs Enabled: ALL

Pruning VLANs Enabled: 2-1001

Cisco IOS ソフトウェアには、主な 3 つの L2 スイッチ ポート モードがあります。

- Access:インターフェイスを非トランキング モードに設定します。

- Dynamic:アクセス モードまたはトランク モードについてダイナミックにネゴシエートするようにインターフェイスを設定します。このセッティングのための 2つのオプションは次のとおりです。

- Desirable:この設定では、隣接デバイスが desirable モードまたは auto モードでトランク設定がされている場合に、ポートがトランクになることができます。Desirable モードはポートがスイッチ ポートの設定になっているときのデフォルトのモードです。

- Auto:この設定では、他の隣接デバイスが desirable モードでトランク設定がされている場合に、ポートがトランクになることができます。

- Trunk:インターフェイスを固定的なトランク モードに設定します。

ポート設定と状態に関する CatOS/Cisco IOS コマンド マトリクス

機能

CatOS

PortFast をイネーブルにする場合

CatOS (enable) set spantree portfast 4/1 enable

Warning: Spantree port fast start should only

be enabled on ports connected to a single host.

Connecting hubs, concentrators, switches,

bridges, etc. to a fast start port can cause

temporary spanning tree loops. Use with caution.

Spantree port 4/1 fast start enabled.

ポートをホスト アクセス用に設定する場合。このコマンドにより、PortFast がイネーブルになり、CatOS でのトランキングとチャネリングがディセーブルになります。

CatOS (enable) set port host 4/2

Port(s) 4/2 channel mode set to off.

Warning: Spantree port fast start should only be

enabled on ports connected to a single host.

Connecting hubs, concentrators, switches,

bridges, etc. to a fast start port can cause

temporary spanning tree loops. Use with caution.

Spantree port 4/2 fast start enabled.

Port(s) 4/2 trunk mode set to off.

CatOS (enable)

ポートの状態を表示する場合

show port

show port mod

show port mod/port

show port counters

show port counters mod/port

機能

Cisco IOS ソフトウェア

PortFast をイネーブルにする場合

CiscoIOS(config)# interface fastethernet 4/2

CiscoIOS(config-if)# spanning-tree portfast

Warning: portfast should only be enabled on

ports connected to a single host.

Connecting hubs, concentrators, switches,

bridges, etc. to this interface when

portfast is enabled can cause temporary

spanning tree loops.

Use with CAUTION

Portfast has been configured on

FastEthernet4/2 but will only have effect

when the interface is in a non-trunking mode.

CiscoIOS(config-if)# ^Z

CiscoIOS#

ポートをホスト アクセス用に設定する場合。このコマンドにより、PortFast がイネーブルになり、CatOS でのトランキングとチャネリングがディセーブルになります。

CiscoIOS(config)# interface fastethernet 4/2

CiscoIOS(config-if)# switchport

CiscoIOS(config-if)# switchport mode access

CiscoIOS(config-if)# spanning-tree portfast

%Warning: portfast should only be enabled

on ports connected to a single host.

Connecting hubs, concentrators, switches,

bridges, etc. to this interface when

portfast is enabled, can cause temporary

spanning tree loops.

Use with CAUTION

%Portfast has been configured on

FastEthernet4/2 but will only have effect

when the interface is in a non-trunking mode.

CiscoIOS(config-if)# ^Z

CiscoIOS#

ポートの状態を表示する場合

show interface status

show interface status module mod

show interface status errordisabled

show interface counters error module mod

Cisco IOS ソフトウェアでの range コマンドの使用方法について

スイッチで Cisco IOS ソフトウェアが稼働している場合でも、依然としてインターフェイスが多数存在する可能性があります。このため、複数のポートを迅速に設定する手段として、CatOS と同様に Cisco IOS ソフトウェアでも、ある範囲のインターフェイスを同時に設定できます。range コマンドを発行すると、多数のインターフェイスを同じ設定に迅速に設定できます。

CiscoIOS(config)# interface range gigabitethernet 1/1 -2, fastethernet 4/1 -24

注：このコマンドの構文では、最初のインターフェイス範囲とハイフンの間にスペースがあります。シンタックスは、重要であり絶対的に正確でなければなりません。空白がないと、command-line interface（CLI; コマンドライン インターフェイス）から構文エラーが返されます。

range コマンドの誤った使用例を次に示します。

CiscoIOS(config)# interface range gigabitethernet 1/1-2,fastethernet 4/1-24

^

% Invalid input detected at '^' marker.

