内容

はじめに

前提条件

要件

使用するコンポーネント

背景説明

コンフィギュレーション

確認

よく寄せられる質問（FAQ）

既知の障害

はじめに

このドキュメントでは、Cisco ISEでのポスチャリースの設定と動作について説明します。

前提条件

要件

- Cisco ISEのポスチャフローに関する知識

- Cisco ISEのAAAポリシーに関する知識

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づいています。

- Cat9300スイッチバージョン17.9.5

- Identity Service Engine(ISE)v3.2

- ISEポスチャモジュール5.1.6を搭載したPC Windows 10 Enterprise

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、クリアな（デフォルト）設定で作業を開始しています。本稼働中のネットワークでは、各コマンドによって起こる可能性がある影響を十分確認してください。

背景説明

ポスチャリースはCisco ISEの機能で、最新の既知のコンプライアンスステータスを最大365日までDBに保存し、エンドポイントにアクセスしてコンプライアンスを確認しません。 ただし、ポスチャリースが期限切れになっても、Cisco ISEはエンドポイントの再認証やポスチャ再評価を自動的にトリガーしません。同じセッションが使用されているため、エンドポイントは同じコンプライアンス状態のままです。エンドポイントの再認証時に、ポスチャが実行され、ポスチャリース時間がリセットされます。

ポスチャリースは、Oracle DBに格納されるエンドポイント属性で、時刻をEPOCH時間で格納します。同じことは、コンテキストの可視性とOracle DBから検証できます。

ポスチャリースに加えて、最後の既知のポスチャ準拠の状態で設定された設定可能な期間(最大200日/4800時間/288000分)の最後の既知のコンプライアンスステータスをキャッシュする、ISEのもう1つの機能があります。この機能により、Cisco ISEは最後のコンプライアンスステータスをキャッシュできます。エンドポイントが最後の既知のポスチャ準拠の状態で非準拠になると、ISEはポスチャポリシーで設定された猶予期間が経過するまでそのエンドポイントを準拠としてマークします。

Last Known Posture Compliant State値はOracle DBに保存されます。また、EPOCH時間で保存されます。

コンフィギュレーション

Cisco ISEでポスチャリースを設定するには、次の手順を実行します。

Work Centers > Posture > Settings > Posture Leaseの順に移動します。 Perform posture assessment everyチェックボックスをオンにして、number of Day(s)（1 ～ 365日）を設定します。 ここでは、1日に設定されています。

Cache Last Known Posture Compliantステータスを確認し、Last Known Posture Compliant状態時間(最大200日 / 4800時間/ 288000分)を設定します。 ここでは、2日間に設定されています。

簡素化のため、1つのポスチャポリシー（Windows FWチェック）のみが2分の猶予期間で有効になっています。

確認

エンドポイントは初めて接続され、準拠しています。

ISE-PSC.log（デバッグでのポスチャ）

ise-psc.logでは、EPが初めて接続されるため、データベースに有効期限がないことがわかります。

2024-11-30 22:55:08,485 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-8][[]] cisco.cpm.posture.runtime.PostureManager -:08C9C50A000000147BE04019::::- posture expriy time retrieved from DB is "" for B4-96-91-26-EB-A1

2024-11-30 22:55:08,485 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-8][[]] cisco.cpm.posture.runtime.PostureManager -:08C9C50A000000147BE04019::::- PostureExpiry value for B4-96-91-26-EB-A1 is not a number :

EPはポスチャチェックプロセスを経て、準拠になります。EPが準拠すると、ISEは有効期限を1日(1733073953816)としてDBを更新します。

2024-11-30 22:55:55,306 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-1][[]] cisco.cpm.posture.runtime.PostureManager -:08C9C50A000000147BE04019:alice:::- posture_bypass_test is null fast reconnect expiry time is1733073953816 2024-12-01T22:55:54.306+0530

