内容

はじめに

前提条件

要件

使用するコンポーネント

背景説明

スイッチのブートシーケンス

スイッチプロンプト

回復手順

はじめに

このドキュメントでは、マルチレイヤデータセンタースイッチ(MDS)をブートローダープロンプトおよびブートモードから回復する方法について説明します。

前提条件

要件

次の項目に関する知識があることが推奨されます。

- MDS9000 CLIコンフィギュレーションコマンド

- MDSスイッチへのコンソール接続の設定方法

- 管理ポートを介してMDSスイッチをセットアップするか、ネットワークに接続する方法。

- TFTPに精通していること。

使用するコンポーネント

このドキュメントの情報は、ソフトウェア要件リリース6.2(9)以降に基づくものです。 このドキュメントでは、12 ～ 48のラインレート16 GbpsファイバチャネルポートをサポートするMDS9148Sスイッチswitchname tempestを使用しています。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、クリアな（デフォルト）設定で作業を開始しています。本稼働中のネットワークでは、各コマンドによって起こる可能性がある影響を十分確認してください。

背景説明

MDSスイッチが正しく機能するには、完全に起動するために、破損していない有効なキックスタートイメージとシステムイメージが必要です。キックスタートイメージが無効、破損、または見つからない場合は、スイッチが起動できず、ブートローダープロンプトで停止します。有効なキックスタートイメージがあるが、システムイメージが無効であるか存在しないスイッチは、最終的にブートモードになる。

スイッチのブートシーケンス

BIOS >ローダー>キックスタートイメージ>システムイメージ

1. Basic Input Output System(BIOS)がローダをロードします。

2. ローダはキックスタートイメージをRAMにロードし、キックスタートイメージを開始します。

3. キックスタートイメージがシステムイメージをロードして起動します。

4. システムイメージがスタートアップコンフィギュレーションファイルを読み取ります。

スイッチプロンプト

フェーズ

プロンプト

説明

BIOS

ブート不能

BIOSが電源投入時自己診断テストとメモリテストを開始します。

ローダ

loader>

ブートローダは、ロードされたソフトウェアを圧縮解除してキックスタートイメージをブートします。

Ctrl + C（CtrlキーとCキー）を押して、ブートローダープロンプトに入ります。

キックスタート

switch (boot)#

ブートローダの段階が終了したら、Ctrl + ]（Controlキーと右ブラケットキー）を押して、ブートモードに入ります。

システム

ログイン：

システムイメージはスタートアップコンフィギュレーションファイルをロードし、ログインプロンプトにスイッチを返します。

回復手順

スイッチコンソールセッションから。

loader>

ステップ 1：スイッチのキックスタートイメージとシステムイメージをダウンロードし、それらをTFTPサーバディレクトリに配置します。

この例では、TFTPサーバのIPアドレスは10.104.204.100です。

ステップ 2：スイッチ管理IPアドレス、サブネットマスク、およびデフォルトゲートウェイを設定します。

Check config options in loader prompt using help option

loader> help

help    - print online help

boot     - Boot image

cmdline - <arguments>

dir     -   List Directory

help    - print online help

network -   Set network communication settings

reload  - Reboot the board.

serial  - Set serial console settings

show    - Show loader configuration

loader> net --ip=10.66.78.80 --nm=255.255.255.128 --gw=10.66.78.4

この例では、

- スイッチインターフェイスmgmt0のIPアドレスは、10.66.78.80 255.255.255.128です。

- スイッチのデフォルトゲートウェイのIPアドレスは10.66.78.4です

または

ローダープロンプトのIP割り当て構文は、スイッチのHWモデルによって若干異なります。

T&Vシリーズファブリックスイッチの場合の例を次に示します。

loader> set ip 10.66.78.80 255.255.255.128

loader> set gw 10.66.78.4

注：ステップ2の設定は、スイッチを初めて（RMAスイッチ用に）ブートする場合、またはスイッチがwrite erase bootの場合に必要です。

ステップ 3：スイッチをブートモードにするため、TFTPサーバディレクトリにあるキックスタートイメージをブートします。

loader> boot tftp://10.104.204.100/m9100-s5ek9-kickstart-mz.8.3.1.bin

eTSEC2: Speed 1000, full duplex

Using eTSEC2 device

TFTP from server 10.104.204.100; our IP address is 10.66.78.80; sending through gateway 10.66.78.4

Filename 'm9100-s5ek9-kickstart-mz.8.3.1.bin'.