CiscoIOS(config)# interface range gigabitethernet 1/1 -2,fastethernet 4/1-24

^

% Invalid input detected at '^' marker.

CiscoIOS(config)# interface range gigabitethernet 1/1 -2,fastethernet 4/1 -24

次の例では、VLAN 2 にある 4/2-8 の範囲のポートを設定しています。

NativeIOS(config)# interface range fastethernet 4/2 -8

CiscoIOS(config-if)# switchport

CiscoIOS(config-if)# switchport access vlan 2

CiscoIOS(config-if)# no shut

CiscoIOS(config-if)# ^Z

CiscoIOS# show interface

このように range コマンドを使用した後、設定は次のようになります。

interface FastEthernet4/4

no ip address

switchport

switchport access vlan 2

!

interface FastEthernet4/5

no ip address

switchport

switchport access vlan 2

!

interface FastEthernet4/6

no ip address

switchport

switchport access vlan 2

!

interface FastEthernet4/7

no ip address

switchport

switchport access vlan 2

!

interface FastEthernet4/8

no ip address

switchport

switchport access vlan 2

!

interface FastEthernet4/9

no ip address

shutdown

Cisco IOS ソフトウェアの設定

Cisco IOS ソフトウェアでのトランクの設定

Cisco IOS ソフトウェアでは、Inter-Switch Link（ISL; スイッチ間リンク）プロトコルと IEEE 802.1Q（dot1q）トランキング モードの両方をサポートしています。「Cisco IOS システム ソフトウェアのインターフェイスについて」で説明したように、インターフェイスの設定には異なるオプションを使用できます。トランキングは CatOS の場合とまったく同じ方式で動作します。ただし、例外として Cisco IOS ソフトウェアでのデフォルト設定は、auto ではなく desirable です。

機能

CatOS

ISL トランクを有効にする場合

CatOS (enable) set trunk 4/1 on isl

Port(s) 4/1 trunk mode set to on.

Port(s) 4/1 trunk type set to isl.

dot1q トランクを有効にする場合

CatOS (enable) set trunk 4/1 on dot1q

Port(s) 4/1 trunk mode set to on.

Port(s) 4/1 trunk type set to dot1q

CatOS (enable) set vlan 2 4/1

VLAN 2 modified.

VLAN 1 modified.

VLAN Mod/Ports

---- -----------------------

2    1/1

4/1

注：dot1qの場合、ネイティブVLANがトランクリンク間で一致することが非常に重要です。CatOS でトランクにネイティブ VLAN を設定するには、set vlan vlan-id mod/port コマンドを使用します。

トランク モードを変更する場合

CatOS (enable) set trunk mod/port {on

| off | desirable | auto | nonegotiate}

[vlans] [isl | dot1q | negotiate]

トランキングの状態を表示する場合

show trunk

show trunk mod

show port mod/port

機能

Cisco IOS ソフトウェア

ISL トランクを有効にする場合

CiscoIOS# configure terminal

Enter configuration commands, one per line.

End with CNTL/Z.

CiscoIOS(config)# interface fastethernet 4/1

CiscoIOS(config-if)# switchport

CiscoIOS(config-if)# switchport trunk encapsulation isl

CiscoIOS(config-if)# switchport mode trunk

3d22h: %DTP-SP-5-TRUNKPORTON:

Port Fa4/1 has become isl

CiscoIOS(config-if)# ^Z

CiscoIOS#

dot1q トランクを有効にする場合

CiscoIOS# configure terminal

Enter configuration commands, one per line.

End with CNTL/Z.

