目次

はじめに

解決策

概要

この資料にある特定のドメインかホストにレートリミット配信にどのように記述されています。

解決策

CLI の destconfig コマンドか GUI のメール Policies タブの宛先管理テーブルは特定のドメインかホストに Cisco E メール セキュリティ アプライアンスで制限する配達レートを設定するのに使用することができます。 このオプションがリモートホストを oveloading 防ぐことを可能にすることは時々推奨されます。

方法の CLI 例はドメイン「example.com」にレート配信を制限する下記にあります。

mail.example.com> destconfig

There are currently 2 entries configured.

Choose the operation you want to perform:

- NEW - Create a new entry.

- EDIT - Modify an entry.

- DELETE - Remove an entry.

- DEFAULT - Change the default.

- PRINT - Display all entries.

- CLEAR - Remove all entries.

[]> new

Enter the domain you wish to limit.

[]> example.com

Do you wish to configure a concurrency limit for example.com? [Y]>

Enter the max concurrency limit for "example.com".

[500]> 100

Do you wish to apply a recipient limit to this domain? [N]> y

Enter the number of minutes used to measure the recipient limit.

[60]> 60

Enter the max number of recipients per 60 minutes for "example.com".

[]> 1000

Select how you want to apply the limits for example.com:

1. One limit applies to the entire domain example.com

2. Separate limit for each mail exchanger IP address

[1]>

Select how the limits will be enforced:

1. System Wide

2. Per Virtual Gateway(tm)

[1]>

Do you wish to apply a specific TLS setting for this domain? [N]>

Do you wish to apply a specific bounce verification address tagging setting for this domain? [N]>

Do you wish to apply a specific bounce profile to this domain? [N]>

There are currently 3 entries configured

Choose the operation you want to perform:

- NEW - Create a new entry.

- EDIT - Modify an entry.

- DELETE - Remove an entry.

- DEFAULT - Change the default.

- PRINT - Display all entries.

- CLEAR - Remove all entries.

[]>

mail.example.com> commit