内容

概要

前提条件

要件

使用するコンポーネント

表記法

設定

ネットワーク図

設定

動作の仕組み

通常の環境（フェールオーバー発生前）

HSRP と IPSec のフェールオーバーの後

元の HSRP プライマリ ルータが停止状態から回復した後

関連情報

概要

このドキュメントでは、サイト間 IPsec VPN ネットワークの新しいハイ アベイラビリティ機能について説明します。ルータ間のフェールオーバーを実現するためルータのインターフェイス ステータスを追跡する際に、Hot Standby Router Protocol（HSRP）が使用されることがよくあります。ただし、IPSec と HSRP の間には内部相関関係がないため、HSRP は IPSec セキュリティ アソシエーション（SA）の状態を追跡できず、IPSec には、HSRP フェールオーバー発生時にこのフェールオーバーと同期するためにスキームが必要です。IPSec と HSRP を緊密に結合するために使用されるスキームについて、いくつかの重要な点を説明します。

- Internet Key Exchange（IKE）キープアライブを使用すると、IPSec で HSRP フェールオーバーが遅れずに検出されます。

- 特定のルータ インターフェイスに適用された暗号化マップが、このインターフェイス上ですでに設定された HSRP グループにリンクされることにより、IPSec で HSRP 設定が認識されます。また、これにより IPSec では、HSRP の仮想 IP アドレスを、HSRP ルータの Internet Security Association and Key Management Protocol（ISAKMP）ID として使用できます。

- Reverse Route Injection（RRI）機能を使用すると、HSRP および IPSec のフェールオーバー時にダイナミック ルーティング情報が更新されます。

注：このドキュメントでは、VPNでホットスタンバイルータプロトコル(HSRP)を使用する方法について説明します。HSRPは、障害が発生したISPリンクを追跡するためにも使用されます。ルータに冗長ISPリンクを設定するには、『ICMPエコー操作を使用したIPサービスレベルの分析』を参照してください。送信元デバイスはルータで、宛先デバイスはISPデバイスです。

前提条件

要件

このドキュメントに関しては個別の前提条件はありません。

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づいています。

- Cisco 7200 シリーズ ルータ

- Cisco IOS®ソフトウェアリリース12.3(7)T1、c7200-a3jk9s-mz.123-7.T1

このマニュアルの情報は、特定のラボ環境に置かれたデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。実稼動中のネットワークで作業をしている場合、実際にコマンドを使用する前に、その潜在的な影響について理解しておく必要があります。

表記法

ドキュメント表記の詳細は、『シスコ テクニカル ティップスの表記法』を参照してください。

設定

このセクションでは、このドキュメントで説明する機能を設定するために必要な情報を提供しています。

注：このセクションで使用されているコマンドの詳細を調べるには、Command Lookup Tool（登録ユーザ専用）を参照してください。一部ツールについては、ゲスト登録のお客様にはアクセスできない場合がありますことをご了承ください。

ネットワーク図

このドキュメントでは、次のネットワーク セットアップを使用します。

設定

このドキュメントでは、次の構成を使用します。

- Cisco VPN 7200 の設定

- Cisco 7204VXR-1 の設定

- Cisco 7204VXR-2 の設定

- Cisco 7206-1 の設定

Cisco VPN 7200 の設定

vpn7200#show run

Building configuration...

Current configuration : 1854 bytes

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname vpn7200

!

!

ip subnet-zero

ip cef

!--- Defines ISAKMP policy and IKE pre-shared key for !--- IKE authentication. Note that 172.16.172.53 is the !--- HSRP virtual IP address of the remote HSRP routers.

crypto isakmp policy 1

hash md5

authentication pre-share

crypto isakmp key cisco123 address 172.16.172.53

!--- IKE keepalive to detect the IPSec liveness of the remote !--- VPN router. When HSRP failover happens, IKE keepalive !--- will detect the HSRP router switchover.

crypto isakmp keepalive 10

!

!

crypto ipsec transform-set myset esp-des esp-md5-hmac

!--- Defines crypto map. Note that the peer address is the !--- HSRP virtual IP address of the remote HSRP routers.

crypto map vpn 10 ipsec-isakmp

set peer 172.16.172.53

set transform-set myset

match address 101

!

interface Loopback0

ip address 20.1.1.1 255.255.255.255

!

interface FastEthernet0/0

ip address 10.48.66.66 255.255.254.0

duplex full

speed 100

!

interface FastEthernet0/1

ip address 172.16.172.69 255.255.255.240

duplex full

speed 100

crypto map vpn

!

ip classless

ip route 10.1.1.0 255.255.255.0 172.16.172.65

ip route 99.99.99.99 255.255.255.255 172.16.172.65

ip route 172.16.172.48 255.255.255.240 172.16.172.65

no ip http server

!

access-list 101 permit ip 20.1.1.0 0.0.0.255 10.1.1.0 0.0.0.255

access-list 101 permit ip 20.1.1.0 0.0.0.255 host 99.99.99.99

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

end

Cisco 7204VXR-1 の設定

7204VXR-1#show run

Building configuration...

Current configuration : 1754 bytes

!

version 12.3

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname 7204VXR-1

!

boot-start-marker

boot-end-marker

!

!

no aaa new-model

ip subnet-zero

!

!

no ip domain lookup

!

!

ip cef!

!--- Defines ISAKMP policy.

crypto isakmp policy 1

hash md5

authentication pre-share

crypto isakmp key cisco123 address 172.16.172.69

crypto isakmp keepalive 10

!