2024-11-30 22:55:55,307 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-1][[]] cisco.cpm.posture.runtime.PostureManager -:08C9C50A000000147BE04019:alice:::- updating fast reconnect for end point B4:96:91:26:EB:A1 with 1 days of expiry time1733073953816 <------Updating posture lease in DB (EDF_POSTUREEXPIRY)

2024-11-30 22:55:55,307 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-1][[]] cisco.cpm.posture.runtime.PostureHandlerImpl -:08C9C50A000000147BE04019:alice:::- updated posutre lease for session 08C9C50A000000177E20CE15

また、ISEは猶予期間の有効期限1733160354306（2日）でDBを更新します。

2024-11-30 22:55:55,306 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-1][[]] cisco.cpm.posture.edf.PostureUdid -:08C9C50A000000147BE04019:alice:::- Starting new thread for updateGracePeriodTime

2024-11-30 22:55:55,306 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-1][[]] cisco.cpm.posture.runtime.GracePeriodManager -:08C9C50A000000147BE04019:alice:::- remove user from expiry list

2024-11-30 22:55:54,306 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-1][[]] cisco.cpm.posture.runtime.GracePeriodUtil -:08C9C50A000000147BE04019:alice:::- updating grace period for device with udid: 6d8a638f9acadd2851a6cd7eae947060a898ebc1 , maclist: [B4:96:91:26:EB:A1], <---- grace period expiry time 1733160354306 <----------- Updating last known compliance status in DB (LAST_COMP_EXPIRY)

EPを再接続すると、セッションは直接Complaintになります。ポスチャリースが有効になると、ISEはDBからポスチャ有効期限を取得し、セッションを準拠としてマークします。

2024-11-30 23:04:17,673 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- Posture status in session is not compliant

2024-11-30 23:04:17,673 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- fast reconnect is enabled

2024-11-30 23:04:17,677 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- Querying posture expiry time by MAC B4-96-91-26-EB-A1

2024-11-30 23:04:17,679 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.runtime.PostureManager -:::::- posture expriy time retrieved from DB is "1733073953816" for B4-96-91-26-EB-A1

2024-11-30 23:04:17,679 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.runtime.PostureManager -:::::- posture lease expiry time 1733073953816 2024-12-01T22:55:53.816+0530 for B4-96-91-26-EB-A1

2024-11-30 23:04:17,679 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- retrieved fast reconnect expiry time 1733073953816 2024-12-01T22:55:53.816+0530 for B4-96-91-26-EB-A1

2024-11-30 23:04:17,679 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- B4-96-91-26-EB-A1 is within fast reconnect expiry

2024-11-30 23:04:17,680 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.runtime.PosturePolicyUtil -:::::- User null belongs to groups NAC Group:NAC:IdentityGroups:Endpoint Identity Groups:Profiled:Workstation,NAC Group:NAC:IdentityGroups:Any

2024-11-30 23:04:17,680 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- PostureStatusPIP for mac B4-96-91-26-EB-A1 - Attribute Session.PostureStatus value is Compliant

シナリオ1:ポスチャのリースを無効にし、最後の既知のポスチャ準拠の状態で最後の既知のポスチャ準拠のステータスのキャッシュを有効にする（デフォルトは無効）は2日です。(このシナリオは、ポスチャリースが期限切れになり、EPがその後に接続する場合にも有効です)。

EPが認証した後、ポスチャリースが有効になっていないため、ISEがポスチャチェックを実行します。

2024-12-01 18:39:50,901 DEBUG [PolicyEngineEvaluationThread-3][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- Posture status in session is not compliant

2024-12-01 18:39:50,901 DEBUG [PolicyEngineEvaluationThread-3][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- fast reconnect is not enabled. Posture status retrieved from LSD for B4-96-91-26-EB-A1 is Unknown

2024-12-01 18:39:50,901 DEBUG [PolicyEngineEvaluationThread-3][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- PostureStatusPIP for mac B4-96-91-26-EB-A1 - Attribute Session.PostureStatus value is Unknown

