目次

はじめに

問題

解決策

関連情報

概要

この資料はエラーに終ってセキュリティ管理 アプライアンス（SMA）および E メール セキュリティ アプライアンス（ESA）統合失敗当たる方法を取り扱っています: 「（3 つは見つける、「一致するキー交換アルゴリズムをことができませんでした。」）または「予想外 EOF」は追加現象接続し。

背景説明

最初に統合間、SMA ESA への SMA 接続は ESA に次の暗号/キー交換アルゴリズムを提供します:

kex_algorithms string: diffie-hellman-group-exchange-sha256,diffie-hellman-group-exchange-sha1,diffie-hellman-group14-sha1,ecdh-sha2-nistp256,ecdh-sha2-nistp384,ecdh-sha2-nistp521

encryption_algorithms_client_to_server string: aes128-ctr,aes192-ctr,aes256-ctr,aes128-cbc,3des-cbc,blowfish-cbc,cast128-cbc,aes192-cbc,aes256-cbc,rijndael-cbc@lysator.liu.se

encryption_algorithms_server_to_client string: aes128-ctr,aes192-ctr,aes256-ctr,aes128-cbc,3des-cbc,blowfish-cbc,cast128-cbc,aes192-cbc,aes256-cbc,rijndael-cbc@lysator.liu.se

SMA および ESA 接続の後で、SMA 提供します ESA に次の暗号/キー交換アルゴリズムを確立されます:

kex_algorithms string: curve25519-sha256@libssh.org,ecdh-sha2-nistp256,ecdh-sha2-nistp384,ecdh-sha2-nistp521,diffie-hellman-group-exchange-sha256,diffie-hellman-group-exchange-sha1,diffie-hellman-group14-sha1,diffie-hellman-group1-sha1

encryption_algorithms_client_to_server string [truncated]: aes128-ctr,aes192-ctr,aes256-ctr,arcfour256,arcfour128,aes128-gcm@openssh.com,aes256-gcm@openssh.com,chacha20-poly1305@openssh.com,aes128-cbc,3des-cbc,blowfish-cbc,cast128-cbc,aes192-cbc,aes256-cbc,arcfour,rijndael-cbc@lysator.liu.se

encryption_algorithms_server_to_client string [truncated]: aes128-ctr,aes192-ctr,aes256-ctr,arcfour256,arcfour128,aes128-gcm@openssh.com,aes256-gcm@openssh.com,chacha20-poly1305@openssh.com,aes128-cbc,3des-cbc,blowfish-cbc,cast128-cbc,aes192-cbc,aes256-cbc,arcfour,rijndael-cbc@lysator.liu.se

本書の情報は、特定のラボ環境にあるデバイスに基づいて作成されたものです。 このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。 対象のネットワークが実稼働中である場合には、どのような作業についても、その潜在的な影響について確実に理解しておく必要があります。

問題

SMA をからの ESA に統合場合 GUI > 管理 アプライアンス > 中央 集中型 サービス > Security アプライアンスまたは CLI > applianceconfig 存在 する問題。 問題は接続のエラーを、これですいくつかの kex アルゴリズム/暗号アルゴリズムが抜けている ESA が原因プロンプト表示します。

1. (3, 'Could not find matching key exchange algorithm.')

2. Error — Unexpected EOF on connect.

解決策

これを解決するため、提供されるデフォルト値に戻って買われる ESA ssh 暗号設定必要:

lab.esa.com> sshconfig

Choose the operation you want to perform:

- SSHD - Edit SSH server settings.

- USERKEY - Edit SSH User Key settings

- ACCESS CONTROL - Edit SSH whitelist/blacklist

[]> sshd

ssh server config settings:

Public Key Authentication Algorithms:

rsa1

ssh-dss

ssh-rsa

Cipher Algorithms:

aes128-ctr

aes192-ctr

aes256-ctr

aes128-cbc

3des-cbc

blowfish-cbc

cast128-cbc

aes192-cbc

aes256-cbc

rijndael-cbc@lysator.liu.se

MAC Methods:

hmac-md5

hmac-sha1

umac-64@openssh.com

hmac-ripemd160

hmac-ripemd160@openssh.com

hmac-sha1-96

hmac-md5-96

Minimum Server Key Size:

1024

KEX Algorithms:

diffie-hellman-group-exchange-sha256

diffie-hellman-group-exchange-sha1

diffie-hellman-group14-sha1

diffie-hellman-group1-sha1

ecdh-sha2-nistp256

ecdh-sha2-nistp384

ecdh-sha2-nistp521

からの出力 CLI > sshconfig > ステップバイステップ セットアップの sshd:

[]> setup

Enter the Public Key Authentication Algorithms do you want to use

[rsa1,ssh-dss,ssh-rsa]>

Enter the Cipher Algorithms do you want to use

[aes128-ctr,aes192-ctr,aes256-ctr,aes128-cbc,3des-cbc,blowfish-cbc,cast128-cbc,aes192-cbc,aes256-cbc,rijndael-cbc@lysator.liu.se]>

Enter the MAC Methods do you want to use

[hmac-md5,hmac-sha1,umac-64@openssh.com,hmac-ripemd160,hmac-ripemd160@openssh.com,hmac-sha1-96,hmac-md5-96]>

Enter the Minimum Server Key Size do you want to use

[1024]>

Enter the KEX Algorithms do you want to use

[diffie-hellman-group-exchange-sha256,diffie-hellman-group-exchange-sha1,diffie-hellman-group14-sha1,diffie-hellman-group1-sha1,ecdh-sha2-nistp256,ecdh-sha2-nistp384,ecdh-sha2-nistp521]>

関連情報

- Cisco 電子メール セキュリティ アプライアンス - エンド ユーザ ガイド

- テクニカル サポートとドキュメント – Cisco Systems

- 中央集中型ポリシー ウイルスおよび発生検疫のために最良実施

- ESA スパム検疫のための包括的なガイドは SMA と設定しました