目次

概要

前提条件

要件

使用するコンポーネント

関連製品

表記法

設定

ネットワーク図

リモート アクセス VPN（IPSec）の設定

CLI による ASA/PIX の設定

Cisco VPN Client の設定

確認

show コマンド

トラブルシューティング

セキュリティ アソシエーションのクリア

トラブルシューティングのためのコマンド

関連情報

概要

このドキュメントでは、Adaptive Security Device Manager（ASDM）または CLI を使用してスタティック IP アドレスを VPN Client に提供できるよう Cisco 5500 シリーズ Adaptive Security Appliance（ASA; 適応型セキュリティ アプライアンス）を設定する方法について解説します。 ASDM では、直感的で使用が容易な Web ベースの管理インターフェイスにより、ワールドクラスのセキュリティ管理と監視機能が提供されています。 Cisco ASA の設定が完了すると、Cisco VPN Client を使用して、これを確認できます。

Cisco VPN Client（4.x for Windows）と PIX 500 シリーズ セキュリティ アプライアンス 7.x との間にリモート アクセス VPN 接続を設定する方法については、「PIX/ASA 7.x および Cisco VPN Client 4.x で Active Directory に対する Windows 2003 IAS RADIUS 認証を使用するための設定例」を参照してください。 リモートの VPN Client ユーザは Microsoft Windows 2003 Internet Authentication Service（IAS）RADIUS サーバを使用して Active Directory に対する認証を行います。

Cisco Secure Access Control Server（ACS バージョン 3.2）を使用して拡張認証（Xauth）用に、Cisco VPN Client（4.x for Windows）と PIX 500 シリーズ セキュリティ アプライアンス 7.x との間にリモート アクセス VPN 接続を設定する方法については、『PIX/ASA 7.x と Cisco VPN Client 4.x の Cisco Secure ACS 認証用の設定例』を参照してください。

前提条件

要件

このドキュメントでは、ASA が完全に動作していて、Cisco ASDM か CLI で設定を変更できるように設定されていることを想定しています。

注: 「ASDM 用の HTTPS アクセスの許可」または「PIX/ASA 7.x： 内部および外部インターフェイスの SSH の設定例」を参照してください。

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づくものです。

- Cisco 適応型セキュリティ アプライアンス ソフトウェア バージョン 7.x 以降

- Adaptive Security Device Manager バージョン 5.x 以降

- Cisco VPN Client バージョン 4.x 以降

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されたものです。 このドキュメントで使用するすべてのデバイスは、クリアな（デフォルト）設定で作業を開始しています。 ネットワークが稼働中の場合は、コマンドが及ぼす潜在的な影響を十分に理解しておく必要があります。

関連製品

この設定は、Cisco PIX セキュリティ アプライアンス バージョン 7.x 以降にも適用できます。

表記法

ドキュメント表記の詳細は、『シスコ テクニカル ティップスの表記法』を参照してください。

設定

この項では、このドキュメントで説明する機能の設定に必要な情報を提供します。

注: このセクションで使用されているコマンドの詳細を調べるには、Command Lookup Tool（登録ユーザ専用）を使用してください。

ネットワーク図

このドキュメントでは、次のネットワーク構成を使用しています。

注: この設定で使用している IP アドレス スキームは、インターネット上で正式にルーティング可能なものではありません。 これらは RFC 1918 でのアドレスであり、ラボ環境で使用されたものです。

リモート アクセス VPN（IPSec）の設定

ASDM の手順

リモート アクセス VPN を設定するには、次の手順を実行します。

1. [Configuration] > [Remote Access VPN] > [Network (Client) Access] > [Advanced] > [IPSec] > [IKE Policies] > [Add] を選択し、ISAKMP ポリシーを作成します。

2. ISAKMP ポリシーの詳細情報を設定します。

[OK]、[Apply] の順にクリックします。

3. [Configuration] > [Remote Access VPN] > [Network (Client) Access] > [Advanced] > [IPSec] > [IKE Parameters] を選択し、外部インターフェイス上の IKE を有効にします。

4. [Configuration] > [Remote Access VPN] > [Network (Client) Access] > [Advanced] > [IPSec] > [IPSec Transform Sets] > [Add] の順に選択し、次のように ESP-DES-SHA トランスフォームを作成します。

[OK]、[Apply] の順にクリックします。

5. [Configuration] > [Remote Access VPN] > [Network (Client) Access] > [Advanced] > [IPSec] > [Crypto Maps] > [Add] の順に選択し、次のような Priority 1 のダイナミック ポリシーを持つ暗号マップを作成します。

[OK]、[Apply] の順にクリックします。

6. [Configuration] > [Remote Access VPN] > [AAA Setup] > [Local Users] > [Add] の順に選択し、VPN Client アクセス用のユーザ アカウント（例：Username - cisco123、Password - cisco123）を作成します。