EPが準拠した後、ISEは猶予期間の有効期限1733231423117（2日）内にDBを更新します。

2024-12-01 18:40:23,116 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-3][[]] cisco.cpm.posture.edf.PostureUdid -:08C9C50A000000227EB700E6:alice:::- Starting new thread for updateGracePeriodTime

2024-12-01 18:40:23,117 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-3][[]] cisco.cpm.posture.runtime.GracePeriodManager -:08C9C50A000000227EB700E6:alice:::- remove user from expiry list

2024-12-01 18:40:23,117 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-3][[]] cisco.cpm.posture.runtime.GracePeriodUtil -:08C9C50A000000227EB700E6:alice:::- updating grace period for device with udid: 6d8a638f9acadd2851a6cd7eae947060a898ebc1 , maclist: [B4:96:91:26:EB:A1], grace period expiry time 1733231423117 <--------------Updating last known compliance status in DB (LAST_COMP_EXPIRY)

2024-12-01 18:40:23,117 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-3][[]] cisco.cpm.posture.edf.PostureUdid -:08C9C50A000000227EB700E6:alice:::- Starting new thread for updateLastCompExpiryTime [B4:96:91:26:EB:A1], grace period expiry time 1733057867397

現在、EPは非苦情になります。

ポスチャポリシーと同様に、Windows FWだけがチェックされます。Windows FWをディセーブルにして、EPを再接続します。

EPは非準拠になりますが、ポスチャポリシーで2分間の猶予期間が設定されています。このため、ACポスチャモジュールはIn grace periodのステータスを示しています。

RADIUSライブログで、ポスチャチェックが失敗した場合でもEPが準拠としてマークされていることが確認できます。猶予期間が終了した後、セッションは非準拠になりました。

ise-psc.logでは、リースが有効になっていないためEPが接続するときに、LSDをチェックしてポスチャステータスを取得したことが確認できます。

2024-11-30 23:26:16,482 DEBUG [PolicyEngineEvaluationThread-16][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- Posture status in session is not compliant

2024-11-30 23:26:16,482 DEBUG [PolicyEngineEvaluationThread-16][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- fast reconnect is not enabled. Posture status retrieved from LSD for B4-96-91-26-EB-A1 is Unknown

2024-11-30 23:26:16,483 DEBUG [PolicyEngineEvaluationThread-16][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- PostureStatusPIP for mac B4-96-91-26-EB-A1 - Attribute Session.PostureStatus value is Unknown

ポスチャチェックが実行され、EPに対して失敗します。その後、ISEはDBを確認して、1733160354306（2日）であるlastCompliantExpiry値を取得します。

2024-11-30 23:27:19,123 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-10][[]] cisco.cpm.posture.runtime.PostureHandlerImpl -:08C9C50A000000147BE04019:alice:::- Last compliant expiry period for device with mac: 6d8a638f9acadd2851a6cd7eae947060a898ebc1 has not expired lastCompliantExpiry: 1733160354306.

lastCompliantExpiryは引き続き有効であるため、2分に設定されているポスチャポリシーで設定されている猶予期間をさらに確認します。

2024-11-30 23:27:19,123 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-10][[]] cisco.cpm.posture.runtime.PostureHandlerImpl -:08C9C50A000000147BE04019:alice:::- handleGracePeriod - calculateGracePeriod: B4-96-91-26-EB-A1.

2024-11-30 23:27:19,544 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-10][[]] cisco.cpm.posture.runtime.PostureHandlerImpl -:08C9C50A000000147BE04019:alice:::- calculateGracePeriod - matched policy: Default_Firewall_Policy_Win with grace period: 2 for mac: B4-96-91-26-EB-A1

2024-11-30 23:27:19,544 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-10][[]] cisco.cpm.posture.runtime.PostureHandlerImpl -:08C9C50A000000147BE04019:alice:::- calculateGracePeriod - grace period is: 2 for mac: B4-96-91-26-EB-A1