CiscoIOS(config)# interface fastethernet 4/1

CiscoIOS(config-if)# switchport

CiscoIOS(config-if)# switchport trunk encapsulation dot1q

CiscoIOS(config-if)# switchport mode trunk

3d22h: %DTP-SP-5-TRUNKPORTON:

Port Fa4/1 has become dot1q

CiscoIOS(config-if)# switchport trunk native vlan 2

CiscoIOS(config-if)# ^Z

CiscoIOS#

トランク モードを変更する場合

CiscoIOS(config-if)# switchport mode {access |

trunk | multi | dynamic {auto | desirable}}

トランキングの状態を表示する場合

show interfaces trunk

show interfaces trunk module number

show interfaces interface-type mod/port

show interfaces status

Cisco IOS ソフトウェアでトランク情報を確認するには、いくつかの方法があります。

注：ルーテッドポートはL2トランクポートではありません。

show interfaces trunk コマンドでは、現在トランクになっているすべてのインターフェイスを表示します。このコマンドでは、トランクとして設定されていても、現在はアクティブなトランクになっていないポートは表示されません。

Switch# show interfaces trunk

Port Mode      Encapsulation Status   Native vlan

Po41 desirable n-isl         trunking 1

Port Vlans allowed on trunk

Po41 1-1005

Port Vlans allowed and active in management domain

Po41 1-6,1002-1005

Port Vlans in spanning tree forwarding state and not pruned

Po41 1-6,1002-1005

show interfaces trunk module number コマンドでは、トランクの状態にかかわらず、指定したモジュール上にあるすべてのインターフェイスが表示されます。

Switch# show interfaces trunk module 4

Port   Mode      Encapsulation Status       Native vlan

Fa4/1  desirable n-isl         trunk-inbndl 1 (Po41)

Fa4/2  desirable n-isl         trunk-inbndl 1 (Po41)

Fa4/3  desirable n-isl         trunk-inbndl 1 (Po41)

Fa4/4  desirable n-isl         trunk-inbndl 1 (Po41)

Fa4/5  desirable negotiate     not-trunking 1

Fa4/6  desirable negotiate     not-trunking 1

Fa4/7  desirable negotiate     not-trunking 1

Fa4/8  desirable negotiate     not-trunking 1

Fa4/9  desirable negotiate     not-trunking 1

Fa4/10 routed    negotiate     routed       1

Fa4/11 desirable negotiate     not-trunking 1

Fa4/12 desirable negotiate     not-trunking 1

Fa4/13 desirable negotiate     not-trunking 1

Fa4/14 desirable negotiate     not-trunking 1

Fa4/15 desirable negotiate     not-trunking 1

Fa4/16 desirable negotiate     not-trunking 1

Fa4/17 desirable negotiate     not-trunking 1

show interfaces interface-type mod/port trunk コマンドを使用すると、複数の画面をスクロールしないで特定のインターフェイスのトランキング状態を確認できます。

Switch# show interfaces fastethernet 4/1 trunk

Port  Mode      Encapsulation Status       Native vlan

Fa4/1 desirable n-isl         trunk-inbndl 1 (Po41)

Port Vlans allowed on trunk

Fa4/1 1-1005

Port Vlans allowed and active in management domain

Fa4/1 1-6,1002-1005

Port Vlans in spanning tree forwarding state and not pruned

Fa4/1 1-6,1002-1005

show interfaces status コマンドでは、各インターフェイスについて、状態とトランキング状態を 1 行で表示します。

Switch# show interfaces status

Port Name Status     Vlan   Duplex Speed Type

Gi1/1   connected  routed full    1000 1000BaseSX

Gi1/2   connected  1      full    1000 1000BaseSX

Gi3/1   notconnect routed full    1000 missing

Gi3/2   notconnect routed full    1000 missing

Gi3/3   notconnect routed full    1000 1000BaseSX

Gi3/4   notconnect routed full    1000 1000BaseSX

Gi3/5   notconnect routed full    1000 1000BaseSX

Gi3/6   notconnect routed full    1000 1000BaseSX

Gi3/7   notconnect routed full    1000 1000BaseSX

Gi3/8   notconnect routed full    1000 1000BaseSX

Fa4/1   connected  trunk  full     100 100BaseFX MM

Fa4/2   connected  trunk  full     100 100BaseFX MM

Fa4/3   connected  trunk  full     100 100BaseFX MM

Fa4/4   connected  trunk  full     100 100BaseFX MM

Fa4/5   notconnect 1     full     100 100BaseFX MM

Fa4/6   notconnect 1     full     100 100BaseFX MM

Fa4/7   notconnect 2     full     100 100BaseFX MM

Fa4/8   notconnect 2     full     100 100BaseFX MM

Fa4/9   notconnect 1     full     100 100BaseFX MM

Fa4/10   notconnect routed full     100 100BaseFX MM

Fa4/11   notconnect 1     full     100 100BaseFX MM

Cisco IOS ソフトウェアでの EtherChannel の設定

Cisco IOS ソフトウェアでの EtherChannel の設定は、CatOS での設定と大きく異なります。Cisco IOS ソフトウェアでポートのグループに対して EtherChannel をイネーブルにするには、ポート チャネル インターフェイスを使用する必要があります。ポートのグループに対してすべての条件が有効である場合は、これによりポート チャネルが形成されます。デフォルトでは、すべてのインターフェイスでポート チャネリングがディセーブルになっています。インターフェイスにスイッチ ポート設定がある場合も同様です。

