内容

概要

前提条件

USRM/VRSMインスタンスを終了してから整合性チェックを無効にする

ユーティリティをダウンロードしています。

RedHat/Linuxのコマンド

ESXiの手順

VMware ESXi 5.xへのインストール

VMware Vsphereのコマンド

概要

このドキュメントでは、厳密な入出力(I/O)要件を持つ一部のアプリケーションに悪影響を及ぼす可能性があるLSI RAIDコントローラのRedundant Array of Individual Disks(RAID)コントローラ整合性チェックを無効にする手順について説明します。 このような要求の厳しいI/O要件を持つアプリケーションのグループがUniversal SessionとResource Manager/Videoscape Session Resource Manager(USRM/VSRM)になった場合、整合性チェックの実行中に発生する可能性のあるI/O待機の影響を無効にすることをお勧めします。 CSCuw01134を参照してください

前提条件

Cisco Unified Computing System(UCS)M3ラックサーバ（LSI 92XXモデルのRAIDコントローラ搭載）

整合性チェックを無効にするには、USRM/VSRMアプリケーションのメンテナンスウィンドウが必要です。

USRM/VRSMインスタンスを終了してから整合性チェックを無効にする

UCS C220には、最大8つのUSRM/VSRMインスタンスがあります。  整合性チェックを無効にする手順を実行する前に、各インスタンスを終了する必要があります。  整合性チェック手順が完了したら、各インスタンスを手動で再起動する必要があります。

注：次の2つのプロセスは、個々の顧客システム/要件に関して記述された高度なMethod of Procedure(MOP)に含める必要があります。  以下に、いくつかの例を示します。MOPには、サーバのフェールオーバーとフェールバックの調整が含まれ、お客様への影響を最小限に抑えることができます。  MOPでは、お客様ごとに異なる要件に対応できます。

USRM/VSRMソフトウェアを終了するには、次の手順を実行します。  注：USRM/VSRMの各インスタンスに対して、次の手順を実行する必要があります。

1. ブラウザでUSRM/VSRM Webユーザインターフェイス(UI)を開きます

2. [Reset]ページに移動します

3. ドロップダウンボックスを使用して、[ServerState]を[Terminate]に設定します。

4. [Commit Changes] ボタンをクリックします。

Result:USRM/VSRMソフトウェアは終了し、再起動しません。

整合性チェックを無効にするプロセスが完了したら、USRM/VSRMの各インスタンスを手動で開始する必要があります。  USRM/VSRMの各インスタンスで次の手順を実行します。

1. USRM/VSRMへのオープンおよびSSHセッション。

2. 適切なディレクトリに移動します

1. USRMの場合：/opt/usrm

2. VSRMの場合：/common/usrm

3. 次のコマンドを実行して、USRM/VSRMを起動します。  ./usrm —<オプション（自動または監視）> -d

1. 監視モードの例：./usrm – 監視される – d

2. 自動モードの例：./usrm —auto -d

注：オプションの前には2つのダッシュがあり、「d」パラメータの前には1つのダッシュがあります。

Result:USRM/VSRMソフトウェアは要求の処理を開始および開始します。

ユーティリティをダウンロードしています。

StorCliユーティリティhttp://docs.avagotech.com/docs/12351437をダウンロードします。

StorCLIのzipファイルには、異なるオペレーティング・システム(OS)プラットフォーム用のインストール・ファイルを含むフォルダがあります。

RedHat Linuxへのインストール

zipファイルの/StorCli_All_OS/Linux/フォルダからstorcli rpmファイルを抽出し、インストールします。

# rpm -ivh <StorCLI-x.xx-x.noarch.rpm>

RedHat/Linuxのコマンド

Change to the folder where storcli64 executable file was installed to, typically /opt/MegaRAID/storcli/

#cd /opt/MegaRAID/storcli

Check to make sure no consistency checks are currently in progress

storcli]#./storcli64 /c0 /vall show cc

VD Operation Progress% Status

---------------------------------------

0 CC - Not in progress <<<<<<<<<<<

1 CC - Not in progress <<<<<<<<<<<

From the output above, if any of the VDs show anything other than ‘Not in progress’, then issue the command to stop any consistency checks running:

./storcli64 /c0/vall stop cc

Issue the command to disable consistency checks from being run in the future:

./storcli64 /c0 set cc=off

Confirm that consistency checks have been disabled:

./storcli64 /c0 show cc

Controller Properties :

=====================

-----------------------------------------------

Ctrl_Prop Value

-----------------------------------------------

CC Operation Mode Disabled <<<<<<<<<<<<<<<<

CC Execution Delay 0

CC Next Starttime 06/20/1999, 19:00:00

CC Current State Stopped

CC Number of iterations 0

CC Number of VD completed 0

CC Excluded VDs None

Confirm the CC Operation Mode line shows ‘Disabled’

ESXiの手順

Vmware ESXi環境で整合性チェックを無効にする必要がある状況では、StorCLIユーティリティのインストールプロセスは異なりますが、storcliコマンドの構文は同じです。 vSphereでは、セキュアシェル(SSH)はデフォルトで無効になっています。ホストでSSHターミナルを開く前に、SSHを有効にする必要があります。

VMware ESXi 5.xへのインストール

zipファイル内の/StorCli_All_OS/Vmware-MN/フォルダからvmware-esx-storcli-xxxxxx.vibファイルを抽出/コピーします。

vmware-esx-storcli-xxxxxx.vibファイルをESXiホストのローカルファイルシステムに/tmpフォルダにコピーします。

次に、esxcliコマンドを実行してインストールします。

#esxcli software vib install -v "/tmp/vmware-esx-storcli-xxxxxx.vib" -no-sig-check

VMware Vsphereのコマンド

Change to the folder where the Storcli executable was installed to, typically /opt/lsi/storcli

#cd /opt/lsi/storcli

Please note the ESXi storcli executable is storcli

Check to make sure no consistency checks are currently in progress

storcli]#./storcli /c0 /vall show cc

VD Operation Progress% Status

---------------------------------------

0 CC - Not in progress <<<<<<<<<<<

1 CC - Not in progress <<<<<<<<<<<

From the output above, if any of the VDs show anything other than ‘Not in progress’, then issue the command to stop any consistency checks running:

./storcli /c0/vall stop cc

Issue the command to disable consistency checks from being run in the future:

./storcli /c0 set cc=off

Confirm that consistency checks have been disabled:

./storcli /c0 show cc

Controller Properties :

=====================

-----------------------------------------------

Ctrl_Prop Value

-----------------------------------------------

CC Operation Mode Disabled <<<<<<<<<<<<<<<<

CC Execution Delay 0

CC Next Starttime 06/20/1999, 19:00:00

CC Current State Stopped

CC Number of iterations 0

CC Number of VD completed 0

CC Excluded VDs None

Confirm the CC Operation Mode line shows ‘Disabled’