2024-11-30 23:27:19,546 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-10][[]] cisco.cpm.posture.runtime.GracePeriodManager -:08C9C50A000000147BE04019:alice:::- Added user with mac B4-96-91-26-EB-A1 udid 6d8a638f9acadd2851a6cd7eae947060a898ebc1 grace period list with an expiration time of 2024/11/30 23:29:19 and startTime of 2024/11/30 23:27:19 <---------------- Updating the Grace period in DB (LAST_GRACE_EXPIRY)

2024-11-30 23:27:19,546 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-10][[]] cisco.cpm.posture.runtime.PostureHandlerImpl -:08C9C50A000000147BE04019:alice:::- handleGracePeriod - device with mac: B4-96-91-26-EB-A1 - has grace period: 2 mins.

2024-11-30 23:27:19,546 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-10][[]] cisco.cpm.posture.runtime.PostureHandlerImpl -:08C9C50A000000147BE04019:alice:::- Device with session id: 08C9C50A0000001A7E3D5087, client mac: B4-96-91-26-EB-A1 - has grace period: 2. Marking posture status as compliant

猶予期間が終了すると、ACモジュールは障害レポートをISEに送信します。ISEはDBで猶予期間を確認して期限切れになったことを検出し、そのセッションを不服としてマークし、DBからLastCompExpiryTimeとGracePeriodTimeを削除します。

2024-11-30 23:29:23,289 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-4][[]] cisco.cpm.posture.runtime.GracePeriodManager -:08C9C50A000000177E20CE15:alice:::- value from cache 1732989439545 and db 1732989439545

2024-11-30 23:29:23,289 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-4][[]] cisco.cpm.posture.runtime.GracePeriodManager -:08C9C50A000000177E20CE15:alice:::- getGracePeriodAndUpdate - StartTime 1732989439545

2024-11-30 23:29:23,289 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-4][[]] cisco.cpm.posture.runtime.GracePeriodManager -:08C9C50A000000177E20CE15:alice:::- Calculated the GracePeriod exp in min 0

2024-11-30 23:29:23,289 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-4][[]] cisco.cpm.posture.runtime.PostureHandlerImpl -:08C9C50A000000177E20CE15:alice:::- GracePeriod value is 0 and removeUser

2024-11-30 23:29:23,289 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-4][[]] cisco.cpm.posture.edf.PostureUdid -:08C9C50A000000177E20CE15:alice:::- Starting new thread for updateGracePeriodTime

2024-11-30 23:29:23,289 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-4][[]] cisco.cpm.posture.runtime.GracePeriodManager -:08C9C50A000000177E20CE15:alice:::- remove user from expiry list

2024-11-30 23:29:23,289 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-4][[]] cisco.cpm.posture.edf.PostureUdid -:08C9C50A000000177E20CE15:alice:::- Starting new thread for updateLastCompExpiryTime

2024-11-30 23:29:23,289 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-4][[]] cisco.cpm.posture.edf.PostureUdid -:08C9C50A000000177E20CE15:alice:::- Starting new thread for updateGracePeriodTime

EPが再接続して非準拠になると、ISEはポスチャポリシーの猶予期間を受け入れません。これは、Last compliant期間がすでに期限切れになっており、セッションが非準拠として直接更新されるためです。

2024-12-01 00:49:40,004 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-6][[]] cisco.cpm.posture.runtime.PostureHandlerImpl -:08C9C50A000000177E20CE15:alice:::- handleGracePeriod - Last compliant period expired for device with mac: B4-96-91-26-EB-A1.

