目次

概要

前提条件

要件

使用するコンポーネント

設定

NX-OS ソフトウェア リリース 6.2(9) を実行している MDS 9509

NX-OS ソフトウェア リリース 6.2(9) を実行している MDS 9148

ネットワーク図

MDS 9148（NPV）から MDS 9509（NPIV）への F-port-channel-trunk

トポロジ

確認

MDS 9509

MDS 9148

トラブルシューティング

VSAN が初期化中のままになる

表示される EPP エラー メッセージ

概要

このドキュメントでは、N_Port ID Virtualization（NPV）機能を実行している Multilayer Data Switch（MDS）9500 から N_Port Virtualization（NPV）機能を実行している MDS 9148 への F-port-channel-trunk を設定する方法について説明します。

F-port-channel-trunk は、NPV スイッチからのファブリック ログインをポート チャネル経由で仮想化できるようにします。 これにより、個別のメンバー リンクで障害が発生しても中断しない冗長性が提供されます。 個別のリンクは、デフォルトで、共有レート モードになりますが、専用レート モードにすることもできます。

前提条件

要件

次の項目に関する知識があることが推奨されます。

- N_Port の仮想化

- ファイバ チャネル

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づくものです。

- NX-OS ソフトウェア リリース 6.2(9) を実行している MDS 9509

- スロット 2：DS-X9148 - 48 ポート 1/2/4 Gbps FC モジュール

- スロット 4：DS-X9124 - 24 ポート 1/2/4 Gbps FC モジュール

- NX-OS ソフトウェア リリース 6.2(9) を実行している MDS 9148

このドキュメントでは、次の機能を取り上げます。

- NPV 機能と NPIV 機能が SAN-OS ソフトウェア リリース 3.3 で追加されました。

- fport-channel-trunk 機能が NX-OS ソフトウェア リリース 4.1(3) で追加されました。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されたものです。 このドキュメントで使用するすべてのデバイスは、クリアな（デフォルト）設定で作業を開始しています。 ネットワークが稼働中の場合は、コマンドが及ぼす潜在的な影響を十分に理解しておく必要があります。

設定

注: このセクションで使用されているコマンドの詳細を調べるには、Command Lookup Tool（登録ユーザ専用）を使用してください。

注：

すべてのインターフェイスを同じ仮想ストレージ エリア ネットワーク（VSAN）に含める必要があります。 この例では VSAN 1 を使用します。

複数のラインカードでメンバー インターフェイスを分散させるのがベスト プラクティスです。

"switchport rate-mode dedicated" はオプションです。 デフォルトで、トランキング F（TF）ポート インターフェイスは、必要に応じて、共有レート モードで動作できます。 ポート グループ単位で帯域幅が使用可能な場合は、それらを switchport rate-mode dedicated コマンドで設定できます。 show port-resources module x コマンドを入力すれば、ポート グループとそれぞれで使用可能な帯域幅を表示することができます。

NX-OS ソフトウェア リリース 6.2(9) を実行している MDS 9509

feature fport-channel-trunk

feature npiv

interface port-channel 1

channel mode active

switchport mode F

switchport trunk allowed vsan 1

switchport trunk allowed vsan add 20

switchport rate-mode dedicated

interface fc2/2

switchport rate-mode dedicated

switchport mode F

channel-group 1 force

no shutdown

interface fc4/8

switchport rate-mode dedicated

switchport mode F

channel-group 1 force

no shutdown

NX-OS ソフトウェア リリース 6.2(9) を実行している MDS 9148

注：

9148 上のすべてのポートが専用（フル レート モード）のため、9148 上で専用を保証するための設定は必要ありません。 実際は、"switchport rate-mode dedicated" コマンドが自動的に追加され、変更することはできません。

