内容

概要

問題

解決方法

概要

このドキュメントでは、Cisco IOS®-XE SD-WANが稼働するルータで、元の（通常/クラシック）Cisco IOS-XEソフトウェアにソフトウェアダウングレードする方法について説明します。

問題

ユーザがboot system flash bootflash:イメージを設定します。

router#config-transaction

admin connected from 127.0.0.1 using console on router

router(config)# boot ?

^

% Invalid input detected at '^' marker.

router(config)# boot system flash bootflash:c1100-universalk9_ias.16.06.05.SPA.bin

-------------------^

syntax error: unknown command

解決方法

この手順は、Cisco IOS-XE SD-WANソフトウェアへのソフトウェアアップグレードに似ています。

1. 必要なソフトウェアをブートフラッシュにコピーするか、USBフラッシュドライブにアップロードします。

2. ルータが管理コンソールに接続されていることを確認します。

3. PnPが実行されている場合は、CLIへのアクセスを許可するためにPnPを停止します。

router# pnpa service discovery stop

4. config-registerを0x0に変更します。

router# config-transaction

router(config)# config-register 0x0

router(config)# commit

router(config)# end

5. ルータのリブート時にconfig-registerが0x0に設定されていることを確認します。

router# show bootvar

BOOT variable = bootflash:packages.conf,1;bootflash:prev_packages.conf,1;

CONFIG_FILE variable does not exist

BOOTLDR variable does not exist

Configuration register is 0x0

Standby not ready to show bootvar

6. ルータをリブートします。

router# reload

Proceed with reload? [confirm] Yes

ルータがリブートし、ROMMONモードになります。

7. ロードするソフトウェアイメージ名を取得するには、ルータのブートフラッシュをチェックします。

rommon 1> dir bootflash

rommon 2> boot bootflash:c1100-universalk9_ias.16.06.05.SPA.bin

ルータが以前のソフトウェアイメージでリブートします。

8. リロード後、config-registerを元の値（0x2102など）に設定して保存します。

router# config terminal

router(config)# config-register 0x2102

router(config)# end

router# wr