インターフェイスのグループを EtherChannel の一部となるよう設定するには、各インターフェイスに対して個別に channel-group group-number mode channel-mode コマンドを発行する必要があります。設定から switchport コマンドを削除すると、そのスイッチ ポートに関連するすべてのコマンドが設定に表示されなくなります。ただし、そのポートをスイッチ ポートとして再設定すると、以前のコマンドがすべて元に戻ります。つまり、あるポートをスイッチ ポートとして設定および設定解除しても、ポート チャネル グループの情報は失われません。

チャネル グループを作成した後は、すべての設定は個々の物理ポートではなく、ポート チャネル インターフェイスに対して発行する必要があります。ポート チャネルに対して発行したコマンドは、すべての物理ポートに透過的に伝搬されます。チャネル メンバの物理インターフェイスに対して発行したコマンドにより、そのインターフェイスがチャネル グループから除外される可能性があります。

機能

CatOS

チャネルを作成する場合

CatOS (enable) set port channel 4/3-4 on

Port(s) 4/3-4 are assigned to admin group 613.

Port(s) 4/3-4 channel mode set to on.

CatOS (enable)

チャネル モードを設定する場合

CatOS (enable) set port channel

mod/port mode {on | off | desirable |

auto} [silent | non-silent]

ポート チャネルの状態を表示する場合

show port channel

show port channel mod/port

show port channel channel-group

機能

Cisco IOS ソフトウェア

チャネルを作成する場合

CiscoIOS# configure terminal

Enter configuration commands, one per line.

End with CNTL/Z.

CiscoIOS(config)# interface port-channel 1

CiscoIOS(config-if)# exit

CiscoIOS(config)# interface fastethernet 4/3

CiscoIOS(config-if)# channel-group 1 mode on

CiscoIOS(config-if)# interface fastethernet 4/4

CiscoIOS(config-if)# channel-group 1 mode on

CiscoIOS(config-if)#

チャネル モードを設定する場合

CiscoIOS(config-if)# channel-group

channel-group_number mode {on | auto

[non-silent] | desirable [non-silent]}

ポート チャネルの状態を表示する場合

show etherchannel

show etherchannel channel-group

show interfaces etherchannel

show interfaces interface-type mod/port etherchannel

show etherchannel コマンドには、ポート チャネルの設定に関する情報を表示するためのさまざまなサブコマンドがあります。

show etherchannel channel-group summary コマンドでは、チャネル グループの設定にあるすべてのインターフェイスの状態が表示されます。このコマンドは、チャネル グループに属するインターフェイスを高速で見つけるのに非常に役立ちます。

CiscoIOS# show etherchannel 256 summary

Flags: U - in use I - in port-channel S - suspended

D - down I - stand-alone d - default setting

Group Port-channel Ports

-----+------------+-----------------------------------------------------------

256   Po256(U)    Fa5/5(I) Fa5/6(I) Fa5/7(I) Fa5/8(I)

show interfaces etherchannel コマンドでは、チャネルの状態にかかわらず、あるチャネル グループに関連しているすべてのインターフェイスが表示されます。

CiscoIOS# show interfaces etherchannel

----

GigabitEthernet1/1:

Port state = EC-Enbld Up In-Bndl Usr-Config

Channel group = 254 Mode = Automatic Gcchange = 0

Port-channel = Po254 GC = 0x00FE0001

Port indx = 0 Load = 0x55

Flags: S - Device is sending Slow hello. C - Device is in Consistent state.

A - Device is in Auto mode. P - Device learns on physical port.

Timers: H - Hello timer is running. Q - Quit timer is running.

S - Switching timer is running. I - Interface timer is running.