Load address: 0x8000000

Loading:         *#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#######

done

Bytes transferred = 26027008 (18d2400 hex)

NBI at 08000000 size 26027008

Booting image at addr 0x00800000 ...

Memory <- <0x0 0x0 0x1 0x0> (4096MB)

ethernet0: local-mac-address <- 10:05:ca:b6:c5:a0

ethernet1: local-mac-address <- 00:e0:0c:00:01:fd

ethernet2: local-mac-address <- 00:e0:0c:00:02:fd

CPU clock-frequency <- 0x3f941f80 (1067MHz)

CPU timebase-frequency <- 0x3f941f8 (67MHz)

CPU bus-frequency <- 0x1fca0fc0 (533MHz)

zImage starting: loaded at 0x00800000 (sp: 0x7fedc620)

Allocating 0x620d88 bytes for kernel ...

gunzipping (0x00000000 <- 0x00817000:0x00de3838)...done 0x5bc060 bytes

Using loader supplied ramdisk at 0x2800000-0x3de8e00

initrd head: 0x1f8b0808

Linux/PowerPC load: rw root=/dev/ram0 rdbase=0x7000000 card_index=9046 maxcpus=2 ip=off ramdisk_size=262144 noquiet obfl_type_ide=1 kgdboc=ttyS0,9600,B console=ttyS0,9600n8nn loader_ver="02.01.17" card_index=9046 quiet bootdev=mgmt0 server_ip=64.104.204.100 ksimg=m9100-s5ek9-kickstart-mz.8.3.1.bin isanimg=  Finalizing device tree... flat tree at 0xdf0140

Ísetup_arch: bootmem

mpc85xx_ds_setup_arch()

arch: exit

[    0.060378] Host controller irq 26

[    0.103390] Assign root port irq 26

[    0.144046] Host controller irq 24

[    0.193691] Assign root port irq 24

[    0.810630] physmap-flash physmap-flash.0: Could not reserve memory region

[    1.084751] Enabling all PCI devices

INIT: Checking all filesystems..r.r.r.retval=[1]

r done

WARNING: Image sync is going to be disabled after a loader netboot.

Loading system software

No system image is specified

/etc/init.d/functions: li

INIT: Sending processes the KILL signal

Cisco Nexus Operating System (NX-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (c) 2002-2018, Cisco Systems, Inc. All rights reserved.

The copyrights to certain works contained in this software are

owned by other third parties and used and distributed under

license. Certain components of this software are licensed under

the GNU General Public License (GPL) version 2.0 or the GNU

Lesser General Public License (LGPL) Version 2.1. A copy of each

such license is available at

http://www.opensource.org/licenses/gpl-2.0.php and

http://www.opensource.org/licenses/lgpl-2.1.php

switch(boot)#

ステップ 4：スイッチをブートモードから回復します。

1. スイッチのブートプロンプトでIP configを確認します。

switch(boot)# sh ip

ip routing is disabled

Management Interface: ip address 10.66.78.80/25

ip default-gateway 10.66.78.4

IP Configが見つからない場合は、次に示すように、インターフェイス管理IPアドレスとデフォルトゲートウェイIPアドレスを再設定します。

switch(boot)# config t

Enter configuration commands, one per line. End with CNTL/Z.

switch(boot)(config)# interface mgmt 0

switch(boot)(config-if)# ip address 10.66.78.80 255.255.255.128

switch(boot)(config-if)# no shut

switch(boot)(config-if)# exit

switch(boot)(config)# ip default-gateway 10.66.78.4

switch(boot)(config)# exit

2. TFTPサーバとスイッチ間のIP接続をテストします（ローダープロンプトではping応答は使用できません）。

TFTPサーバからスイッチ管理IPアドレスにpingを実行します。

C:\Users\mpandika> ping 10.66.78.80

Pinging 10.66.78.80 with 32 bytes of data:

Reply from 10.66.78.80: bytes=32 time=2ms TTL=60

Reply from 10.66.78.80: bytes=32 time=3ms TTL=60

Reply from 10.66.78.80: bytes=32 time=3ms TTL=60

Reply from 10.66.78.80: bytes=32 time=3ms TTL=60

Ping statistics for 10.66.78.80:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 2ms, Maximum = 3ms, Average = 2ms

C:\Users\mpandika>

3. キックスタートイメージおよびシステムイメージをTFTPサーバからスイッチのブートフラッシュにダウンロードします。

switch(boot)# copy tftp://10.104.204.100/m9100-s5ek9-kickstart-mz.8.3.1.bin bootflash:

Trying to connect to tftp server......

