内容

概要

前提条件

要件

使用するコンポーネント

背景説明

トポロジ

初期検証

BGPの設定

セグメントルーティングの設定

最終検証

概要

このドキュメントでは、Cisco IOS®XRソフトウェアを使用して、セグメントルーティングサービスプロバイダー(SP)間のエンドツーエンド接続を確認するプロセスについて説明します。

前提条件

要件

次の項目に関する知識があることが推奨されます。

- 基本的なIPルーティングの知識

- Cisco IOSおよびCisco IOS XRコマンドラインの知識

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づいています。

- Cisco IOS XRソフトウェアを搭載したルータ

- Cisco IOSソフトウェアが稼働するルータ

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。本稼働中のネットワークでは、各コマンドによって起こる可能性がある影響を十分確認してください。

背景説明

このドキュメントの目的は、セグメントルーティングクラウドを作成するための基本設定と、Cisco IOS XRルータのエンドツーエンド接続を確認する方法を示すことです。

トポロジ

Network Topology

初期検証

BGPの設定

CE-1

Loopback55は、ルータCE-1のLAN側をシミュレートします。このプレフィクスは、eBGPを介してPE-1ネイバーにアドバタイズできます。

CE-1#show run | section r b

router bgp 65535

bgp router-id 10.1.1.1

bgp log-neighbor-changes

redistribute connected

redistribute eigrp 10

neighbor 172.16.20.2 remote-as 8181

CE-1#show ip bgp neighbors 172.16.20.2 advertised-routes

BGP table version is 25, local router ID is 10.1.1.1

Status codes: s suppressed, d damped, h history, * valid, > best, i - internal,

r RIB-failure, S Stale, m multipath, b backup-path, f RT-Filter,

x best-external, a additional-path, c RIB-compressed,

t secondary path,

Origin codes: i - IGP, e - EGP, ? - incomplete

RPKI validation codes: V valid, I invalid, N Not found

Network          Next Hop            Metric LocPrf Weight Path

*>   10.1.1.1/32      0.0.0.0                  0         32768 ?

*>   10.11.11.11/32   192.168.1.1          10880         32768 ?

*> 10.55.55.55/32 0.0.0.0 0 32768 ?

*>   172.16.20.0/30   0.0.0.0                  0         32768 ?

*>   192.168.1.0      0.0.0.0                  0         32768 ?

Total number of prefixes 5

PE-1

このルータはプレフィックス10.55.55.55/32を受信し、接続を確立しました。これで、このルータをサービスプロバイダークラウドにアドバタイズできます。

RP/0/RP0/CPU0:PE-1#show run vrf

Fri Jan 27 15:07:10.465 UTC

vrf Yellow

address-family ipv4 unicast

import route-target

200:200

!

export route-target

200:200

!

RP/0/RP0/CPU0:PE-1#show run router bgp

Fri Jan 27 14:54:33.488 UTC

router bgp 8181

bgp router-id 10.2.2.2

address-family ipv4 unicast

!

address-family vpnv4 unicast

!

neighbor 10.3.3.3

remote-as 8181

update-source Loopback0

address-family vpnv4 unicast

route-policy PASS in

route-policy PASS out

!

!

vrf Yellow

rd 200:200

address-family ipv4 unicast

!

neighbor 172.16.20.1

remote-as 65535

address-family ipv4 unicast

route-policy PASS in

route-policy PASS out

as-override

!

RP/0/RP0/CPU0:PE-1#show bgp vrf Yellow ipv4 unicast neighbors 172.16.20.1 routes

Fri Jan 27 14:54:48.433 UTC

BGP VRF Yellow, state: Active

BGP Route Distinguisher: 200:200

VRF ID: 0x60000001

BGP router identifier 10.2.2.2, local AS number 8181

Non-stop routing is enabled

BGP table state: Active

Table ID: 0xe0000001   RD version: 73

BGP main routing table version 73

BGP NSR Initial initsync version 2 (Reached)

BGP NSR/ISSU Sync-Group versions 0/0

Status codes: s suppressed, d damped, h history, * valid, > best

i - internal, r RIB-failure, S stale, N Nexthop-discard

Origin codes: i - IGP, e - EGP, ? - incomplete

Network            Next Hop            Metric LocPrf Weight Path

Route Distinguisher: 200:200 (default for vrf Yellow)

*> 10.1.1.1/32        172.16.20.1              0             0 65535 ?