「fport-channel-trunk 機能」は MDS NPV スイッチ上で設定する必要がありません。

NPV モードに変更すると、現在の設定が消去され、スイッチが NPV モードでリブートします。

feature npv

interface port-channel 1

channel mode active

switchport mode NP

switchport trunk allowed vsan 1

switchport trunk allowed vsan add 20

switchport rate-mode dedicated

switchport trunk mode on

interface fc1/2

switchport mode NP

switchport trunk mode on

port-license acquire

channel-group 1 force

no shutdown

interface fc1/14

switchport mode NP

switchport trunk mode on

port-license acquire

channel-group 1 force

no shutdown

ネットワーク図

MDS 9148（NPV）から MDS 9509（NPIV）への F-port-channel-trunk

トポロジ

MDS 9509 モジュールの情報：

mds9509# show mod

Mod  Ports  Module-Type                         Model              Status

---  -----  ----------------------------------- ------------------ ----------

2    48     1/2/4 Gbps FC Module                DS-X9148           ok

4    24     1/2/4 Gbps FC Module                DS-X9124           ok

5    0      Supervisor/Fabric-2                 DS-X9530-SF2-K9    active *

6    0      Supervisor/Fabric-2                 DS-X9530-SF2-K9    ha-standby

MDS 9148 モジュールの情報：

mds9148# show mod

Mod  Ports  Module-Type                         Model              Status

---  -----  ----------------------------------- ------------------ ----------

1    48     1/2/4/8 Gbps FC/Supervisor-3        DS-C9148-K9-SUP    active *

確認

ここでは、設定が正常に動作していることを確認します。

特定の show コマンドがアウトプット インタープリタ ツール（登録ユーザ専用）でサポートされています。 show コマンド出力の分析を表示するには、アウトプット インタープリタ ツールを使用します。

MDS 9509

このコマンドは、ポート チャネル 1 に 2 つの動作可能なポートがあること示します。

mds9509# show port-channel summary

------------------------------------------------------------------------------

Interface                 Total Ports        Oper Ports        First Oper Port

------------------------------------------------------------------------------

port-channel 1                 2                 2                  fc4/8

このコマンドは、ポート チャネルとすべてのメンバー インターフェイスを表示します。 First Operational Port（FOP）がアスタリスクで示されます。

mds9509(config-if)# show port-channel data

port-channel1

Administrative channel mode is active

Operational channel mode is active

Last membership update succeeded

First operational port is fc4/8

2 ports in total, 2 ports up

Ports:   fc2/2    [up]

fc4/8    [up] *

このコマンドは、ポート チャネル 1 インターフェイスが「トランキング」状態（望ましい状態）にあることを表示します。

注: VSAN 1 と VSAN 20 の両方がアップしています。これは、9148 上でアップしている両方の VSAN にポートが存在することを意味します。

mds9509# show int po1

port-channel 1 is trunking

Hardware is Fibre Channel

Port WWN is 24:01:00:0d:ec:20:ba:00

Admin port mode is F, trunk mode is on

snmp link state traps are enabled

Port mode is TF

Port vsan is 1

Speed is 8 Gbps

Trunk vsans (admin allowed and active) (1,20)

Trunk vsans (up)                       (1,20)

Trunk vsans (isolated)                 ()

Trunk vsans (initializing)             ()

5 minutes input rate 112 bits/sec, 14 bytes/sec, 0 frames/sec

5 minutes output rate 152 bits/sec, 19 bytes/sec, 0 frames/sec

25798 frames input, 1399932 bytes

0 discards, 0 errors

0 CRC,  0 unknown class

0 too long, 0 too short

23082 frames output, 1013152 bytes

0 discards, 0 errors

18 input OLS, 14 LRR, 29 NOS, 0 loop inits

17 output OLS, 0 LRR, 21 NOS, 0 loop inits

Member[1] : fc4/2

Member[2] : fc4/8

Interface last changed at Thu Mar  6 06:27:36 2014

このコマンドは、「トランキング」状態にある 2 つのメンバー インターフェイスも表示します。

mds9509# show interface fc2/2, fc4/8

fc2/2 is trunking

Hardware is Fibre Channel, SFP is short wave laser w/o OFC (SN)

Port WWN is 20:42:00:0d:ec:20:ba:00

Admin port mode is F, trunk mode is on

snmp link state traps are enabled

Port mode is TF

Port vsan is 1

Speed is 4 Gbps

Rate mode is dedicated

Transmit B2B Credit is 32

Receive B2B Credit is 16

Receive data field Size is 2112

Beacon is turned off

admin fec state is down

oper fec state is down

Belongs to port-channel1

Trunk vsans (admin allowed and active) (1,20)

Trunk vsans (up)                       (1,20)

Trunk vsans (isolated)                 ()

Trunk vsans (initializing)             ()

5 minutes input rate 0 bits/sec,0 bytes/sec, 0 frames/sec

5 minutes output rate 0 bits/sec,0 bytes/sec, 0 frames/sec

31 frames input,4476 bytes

0 discards,0 errors

0 invalid CRC/FCS,0 unknown class

0 too long,0 too short

30 frames output,4224 bytes

0 discards,0 errors

3 input OLS,3  LRR,7 NOS,0 loop inits

5 output OLS,0 LRR, 4 NOS, 0 loop inits

16 receive B2B credit remaining

32 transmit B2B credit remaining

32 low priority transmit B2B credit remaining

Last clearing of "show interface" counters  :never

fc4/8 is trunking

Hardware is Fibre Channel, SFP is short wave laser w/o OFC (SN)