!

crypto ipsec transform-set myset esp-des esp-md5-hmac

!--- Defines crypto map. Note that "reverse-route" !--- turns on the RRI feature.

crypto map vpn 10 ipsec-isakmp

set peer 172.16.172.69

set transform-set myset

match address 101

reverse-route

!

!

!--- Define HSRP under the interface. HSRP will track the !--- internal interface as well. HSRP group name must be !--- defined here and will be used for IPSec configuration. !--- The "redundancy" keyword in the crypto map command !--- specifies the HSRP group to which IPSec will couple. !--- In normal circumstances, this router will be the HSRP !--- primary router since it has higher priority than the !--- other HSRP router.

interface FastEthernet0/0

ip address 172.16.172.52 255.255.255.240

duplex full

speed 100

standby 1 ip 172.16.172.53

standby 1 priority 200

standby 1 preempt

standby 1 name VPNHA

standby 1 track FastEthernet0/1 150

crypto map vpn redundancy VPNHA

!

interface FastEthernet0/1

ip address 10.1.1.1 255.255.255.0

duplex full

speed 100

!

interface ATM1/0

no ip address

shutdown

no atm ilmi-keepalive

!

interface FastEthernet3/0

no ip address

shutdown

duplex half

!

interface ATM6/0

no ip address

shutdown

no atm ilmi-keepalive

!--- Define dynamic routing protocol and re-distribute static !--- route. This enables dynamic routing information update !--- during the HSRP/IPSec failover. All the "VPN routes" !--- that are injected in the routing table by RRI as static !--- routes will be redistributed to internal networks.

!

router ospf 1

log-adjacency-changes

redistribute static subnets

network 10.1.1.0 0.0.0.255 area 0

!

ip classless

ip route 172.16.172.64 255.255.255.240 172.16.172.49

no ip http server

no ip http secure-server

!

!

!--- Defines VPN traffic. The destination IP subnet will be !--- injected into the routing table as static routes by RRI.

access-list 101 permit ip 10.1.1.0 0.0.0.255 20.1.1.0 0.0.0.255

access-list 101 permit ip host 99.99.99.99 20.1.1.0 0.0.0.255

!

line con 0

exec-timeout 0 0

stopbits 1

line aux 0

stopbits 1

line vty 0 4

!

!

!

end

Cisco 7204VXR-2 の設定

7204VXR-2#show run

Building configuration...

Current configuration : 2493 bytes

!

version 12.3

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname 7204VXR-2

!

boot-start-marker

boot system flash disk1:c7200-a3jk9s-mz.123-7.T1

boot-end-marker

!

no aaa new-model

ip subnet-zero

!

!

no ip domain lookup

ip host rund 10.48.92.61

!

!

ip cef

!

crypto isakmp policy 1

hash md5

authentication pre-share

crypto isakmp key cisco123 address 172.16.172.69

crypto isakmp keepalive 10

!

!

crypto ipsec transform-set myset esp-des esp-md5-hmac

!

crypto map vpn 10 ipsec-isakmp

set peer 172.16.172.69

set transform-set myset

match address 101

reverse-route

!

!--- During normal operational conditions this router !--- will be the standby router.

interface FastEthernet0/0

ip address 172.16.172.54 255.255.255.240

ip directed-broadcast

duplex full

standby 1 ip 172.16.172.53

standby 1 preempt

standby 1 name VPNHA

standby 1 track FastEthernet1/0

crypto map vpn redundancy VPNHA

!

interface FastEthernet1/0

ip address 10.1.1.2 255.255.255.0

ip directed-broadcast

duplex full

!

interface FastEthernet3/0

ip address 10.48.67.182 255.255.254.0

ip directed-broadcast

shutdown

duplex full

!

router ospf 1

log-adjacency-changes

redistribute static subnets

network 10.1.1.0 0.0.0.255 area 0

!

ip classless

ip route 172.16.172.64 255.255.255.240 172.16.172.49

no ip http server

no ip http secure-server

!

!

!

access-list 101 permit ip 10.1.1.0 0.0.0.255 20.1.1.0 0.0.0.255

access-list 101 permit ip host 99.99.99.99 20.1.1.0 0.0.0.255

!

line con 0

exec-timeout 0 0

transport preferred all

transport output all

stopbits 1

line aux 0

transport preferred all

transport output all

stopbits 1

line vty 0 4

login

transport preferred all

transport input all

transport output all

!

!

!

end

Cisco 7206-1 の設定

7206-1#show run

Building configuration...

Current configuration : 1551 bytes

!

version 12.2

no service pad

service timestamps debug datetime msec localtime

service timestamps log datetime msec localtime

no service password-encryption

!

hostname 7206-1

!

ip subnet-zero

no ip source-route

ip cef

!

interface Loopback0

ip address 99.99.99.99 255.255.255.255

!

interface FastEthernet0/0

shutdown

duplex full

speed 100

!

!--- Define dynamic routing protocol. All the "VPN routes" !--- will be learned and updated dynamically from upstream HSRP !--- routers using the dynamic routing protocols.

interface FastEthernet0/1

ip address 10.1.1.3 255.255.255.0

duplex full

speed 100

!

router ospf 1

log-adjacency-changes

passive-interface Loopback0

network 10.1.1.0 0.0.0.255 area 0

network 99.99.99.99 0.0.0.0 area 0

!

ip classless

no ip http server

!