シナリオ2:ポスチャのリースをキャッシュの最後の既知のポスチャ準拠ステータスとともに無効にします。

この場合、デフォルトでは、ISEはlastCompliantexception時間を365日(DB)に更新します。

ポスチャリースが有効になっていないと、ポスチャチェックが発生し、ISEがlastCompliant有効期限をDBで365日に更新した後でEPが苦情を申し立てます。

2024-12-01 00:58:17,191 DEBUG [PolicyEngineEvaluationThread-12][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- Posture status in session is not compliant

2024-12-01 00:58:17,191 DEBUG [PolicyEngineEvaluationThread-12][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- fast reconnect is not enabled. Posture status retrieved from LSD for B4-96-91-26-EB-A1 is Unknown

2024-12-01 00:58:17,191 DEBUG [PolicyEngineEvaluationThread-12][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- PostureStatusPIP for mac B4-96-91-26-EB-A1 - Attribute Session.PostureStatus value is Unknown

2024-12-01 00:58:56,722 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-10][[]] cisco.cpm.posture.runtime.PostureHandlerImpl -:08C9C50A000000147BE04019:alice:::- handleGracePeriod - Device is compliant. Removing device with mac: B4-96-91-26-EB-A1 from grace period map

2024-12-01 00:58:56,723 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-10][[]] cisco.cpm.posture.runtime.GracePeriodUtil -:08C9C50A000000147BE04019:alice:::- Last cache time period is not set, setting lastCompliant expiry time to 365 days

2024-12-01 00:58:56,723 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-10][[]] cisco.cpm.posture.runtime.GracePeriodUtil -:08C9C50A000000147BE04019:alice:::- updating grace period for device with udid: 6d8a638f9acadd2851a6cd7eae947060a898ebc1 , maclist: [B4:96:91:26:EB:A1], grace period expiry time 1764530936723 <------------Updating last known compliance status in DB (LAST_COMP_EXPIRY)

2024-12-01 00:58:56,723 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-10][[]] cisco.cpm.posture.edf.PostureUdid -:08C9C50A000000147BE04019:alice:::- Starting new thread for updateLastCompExpiryTime

シナリオ3：ライトセッションディレクトリ(LSD)のポスチャリースへの影響。

LSDを有効または無効にしても、ポスチャリースと最後のコンプライアンスステータスの両方の属性がOracle DBに保存され、導入環境全体で複製されるため、影響はありません。一方、LSDは限られたEP属性をメモリに保存し、他のPSNに複製します。

LSDが有効な場合：

LSDを有効にするには、Administration > System > Settings > Light Data Distribution > Check RADIUS Session Directoryの順に選択します。

EPは初めて接続し、ポスチャチェックを通過します。EPが準拠すると、ポスチャリースとDBの最後の既知のコンプライアンス属性が更新されます。

2024-12-02 19:36:43,274 DEBUG [PolicyEngineEvaluationThread-11][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- fast reconnect is enabled

2024-12-02 19:36:43,276 WARN [PolicyEngineEvaluationThread-11][[]] cisco.cpm.posture.runtime.PostureManager -:::::- Cannot find endpoint B4-96-91-26-EB-A1 in end point DB

2024-12-02 19:36:43,276 INFO [PolicyEngineEvaluationThread-11][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- not able to find user name in posture pip for B4-96-91-26-EB-A1 08C9C50A0000002B87B7D6EC. Set posture status to unknown

2024-12-02 19:37:27,164 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-5][[]] cisco.cpm.posture.runtime.PostureManager -:08C9C50A000000227EB700E6::::- posture expriy time retrieved from DB is "" for B4-96-91-26-EB-A1

2024-12-02 19:37:29,110 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-6][[]] cisco.cpm.posture.runtime.GracePeriodUtil -:08C9C50A0000002B87B7D6EC:alice:::- updating grace period for device with udid: 6d8a638f9acadd2851a6cd7eae947060a898ebc1 , maclist: [B4:96:91:26:EB:A1], grace period expiry time 1733321249110 <--------------------Updated last known compliance status in DB

2024-12-02 19:37:29,113 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-6][[]] cisco.cpm.posture.runtime.PostureManager -:08C9C50A0000002B87B7D6EC:alice:::- posture_bypass_test is null fast reconnect expiry time is 1733234849113 2024-12-03T19:37:29.113+0530