7. [VPN Policy] に移動し、次のようにユーザ "cisco123" の Static/Dedicated IP Address を追加します。

8. [Configuration] > [Remote Access VPN] > [Network (Client) Access] > [Address Assignment] > [Address Pools] を選択して [Add] をクリックし、VPN Client ユーザの VPN Client を追加します。

9. [Configuration] > [Remote Access VPN] > [Network (Client) Access] > [IPSec Connection Profiles] > [Add] を選択し、次のようにトンネル グループ（例：TunnelGroup1、事前共有鍵が cisco123）を追加します。

- [Basic] タブの User Authentication フィールドで、サーバ グループとして LOCAL を選択します。

- VPN Client ユーザの Client Address Pools として  vpnclient1  を選択します。

[OK] をクリックします。

10. [Advanced] > [Client Addressing] を選択し、[Use address pool] チェック ボックスにチェックマークを入れて、VPN Client に IP アドレスを割り当てます。

注: [Use authentication server] および [Use DHCP] チェック ボックスのチェックマークは外します。

[OK] をクリックします。

11. IPSec アクセスの Outside インターフェイスを有効にします。 [Apply] をクリックして、次に進みます。

CLI による ASA/PIX の設定

後述のステップを実行して DHCP サーバを設定し、コマンドラインから VPN Client に IP アドレスを割り当てます。 使用する各コマンドについての詳細は、『リモート アクセス VPN の設定』または『Cisco ASA 5500 シリーズ適応型セキュリティ アプライアンス、コマンド リファレンス』を参照してください。

ASA デバイスでの実行コンフィギュレーション

ASA# sh run

ASA Version 8.0(2)

!

!--- Specify the hostname for the Security Appliance.

hostname ASA

enable password 8Ry2YjIyt7RRXU24 encrypted

names

!

!--- Configure the outside and inside interfaces.

interface Ethernet0/0

nameif inside

security-level 100

ip address 10.1.1.1 255.255.255.0

!

interface Ethernet0/1

nameif outside

security-level 0

ip address 192.168.1.1 255.255.255.0

!

interface Ethernet0/2

nameif DMZ

security-level 50

ip address 192.168.10.2 255.255.255.0

!--- Output is suppressed.

passwd 2KFQnbNIdI.2KYOU encrypted

boot system disk0:/asa802-k8.bin

ftp mode passive

access-list 101 extended permit ip 10.1.1.0 255.255.255.0

192.168.5.0 255.255.255.0

pager lines 24

logging enable

logging asdm informational

mtu inside 1500

mtu outside 1500

mtu dmz 1500

ip local pool vpnclient1 192.168.5.10-192.168.5.100 mask 255.255.255.0

no failover

icmp unreachable rate-limit 1 burst-size 1

!--- Specify the location of the ASDM image for ASA to fetch the image for ASDM access.

asdm image disk0:/asdm-613.bin

no asdm history enable

arp timeout 14400

global (outside) 1 192.168.1.5

nat (inside) 0 access-list 101

nat (inside) 1 0.0.0.0 0.0.0.0

route outside 0.0.0.0 0.0.0.0 192.168.1.2 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 icmp 0:00:02

timeout sunrpc 0:10:00 h323 0:05:00 h225 1:00:00 mgcp 0:05:00 mgcp-pat 0:05:00

timeout sip 0:30:00 sip_media 0:02:00 sip-invite 0:03:00 sip-disconnect 0:02:00

timeout uauth 0:05:00 absolute

dynamic-access-policy-record DfltAccessPolicy

http server enable

http 0.0.0.0 0.0.0.0 inside

no snmp-server location

no snmp-server contact

snmp-server enable traps snmp authentication linkup linkdown coldstart

crypto ipsec transform-set ESP-DES-SHA esp-des esp-sha-hmac

crypto dynamic-map outside_dyn_map 1 set transform-set ESP-DES-SHA

crypto map outside_map 1 ipsec-isakmp dynamic outside_dyn_map

!--- Specifies the interface to be used with !--- the settings defined in this configuration.

crypto map outside_map interface outside

!--- PHASE 1 CONFIGURATION ---! !--- This configuration uses ISAKMP policy 2. !--- The configuration commands here define the Phase !--- 1 policy parameters that are used.

crypto isakmp enable outside

crypto isakmp policy 2

authentication pre-share

encryption des

hash sha

group 2

lifetime 86400

no crypto isakmp nat-traversal

!--- Specifies that the IP address to the vpn clients are assigned by the local and not by AAA or dhcp. The CLI vpn-addr-assign local for VPN address assignment through ASA is hidden in the CLI provided by show run command.

no vpn-addr-assign aaa

no vpn-addr-assign dhcp

telnet timeout 5

ssh timeout 5

console timeout 0

threat-detection basic-threat

threat-detection statistics access-list

!

class-map inspection_default

match default-inspection-traffic

!