*> 10.11.11.11/32     172.16.20.1          10880             0 65535 ?

*> 10.55.55.55/32 172.16.20.1 0 0 65535 ?

*> 172.16.20.0/30     172.16.20.1              0             0 65535 ?

*> 192.168.1.0/24     172.16.20.1              0             0 65535 ?

Processed 5 prefixes, 5 paths

RP/0/RP0/CPU0:PE-1#ping vrf Yellow 10.55.55.55

Fri Jan 27 14:55:06.077 UTC

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.55.55.55, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/5/7 ms

CE-2

Loopback66はCE-2ルータのLAN側をシミュレートします。CE-1と同様に、このルータはeBGP経由でネイバールータPE-2にプレフィックスをアドバタイズします。

CE-2#show run | section r b

router bgp 65535

bgp router-id 10.5.5.5

bgp log-neighbor-changes

redistribute connected

redistribute eigrp 10

neighbor 172.16.50.1 remote-as 8181

CE-2#show ip bgp neighbors 172.16.50.1 advertised-routes

BGP table version is 15, local router ID is 10.5.5.5

Status codes: s suppressed, d damped, h history, * valid, > best, i - internal,

r RIB-failure, S Stale, m multipath, b backup-path, f RT-Filter,

x best-external, a additional-path, c RIB-compressed,

t secondary path,

Origin codes: i - IGP, e - EGP, ? - incomplete

RPKI validation codes: V valid, I invalid, N Not found

Network          Next Hop            Metric LocPrf Weight Path

*>   10.5.5.5/32      0.0.0.0                  0         32768 ?

*>   10.22.22.22/32   192.168.4.1          10880         32768 ?

*>   10.66.66.66/32   0.0.0.0                  0         32768 ?

*>   172.16.50.0/30   0.0.0.0                  0         32768 ?

*>   192.168.4.0      0.0.0.0                  0         32768 ?

Total number of prefixes 5

PE-2

このルータはプレフィックス10.66.66.66/32を受信し、サービスプロバイダークラウドにアドバタイズできるようになりました。

RP/0/RP0/CPU0:PE-2#show run vrf

Fri Jan 27 15:07:51.117 UTC

vrf Yellow

address-family ipv4 unicast

import route-target

200:200

!

export route-target

200:200

!

RP/0/RP0/CPU0:PE-2#show run router bgp

Fri Jan 27 14:59:56.957 UTC

router bgp 8181

bgp router-id 10.4.4.4

address-family ipv4 unicast

!

address-family vpnv4 unicast

!

neighbor 10.3.3.3

remote-as 8181

update-source Loopback0

address-family vpnv4 unicast

route-policy PASS in

route-policy PASS out

!

!

vrf Yellow

rd 200:200

address-family ipv4 unicast

!

neighbor 172.16.50.2

remote-as 65535

address-family ipv4 unicast

route-policy PASS in

route-policy PASS out

as-override

!

RP/0/RP0/CPU0:PE-2#show bgp vrf Yellow ipv4 unicast neighbors 172.16.50.2 routes

Fri Jan 27 15:00:10.383 UTC

BGP VRF Yellow, state: Active

BGP Route Distinguisher: 200:200

VRF ID: 0x60000001

BGP router identifier 10.4.4.4, local AS number 8181

Non-stop routing is enabled

BGP table state: Active

Table ID: 0xe0000001   RD version: 64

BGP main routing table version 64

BGP NSR Initial initsync version 2 (Reached)

BGP NSR/ISSU Sync-Group versions 0/0

Status codes: s suppressed, d damped, h history, * valid, > best

i - internal, r RIB-failure, S stale, N Nexthop-discard

Origin codes: i - IGP, e - EGP, ? - incomplete

Network            Next Hop            Metric LocPrf Weight Path

Route Distinguisher: 200:200 (default for vrf Yellow)

*> 10.5.5.5/32        172.16.50.2              0             0 65535 ?

