内容

概要

Cisco Multilayer Data Switch(MDS)9000ファミリ着脱可能トランシーバのデータシート

短波SFPの場合

長波SFPの場合

テストのタイプ

遅延/ケーブル長テスト

トラフィックジェネレータテスト

スケジューラジョブの設定

概要

このドキュメントでは、ビット/ワードエラーの問題が発生した場合に、サポート対象として確認する必要があるスイッチ/モジュール/SFPおよびケーブルのタイプについて説明します。

著者：Cisco TACエンジニア、Afroj AhmadおよびEd Mazurek

Cisco Multilayer Data Switch(MDS)9000ファミリ着脱可能トランシーバのデータシート

https://www.cisco.com/c/en/us/products/collateral/storage-networking/mds-9000-series-multilayer-switches/product_data_sheet09186a00801bc698.html?dtid=osscdc000283

主に、必要なケーブルの正確な量、長さ、タイプ（OM2、OM3など）と、その中のパッチパネルの数を決定します。

SFPには実際に次の機能が表示されます。

短波SFPの場合

F241-15-09-MDS9710# show interface fc1/4 transceiver details

fc1/4 sfp is present

Name is CISCO-AVAGO

Manufacturer's part number is AFBR-57F5PZ-CS1

Revision is B2

Serial number is AVA1551J9KF

Cisco part number is 10-2666-01

Cisco pid is DS-SFP-FC16G-SW

FC Transmitter type is short wave laser w/o OFC (SN)

FC Transmitter supports short distance link length

Transmission medium is multimode laser with 62.5 um aperture (M6)

Supported speeds are - Min speed: 4000 Mb/s, Max speed: 16000 Mb/s

Nominal bit rate is 14000 Mb/s

Link length supported for 50/125um OM2 fiber is 35 m

Link length supported for 62.5/125um fiber is 15 m

Link length supported for 50/125um OM3 fiber is 100 m

Cisco extended id is unknown (0x0)

No tx fault, no rx loss, in sync state, diagnostic monitoring type is 0x68

SFP Diagnostics Information:

----------------------------------------------------------------------------

Alarms                  Warnings

High        Low         High          Low

----------------------------------------------------------------------------

Temperature   33.48 C         75.00 C     -5.00 C     70.00 C        0.00 C

Voltage        3.29 V          3.63 V      2.97 V      3.46 V        3.13 V

Current        7.46 mA        10.50 mA     2.50 mA    10.50 mA       2.50 mA

Tx Power      -2.54 dBm        1.70 dBm  -13.00 dBm   -1.30 dBm     -9.00 dBm

Rx Power      -2.32 dBm        3.00 dBm  -15.90 dBm    0.00 dBm    -11.90 dBm

Transmit Fault Count = 0

----------------------------------------------------------------------------

Note: ++  high-alarm; +  high-warning; --  low-alarm; -  low-warning

F241-15-09-MDS9710#

上記は、SFPのタイプがDS-SFP-FC16G-SWで、最大長が100メートル(50/125um(mIcron)OM3ケーブルであることを示しています。

長波SFPの場合

F241-15-09-MDS9710# show interface fc9/1 transceiver details

fc9/1 sfp is present

Name is CISCO-FINISAR

Manufacturer's part number is FTLF1432P3BCV-C1

Revision is B

Serial number is FNS21190B7F

Cisco part number is 10-3207-01

Cisco pid is DS-SFP-FC32G LW

FC Transmitter type is long wave laser cost reduced

FC Transmitter supports long distance link length

Transmission medium is single mode (SM) laser

Supported speeds are - Min speed: 8000 Mb/s, Max speed: 32000 Mb/s

Nominal bit rate is 28000 Mb/s

Link length supported for 9/125um fiber is 10 km

Cisco extended id is unknown (0x0)

No tx fault, no rx loss, in sync state, diagnostic monitoring type is 0x68

SFP Diagnostics Information:

----------------------------------------------------------------------------

Alarms                  Warnings

High        Low         High          Low

----------------------------------------------------------------------------

Temperature   32.52 C         75.00 C     -5.00 C     70.00 C        0.00 C

Voltage        3.37 V          3.63 V      2.97 V      3.46 V        3.13 V

Current       38.55 mA        70.00 mA     1.00 mA    68.00 mA       2.00 mA

Tx Power       0.49 dBm        5.00 dBm  -12.40 dBm    2.00 dBm     -8.40 dBm

Rx Power      -7.43 dBm        5.00 dBm  -18.01 dBm    2.00 dBm    -14.00 dBm

Transmit Fault Count = 0

----------------------------------------------------------------------------

Note: ++  high-alarm; +  high-warning; --  low-alarm; -  low-warning

F241-15-09-MDS9710#

上記は、SFPのタイプがDS-SFP-FC32G-LWで、最大長が10KMであることを示しています。

注：表示される長さは、完璧な条件下での最大の長さです。パッチパネルとパス内のファイバの追加の長さによって距離が短くなることがありますが、時には大幅に短くなります。

パッチパネルやその他の中間接続は、しばしば問題の原因になります。診断の手順として、常にこれらを削除してください。これは系統的なアプローチで行い、各変更で結果が文書化されていることを確認します。

上記の出力のRx出力が許容範囲であることに注意してください。

-18.01 dBm   -14.00 dBm           -7.43 dBm         0.00 dBm        2.00 dBm        5.00 dBm

<---------+------------+-------------------+----------------+---------------+---------------+------->

<---Error-+                                                                                 Error--->

<------Warning                                                    Warning--------->

<-------------------------OK----------------------->

Rx Powerが許容範囲を超えている場合は、ファイバ/ジャンパー/パッチパネルのエンドツーエンド接続が正常であることを示しません。ただし、一度に1つずつバイパスする必要があります。

通常、過剰なビット/ワードエラーの問題はASICの問題ではありません。ただし、同じモジュール上の別のポートにケーブルを移動する場合は、モジュールのアーキテクチャ（ASICごとのポート層）を知る必要があります。

例：

MDS 9500(DS-X9248-256K9)には、Thunderbirdsと呼ばれる4つのFC ASICがあります。

これらのFC ASICは、それぞれ12個のポートを処理します。

ASIC 0:fc1/1-12

ASIC 1 - fc1/13-24

ASIC 2:fc1/25-36

ASIC 3:fc1/37-48

MDSには、実行可能なISL診断が組み込まれています。

テストのタイプ

リンクで診断テストを実行する方法を次に示します。

遅延/ケーブル長テスト

これは、遅延を測定し、ケーブル長を決定する短時間のテストです。この方法を次に説明します。

サイドA：これをジェネレータ側と呼びます。トラフィックを生成します。

サイドB：これをリフレクタ側と呼びます。ジェネレータからトラフィックを受信し、それを返信します。

以下に、いくつかの例を示します。

サイドA（ジェネレータ） fc9/1 — fc6/1サイドB（リフレクタ）

1.1サイドB（リフレクタ）

1.1.1：使用するインターフェイスをシャットダウンする

1.1.2 - diagnostic isl reflector latency_test loop-back interface fc6/1 enable

1.2サイドA（ジェネレータ）

1.2.1：使用するインターフェイスをシャットダウンする

1.2.2 - diagnostic isl latency-test interface fc9/1

ラボスイッチの内容は次のとおりです。

F241-15-09-MDS9710# diagnostic isl latency-test interface fc9/1

Waiting for sync to be achieved on the link ....

Sync is achieved, Link has been initialized.

Starting the test ....