Port WWN is 20:c8:00:0d:ec:20:ba:00

Admin port mode is F, trunk mode is on

snmp link state traps are enabled

Port mode is TF

Port vsan is 1

Speed is 4 Gbps

Rate mode is dedicated

Transmit B2B Credit is 32

Receive B2B Credit is 16

Receive data field Size is 2112

Beacon is turned off

admin fec state is down

oper fec state is down

Belongs to port-channel1

Trunk vsans (admin allowed and active) (1,20)

Trunk vsans (up)                       (1,20)

Trunk vsans (isolated)                 ()

Trunk vsans (initializing)             ()

5 minutes input rate 8 bits/sec,1 bytes/sec, 0 frames/sec

5 minutes output rate 8 bits/sec,1 bytes/sec, 0 frames/sec

45855 frames input,1934340 bytes

0 discards,0 errors

0 invalid CRC/FCS,0 unknown class

0 too long,0 too short

23018 frames output,1115304 bytes

0 discards,0 errors

8 input OLS,5  LRR,8 NOS,0 loop inits

7 output OLS,0 LRR, 6 NOS, 0 loop inits

16 receive B2B credit remaining

32 transmit B2B credit remaining

32 low priority transmit B2B credit remaining

Last clearing of "show interface" counters 2w 1d

MDS 9148

このコマンドは、ポート チャネル 1 に 2 つの動作可能なポートがあること示します。

mds9148# show port-channel summary

------------------------------------------------------------------------------

Interface                 Total Ports        Oper Ports        First Oper Port

------------------------------------------------------------------------------

port-channel 1                 2                 2                  fc1/2

このコマンドは、ポート チャネル 1 インターフェイスが「トランキング」状態（望ましい状態）にあることを表示します。

注: VSAN 1 と VSAN 20 の両方がアップしています。これは、9148 上でアップしている両方の VSAN にポートが存在することを意味します。

mds9148# show int po1

port-channel 1 is trunking

Hardware is Fibre Channel

Port WWN is 24:01:00:0d:ec:fc:40:c0

Admin port mode is NP, trunk mode is on

snmp link state traps are enabled

Port mode is TNP

Port vsan is 1

Speed is 8 Gbps

Trunk vsans (admin allowed and active) (1,20)

Trunk vsans (up)                       (1,20)

Trunk vsans (isolated)                 ()

Trunk vsans (initializing)             ()

5 minutes input rate 32 bits/sec,4 bytes/sec, 0 frames/sec

5 minutes output rate 32 bits/sec,4 bytes/sec, 0 frames/sec

688 frames input,91096 bytes

0 discards,0 errors

0 invalid CRC/FCS,0 unknown class

0 too long,0 too short

661 frames output,89080 bytes

3 discards,0 errors

14 input OLS,0  LRR,0 NOS,0 loop inits

32 output OLS,29 LRR, 14 NOS, 0 loop inits

Member[1] : fc1/2

Member[2] : fc1/14

Interface last changed at Thu Mar  6 18:48:57 2014

トラブルシューティング

ここでは、設定のトラブルシューティングに役立つ情報について説明します。

ポート チャネルがアップしない場合は、次の情報を確認してください。

ポートは、次の設定がポートと PortChannel で同じ場合にのみ、静的 PortChannel のメンバーとして設定できます。

- Speed

- モード

- レート モード

- ポート VSAN

- トランキング モード

- 許可された VSAN リストまたは VF-ID リスト

ポート チャネルに含まれないポートを設定して、それがアップすることを確認します。

詳細については、『ポート チャネルの設定』を参照してください。

VSAN が初期化中のままになる

VSAN は、MDS 9148 上でそれに FLOGI しているインターフェイスが存在しない場合に、初期化中として表示されます。 VSAN がポート チャネル上でアップしてから、MDS 9148 上の VSAN 内で最後まで残っていたポートがダウンすると、VSAN がアップしたままになります。

表示される EPP エラー メッセージ

トランク プロトコル（EPP）が有効になっていることを確認します。 これは絶対にオフにしないでください。

rtp-san-34-15-9509(config)# show trunk protocol

Trunk Protocol is enabled

トランク プロトコルが無効になっていたら、それをオンに戻します。

mds9509(config)# show trunk protocol

Trunk Protocol is disabled

mds9509(config)# trunk protocol

mds9509(config)#

mds9509(config)# show trunk protocol

Trunk Protocol is enabled