*> 10.22.22.22/32     172.16.50.2          10880             0 65535 ?

*> 10.66.66.66/32     172.16.50.2              0             0 65535 ?

*> 172.16.50.0/30     172.16.50.2              0             0 65535 ?

*> 192.168.4.0/24     172.16.50.2              0             0 65535 ?

Processed 5 prefixes, 5 paths

RP/0/RP0/CPU0:PE-2#ping vrf Yellow 10.66.66.66

Fri Jan 27 15:00:26.020 UTC

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.66.66.66, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 3/26/120 ms

PE-1、プロバイダー、およびPE-2からのルーティング情報のステータス

このデモンストレーションでは、OSPFをIGPおよびiBGPとして設定します。

PE-1

OSPFネイバーがアップ状態で、ルートリフレクタである10.3.3.3へのiBGPセッションが確立されている。

RP/0/RP0/CPU0:PE-1#show run router ospf

Fri Jan 27 15:09:23.910 UTC

router ospf 1

router-id 10.2.2.2

area 0

!

interface GigabitEthernet0/0/0/1

!

!

!

RP/0/RP0/CPU0:PE-1#show ospf neighbor

Fri Jan 27 15:09:31.435 UTC

* Indicates MADJ interface

# Indicates Neighbor awaiting BFD session up

Neighbors for OSPF 1

Neighbor ID     Pri   State           Dead Time   Address         Interface

10.3.3.3        1     FULL/BDR        00:00:37    172.16.30.2     GigabitEthernet0/0/0/1

Neighbor is up for 16:59:30

Total neighbor count: 1

RP/0/RP0/CPU0:PE-1#show bgp vpnv4 unicast summary

Fri Jan 27 15:09:37.760 UTC

BGP router identifier 10.2.2.2, local AS number 8181

BGP generic scan interval 60 secs

Non-stop routing is enabled

BGP table state: Active

Table ID: 0x0   RD version: 0

BGP main routing table version 73

BGP NSR Initial initsync version 2 (Reached)

BGP NSR/ISSU Sync-Group versions 0/0

BGP scan interval 60 secs

BGP is operating in STANDALONE mode.

Process       RcvTblVer   bRIB/RIB   LabelVer  ImportVer  SendTblVer  StandbyVer

Speaker              73         73         73         73          73           0

Neighbor        Spk    AS MsgRcvd MsgSent   TblVer  InQ OutQ  Up/Down  St/PfxRcd

10.3.3.3          0  8181    1010     997       73    0    0 16:24:45          5

プロバイダールータ

このデバイスでは、がルートリフレクタとして動作し、ネイバー10.2.2.2および10.4.4.4とのIBGPセッションが確立されていることを確認できます

RP/0/RP0/CPU0:Provider#show run router ospf

Fri Jan 27 15:19:33.250 UTC

router ospf 1

router-id 10.3.3.3

area 0

!

interface GigabitEthernet0/0/0/1

!

interface GigabitEthernet0/0/0/2

!

RP/0/RP0/CPU0:Provider#show run router bgp

Fri Jan 27 15:11:08.321 UTC

router bgp 8181

bgp router-id 10.3.3.3

address-family ipv4 unicast

!

address-family vpnv4 unicast

!

neighbor-group IBGP

remote-as 8181

update-source Loopback0

!

neighbor 10.2.2.2

use neighbor-group IBGP

address-family vpnv4 unicast

route-policy PASS in

route-reflector-client

route-policy PASS out

next-hop-self

!

!

neighbor 10.4.4.4

use neighbor-group IBGP

address-family vpnv4 unicast

route-policy PASS in

route-reflector-client

route-policy PASS out

next-hop-self

!

RP/0/RP0/CPU0:Provider#show bgp vpnv4 unicast summary

Fri Jan 27 15:11:19.263 UTC

BGP router identifier 10.3.3.3, local AS number 8181

BGP generic scan interval 60 secs

Non-stop routing is enabled

BGP table state: Active

Table ID: 0x0   RD version: 0

BGP main routing table version 25

BGP NSR Initial initsync version 1 (Reached)

BGP NSR/ISSU Sync-Group versions 0/0

BGP scan interval 60 secs

BGP is operating in STANDALONE mode.