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

end

動作の仕組み

この例では、上記の設定によって、HSRP と IPSec のフェールオーバーが同時に動作する仕組みについて説明しています。このケース スタディでは、次の 3 つの面に重点を置いています。

- インターフェイス障害による HSRP フェールオーバー。

- HSRP フェールオーバーの後に IPSec フェールオーバーが発生する仕組み。上記からわかるように、ここでは IPSec フェールオーバーは「ステートレス フェールオーバー」となります。

- フェールオーバーによるルーティング情報の変更が動的に更新され、内部ネットワークに伝搬される仕組み。

注：このテストトラフィックは、Cisco 7206-1(99.99.99.99)のループバックIPアドレスとCisco VPN 7200(20.1.1.1)のループバックIPアドレスの間のInternet Control Message Protocol(ICMP)パケットであり、2サイト間のVPNトラフィックをシミュレートします。

通常の環境（フェールオーバー発生前）

フェールオーバーの前は、Cisco 7204VXR-1 がプライマリ HSRP ルータであり、Cisco VPN 7200 には Cisco 7204VXR-1 との IPSec SA が設定されています。

インターフェイスにクリプト マップが設定されていると、設定されている IPSec access control list（ACL; アクセス コントロール リスト）とクリプト マップの set peer コマンド文に一致するように、RRI 機能によって VPN ルートが挿入されます。このルートはプライマリ HSRP ルータの 7204VXR-1 のルーティング テーブルに追加されます。

次の debug crypto ipsec コマンドの出力には、VPN ルート 20.1.1/24 が Routing Information Base（RIB; ルーティング情報ベース）に追加されたことが示されています。

IPSEC(rte_mgr): VPN Route Added 20.1.1.0 255.255.255.0

via 172.16.172.69 in IP DEFAULT TABLE

プライマリ HSRP ルータのルーティング テーブルでは、スタティック ルートが 20.1.1/24 にされています。これは Open Shortest Path First（OSPF）によってセカンダリ HSRP ルータである 7204VXR-2 と、内部ルータの 7206-1 に再配布されます。

ルータ 7204VXR-1 の RIB にスタティック ルートとして挿入された VPN ルート 20.1.1/24 に対するネクストホップは、リモート クリプト ピアの IP アドレスです。この場合、VPNルート20.1.1/24のネクストホップは172.16.172.69です。VPNルートのネクストホップのIPアドレスは、次のCisco Express Forwardingの表に示すように、再帰ルートルックアップによって解決されます。

7204VXR-1#show ip route

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF,

IA - OSPF inter area, N1 - OSPF NSSA external type 1,

N2 - OSPF NSSA external type 2, E1 - OSPF external type 1,

E2 - OSPF external type 2, i - IS-IS, su - IS-IS summary,

L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area,

* - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is not set

99.0.0.0/32 is subnetted, 1 subnets

O     99.99.99.99 [110/2] via 10.1.1.3, 00:11:21, FastEthernet0/1

20.0.0.0/24 is subnetted, 1 subnets

S     20.1.1.0 [1/0] via 172.16.172.69

172.16.0.0/28 is subnetted, 2 subnets

C     172.16.172.48 is directly connected, FastEthernet0/0

S      172.16.172.64 [1/0] via 172.16.172.49

10.0.0.0/8 is variably subnetted, 2 subnets, 2 masks

C     10.1.1.0/24 is directly connected, FastEthernet0/1

S      10.48.66.0/23 [1/0] via 10.1.1.2

7204VXR-1#show ip cef 20.1.1.0 detail

20.1.1.0/24, version 66, epoch 0, cached adjacency 172.16.172.49

0 packets, 0 bytes

via 172.16.172.69, 0 dependencies, recursive

next hop 172.16.172.49, FastEthernet0/0 via 172.16.172.64/28

valid cached adjacency

セカンダリ HSRP ルータと内部ルータ 7206-1 は、この VPN ルートを OSPF/ 経由で学習します。ネットワーク管理者がスタティック ルートを手作業で入力する必要はありません。さらに重要なのは、フェールオーバーによって生じたルーティングの変更はダイナミックに更新されることです。

7204VXR-2#show ip route

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF,

IA - OSPF inter area, N1 - OSPF NSSA external type 1,

N2 - OSPF NSSA external type 2, E1 - OSPF external type 1,

E2 - OSPF external type 2, i - IS-IS, su - IS-IS summary,

L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area,

* - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is 10.48.66.1 to network 0.0.0.0