Connection to server Established. Copying Started.....

TFTP get operation was successful

Copy complete, now saving to disk (please wait)...

switch(boot)#

switch(boot)#copy tftp://10.104.204.100/m9100-s5ek9-mz.8.3.1.bin bootflash:

Trying to connect to tftp server......

Connection to server Established. Copying Started.....

TFTP get operation was successful

Copy complete, now saving to disk (please wait)...

switch(boot)#

4. キックスタートイメージおよびシステムイメージがスイッチのブートフラッシュに正常にダウンロードされていることを確認します。

switch(boot)# dir bootflash:

4096   Dec 22 2002 01:38:31  .partner/

297  Nov 09 2017 07:18:54  MDS201711091818530370.lic

297  Nov 09 2017 07:28:42  MDS201711091828418770.lic

4096  Jul 23 2018 14:44:25  lost+found/

26027008  Aug 08 2018 02:55:31  m9100-s5ek9-kickstart-mz.8.3.1.bin

109635731  Aug 08 2018 02:53:38  m9100-s5ek9-mz.8.3.1.bin

3430222  Feb 01 2000 02:31:30  moonlake.1.f.xsvf

23467  Jul 30 2018 12:40:56  mts.log

347607  Jul 28 2017 04:46:31  portchannel

4096  Dec 22 2002 02:38:54  scripts/

31812  Jun 30 2018 05:07:27  snmp.pcap

Usage for bootflash: filesystem

1264746496 bytes used

2106781696 bytes free

3371528192 bytes total

switch(boot)#

5. システムイメージをロードします。

switch(boot)# load bootflash:m9100-s5ek9-mz.8.3.1.bin

Uncompressing system image: bootflash:/m9100-s5ek9-mz.8.3.1.bin

CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

Load plugins that defined in image conf: /isan/plugin_img/img.conf

No Patching support on this platform

Loading plugin 0: core_plugin...

No Patching support on this platform

Enter pboot_chk_compatibility

num srgs 1

0: swid-core-s5ek9m, swid-core-s5ek9m

num srgs 1

0: swid-sup-mini-ks, swid-sup-mini-ks

INIT: Switching to runlevel: 3

INIT: Sending processes the TERM signal

switch(boot)#

INIT:

2018 Aug  8 03:13:03  %SYSLOG-2-SYSTEM_MSG : Syslogs wont be logged into logflash until logflash is online

2018 Aug  8 03:13:06  %KERN-0-SYSTEM_MSG: [    1.084751] Enabling all PCI devices - kernel

2018 Aug  8 03:14:13 switch %CARDCLIENT-2-REG: OK

System is coming up ... Please wait ...

System is coming up ... Please wait ...

2018 Aug  8 03:14:22 switch %ASCII-CFG-2-CONFIG_REPLAY_STATUS: Bootstrap Replay Started.

System is coming up ... Please wait ...

User Access Verification

10.66.78.80 login: 2018 Aug  8 03:14:41 switch %ASCII-CFG-2-CONFIG_REPLAY_STATUS: Bootstrap Replay Done.

2018 Aug  8 03:14:44 switch %PMON-SLOT1-2-PMON_CRIT_INFO: Port Monitor Critical Information: Config download success .

2018 Aug  8 03:14:45 switch %ASCII-CFG-2-CONFIG_REPLAY_STATUS: Ascii Replay Started.

2018 Aug  8 03:14:45 switch %PMON-SLOT1-2-PMON_CRIT_INFO: Port Monitor Critical Information: Policy (slowdrain) activation is successfull .

2018 Aug  8 03:14:46 switch %PLATFORM-2-PS_OK: Power supply 1 ok(Serial number QCS18242L8D)

2018 Aug  8 03:14:46 switch %PLATFORM-2-PS_FANOK: Fan in Power supply 1 ok

2018 Aug  8 03:14:46 switch %PLATFORM-2-PS_FAIL: Power supply 2 failed or shut down(Serial number QCS18242L0H)

2018 Aug  8 03:14:46 switch %PLATFORM-2-FAN_OK: Fan module ok

2018 Aug  8 03:14:46 switch %PLATFORM-2-FAN_OK: Fan module ok

2018 Aug  8 03:14:46 switch %PLATFORM-2-FAN_OK: Fan module ok

2018 Aug  8 03:14:46 switch %PLATFORM-2-FAN_OK: Fan module ok

2018 Aug  8 14:15:35 tempest %ASCII-CFG-2-CONFIG_REPLAY_STATUS: Ascii Replay Done.

User Access Verification

tempest login:

注：スイッチには以前switchname tempestが設定されていました。

6. スイッチにログインします。

tempest login: admin

Password:

Last login: Wed Aug  8 14:20:01 on pts/0

Cisco Nexus Operating System (NX-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (c) 2002-2018, Cisco Systems, Inc. All rights reserved.