!

policy-map type inspect dns preset_dns_map

parameters

message-length maximum 512

policy-map global_policy

class inspection_default

inspect dns preset_dns_map

inspect ftp

inspect h323 h225

inspect h323 ras

inspect netbios

inspect rsh

inspect rtsp

inspect skinny

inspect esmtp

inspect sqlnet

inspect sunrpc

inspect tftp

inspect sip

inspect xdmcp

!

service-policy global_policy global

!

group-policy DfltGrpPolicy attributes

vpn-tunnel-protocol IPSec webvpn

group-policy GroupPolicy1 internal

!--- In order to identify remote access users to the Security Appliance, !--- you can also configure usernames and passwords on the device. !--- specify the IP address to assign to a particular user, use the vpn-framed-ip-address command !--- in username mode

username cisco123 password ffIRPGpDSOJh9YLq encrypted

username cisco123 attributes

vpn-framed-ip-address 192.168.5.1 255.255.255.0

!--- Create a new tunnel group and set the connection !--- type to remote-access.

tunnel-group TunnelGroup1 type remote-access

tunnel-group TunnelGroup1 general-attributes

address-pool vpnclient1

!--- Enter the pre-shared-key to configure the authentication method.

tunnel-group TunnelGroup1 ipsec-attributes

pre-shared-key *

prompt hostname context

Cryptochecksum:e0725ca9ccc28af488ded9ee36b7822d

: end

ASA#

Cisco VPN Client の設定

ASA の設定に成功したことを確認するには、Cisco VPN Client を使用して Cisco ASA に接続してみます。

1. [Start] > [Programs] > [Cisco Systems VPN Client] > [VPN Client] の順に選択します。

2. [New] をクリックして、[Create New VPN Connection Entry] ウィンドウを開きます。

3. 新しい接続の詳細情報を入力します。

接続エントリの名前と説明を入力します。 Host ボックスに、ASA の Outside の IP アドレスを入力します。 次に、ASA で設定されている VPN トンネル  グループ名（TunnelGroup1）とパスワード（事前共有鍵 - cisco123）を入力します。 [Save] をクリックします。

4. 使用する接続をクリックし、VPN Client メイン ウィンドウの [Connect] をクリックします。

5. プロンプトが表示されたら、Username : に cisco123、[Password:] に cisco123 と入力し、[OK] をクリックして リモート ネットワークに接続します。

6. VPN Client が中央サイトの ASA に接続されます。

7. 接続が正常に確立されたら、Status メニューから [Statistics] を選択し、トンネルの詳細情報を確認します。

確認

show コマンド

ここでは、設定が正常に動作していることを確認します。

Output Interpreter Tool（OIT）（登録ユーザ専用）では、特定の show コマンドがサポートされています。 OIT を使用して、show コマンド出力の解析を表示できます。

- show crypto isakmp sa：ピアの現在の IKE セキュリティ アソシエーション（SA）すべてを表示します。

- show crypto ipsec sa：現在の SA が使用している設定を表示します。

トラブルシューティング

ここでは、設定のトラブルシューティングに役立つ情報について説明します。 デバッグ出力例も紹介しています。

注: リモートアクセス IPSec VPN の詳細は、『一般的な L2L およびリモート アクセス IPSec VPN のトラブルシューティング方法について』を参照してください。

セキュリティ アソシエーションのクリア

トラブルシューティングを行う際には、変更を加えた後、既存のセキュリティ アソシエーションを必ずクリアしてください。 PIX の特権モードで、次のコマンドを使用します。

- clear [crypto] ipsec sa：アクティブな IPSec SA を削除します。 crypto キーワードはオプションです。

- clear [crypto] ipsec sa：アクティブな IKE SA を削除します。 crypto キーワードはオプションです。

トラブルシューティングのためのコマンド

Output Interpreter Tool（OIT）（登録ユーザ専用）では、特定の show コマンドがサポートされています。 OIT を使用して、show コマンド出力の解析を表示できます。

注: debug コマンドを使用する前に、『debug コマンドの重要な情報』を参照してください。

- debug crypto ipsec 7：フェーズ 2 の IPSec ネゴシエーションを表示します。

- debug crypto isakmp 7：フェーズ 1 の ISAKMP ネゴシエーションを表示します。

関連情報

- Cisco ASA 5500 シリーズ適応型セキュリティ アプライアンスに関するサポート ページ

- Cisco ASA 5500 シリーズ適応型セキュリティ アプライアンス、コマンド リファレンス

- Cisco PIX 500 シリーズ セキュリティ アプライアンス サポート ページ

- Cisco PIX 500 シリーズ セキュリティ アプライアンス、コマンド リファレンス

- Cisco Adaptive Security Device Manager

- IPSec ネゴシエーション/IKE プロトコルに関するサポート ページ

- Cisco VPN Client に関するサポート ページ

- Cisco PIX Firewall ソフトウェア

- Cisco Secure PIX ファイアウォール コマンド リファレンス

- セキュリティ製品に関する Field Notice（PIX を含む）

- Requests for Comments（RFC）

- テクニカルサポートとドキュメント - Cisco Systems