99.0.0.0/32 is subnetted, 1 subnets

O     99.99.99.99 [110/2] via 10.1.1.3, 00:29:31, FastEthernet1/0

20.0.0.0/24 is subnetted, 1 subnets

O E2     20.1.1.0 [110/20] via 10.1.1.1, 00:11:06, FastEthernet1/0

172.16.0.0/28 is subnetted, 2 subnets

C     172.16.172.48 is directly connected, FastEthernet0/0

S      172.16.172.64 [1/0] via 172.16.172.49

10.0.0.0/8 is variably subnetted, 2 subnets, 2 masks

C      10.1.1.0/24 is directly connected, FastEthernet1/0

C      10.48.66.0/23 is directly connected, FastEthernet3/0

S*     0.0.0.0/0 [1/0] via 10.48.66.1

7206-1#show ip route

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF,

IA - OSPF inter area, N1 - OSPF NSSA external type 1,

N2 - OSPF NSSA external type 2, E1 - OSPF external type 1,

E2 - OSPF external type 2, i - IS-IS, su - IS-IS summary,

L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area,

* - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is not set

99.0.0.0/32 is subnetted, 1 subnets

C     99.99.99.99 is directly connected, Loopback0

20.0.0.0/24 is subnetted, 1 subnets

O E2     20.1.1.0 [110/20] via 10.1.1.1, 00:14:01, FastEthernet0/1

172.16.0.0/28 is subnetted, 1 subnets

O E2     172.16.172.64 [110/20] via 10.1.1.1, 00:32:21, FastEthernet0/1

[110/20] via 10.1.1.2, 00:32:21, FastEthernet0/1

10.0.0.0/8 is variably subnetted, 2 subnets, 2 masks

C     10.1.1.0/24 is directly connected, FastEthernet0/1

O E2     10.48.66.0/23 [110/20] via 10.1.1.2, 00:32:22, FastEthernet0/1

ルータ 7204VXR-1 はプライマリ HSRP ルータで、内部インターフェイス Fa0/1 を監視します。

7204VXR-1#show standby

FastEthernet0/0 - Group 1

State is Active

2 state changes, last state change 03:21:20

Virtual IP address is 172.16.172.53

Active virtual MAC address is 0000.0c07.ac01

Local virtual MAC address is 0000.0c07.ac01 (v1 default)

Hello time 3 sec, hold time 10 sec

Next hello sent in 0.172 secs

Preemption enabled

Active router is local

Standby router is 172.16.172.54,

priority 100 (expires in 7.220 sec)

Priority 200 (configured 200)

Track interface FastEthernet0/1 state Up decrement 150

IP redundancy name is "VPNHA" (cfgd)

show track コマンドを使用すると、HSRP によって監視されるすべてのオブジェクトの一覧を確認できます。

7204VXR-1#show track

Track 1 (via HSRP)

Interface FastEthernet0/1 line-protocol

Line protocol is Up

1 change, last change 03:18:22

Tracked by:

HSRP FastEthernet0/0 1

ルータ 7204VXR-2 はスタンバイ HSRP ルータです。通常の動作状況では、このデバイスは内部インターフェイス Fa1/0 を監視します。

7204VXR-2#show standby

FastEthernet0/0 - Group 1

State is Standby

1 state change, last state change 02:22:30

Virtual IP address is 172.16.172.53

Active virtual MAC address is 0000.0c07.ac01

Local virtual MAC address is 0000.0c07.ac01 (v1 default)

Hello time 3 sec, hold time 10 sec

Next hello sent in 0.096 secs

Preemption enabled

Active router is 172.16.172.52,

priority 200 (expires in 7.040 sec)

Standby router is local

Priority 100 (default 100)

Track interface FastEthernet1/0 state Up decrement 10

IP redundancy name is "VPNHA" (cfgd)

次の IPSec 関連の show コマンドでは、Cisco VPN 7200 ルータに関する情報が出力されます。ここでは、Cisco VPN 7200 とプライマリ HSRP ルータである Cisco 7204VXR-1 との間の ISAKMP と IPSec SA の情報が表示されています。

7204VXR-1#show crypto isakmp sa detail

Codes: C - IKE configuration mode, D - Dead Peer Detection

K - Keepalives, N - NAT-traversal

X - IKE Extended Authentication

psk - Preshared key, rsig - RSA signature

renc - RSA encryption

C-id       Local       Remote     I-VRF  Encr  Hash  Auth  DH  Lifetime  Cap.

1    172.16.172.53  172.16.172.69         des   md5   psk   1  23:49:52   K

Connection-id:Engine-id = 1:1(software)

7204VXR-1#show crypto ipsec sa

interface: FastEthernet0/0

Crypto map tag: vpn, local addr. 172.16.172.53

protected vrf:

local ident (addr/mask/prot/port): (99.99.99.99/255.255.255.255/0/0)

remote ident (addr/mask/prot/port): (20.1.1.0/255.255.255.0/0/0)

current_peer: 172.16.172.69:500

PERMIT, flags={origin_is_acl,}

#pkts encaps: 5, #pkts encrypt: 5, #pkts digest: 5

#pkts decaps: 5, #pkts decrypt: 5, #pkts verify: 5

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0

#pkts not decompressed: 0, #pkts decompress failed: 0

#send errors 0, #recv errors 0

local crypto endpt.: 172.16.172.53, remote crypto endpt.: 172.16.172.69

path mtu 1500, media mtu 1500

current outbound spi: 44E0B22B

inbound esp sas:

spi: 0x5B23F22E(1529082414)

transform: esp-des esp-md5-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 2000, flow_id: 1, crypto map: vpn

crypto engine type: Software, engine_id: 1

sa timing: remaining key lifetime (k/sec): (4504144/2949)

ike_cookies: B57A9DC9 FA2D627B F70FEDF6 FAAF9E34

IV size: 8 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0x44E0B22B(1155576363)

transform: esp-des esp-md5-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 2001, flow_id: 2, crypto map: vpn

crypto engine type: Software, engine_id: 1

sa timing: remaining key lifetime (k/sec): (4504145/2949)

ike_cookies: B57A9DC9 FA2D627B F70FEDF6 FAAF9E34

IV size: 8 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas:

vpn7200#show crypto isakmp sa

dst            src             state     conn-id    slot

172.16.172.53  172.16.172.69   QM_IDLE   1          0

7204VXR-2#show crypto ipsec sa

interface: FastEthernet0/1

Crypto map tag: vpn, local addr. 172.16.172.69

local ident (addr/mask/prot/port): (20.1.1.0/255.255.255.0/0/0)

remote ident (addr/mask/prot/port): (99.99.99.99/255.255.255.255/0/0)

current_peer: 172.16.172.53

PERMIT, flags={origin_is_acl,}

#pkts encaps: 10, #pkts encrypt: 10, #pkts digest 10

#pkts decaps: 10, #pkts decrypt: 10, #pkts verify 10

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0, #pkts decompress failed: 0