The copyrights to certain works contained in this software are

owned by other third parties and used and distributed under

license. Certain components of this software are licensed under

the GNU General Public License (GPL) version 2.0 or the GNU

Lesser General Public License (LGPL) Version 2.1. A copy of each

such license is available at

http://www.opensource.org/licenses/gpl-2.0.php and

http://www.opensource.org/licenses/lgpl-2.1.php

tempest#

7. ブート変数を確認します。

tempest# show boot

Current Boot Variables:

kickstart variable = bootflash:/m9100-s5ek9-kickstart-mz.8.1.1.bin

system variable = bootflash:/m9100-s5ek9-mz.8.1.1.bin

Boot POAP Disabled

No module boot variable set

Boot Variables on next reload:

kickstart variable = bootflash:/m9100-s5ek9-kickstart-mz.8.1.1.bin

system variable = bootflash:/m9100-s5ek9-mz.8.1.1.bin

Boot POAP Disabled

No module boot variable set

tempest#

8. ブート変数を正しいイメージに設定します。

tempest# show version

Cisco Nexus Operating System (NX-OS) Software

TAC support: http://www.cisco.com/tac

Documents: http://www.cisco.com/en/US/products/ps9372/tsd_products_support_series_home.html

Copyright (c) 2002-2018, Cisco Systems, Inc. All rights reserved.

The copyrights to certain works contained herein are owned by

other third parties and are used and distributed under license.

Some parts of this software are covered under the GNU Public

License. A copy of the license is available at

http://www.gnu.org/licenses/gpl.html.

Software

BIOS:      version 2.1.17

loader:    version N/A

kickstart: version 8.3(1)

system:    version 8.3(1)

BIOS compile time:       01/08/14

system image file is:    bootflash:///m9100-s5ek9-mz.8.3.1.bin

system compile time:     7/30/2018 12:00:00 [07/12/2018 19:32:46]

Hardware

cisco MDS 9148S 16G 48 FC (1 Slot) Chassis ("2/4/8/16 Gbps FC/Supervisor")

Motorola, e500v2 with 4088556 kB of memory.

Processor Board ID JAE18250A8C

Device name: tempest

bootflash:    4018896 kB

Kernel uptime is 0 day(s), 0 hour(s), 47 minute(s), 44 second(s)

Last reset at 362296 usecs after Wed Aug  8 13:02:31 2018

Reason: Reset Requested by CLI command reload

System version: 8.1(1)

Service:

plugin

Core Plugin

tempest# config t

Enter configuration commands, one per line.  End with CNTL/Z.

tempest(config)# boot kickstart bootflash:m9100-s5ek9-kickstart-mz.8.3.1.bin

Performing image verification and compatibility check, please wait....

tempest(config)# boot system bootflash:m9100-s5ek9-mz.8.3.1.bin

Performing image verification and compatibility check, please wait....

tempest(config)#

9. 設定したブート変数を確認します。

tempest# show boot

Current Boot Variables:

kickstart variable = bootflash:/m9100-s5ek9-kickstart-mz.8.3.1.bin

system variable = bootflash:/m9100-s5ek9-mz.8.3.1.bin

Boot POAP Disabled

No module boot variable set

Boot Variables on next reload:

kickstart variable = bootflash:/m9100-s5ek9-kickstart-mz.8.1.1.bin

system variable = bootflash:/m9100-s5ek9-mz.8.1.1.bin

Boot POAP Disabled

No module boot variable set

10. スイッチのrunning-configを保存します。

tempest# copy running-config startup-config

[########################################] 100%

Copy complete.

tempest#

11. set Boot Variables post copy running-config startup-configを確認します。

tempest# show boot

Current Boot Variables:

kickstart variable = bootflash:/m9100-s5ek9-kickstart-mz.8.3.1.bin

system variable = bootflash:/m9100-s5ek9-mz.8.3.1.bin

Boot POAP Disabled

No module boot variable set

Boot Variables on next reload:

kickstart variable = bootflash:/m9100-s5ek9-kickstart-mz.8.3.1.bin

system variable = bootflash:/m9100-s5ek9-mz.8.3.1.bin

Boot POAP Disabled

No module boot variable set