2024-12-02 19:37:29,113 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-6][[]] cisco.cpm.posture.runtime.PostureManager -:08C9C50A0000002B87B7D6EC:alice:::- updating fast reconnect for end point B4:96:91:26:EB:A1 with 1 days of expiry time 1733234849113 <------Updated posture lease in DB

これらは、PSN全体に配布されるLSDの属性です。属性には、ポスチャリースも最後のコンプライアンスステータスも表示されません。

2024-12-02 19:37:32,221 DEBUG [LSD-consumers-pool-28][[]] cisco.cpm.lsd.service.SessionDirectory -:::::- Updating session sessionID:[08C9C50A0000002B87B7D6EC] status:[Authenticated] randomId:[0352b361-e72a-40e7-a0c8-b1ef779f73a5] auditSessionID:[08C9C50A0000002B87B7D6EC] accountingSessionID:[null] endpointMAC:[B4-96-91-26-EB-A1] callingStationId: [B4-96-91-26-EB-A1] endpointIP:[10.197.201.180], IPv6 : [[]], psnIP:[10.127.197.170] psnFQDN: [labpsn01.vmlab.local] deviceIP:[10.197.201.8] destinationIP:[10.127.197.170] nasIP:[10.197.201.8] nasIPv6:[null] postureStatus: [Compliant] timeStamp:[1733148451] cts:security-group-tag:[7] cts:vn:[null] proxyFlow:[null] retry count : 1

次に、展開内の別のPSNでEPを認証します。

認証要求が別のPSNに到着すると、PSNがポスチャリース時間をDBから取得し、セッションを準拠として直接マークすることがわかります。ライブログでも確認できます。

2024-12-02 20:08:27,449 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- Posture status in session is not compliant

2024-12-02 20:08:27,449 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- fast reconnect is enabled

2024-12-02 20:08:27,468 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- Querying posture expiry time by MAC B4-96-91-26-EB-A1

2024-12-02 20:08:27,471 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.runtime.PostureManager -:::::- posture expriy time retrieved from DB is "1733234849113" for B4-96-91-26-EB-A1

2024-12-02 20:08:27,471 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.runtime.PostureManager -:::::- posture lease expiry time 1733234849113 2024-12-03T19:37:29.113+0530 for B4-96-91-26-EB-A1

2024-12-02 20:08:27,472 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- retrieved fast reconnect expiry time 1733234849113 2024-12-03T19:37:29.113+0530 for B4-96-91-26-EB-A1

2024-12-02 20:08:27,472 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- B4-96-91-26-EB-A1 is within fast reconnect expiry

LSDが無効な場合：

LSDを無効にするには、Administration > System > Settings > Light Data Distribution > Uncheck RADIUS Session Directoryの順に選択します。

EP初めて接続し、ポスチャプロセスを実行します。EPが準拠すると、ポスチャリースとDBの最後の既知のコンプライアンス属性が更新されます。

2024-12-02 20:40:10,417 DEBUG [PolicyEngineEvaluationThread-9][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- fast reconnect is enabled

2024-12-02 20:40:10,423 WARN [PolicyEngineEvaluationThread-9][[]] cisco.cpm.posture.runtime.PostureManager -:::::- Cannot find endpoint B4-96-91-26-EB-A1 in end point DB

2024-12-02 20:40:10,423 INFO [PolicyEngineEvaluationThread-9][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- not able to find user name in posture pip for B4-96-91-26-EB-A1 08C9C50A0000003087F1EE30. Set posture status to unknown

2024-12-02 20:40:45,679 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-1][[]] cisco.cpm.posture.runtime.GracePeriodUtil -:08C9C50A0000002E87E4FE87:alice:::- updating grace period for device with udid: 6d8a638f9acadd2851a6cd7eae947060a898ebc1 , maclist: [B4:96:91:26:EB:A1], grace period expiry time 1733325045679<--------------------Updated last known compliance status in DB (LAST_COMP_EXPIRY)