#send errors 5, #recv errors 0

local crypto endpt.: 172.16.172.69, remote crypto endpt.: 172.16.172.53

path mtu 1500, ip mtu 1500

current outbound spi: 5B23F22E

inbound esp sas:

spi: 0x44E0B22B(1155576363)

transform: esp-des esp-md5-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 2029, flow_id: 1, crypto map: vpn

sa timing: remaining key lifetime (k/sec): (4607997/2824)

IV size: 8 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0x5B23F22E(1529082414)

transform: esp-des esp-md5-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 2030, flow_id: 2, crypto map: vpn

sa timing: remaining key lifetime (k/sec): (4607998/2824)

IV size: 8 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas:

HSRP と IPSec のフェールオーバーの後

フェールオーバーは、Cisco 7204VXR-1のFa0/0をシャットダウンすることでトリガーされました。他のインターフェイスFa0/1がダウンしている場合も、HSRPはこのインターフェイスのステータスを追跡するため、同様の動作が見られます。

プライマリ HSRP ルータへ送られた IKE キープアライブ パケットへの応答が Cisco VPN 7200 で受信されないと、ルータではその IPSec SA が廃棄されます。

この debug crypto isakmp コマンドの出力では、IKE キープアライブによってプライマリ ルータの停止をどのように検出したかが示されています。

ISAKMP (0:1): received packet from 172.16.172.53 (I) QM_IDLE

ISAKMP (0:1): processing HASH payload. message ID = 1585108592

ISAKMP (0:1): processing NOTIFY ITS_ALIVE protocol 1

spi 0, message ID = 1585108592, sa = 61C3E754

ISAKMP (0:1): sending packet to 172.16.172.53 (I) QM_IDLE

ISAKMP (0:1): purging node -1484552386

ISAKMP (0:1): deleting node 1585108592 error FALSE

reason "informational (in) state 1"

ISAKMP (0:1): purging node 642343711

ISAKMP (0:1): sending packet to 172.16.172.53 (I) QM_IDLE

ISAKMP (0:1): purging node -523181212

ISAKMP (0:1): purging node -2089541867

ISAKMP (0:1): incrementing error counter on sa: PEERS_ALIVE_TIMER

ISAKMP (0:1): sending packet to 172.16.172.53 (I) QM_IDLE

ISAKMP (0:1): purging node 1671177686

ISAKMP (0:1): incrementing error counter on sa: PEERS_ALIVE_TIMER

ISAKMP (0:1): sending packet to 172.16.172.53 (I) QM_IDLE

ISAKMP (0:1): purging node 1706520344

ISAKMP (0:1): incrementing error counter on sa: PEERS_ALIVE_TIMER

ISAKMP (0:1): sending packet to 172.16.172.53 (I) QM_IDLE

ISAKMP (0:1): purging node 503375209

ISAKMP (0:1): incrementing error counter on sa: PEERS_ALIVE_TIMER

ISAKMP (0:1): sending packet to 172.16.172.53 (I) QM_IDLE

ISAKMP (0:1): purging node 1272270610

ISAKMP (0:1): incrementing error counter on sa: PEERS_ALIVE_TIMER

ISAKMP (0:1): peer not responding!

ISAKMP (0:1): peer does paranoid keepalives.

ISAKMP (0:1): phase 1 going away; let's be paranoid.

ISAKMP (0:1): Bring down phase 2's

ISAKMP (0:1): That phase 1 was the last one of its kind.

Taking phase 2's with us.

ISAKMP (0:1): peer does paranoid keepalives.

ISAKMP (0:1): deleting SA reason "P1 errcounter exceeded

(PEERS_ALIVE_TIMER)" state (I)

QM_IDLE (peer 172.16.172.53) input queue 0

IPSEC(key_engine): got a queue event...

IPSEC(key_engine_delete_sas): rec'd delete notify from ISAKMP

IPSEC(key_engine_delete_sas): delete all SAs shared with 172.16.172.53

IPSEC(delete_sa): deleting SA,

(sa) sa_dest= 172.16.172.69, sa_prot= 50,

sa_spi= 0x44E0B22B(1155576363),

sa_trans= esp-des esp-md5-hmac , sa_conn_id= 2029

IPSEC(delete_sa): deleting SA,

(sa) sa_dest= 172.16.172.53, sa_prot= 50,

sa_spi= 0x5B23F22E(1529082414),

sa_trans= esp-des esp-md5-hmac , sa_conn_id= 2030

ISAKMP (0:1): sending packet to 172.16.172.53 (I) MM_NO_STATE

ISAKMP (0:1): purging node -248155233

ISAKMP (0:1): peer does paranoid keepalives.

IPSEC(key_engine): got a queue event...