Local information:

Hello Partner PAgP    Learning Group

Port  Flags   State   Timers   Interval Count Priority Method Ifindex

Gi1/1 SAC     U6/S7   Q     30s     1   128      Any    56

Partner's information:

Partner Partner Partner  Partner        Group

Port Name    Device   ID         Port Age Flags Cap.

Gi1/1   69055180(STELLA) 0010.7bbe.50bb 3/4  12s SC    2

show interfaces interface-type mod/port etherchannel コマンドを使用すると、複数の画面をスクロールしないで特定のインターフェイスのチャネル状態を確認できます。

CiscoIOS# show interfaces fastethernet 5/5 etherchannel

Port state = EC-Enbld Up Cnt-bndl Sngl-port-Bndl Cnt-Bndl Not-in-Bndl Usr-Config

Channel group = 256 Mode = Automatic Gcchange = 1

Port-channel = null GC = 0x11000002

Port indx = 0 Load = 0x00

Flags: S - Device is sending Slow hello. C - Device is in Consistent state.

A - Device is in Auto mode. P - Device learns on physical port.

Timers: H - Hello timer is running. Q - Quit timer is running.

S - Switching timer is running. I - Interface timer is running.

Local information:

Hello Partner PAgP  Learning Group

Port  Flags   State Timers   Interval Count Priority Method Ifindex

Fa5/5 SAC     U6/S7 Q  30s   1     128      Any 0

Partner's information:

Partner Partner   Partner Partner        Group

Port Name   Device  ID      Port Age Flags Cap.

Fa5/5   066549452(SINGHA) 00d0.bb3a.c0d9 4/17 29s SC 2

Age of the port in the current state: 00h:30m:31s

Probable reason: pm - different in oper mode (1) with Fa5/8(2)

show interfaces port-channel channel-group etherchannel コマンドでは、現在ポート チャネルのアクティブなメンバになっているポートが表示されます。

CiscoIOS# show interfaces port-channel 256 etherchannel

Age of the Port-channel = 05h:52m:49s

Logical slot/port = 13/64 Number of ports = 2

GC = 0x01000001 HotStandBy port = null

Port state = Port-channel Ag-Inuse

Ports in the Port-channel:

Index  Load   Port   EC state  Configuration

------+------+------+-----------+--------------

1    55     Fa5/7  auto      user

0    AA     Fa5/8  auto      user

Time since last port bundled: 00h:46m:51s Fa5/7

Time since last port Un-bundled: 00h:46m:54s Fa5/8

Cisco IOS ソフトウェアでの VLAN の設定

VLAN の概念と機能は、Cisco IOS ソフトウェアと CatOS とでは同一です。しかし、これらの設定方法は大きく異なります。CatOS では set コマンドを使用して VLAN を作成しますが、Cisco IOS ソフトウェアでは VLAN database コンフィギュレーション モードで VLAN を作成します。

機能

CatOS

VLAN を作成する場合

CatOS (enable) set vlan 2

Vlan 2 configuration successful

VLAN を削除する場合

CatOS (enable) clear vlan 2

This command will deactivate all

ports on vlan 2

Do you want to continue(y/n) [n]?y

Vlan 2 deleted

VLAN にポートを割り当てる場合

CatOS (enable) set vlan 2 1/1

VLAN 2 modified.

VLAN 10 modified.

VLAN Mod/Ports

---- -----------------------

2    1/1

VLAN ステータスの表示

show vlan

機能

Cisco IOS ソフトウェア

VLAN を作成する場合

CiscoIOS# vlan database

CiscoIOS(vlan)# vlan 2

VLAN 2 added:

Name: VLAN0002

CiscoIOS(vlan)# exit

APPLY completed.

Exiting....

VLAN を削除する場合

NativeIOS# vlan database

CiscoIOS(vlan)# no vlan 2

Deleting VLAN 2...

CiscoIOS(vlan)# exit

APPLY completed.

Exiting....

VLAN にポートを割り当てる場合

CiscoIOS# configure terminal

Enter configuration commands, one per line.

End with CNTL/Z.