---------------------------------------------------------

Latency test Result for port: fc9/1

Latency in the switch (in ns): 264

Latency in the cable (in ns): 6593

Length of the cable (accuracy ± 2m): 4373 m

---------------------------------------------------------

F241-15-09-MDS9710#

トラフィックジェネレータテスト

これは、長期のフルラインレートテストです。最大3600秒（1時間）

2.1サイドB（リフレクタ）

2.1.1：使用するインターフェイスをシャットダウンする

2.1.2 - diagnostic isl reflector traffic_test link_speed 32G loop-back interface fc6/1 enable

2.2サイドA（ジェネレータ）

2.2.1：使用するインターフェイスをシャットダウンする

2.2.2 - diagnostic isl generator interface fc9/1 start duration 3600 rate 100% frame_size min 16 max 517 step 100 link_speed 32g

これは、32Gのフルラインレートで1時間稼働します。

ラボスイッチの内容は次のとおりです。

F241-15-09-MDS9710# diagnostic isl generator interface fc9/1 start duration 3600 rate 100% frame_size min 16 max 517 step 100 link_speed 32g

Waiting for sync to be achieved on the link ....

Link initialized successfully. Starting the test.

F241-15-09-MDS9710#

When it end there is no message but you can see the frames on the ports:

F241-15-10-9706-2# show int fc6/1 | i fc|rate

fc6/1 is down (Administratively down)

5 minutes input rate 5754800992 bits/sec,719350124 bytes/sec, 666558 frames/sec

5 minutes output rate 5754800512 bits/sec,719350064 bytes/sec, 666558 frames/sec

F241-15-10-9706-2#

F241-15-10-9706-2# show int fc6/1 counters details | i i fc|fec|crc

fc6/1

0 invalid CRCs, 0 Delimiter Errors

regardless of the CRC/FCS error

CRC/FCS error

7262 fec corrected blocks

0 fec uncorrected blocks

F241-15-10-9706-2#

インターフェイスカウンタをクリアし、各リンクで1時間実行することを推奨します。次に、上記のCRCおよびFEC情報を両側で取得します。

インターフェイスカウンタの問題をクリアするには、clear counters interface allを使用します。

スケジューラジョブの設定

上記のトラフィックジェネレータのテストは、最大1時間実行されます。24時間のように長く実行するには、スケジューラジョブを設定します。

スケジューラを設定する必要があります。次の2つの部分があります。

- スケジューラジョブ

- スケジューラスケジュール

スケジューラジョブは、スケジューラスケジュールの実行内容を設定する場所で、ジョブの実行時期を設定する場所です。このスケジュールは、スケジュールを削除するまで実行されます。手動で停止する簡単な方法はありません。

インターフェイスをファブリック内のインターフェイスに置き換える必要があります。

ジョブの設定に誤りがある場合は、ジョブを削除してから再起動する必要があります。変更に戻ることはできません。

ジェネレータ側では、ジェネレータが初めて実行されるため、ジェネレータの停止が発生し、エラーが発生する場合がありますが、問題は発生しません。次に走る時は良いはずです。

スクリプトは次のとおりです。

Generator:

---------

shutdown fc1/42

feature scheduler

scheduler logfile size 1024

clear counters interface fc1/42

clear scheduler logfile

scheduler job name stats

diagnostic isl generator interface fc1/42 stop

show interface fc1/42 counters details | i i fc|fec|crc

show interface fc1/42 counters | i i fc|rate

diagnostic isl generator interface fc1/42 start duration 3600 frame_size min 64 max 517 step 1 link_speed 32G

exit

scheduler schedule name test

job name stats

time start +00:01:00 repeat 00:01:00

exit

Reflector:

---------

shutdown fc7/1

feature scheduler

scheduler logfile size 1024

clear counters interface fc7/1

clear scheduler logfile

diagnostic isl reflector traffic_test link_speed 32G loop-back interface fc7/1 enable

scheduler job name stats

show interface fc7/1 counters details | i i fc|fec|crc

show interface fc7/1 counters | i i fc|rate

exit

scheduler schedule name test

job name stats

time start +00:01:00 repeat 00:01:00

exit

At the end of 24 hours, please remove the scheduler schedule to stop it at both generator and reflector sides:

no scheduler schedule name test

You can collect the scheduler logfile which will contain all the output of the tests and the show command:

show scheduler logfile | no-more

追加コマンド:

- show logging onboard status

- show logging onboard module <module number>

- show logging onboard stack-trace

- show logging onboard mem-leak

- show logging onboard error-stats

- show logging onboard exception-log

- show logging onboard error-stats

- show logging onboard environmental history