IPSEC(key_engine_delete_sas): rec'd delete notify from ISAKMP

IPSEC(key_engine_delete_sas): delete all SAs shared with 172.16.172.53

ISAKMP (0:1): purging node 958118275

Cisco 7204VXR-1 プライマリ HSRP ルータでフェールオーバーが発生すると、このデバイスはスタンバイ ルータになります。既存の ISAKMP と IPSec SA は廃棄されます。Cisco 7204VXR-2 セカンダリ HSRP ルータがアクティブになり、Cisco VPN 7200 によって新しい IPSec SA が確立されます。

debug standby events コマンドの出力では、HSRP に関連したイベントが示されています。

HSRP: Fa0/0 API Software interface going down

HSRP: Fa0/0 API Software interface going down

HSRP: Fa0/0 Interface down

HSRP: Fa0/0 Grp 1 Active: b/HSRP disabled

HSRP: Fa0/0 Grp 1 Active router is unknown, was local

HSRP: Fa0/0 Grp 1 Standby router is unknown, was 172.16.172.54

HSRP: Fa0/0 Grp 1 Active -> Init

%HSRP-6-STATECHANGE: FastEthernet0/0 Grp 1 state Active -> Init

HSRP: Fa0/0 Grp 1 Redundancy "VPNHA" state Active -> Init

%CRYPTO-5-SESSION_STATUS: Crypto tunnel is DOWN.

Peer 172.16.172.69:500 Id: 172.16.172.69

HSRP: Fa0/0 Grp 1 Redundancy enquiry for VPNHA succeeded

HSRP: Fa0/0 API Add active HSRP addresses to ARP table

%LINK-5-CHANGED: Interface FastEthernet0/0,

changed state to administratively down

HSRP: API Hardware state change

%LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet0/0,

changed state to down

インターフェイスがシャットダウンされたため、HSRP の状態は「Init」に変わります。

paal#show standby

FastEthernet0/0 - Group 1

State is Init (interface down)

3 state changes, last state change 00:07:29

Virtual IP address is 172.16.172.53

Active virtual MAC address is unknown

Local virtual MAC address is 0000.0c07.ac01 (v1 default)

Hello time 3 sec, hold time 10 sec

Preemption enabled

Active router is unknown

Standby router is unknown

Priority 200 (configured 200)

Track interface FastEthernet0/1 state Up decrement 150

IP redundancy name is "VPNHA" (cfgd)

Cisco 7204VXR-2 はアクティブな HSRP ルータになり、状態は「Active」に変わります。

HSRP: Fa0/0 Grp 1 Standby: c/Active timer expired (172.16.172.52)

HSRP: Fa0/0 Grp 1 Active router is local, was 172.16.172.52

HSRP: Fa0/0 Grp 1 Standby router is unknown, was local

HSRP: Fa0/0 Grp 1 Standby -> Active (active 0->1, passive 2->1)

%HSRP-6-STATECHANGE: FastEthernet0/0 Grp 1 state Standby -> Active

HSRP: Fa0/0 Grp 1 Redundancy "VPNHA" state Standby -> Active

!--- VPN route 20.1.1.0/24 is added to the routing table.

IPSEC(rte_mgr): VPN Route Added 20.1.1.0 255.255.255.0

via 172.16.172.69 in IP DEFAULT TABLE

7204VXR-2#show standby

FastEthernet0/0 - Group 1

State is Active

2 state changes, last state change 00:10:38

Virtual IP address is 172.16.172.53

Active virtual MAC address is 0000.0c07.ac01

Local virtual MAC address is 0000.0c07.ac01 (v1 default)

Hello time 3 sec, hold time 10 sec

Next hello sent in 0.116 secs

Preemption enabled

Active router is local

Standby router is unknown

Priority 100 (default 100)

Track interface FastEthernet1/0 state Up decrement 10

IP redundancy name is "VPNHA" (cfgd)

RRI がイネーブルであると、フェールオーバーの際に VPN ルートがダイナミックにアップデートされます。スタティック ルート 20.1.1.0/24 が削除され、Cisco 7204VXR-1 ルータは Cisco 7204VXR-2 ルータからのルートを学習します。