CiscoIOS(config)# interface gigabitethernet2/2

CiscoIOS(config-if)# switchport

CiscoIOS(config-if)# switchport access vlan 2

CiscoIOS(config-if)# ^Z

CiscoIOS#

VLAN ステータスの表示

show vlan

VLAN のステータスをチェックするために、 show vlan コマンドを使用します。

Router# show vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active

2    VLAN0002                         active

10   VLAN0010                         active

1002 fddi-default                     active

1003 token-ring-default               active

1004 fddinet-default                  active

1005 trnet-default                    active

VLAN Type  SAID       MTU   Parent RingNo BridgeNo Stp  BrdgMode Trans1 Trans2

---- ----- ---------- ----- ------ ------ -------- ---- -------- ------ ------

1    enet  100001     1500  -      -      -        -    -        0      0

2    enet  100002     1500  -      -      -        -    -        0      0

10   enet  100010     1500  -      -      -        -    -        0      0

1002 fddi  101002     1500  -      -      -        -    -        0      0

1003 tr    101003     1500  -      -      -        -    -        0      0

1004 fdnet 101004     1500  -      -      -        ieee -        0      0

1005 trnet 101005     1500  -      -      -        ibm  -        0      0

Primary Secondary Type              Ports

------- --------- ----------------- ------------------------------------------

Cisco IOS ソフトウェアでの VTP の設定

VTP とは、VTP ドメインにある VLAN データベースを同期させるための L2 プロトコルです。同じ VTP ドメインで VLAN を追加、削除、変更した際には、VTP により、同じ VTP ドメインにあるすべてのメンバの VLAN データベースの同期が取られます。VTP プルーニングによってトランク上のトラフィックが最小になります。これは、伝搬する必要のない VLAN に対する不要なブロードキャスト トラフィックやマルチキャスト トラフィックが減少するためです。

Cisco IOS ソフトウェアでは、VLAN データベースのモードによって VTP の設定が決まります。VLAN データベースや VTP の変更は、VLAN データが適用された際に発生します。これが発生するのは、ユーザが VLAN データベースのコンフィギュレーション モードを終了した時点です。Cisco IOS ソフトウェアでのデフォルトの VTP 設定は次のようになっています。

注：デフォルトのVTPモードはServerです。

CiscoIOS# show vtp status

VTP Version : 2

Configuration Revision : 0

Maximum VLANs supported locally : 1005

Number of existing VLANs : 6

VTP Operating Mode : Server

VTP Domain Name : null

VTP Pruning Mode : Disabled

VTP V2 Mode : Disabled

VTP Traps Generation : Disabled

MD5 digest : 0xE2 0x4F 0xC0 0xD6 0x94 0xBB 0x31 0x9A

Configuration last modified by 0.0.0.0 at 6-27-01 02:04:20

Local updater ID is 0.0.0.0 (no valid interface found)

機能

CatOS

VTP を設定する場合

CatOS (enable) set vtp domain cisco

VTP domain cisco modified

VTP モードを変更する場合

CatOS (enable) set vtp mode client

VTP domain cisco modified

CatOS (enable) set vtp mode server

VTP domain cisco modified

CatOS (enable) set vtp mode transparent

VTP domain cisco modified

VTP プルーニングをイネーブルにする場合

CatOS (enable) set vtp pruning enable

This command will enable the pruning

function in the entire management domain.

All devices in the management domain

should be pruning-capable before enabling.

Do you want to continue (y/n) [n]? y

VTP domain cisco modified

VTP の設定を表示する場合

CatOS (enable) show vtp domain

機能

Cisco IOS ソフトウェア

VTP を設定する場合

CiscoIOS# vlan database

CiscoIOS(vlan)# vtp domain cisco

Changing VTP domain name from null to cisco

CiscoIOS(vlan)# exit

APPLY completed.

Exiting....

VTP モードを変更する場合

CiscoIOS# vlan database

CiscoIOS(vlan)# vtp client

Setting device to VTP CLIENT mode.

CiscoIOS(vlan)# vtp server

Setting device to VTP SERVER mode.

CiscoIOS(vlan)# vtp transparent

Setting device to VTP TRANSPARENT mode.

CiscoIOS(vlan)# exit

APPLY completed.

Exiting....

VTP プルーニングをイネーブルにする場合

CiscoIOS# vlan database

CiscoIOS(vlan)# vtp pruning

Pruning switched ON

CiscoIOS(vlan)# exit

APPLY completed.

