内容

概要

前提条件

要件

使用するコンポーネント

背景説明

設定

確認

トラブルシュート

概要

このドキュメントでは、ASR903ルータでFlexible Netflow機能を有効にするために必要な事前設定について説明します。

注：ここをクリックして、Flexible Netflowの動作の詳細を確認してください。

前提条件

要件

Flexible Netflow機能の設定に関する知識を持っておくことをお勧めします。

使用するコンポーネント

このドキュメントの内容は、特定のソフトウェアやハードウェアのバージョンに限定されるものではありません。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

背景説明

ASR903プラットフォーム上のFlexible Netflowは、XE3.18.0 SPリリースからサポートされています。ただし、この機能を設定しようとすると、次のエラーが発生します。

Router_ASR903(config)#int BDI10

Router_ASR903(config-if)#ip flow monitor TEST_IPV4_MONITOR input

% Flow Monitor: Failed to add monitor to interface: Unsupported template

Router_ASR903(config-if)#int GigabitEthernet0/1/0

Router_ASR903(config-if)#ip flow monitor TEST_IPV4_MONITOR input

% Flow Monitor: Failed to add monitor to interface: Unsupported template

Router_ASR903#

設定

ASR903ルータでmetroaggrservicesライセンスを有効にする必要があります。次に設定例を示します。

Router_ASR903#config t

Enter configuration commands, one per line. End with CNTL/Z.

Router_ASR903(config)#license boot level metroaggrservices

Router_ASR903(config)#end

Router_ASR903#write

Building configuration...

[OK]

Router_ASR903#

新しいライセンスレベルを有効にするには、デバイスのリロードが必要です。デバイスがリロードされると、show versionの出力からライセンスレベルを確認できます。

Cisco IOS XEソフトウェアバージョン03.18.00.SP.156-2.SP-ext

Cisco IOSソフトウェア、ASR900ソフトウェア(PPC_LINUX_IOSD-UNIVERSALK9_NPE-M)、バージョン15.6(2)SP、リリースソフトウェア(fc2)

Technical Support:http://www.cisco.com/techsupport

Copyright (c) 1986-2016 by Cisco Systems, Inc.

編日時：27-Jul-16 08:13 by mcpre

Cisco IOS-XE software, Copyright (c) 2005-2016 by cisco Systems, Inc.

All rights reserved.Certain components of Cisco IOS-XE software are

GNU General Public License （以下「GPL」）バージョン2.0に基づいてライセンスを受けます。

software code licensed under GPL Version 2.0 is free software that comes

with ABSOLUTELY NO WARRANTY.You can redistribute and/or modify such

GPLバージョン2.0の条件に基づくGPLコード。詳細については、

documentation or "License Notice" file accompanying the IOS-XE software,

or the applicable URL provided on the flyer accompanying the IOS-XE

説明します。

ROM:IOS-XE ROMMON

Router_ASR903の稼働時間は18時間16分

このコントロールプロセッサの稼働時間は18時間18分です

2016年8月12日（金）08:02:20 UTC(GMT)にリロードしてROMに戻されたシステム

2016年8月14日の14:15:01 UTC(GMT)に再起動したシステム

システムイメージファイルは「bootflash:Image/packages.conf」です。

Last reload reason:電源オン

This product contains cryptographic features and is subject to United

States and local country laws governing import, export, transfer and

use.Delivery of Cisco cryptographic products does not imply

third-party authority to import, export, distribute or use encryption.

Importers, exporters, distributors and users are responsible for

compliance with U.S. and local country laws.By using this product you

agree to comply with applicable laws and regulations.If you are unable

to comply with U.S. and local laws, return this product immediately.

A summary of U.S. laws governing Cisco cryptographic products may be found at:

http://www.cisco.com/wwl/export/crypto/tool/stqrg.html

詳細については、export@cisco.comまでお問い合わせください。

License Level: metroaggrservices

License Type: Permanent

Next reload license Level: metroaggrservices

cisco ASR-903(RSP2)プロセッサ（リビジョンRSP2）、912985K/6147Kバイトのメモリ

プロセッサボードID FOX1929P433

8 Gigabit Ethernet interfaces

10ギガビットイーサネットインターフェイス

32768K バイトの不揮発性構成メモリ。

3670016Kバイトの物理メモリ。

bootflash:

Configuration register is 0x2102

metroaggrservicesライセンスがルータで有効になったら、次のテンプレートを設定します。

Router_ASR903#config t

Enter configuration commands, one per line. End with CNTL/Z.

Router_ASR903(config)#sdm prefer video

Router_ASR903#end

Router_ASR903#write

Building configuration...

[OK]

Router_ASR903#

sdmテンプレートを設定したら、Flexible NetFlow機能を設定して動作させることができます。

Flexible NetFlow機能の設定例を次に示します。

Router_ASR903

!

flow record TEST_IPV4_RECORD

match ipv4 source address

match ipv4 destination address

match ipv4 protocol

match transport source-port

match transport destination-port

collect counter packets

collect counter bytes

!

!

flow exporter TEST_EXPORTER

destination 192.168.100.1

source Loopback1

transport udp 9999

!

!

flow monitor TEST_IPV4_MONITOR

exporter TEST_EXPORTER

cache timeout inactive 20

cache timeout active 180

record TEST_IPV4_RECORD

!

interface GigabitEthernet0/1/0

ip address 10.10.10.2 255.255.255.0

ip flow monitor TEST_IPV4_MONITOR input

speed 1000

no negotiation auto

!

確認

ここでは、設定が正常に機能しているかどうかを確認します。

Flexible Netflow機能の動作は、次の情報を使用して確認できます

トラブルシュート

現在、この設定に関する特定のトラブルシューティング情報はありません。