show ip route コマンドから得られた出力には、このダイナミック アップデートが示されています。

7204VXR-1#show ip route

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF,

IA - OSPF inter area, N1 - OSPF NSSA external type 1,

N2 - OSPF NSSA external type 2, E1 - OSPF external type 1,

E2 - OSPF external type 2, i - IS-IS, su - IS-IS summary,

L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area,

* - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is not set

99.0.0.0/32 is subnetted, 1 subnets

O   99.99.99.99 [110/2] via 10.1.1.3, 02:46:16, FastEthernet0/1

20.0.0.0/24 is subnetted, 1 subnets

O E2   20.1.1.0 [110/20] via 10.1.1.2, 00:08:35, FastEthernet0/1

172.16.0.0/28 is subnetted, 1 subnets

O E2   172.16.172.64 [110/20] via 10.1.1.2, 00:07:56, FastEthernet0/1

10.0.0.0/8 is variably subnetted, 2 subnets, 2 masks

C  10.1.1.0/24 is directly connected, FastEthernet0/1

S   10.48.66.0/23 [1/0] via 10.1.1.2

スタティック VPN ルートは、Cisco 7204VXR-2 ルータのルーティング テーブルに挿入されます。

7204VXR-2#show ip route

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF,

IA - OSPF inter area, N1 - OSPF NSSA external type 1,

N2 - OSPF NSSA external type 2, E1 - OSPF external type 1,

E2 - OSPF external type 2, i - IS-IS, su - IS-IS summary,

L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area,

* - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is not set

99.0.0.0/32 is subnetted, 1 subnets

O   99.99.99.99 [110/2] via 10.1.1.3, 03:04:18, FastEthernet1/0

20.0.0.0/24 is subnetted, 1 subnets

S   20.1.1.0 [1/0] via 172.16.172.69

172.16.0.0/28 is subnetted, 2 subnets

C   172.16.172.48 is directly connected, FastEthernet0/0

S   172.16.172.64 [1/0] via 172.16.172.49

10.0.0.0/24 is subnetted, 1 subnets

C   10.1.1.0 is directly connected, FastEthernet1/0

内部ルータ7206-1は、OSPFネイバールータ7204VXR-2からリモートVPNピアへの20.1.1/24ルートを学習します。これらのルーティング変更は、HSRP/RRIとOSPFの組み合わせによって動的に行われます。

7206-1#show ip route

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF,

IA - OSPF inter area, N1 - OSPF NSSA external type 1,

N2 - OSPF NSSA external type 2, E1 - OSPF external type 1,

E2 - OSPF external type 2, i - IS-IS, su - IS-IS summary,

L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area,

* - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is not set

99.0.0.0/32 is subnetted, 1 subnets

C     99.99.99.99 is directly connected, Loopback0

20.0.0.0/24 is subnetted, 1 subnets

O E2     20.1.1.0 [110/20] via 10.1.1.2, 00:13:55, FastEthernet0/1

172.16.0.0/28 is subnetted, 1 subnets

O E2     172.16.172.64 [110/20] via 10.1.1.2, 00:13:17, FastEthernet0/1

10.0.0.0/8 is variably subnetted, 2 subnets, 2 masks

C     10.1.1.0/24 is directly connected, FastEthernet0/1

O E2     10.48.66.0/23 [110/20] via 10.1.1.2, 03:06:08, FastEthernet0/1

Cisco 7204VXR-2 が HSRP フェールオーバーの際にアクティブ ルータになった後、Cisco 7204VXR-2 と Cisco VPN 7200 ルータとの間の VPN トラフィックによって、ISAKMP と IPSec SA が起動します。

VPN 7200 ルータでの show crypto isakmp sa コマンドおよび show crypto ipsec sa コマンドの出力を次に示します。

7204VXR-2#show crypto isakmp sa detail

Codes: C - IKE configuration mode, D - Dead Peer Detection

K - Keepalives, N - NAT-traversal

X - IKE Extended Authentication

psk - Preshared key, rsig - RSA signature

renc - RSA encryption

C-id  Local         Remote       I-VRF  Encr Hash Auth DH Lifetime Cap.

1    172.16.172.53  172.16.172.69        des  md5   psk  1  23:53:47 K

Connection-id:Engine-id = 1:1(software)

7204VXR-2#show crypto ipsec sa

interface: FastEthernet0/0

Crypto map tag: vpn, local addr. 172.16.172.53

protected vrf:

local ident (addr/mask/prot/port): (99.99.99.99/255.255.255.255/0/0)

remote ident (addr/mask/prot/port): (20.1.1.0/255.255.255.0/0/0)

current_peer: 172.16.172.69:500

PERMIT, flags={origin_is_acl,}

#pkts encaps: 9, #pkts encrypt: 9, #pkts digest: 9

#pkts decaps: 9, #pkts decrypt: 9, #pkts verify: 9

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0

#pkts not decompressed: 0, #pkts decompress failed: 0

#send errors 0, #recv errors 0

local crypto endpt.: 172.16.172.53, remote crypto endpt.: 172.16.172.69

path mtu 1500, media mtu 1500

current outbound spi: 83827275

inbound esp sas:

spi: 0x8D70E8A3(2372987043)

transform: esp-des esp-md5-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 2000, flow_id: 1, crypto map: vpn

crypto engine type: Software, engine_id: 1

sa timing: remaining key lifetime (k/sec): (4453897/3162)

ike_cookies: 95074F89 3FF73F2B F70FEDF6 5998090C

IV size: 8 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0x83827275(2206364277)

transform: esp-des esp-md5-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 2001, flow_id: 2, crypto map: vpn

crypto engine type: Software, engine_id: 1

sa timing: remaining key lifetime (k/sec): (4453898/3162)

ike_cookies: 95074F89 3FF73F2B F70FEDF6 5998090C

IV size: 8 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas: vpn7200#show crypto isa sa

dst  src  state  conn-id slot

172.16.172.53   172.16.172.69   QM_IDLE 1       0

vpn7200#show crypto ipsec sa

interface: FastEthernet0/1

Crypto map tag: vpn, local addr. 172.16.172.69

local ident (addr/mask/prot/port): (20.1.1.0/255.255.255.0/0/0)

remote ident (addr/mask/prot/port): (99.99.99.99/255.255.255.255/0/0)

current_peer: 172.16.172.53

PERMIT, flags={origin_is_acl,}

#pkts encaps: 19, #pkts encrypt: 19, #pkts digest 19

#pkts decaps: 19, #pkts decrypt: 19, #pkts verify 19

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0, #pkts decompress failed: 0