VTP の設定を表示する場合

CiscoIOS# show vtp status

CatOS/Cisco IOS ソフトウェアのコマンド マトリクス

この表では、CatOS のコマンドと、そのコマンドに相当する Cisco IOS ソフトウェアのコマンドを簡潔に一覧しています。この表は、CatOS から Cisco IOS ソフトウェアへ移行するときのクイック リファレンスとして便利に使用できます。この表は頻繁に使用するコマンドについて要約したものです。各コマンドのすべてのパラメータは一覧していません。コマンドの構文とパラメータの全体については、『Catalyst 6500 シリーズ スイッチ Cisco IOS コマンド リファレンス Release 12.2SX』を参照してください。

このセクションのコメントは、それぞれのコマンドの説明を補うものです。コメントは斜体で表示されます。

CatOS コマンド

Cisco IOS ソフトウェア コマンド

clear vlan vlan

no vlan このコマンドは VLAN データベースのコマンドです。

set cam agingtime

mac-address-table aging-time このコマンドは VLAN ごとの MAC アドレスのエージング タイムを設定します。

set cam set cam {static | permanent}

mac-address-table static スタティックなエントリはすべて固定的でもあります。

set errdisable-timeout interval

errdisable recovery interval 30-86400 このコマンドでは errdisable の復旧時間を設定します。

set mls

mls マルチレイヤ スイッチング（MLS）は Cisco IOS ソフトウェアでは透過的に行われます。

set option errport

errdisable recovery cause このコマンドは errdisable のオプションを設定します。

set port channel デフォルトのモードは auto です。

channel-group group mode デフォルトのモードは off です。

set port duplex

二重モード デフォルトの動作はラインカードによって変わります。

set port flowcontrol send [desired |オフ |オン]

flowcontrol send [desired] |オフ | on ]

set port flowcontrol receive [desired |オフ |オン]

flowcontrol receive [desired |オフ | on ]

set port host

switchportswitchport mode accessspanning-tree portfast アクセス ポートではチャネリングとトランキングが自動的にオフに切り替わります。

set port negotiation mod/port disable

speed nonegotiate このコマンドはギガビット ポートに対してのみ使用します。10/100 Mbps のポートに対しては speed コマンドと duplex コマンドを使用します。

set port negotiation mod/port enable

no speed nonegotiate このコマンドはギガビット ポートに対してのみ使用します。10/100 Mbps のポートに対しては speed コマンドと duplex コマンドを使用します。

set port speed

スピード デフォルトの動作はラインカードによって変わります。

set qos

mls qos

set span

monitor session

set spantree

スパニング ツリー

set system crossbar-fallback

service internal [no] fabric switching-mode allow [bus-only |切り捨て

set test diaglevel

diagnostic level これはブートアップの診断レベルです。

set trace

デバッグ このコマンドの使用には注意が必要です。デバッグの種類によっては他に影響が及ぶことがあります。

set trunk デフォルトのモードは auto です。

switchport mode trunk デフォルトのモードは desirable です。

set udld

udld このコマンドはグローバルおよびインターフェイスごとに設定します。

set vlan

vlan switchport access vlan このコマンドは VLAN データベースのコマンドです。 このコマンドはインターフェイス コマンドであり、VLAN は作成しません。

set vtp

vtp このコマンドは VLAN データベースのコマンドです。

show boot

show bootvar このコマンドでは起動時のパラメータを表示します。

show cam dynamic

show mac-address-table dynamic

show channel infoshow port channel

show etherchannel summary

show errordetection

show errdisable detect

show errdisable-timeout

show errdisable recovery

show portshow mac

show interface

show port status

show interface status

show span

show monitor

show sprom

show idprom このコマンドはシャーシのシリアル番号を調べるのに便利です。

show system crossbar-fallback

show fabric switching-mode

show test [diaglevel | mod]

show diagnostic [level | mod module]

show qos

show mls qos

show traffic

show catalyst6000 traffic-meter このコマンドはバックプレーンの使用率を表示します。

show trunkshow port trunk

show interfaces trunk

show udld

show udld

show vlan

show vlan

show vtp domain

show vtp status

switch console

remote login このコマンドは、Cisco テクニカルサポートによる指示があった場合にのみ、トラブルシューティングのために使用します。

関連情報

- LAN 製品に関するサポート ページ

- LAN スイッチング テクノロジーに関するサポート ページ

- ツールとリソース

- テクニカル サポートとドキュメント – Cisco Systems