Process       RcvTblVer   bRIB/RIB   LabelVer  ImportVer  SendTblVer  StandbyVer

Speaker              25         25         25         25          25           0

Neighbor        Spk    AS MsgRcvd MsgSent   TblVer  InQ OutQ  Up/Down  St/PfxRcd

10.2.2.2          0  8181     998    1011       25    0    0 16:26:27          5

10.4.4.4          0  8181     997    1009       25    0    0 16:24:25          5

PE-2

OSPFネイバーがアップ状態で、ルートリフレクタである10.3.3.3へのIBGPセッションが確立されています。

RP/0/RP0/CPU0:PE-2#show run router ospf

Fri Jan 27 15:12:47.741 UTC

router ospf 1

router-id 10.4.4.4

area 0

!

interface GigabitEthernet0/0/0/2

!

RP/0/RP0/CPU0:PE-2#show ospf neighbor

Fri Jan 27 15:12:55.229 UTC

* Indicates MADJ interface

# Indicates Neighbor awaiting BFD session up

Neighbors for OSPF 1

Neighbor ID     Pri   State           Dead Time   Address         Interface

10.3.3.3        1     FULL/DR         00:00:35    172.16.40.1     GigabitEthernet0/0/0/2

Neighbor is up for 17:01:21

Total neighbor count: 1

RP/0/RP0/CPU0:PE-2#show bgp vpnv4 unicast summary

Fri Jan 27 15:13:01.911 UTC

BGP router identifier 10.4.4.4, local AS number 8181

BGP generic scan interval 60 secs

Non-stop routing is enabled

BGP table state: Active

Table ID: 0x0   RD version: 0

BGP main routing table version 64

BGP NSR Initial initsync version 2 (Reached)

BGP NSR/ISSU Sync-Group versions 0/0

BGP scan interval 60 secs

BGP is operating in STANDALONE mode.

Process       RcvTblVer   bRIB/RIB   LabelVer  ImportVer  SendTblVer  StandbyVer

Speaker              64         64         64         64          64           0

Neighbor        Spk    AS MsgRcvd MsgSent   TblVer  InQ OutQ  Up/Down  St/PfxRcd

10.3.3.3          0  8181    1011     998       64    0    0 16:26:08          5

RP/0/RP0/CPU0:PE-2#ping 10.2.2.2 source loopback0

Fri Jan 27 15:13:09.728 UTC

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.2.2.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 9/21/67 ms

RP/0/RP0/CPU0:PE-2#ping 10.3.3.3 source loopback0

Fri Jan 27 15:13:16.696 UTC

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.3.3.3, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 5/6/7 ms

セグメントルーティングの設定

PE-1

RP/0/RP0/CPU0:PE-1#show run router ospf

Fri Jan 27 16:15:56.479 UTC

router ospf 1

router-id 10.2.2.2

segment-routing mpls

area 0

segment-routing mpls

interface Loopback0

prefix-sid index 15

!

プロバイダー

RP/0/RP0/CPU0:Provider#show run router ospf

Fri Jan 27 16:17:09.471 UTC

router ospf 1

router-id 10.3.3.3

segment-routing mpls

area 0

segment-routing mpls

interface Loopback0

prefix-sid index 16

!

PE-2

RP/0/RP0/CPU0:PE-2#show run router ospf

Fri Jan 27 16:18:11.090 UTC

router ospf 1

router-id 10.4.4.4

segment-routing mpls

area 0

segment-routing mpls

interface Loopback0

prefix-sid index 17

!

最終検証

CE-1は、CE-2ルータ上のインターフェイスloopback66に到達できます。次のTraceroute出力は、10.66.66.66プレフィクス宛てのパケットがラベルスイッチパスを通ることを示しています。また、ラベルがルータPE-2を通過するときにプレフィックスSID 16017を使用していることも確認できます。

CE-1#ping 10.66.66.66 source loopback0

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.66.66.66, timeout is 2 seconds:

Packet sent with a source address of 10.1.1.1

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 9/13/32 ms

CE-1#traceroute 10.66.66.66 source loopback0

Type escape sequence to abort.