#send errors 6, #recv errors 0

local crypto endpt.: 172.16.172.69, remote crypto endpt.: 172.16.172.53

path mtu 1500, ip mtu 1500

current outbound spi: 8D70E8A3

inbound esp sas:

spi: 0x83827275(2206364277)

transform: esp-des esp-md5-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 2029, flow_id: 1, crypto map: vpn

sa timing: remaining key lifetime (k/sec): (4607997/3070)

IV size: 8 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0x8D70E8A3(2372987043)

transform: esp-des esp-md5-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 2030, flow_id: 2, crypto map: vpn

sa timing: remaining key lifetime (k/sec): (4607998/3070)

IV size: 8 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas:

元の HSRP プライマリ ルータが停止状態から回復した後

元の HSRP プライマリ ルータである Cisco 7204VXR-1 でサービスが回復した後、このデバイスはアクティブ ルータとしての地位を取り戻します。これは、このデバイスの方が優先順位が高く、HSRP preempt が設定されているためです。

他のルータから得られた show コマンドおよび debug コマンドの出力には、HSRP と IPSec の他のスイッチオーバーが示されています。ISAKMP および IPSec SA は自動的に再確立され、ルーティング情報の変更はダイナミックにアップデートされます。

次の出力例には、ルータ 7204VXR-1 の状態が「Active」に変わることが示されています。

HSRP: Fa0/0 API 172.16.172.52 is not an HSRP address

HSRP: Fa0/0 API MAC address update

HSRP: Fa0/0 API Software interface coming up

%LINK-3-UPDOWN: Interface FastEthernet0/0, changed state to up

HSRP: API Hardware state change

HSRP: Fa0/0 API Software interface coming up

%LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet0/0,

changed state to up

HSRP: Fa0/0 Interface up

HSRP: Fa0/0 Starting minimum interface delay (1 secs)

HSRP: Fa0/0 Interface min delay expired

HSRP: Fa0/0 Grp 1 Init: a/HSRP enabled

HSRP: Fa0/0 Grp 1 Init -> Listen

HSRP: Fa0/0 Grp 1 Redundancy "VPNHA" state Init -> Backup

HSRP: Fa0/0 Grp 1 Listen: c/Active timer expired (unknown)

HSRP: Fa0/0 Grp 1 Listen -> Speak

HSRP: Fa0/0 Grp 1 Redundancy "VPNHA" state Backup -> Speak

HSRP: Fa0/0 Grp 1 Speak: d/Standby timer expired (unknown)

HSRP: Fa0/0 Grp 1 Standby router is local

HSRP: Fa0/0 Grp 1 Speak -> Standby

HSRP: Fa0/0 Grp 1 Redundancy "VPNHA" state Speak -> Standby

HSRP: Fa0/0 Grp 1 Redundancy enquiry for VPNHA succeeded

HSRP: Fa0/0 Grp 1 Standby: c/Active timer expired (unknown)

HSRP: Fa0/0 Grp 1 Active router is local

HSRP: Fa0/0 Grp 1 Standby router is unknown, was local

HSRP: Fa0/0 Grp 1 Standby -> Active

%HSRP-6-STATECHANGE: FastEthernet0/0 Grp 1 state Standby -> Active

HSRP: Fa0/0 Grp 1 Redundancy "VPNHA" state Standby -> Active

HSRP: Fa0/0 Grp 1 Active: i/Resign rcvd (100/172.16.172.54)

HSRP: Fa0/0 Grp 1 Redundancy group VPNHA state Active -> Active

HSRP: Fa0/0 Grp 1 Redundancy group VPNHA state Active -> Active

HSRP: Fa0/0 Grp 1 Standby router is 172.16.172.54

ルータ 7204VXR-2 の状態が「Standby」に変わります。 VPN ルートがルーティング テーブルから削除されます。

HSRP: Fa0/0 Grp 1 Standby router is 172.16.172.52

HSRP: Fa0/0 Grp 1 Hello in 172.16.172.52 Active pri 200 vIP 172.16.172.53

hel 3000 hol 10000 id 0000.0c07.ac01

HSRP: Fa0/0 Grp 1 Active router is 172.16.172.52, was local

HSRP: Fa0/0 Grp 1 Standby router is unknown, was 172.16.172.52

HSRP: Fa0/0 Grp 1 Active: g/Hello rcvd from

higher pri Active router (200/172.16.172.52)

HSRP: Fa0/0 Grp 1 Active -> Speak (active 1->0, passive 0->1)

%HSRP-6-STATECHANGE: FastEthernet0/0 Grp 1 state Active -> Speak

HSRP: Fa0/0 Grp 1 Redundancy "VPNHA" state Active -> Speak

HSRP: Fa0/0 Grp 1 Speak: d/Standby timer expired (unknown)

HSRP: Fa0/0 Grp 1 Standby router is local

HSRP: Fa0/0 Grp 1 Speak -> Standby (active 0, passive 1)

HSRP: Fa0/0 Grp 1 Redundancy "VPNHA" state Speak -> Standby

HSRP: Fa0/0 Grp 1 Redundancy enquiry for VPNHA succeeded

addr 172.16.172.53 name VPNHA state Speak

active 172.16.172.52 standby 172.16.172.54

!--- The VPN route is removed.

IPSEC(rte_mgr): VPN Route Removed 20.1.1.0 255.255.255.0

via 172.16.172.69 in IP DEFAULT TABLE

関連情報

- IPSec ネゴシエーション/IKE プロトコルに関するサポート ページ

- テクニカル サポートとドキュメント – Cisco Systems