2024-12-02 20:40:45,682 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-1][[]] cisco.cpm.posture.runtime.PostureManager -:08C9C50A0000002E87E4FE87:alice:::- posture_bypass_test is null fast reconnect expiry time is 1733238645682 2024-12-03T20:40:45.682+0530

2024-12-02 20:40:45,682 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-1][[]] cisco.cpm.posture.runtime.PostureManager -:08C9C50A0000002E87E4FE87:alice:::- updating fast reconnect for end point B4:96:91:26:EB:A1 with 1 days of expiry time 1733238645682<------Updated posture lease in DB (EDF_POSTUREEXPIRY)

次に、展開内の別のPSNでEPを認証します。

認証要求が別のPSNに到着すると、PSNがポスチャリース時間をDBから取得し、セッションを準拠として直接マークすることがわかります。ライブログでも確認できます。

2024-12-02 20:49:56,115 DEBUG [PolicyEngineEvaluationThread-10][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- Posture status in session is not compliant

2024-12-02 20:49:56,115 DEBUG [PolicyEngineEvaluationThread-10][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- fast reconnect is enabled

2024-12-02 20:49:56,119 DEBUG [PolicyEngineEvaluationThread-10][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- Querying posture expiry time by MAC B4-96-91-26-EB-A1

2024-12-02 20:49:56,123 DEBUG [PolicyEngineEvaluationThread-10][[]] cisco.cpm.posture.runtime.PostureManager -:::::- posture expriy time retrieved from DB is "1733238645682" for B4-96-91-26-EB-A1

2024-12-02 20:49:56,123 DEBUG [PolicyEngineEvaluationThread-10][[]] cisco.cpm.posture.runtime.PostureManager -:::::- posture lease expiry time 1733238645682 2024-12-03T20:40:45.682+0530 for B4-96-91-26-EB-A1

2024-12-02 20:49:56,123 DEBUG [PolicyEngineEvaluationThread-10][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- retrieved fast reconnect expiry time 1733238645682 2024-12-03T20:40:45.682+0530 for B4-96-91-26-EB-A1

2024-12-02 20:49:56,123 DEBUG [PolicyEngineEvaluationThread-10][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- B4-96-91-26-EB-A1 is within fast reconnect expiry

これら2つのシナリオから、LSDがポスチャリースに影響を与えないことを確認できます。

よく寄せられる質問（FAQ）

1. ポスチャリースとキャッシュされた最後の既知のポスチャは互いに独立していますか。

はい、最後にキャッシュされた既知のポスチャを有効にしなくてもポスチャリースを有効にできます。逆も同様です。ポスチャリースは、設定された期間、エンドポイント属性としてエンドポイントのコンプライアンス状況を保存します。 キャッシュされた最後の既知のポスチャは、エンドポイントが非準拠になった場合に猶予期間が与えられるDBで保存された時間です。これはエンドポイント属性ではありません。

2. ポスチャリースとキャッシュされた最後の既知のポスチャの両方がノード間で複製されますか。

ポスチャリースはエンドポイント属性であり、すべてのノードに複製されます。最後にキャッシュされた既知のポスチャはエンドポイント属性ではありませんが、値はOracle DB内にあるため、すべてのノードにも複製されます。

3. ノードをリブートすると、これらの値は削除されますか。

いいえ。両方ともOracle DBに保存されるため、ノードを再ロードしても値は削除されません。

4. ポスチャリースはセキュリティ問題を引き起こしますか。

ポスチャリースが有効な場合、ISEはエンドポイントのポスチャステータスを確認しません。エンドポイントが準拠していない場合、ISEは準拠として処理できるため、セキュリティ上の問題が発生する可能性があります。 このリスクを最小限に抑えるには、ポスチャリースとともにポスチャ再評価を使用することをお勧めします。

既知の障害

Cisco Bug ID CSCwk07454 PSNは、正しいポスチャリース有効期限でDBを更新しません。

Cisco Bug ID CSCwi58421 PSNノードが、ポスチャリースが有効な場合に、正しいポスチャ有効期限でDBを更新しません。