Tracing the route to 10.66.66.66

VRF info: (vrf in name/id, vrf out name/id)

1 172.16.20.2 6 msec 5 msec 5 msec

2 172.16.30.2 [MPLS: Labels 16017/24003 Exp 0] 12 msec 13 msec 16 msec 3 172.16.40.2 [MPLS: Label 24003 Exp 0] 15 msec 13 msec 12 msec

4 172.16.50.2 [AS 8181] 13 msec 11 msec *

設定ではabsoluteオプションを使用しなかったため、ラベルは16000の値から始まり、セグメントルーティング用に設定されたprefix-sidを付加しました。

RP/0/RP0/CPU0:PE-1#show cef 10.3.3.3/32

Fri Jan 27 21:32:42.813 UTC

10.3.3.3/32, version 43, labeled SR, internal 0x1000001 0x8110 (ptr 0xe3f6a00) [1], 0x600 (0xe593918), 0xa20 (0xee6e4b8)

Updated Jan 26 23:21:30.314

remote adjacency to GigabitEthernet0/0/0/1

Prefix Len 32, traffic index 0, precedence n/a, priority 1

gateway array (0xe3fbda8) reference count 3, flags 0x68, source rib (7), 0 backups

[3 type 4 flags 0x8401 (0xeeb1648) ext 0x0 (0x0)]

LW-LDI[type=1, refc=1, ptr=0xe593918, sh-ldi=0xeeb1648]

gateway array update type-time 1 Jan 26 23:21:30.314

LDI Update time Jan 26 23:21:30.315

LW-LDI-TS Jan 26 23:21:30.315

via 172.16.30.2/32, GigabitEthernet0/0/0/1, 8 dependencies, weight 0, class 0 [flags 0x0]

path-idx 0 NHID 0x0 [0xf427148 0xf4271e0]

next hop 172.16.30.2/32

remote adjacency

local label 16016      labels imposed {ImplNull}

Load distribution: 0 (refcount 3)

Hash  OK  Interface                 Address

0     Y   GigabitEthernet0/0/0/1    remote

RP/0/RP0/CPU0:PE-1#show cef 10.4.4.4/32

Fri Jan 27 21:29:36.990 UTC

10.4.4.4/32, version 45, labeled SR, internal 0x1000001 0x8110 (ptr 0xe3f65c0) [1], 0x600 (0xe593e70), 0xa28 (0xee6e508)

Updated Jan 26 23:21:47.181

remote adjacency to GigabitEthernet0/0/0/1

Prefix Len 32, traffic index 0, precedence n/a, priority 1

gateway array (0xe3fbe90) reference count 3, flags 0x68, source rib (7), 0 backups

[2 type 5 flags 0x8401 (0xeeb16a8) ext 0x0 (0x0)]

LW-LDI[type=5, refc=3, ptr=0xe593e70, sh-ldi=0xeeb16a8]

gateway array update type-time 1 Jan 26 23:21:47.182

LDI Update time Jan 26 23:21:47.182

LW-LDI-TS Jan 26 23:21:47.182

via 172.16.30.2/32, GigabitEthernet0/0/0/1, 6 dependencies, weight 0, class 0 [flags 0x0]

path-idx 0 NHID 0x0 [0xf4271e0 0x0]

next hop 172.16.30.2/32

remote adjacency

local label 16017      labels imposed {16017}

Load distribution: 0 (refcount 2)

Hash  OK  Interface                 Address

0     Y   GigabitEthernet0/0/0/1    remote

反対側からは、CE-2はCE-1ルータにあるloopback55にも到達できます。

CE-2#ping 10.55.55.55 source loopback66

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.55.55.55, timeout is 2 seconds:

Packet sent with a source address of 10.66.66.66

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 11/12/15 ms

CE-2#traceroute 10.55.55.55 source loopback66

Type escape sequence to abort.

