はじめに

このドキュメントでは、Cisco Intersightを使用してCisco Nutanix HCIクラスタのファームウェアアップグレードを実行する手順について説明します。

バックグラウンド情報

ISM/IMMクラスタのファームウェアを修復する場合は、ライフサイクルマネージャ(LCM)を使用することをお勧めしますが、不具合やField Notice(FN)が発生した場合など、特定のシナリオでは、アップグレードまたはダウングレードのために特定のバージョンを選択する必要があります。この場合、Intersightを介してファームウェアの変更を適用できます。

LCMプロセスとは異なり、オフラインアップグレードでは、ホストごとにファームウェアの編集とパッチ適用を手動で行う必要があります。これらのアクションを実行する前に、クラスタのワークロードとキャパシティを理解する必要があります。

ユーザは手動でホストをメンテナンスモードに設定し、Intersightを介してファームウェアの変更を適用した後、メンテナンスモードを終了します。これは、クラスタ内のノードごとに繰り返されます。

ヒント：クラスタで同時に見つからないノードの数に耐えられる数の詳細については、Nutanixのドキュメント『Cluster Fault Tolerance』を参照してください。

手動アップグレード手順の概要

1. 新しいファームウェアバージョンで各ファームウェアポリシーを編集します。

2. ファームウェアをステージングするために、即時に再起動せずにすべてのプロファイルを展開します。

3. Prism ElementまたはPrism Centralを介して、メンテナンスモードにシングルノードを配置します。

4. メンテナンスモードでサーバのプロファイルをアクティブにして、サーバの電源を再投入し、ファームウェアを適用します。

5. クラスタ内のすべてのノードに対して、手順3と4を繰り返します。

6. アップグレードが完了し、クラスタが正常であることを確認する

ファームウェアポリシーの変更

Intersightはファームウェアポリシーによってファームウェアをプッシュします。各ノードには独自のポリシーがあり、これらのポリシーを編集することで新しいバージョンが選択されます。

ファームウェアポリシー名の構文はntnx_firmware_<Serial Number>_<Deployment UUID>です。

ポリシーの検索と編集

Policiesに移動し、Filters > Check Firmwareの順にクリックします。

変更するポリシーを選択し、editをクリックします。

ドロップダウンリストから目的のファームウェアバージョンを選択し、[保存して展開]をクリックします。

ファームウェアのステージング

サーバプロファイルを再導入する場合は、Reboot Immediatelyオプションのチェックマークをはずします。これにより、ブレードに新しいファームウェアがステージングされます。変更は、次の電源の再投入後にのみ実行されます。

導入を開始したら、次の作業を行います。

- 新しいワークフローが「リクエスト」タブに表示されます。

- ファームウェアのダウンロードが開始されます。

- 即時にリブートせずにサーバを導入すると、サーバプロファイルにInconsistentステータスが表示されます。これは、プロファイルがアクティブになるまで必要です。

