内容

概要

前提条件

要件

使用するコンポーネント

背景説明

ログの表示方法

解決方法

関連情報

概要

このドキュメントでは、RAIDコントローラUCSC-PSAS12GHBAからログを収集する方法について説明します。

前提条件

要件

このドキュメントに特有の要件はありません。

使用するコンポーネント

- コントローラPID:UCSC-PSAS12GHBA

- ベンダー：PMC-Sierra(Microsemi)

- ドライバ：アカウド

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。本稼働中のネットワークでは、各コマンドによって起こる可能性がある影響を十分確認してください。

背景説明

UCSC-PSAS12GHBA(Microsemi PMC-Sierra HBA)は、C240 M4サーバで使用される唯一の非LSI HBAコントローラです。lsi RAIDコントローラとは異なり、CIMCのストレージデーモン「ストレージ」はこのHBAカードのログを保存しません。

ログの表示方法

UCSサーバからのログの例：メッセージ/

"Event log fetch is not valid for this controller type"

723: 6:2017 Dec 20 00:50:14 EST:BMC:storaged:1628: handy_utils.c:46:==>>>> ctlr 2 pd_list device_IDs: 0x0000000000000000 0x0000000000000000 0x0000000000000000 0x0000000000007f00

749: 6:2017 Dec 20 00:50:50 EST:BMC:storaged:1628: handy_utils.c:46:==>>>> ctlr 2 occupied slots according to pd_list: 0x0000000000000000 0x0000000000000000 0x0000000000000000 0x00000000000000fe

893: 5:2017 Dec 20 01:29:11 EST:BMC:storaged:1628: service.c:283:CMD: 'controller-type: ALL;controller: SLOT-HBA;log: ;command: get-newest-entries;starting-entry: 1;entry-count: 500 '

894: 5:2017 Dec 20 01:29:11 EST:BMC:storaged:1628: service.c:333:Accepted request 'controller-type: ALL;controller: SLOT-HBA;log: ;command: get-newest-entries;starting-entry: 1;entry-count: 500 '

895: 4:2017 Dec 20 01:29:11 EST:BMC:storaged:1628: service.c:169:CMD: write-status: Event log fetch is not valid for this controller type

896: 5:2017 Dec 20 01:29:11 EST:BMC:storaged:1628: service.c:283:CMD: 'controller-type: RAID;controller: SLOT-HBA;operation: get-tty-log;mode: compressed '

897: 5:2017 Dec 20 01:29:11 EST:BMC:storaged:1628: service.c:333:Accepted request 'controller-type: RAID;controller: SLOT-HBA;operation: get-tty-log;mode: compressed '

898: 5:2017 Dec 20 01:29:11 EST:BMC:storaged:1628: service.c:283:CMD: 'controller-type: RAID;controller: SLOT-HBA;operation: get-phy-errors '

899: 5:2017 Dec 20 01:29:11 EST:BMC:storaged:1628: service.c:333:Accepted request 'controller-type: RAID;controller: SLOT-HBA;operation: get-phy-errors '

900: 4:2017 Dec 20 01:29:12 EST:BMC:storaged:1628: service.c:169:CMD: write-status: Invalid controller operation

解決方法

このHBAコントローラにはCLIツールがあります（LSIコントローラのstorcliと同様）。

Adaptec ARCCONFコマンドラインユーティリティv2.01.22270

https://storage.microsemi.com/en-us/speed/raid/storage_manager/arcconf_v2_01_22270_zip.php

ユーザガイド：

http://download.adaptec.com/pdfs/user_guides/cli_arc_v2_01_22270_users_guide.pdf

関連情報

このコントローラのドライバの詳細を取得するには：

Linux の場合

$ modinfo aacraid

filename:       /lib/modules/2.6.32-696.6.3.el6.x86_64/kernel/drivers/scsi/aacraid/aacraid.ko

version:        1.2-0[30300]-ms

license:        GPL

description:    Dell PERC2, 2/Si, 3/Si, 3/Di, Adaptec Advanced Raid Products, HP NetRAID-4M, IBM ServeRAID & ICP SCSI driver

author:         Red Hat Inc and Adaptec

VMWare:

vmkload_mod -s aacraid | grep Version