Tracing the route to 10.55.55.55

VRF info: (vrf in name/id, vrf out name/id)

1 172.16.50.1 6 msec 5 msec 4 msec

2 172.16.40.1 [MPLS: Labels 16015/24003 Exp 0] 9 msec 16 msec 10 msec

3 172.16.30.1 [MPLS: Label 24003 Exp 0] 10 msec 13 msec 8 msec

4 172.16.20.1 [AS 8181] 11 msec 7 msec *

MPLS ラベル

次の出力では、セグメントルーティングラベルがトラフィックをエンドツーエンドで切り替えるために使用されていることを確認できます。

RP/0/RP0/CPU0:PE-1#show mpls forwarding

Fri Jan 27 20:32:13.697 UTC

Local  Outgoing    Prefix             Outgoing     Next Hop        Bytes

Label  Label       or ID              Interface                    Switched

------ ----------- ------------------ ------------ --------------- ------------

16016  Pop         SR Pfx (idx 16)    Gi0/0/0/1    172.16.30.2     126880

16017  16017       SR Pfx (idx 17)    Gi0/0/0/1    172.16.30.2     17292

24000  Pop         SR Adj (idx 0)     Gi0/0/0/1    172.16.30.2     0

24001  Aggregate   172.16.20.0/30[V]  Yellow                       11384

24002  Unlabelled  192.168.1.0/24[V]  Gi0/0/0/0    172.16.20.1     0

24003  Unlabelled  10.55.55.55/32[V]  Gi0/0/0/0    172.16.20.1     0

24004  Unlabelled  10.11.11.11/32[V]  Gi0/0/0/0    172.16.20.1     0

24005  Unlabelled  10.1.1.1/32[V]     Gi0/0/0/0    172.16.20.1     0

RP/0/RP0/CPU0:Provider#show mpls forwarding

Fri Jan 27 20:33:14.878 UTC

Local  Outgoing    Prefix             Outgoing     Next Hop        Bytes

Label  Label       or ID              Interface                    Switched

------ ----------- ------------------ ------------ --------------- ------------

16015  Pop         SR Pfx (idx 15)    Gi0/0/0/1    172.16.30.1     151687

16017  Pop         SR Pfx (idx 17)    Gi0/0/0/2    172.16.40.2     147701

24000  Pop         SR Adj (idx 0)     Gi0/0/0/1    172.16.30.1     0

24001  Pop         SR Adj (idx 0)     Gi0/0/0/2    172.16.40.2     0

RP/0/RP0/CPU0:PE-2#show mpls forwarding

Fri Jan 27 20:33:49.201 UTC

Local  Outgoing    Prefix             Outgoing     Next Hop        Bytes

Label  Label       or ID              Interface                    Switched

------ ----------- ------------------ ------------ --------------- ------------

16015  16015       SR Pfx (idx 15)    Gi0/0/0/2    172.16.40.1     25304

16016  Pop         SR Pfx (idx 16)    Gi0/0/0/2    172.16.40.1     128619

24000  Pop         SR Adj (idx 0)     Gi0/0/0/2    172.16.40.1     0

24001  Aggregate   172.16.50.0/30[V]  Yellow                       1200

24002  Unlabelled  192.168.4.0/24[V]  Gi0/0/0/3    172.16.50.2     0

24003  Unlabelled  10.66.66.66/32[V]  Gi0/0/0/3    172.16.50.2     0

24004  Unlabelled  10.5.5.5/32[V]     Gi0/0/0/3    172.16.50.2     0

24005  Unlabelled  10.22.22.22/32[V]  Gi0/0/0/3    172.16.50.2     0

CE-2#show ip bgp neighbors 172.16.50.1 advertised-routes

BGP table version is 5, local router ID is 5.5.5.5

Status codes: s suppressed, d damped, h history, * valid, > best, i - internal,

r RIB-failure, S Stale, m multipath, b backup-path, f RT-Filter,

x best-external, a additional-path, c RIB-compressed,

t secondary path,

Origin codes: i - IGP, e - EGP, ? - incomplete

RPKI validation codes: V valid, I invalid, N Not found

Network          Next Hop            Metric LocPrf Weight Path

*>   5.5.5.5/32       0.0.0.0                  0         32768 ?

*>   22.22.22.22/32   192.168.4.1          10880         32768 ?

*>   172.16.50.0/30   0.0.0.0                  0         32768 ?

*>   192.168.4.0      0.0.0.0                  0         32768 ?

Total number of prefixes 4