その他のポリシーのファームウェアの編集を続行し、即時リブートを行わずに展開します。

Prism CentralまたはPrism Elementを介してサーバをメンテナンスモードにする

中断を回避するには、サーバをメンテナンスモードにして、再起動の前にワークロードを移行する必要があります。

貫通プリズム要素

1. Hardware > Diagramの順に選択します。

2. AHV#を選択します。

3. [メンテナンスモードに入る]を選択します。

貫通プリズムセントラル

1. Infrastructure > Hardware > Clustersの順に移動します。

2. Clusterを選択します。

3. 特定のノードを選択してメンテナンスモードに切り替えます。

プロファイルのアクティブ化とファームウェアのプッシュ

ホストがメンテナンスモードになると、ファームウェアをノードにプッシュできます

1. Profilesタブに移動します。

2. メンテナンスモードで、シリアル番号を使用してサーバのプロファイルを見つけます。

3. Actions > Activateの順に選択します。

（オプション）KVMコンソールからファームウェアのアップグレードの進行状況を監視します。

アップグレードの確認とメンテナンスモードの終了

アクティブ化が完了すると、サーバプロファイルのステータスがOKに移行します。

これで、ノードをメンテナンスモードから外すことができます。

すべてのプロファイルに[OK]ステータスが表示されるまで、残りのノードに対してこのプロセスを繰り返します。

クラスタの健全性の確認

PrismでCluster Resiliency がOKになっていることを確認します。

関連情報

Cisco UCSハードウェア互換性リスト

Nutanixプラットフォームの互換性と相互運用性マトリクス

KB-15110 LCM事前チェック：test_cisco_validate_credentials_and_setup

Perform Cisco Nutanix HCI Cluster Offline Upgrade Through Intersight

## Introduction

This document describes the process to manually perform an offline firmware upgrade for Cisco Nutanix HCI clusters using Cisco Intersight when LCM is not used.

## Background Information

While it is recommended to use Life Cycle Manager (LCM) when remediating firmware for ISM/IMM Clusters, specific scenarios—such as hitting a bug or Field Notice (FN)—may require selecting a specific version for an upgrade or downgrade. In these cases, firmware changes can be applied through Intersight.

Unlike the LCM process, an offline upgrade requires editing and patching firmware on a per-host basis. It is mandatory to understand the workload and capacity of the cluster before performing these actions. During this process, the user manually places the host in Maintenance Mode, applies the firmware change via Intersight, and then exits Maintenance Mode. This is repeated for each node in the cluster.

## Manual Upgrade Steps at a Glance

1. Edit the Firmware Policy with the new firmware version.

2. Deploy all profiles without an immediate reboot to stage the firmware.

3. Place the node in Maintenance Mode via Prism Element or Prism Central.

4. Activate the profile for the server in Maintenance Mode to power cycle the server and apply firmware.

5. Repeat steps 3 and 4 for all nodes in the cluster.

## Modify Firmware Policies

Intersight pushes firmware through a Firmware Policy. Each node has its own policy, and new versions are selected by editing these policies.

The syntax for the firmware policy name is: `ntnx_firmware_

_

`

### Locate and Edit Policies

1. Navigate to **Policies** > Click **Filters** > **Type** > Check **Firmware**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image.png)

2. Select the Policy and click **Edit**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%201.png)

3. Select the desired firmware version from the drop-down list and click **Save & Deploy**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%202.png)

### Stage the Firmware

When redeploying the server profile, ensure the **Reboot Immediately** option is **unchecked**. This stages the new firmware on the blade; the change is only executed after the next power cycle. This method saves time by staging firmware across all nodes simultaneously.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%203.png)

Once deployment starts:

* A new workflow appears in the **Requests** tab.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%204.png)

* The firmware download is initiated.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%205.png)

* After the server is deployed without an immediate reboot, the Server Profile will show an **Inconsistent** status. This is expected until the profile is activated.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%206.png)

## Place Servers in Maintenance Mode Through Prism Central or Prism Element

To avoid disruption, servers must be placed into Maintenance Mode to migrate workloads before the reboot.

### Using Prism Element

1. Navigate to **Hardware** > **Diagram**.

2. Select the **AHV#**.

3. Select **Enter Maintenance Mode**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%207.png)

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%208.png)

### Using Prism Central

1. Navigate to **Infrastructure** > **Hardware** > **Clusters**.

2. Select the **Cluster**.

3. Select the specific **Node** to place it in Maintenance Mode.

## Activate Profiles and Push Firmware

Once the host is in Maintenance Mode, you can push the firmware.

1. Navigate to the **Profiles** tab.

2. Locate the profile of the server in Maintenance Mode using its Serial Number.

3. Select **Actions** > **Activate**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%209.png)

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2010.png)

4. (Optional) Monitor the firmware upgrade progress through the KVM console.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2011.png)

## Verify Upgrade and Exit Maintenance Mode

Once the activation is complete:

1. The Server Profile status transitions to **OK**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2012.png)

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2013.png)

2. The node can now be taken out of Maintenance Mode.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2014.png)

3. Repeat the process for the remaining nodes until all profiles show an **OK** status.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2015.png)

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2016.png)