内容

概要

前提条件

要件

使用するコンポーネント

背景説明

設定

ネットワーク図

ASR1K

ASR9K

確認

トラブルシュート

ASR9Kの設定を確認するコマンド

L2VPN XCのチェック

インターフェイスリストの確認

インターフェイスリストで使用されるPWHEの確認

MAに正しい情報を持つPWHEがあることを確認します。

PWHEサマリー情報の確認

ラベルの確認

トラフィックドロップ/セッションが起動しない

BNG関連のshowコマンド

有効にするデバッグ

エスカレーション

概要

このドキュメントでは、ASR9Kで擬似回線ヘッドエンド(PWHE)を使用してIP over Ethernet(IPoE)セッションを設定する手順について説明します。

前提条件

要件

次の項目に関する知識があることが推奨されます。

- MPLSレイヤ2 VPN

- ASR9KのBNG機能

ヒント:BNG機能に精通するには、シスコの記事『Cisco ASR 9000シリーズブロードバンドネットワークゲートウェイ設定ガイド』を参照してください。

ヒント:MPLSレイヤ2 VPNに関する知識を得るには、シスコの記事『MPLSレイヤ2 VPNコンフィギュレーションガイド』を参照してください。

使用するコンポーネント

このドキュメントは特定のソフトウェアバージョンに限定されるものではありませんが、ASR9Kで使用したラインカードはA9K-MPA-20X1GEです。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

背景説明

BNGは、PWHEを介して加入者サポートを提供します。PWHEは、擬似回線接続を通じて顧客のエッジノードにL3接続を提供します。PWHEは、アクセス提供エッジ(A-PE)ノード間に存在するL2VPN回線を仮想インターフェイスに終端し、ネイティブIPパケットでルーティングを実行します。 各仮想インターフェイスは、アクセスクラウドに向けた1つ以上の物理インターフェイスを使用して、A-PEノード経由で顧客のルータに到達できます。

注：この機能は、PPPoE PTA、PPPoE LAC Subscriber Over PWHE、およびIPoEサブスクライバでサポートされます。

設定

ネットワーク図

このテストを実行するには、バージョン154-3.S2のASR1Kを1つ使用し、バージョンIOS-XR 5.2.2のASR9Kを使用します。OSPFは、互いのループバックアドレスに到達するためのルーティングプロトコルとして使用されます。

ASR9Kループバックアドレス：10.1.1.1/32

ASR1Kループバックアドレス：10.2.2.2/32

ASR1K

pseudowire-class MPLS

encapsulation mpls

interface GigabitEthernet1/0/0

no ip address

media-type rj45

negotiation auto

cdp enable

xconnect 10.1.1.1 2020 encapsulation mpls pw-class MPLS

end

ASR1K#show etherchannel summary

Flags:  D - down        P/bndl - bundled in port-channel

I - stand-alone s/susp - suspended

H - Hot-standby (LACP only)

R - Layer3      S - Layer2

U - in use      f - failed to allocate aggregator

M - not in use, minimum links not met

u - unsuitable for bundling

w - waiting to be aggregated

d - default port

Number of channel-groups in use: 1

Number of aggregators:           1

Group  Port-channel  Protocol    Ports

------+-------------+-----------+-----------------------------------------------

20 Po20(RU) LACP  Gi1/0/1(bndl) Gi1/1/1(bndl)

RU - L3 port-channel UP State

SU - L2 port-channel UP state

P/bndl -  Bundled

S/susp  - Suspended

interface Port-channel20

ip address 192.168.20.2 255.255.255.0

no negotiation auto

mpls ip

end

ASR9K

ASR9Kからの設定を次に示します。これはBNG PWHEとして機能します。

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show bundle bundle-ether 20

Thu May 21 06:35:39.294 UTC

Bundle-Ether20

Status:                                    Up

Local links

: 2 / 0 / 2 Local bandwidth

: 2000000 (2000000) kbps MAC address (source): 10f3.1172.02c8 (Chassis pool) Inter-chassis link: No Minimum active links / bandwidth: 1 / 1 kbps Maximum active links: 64 Wait while timer: 2000 ms Load balancing: Default LACP: Operational Flap suppression timer: Off Cisco extensions: Disabled mLACP: Not configured IPv4 BFD: Not configured Port Device State Port ID B/W, kbps -------------------- --------------- ----------- -------------- ---------- Gi0/0/1/18 Local Active 0x8000, 0x0007 1000000 Link is Active Gi0/0/1/19 Local Active 0x8000, 0x0008 1000000 Link is Active interface Bundle-Ether20 ipv4 address 192.168.20.1 255.255.255.0 load-interval 30 !

次に、ASR1KとASR9Kの間のxconnectを設定します。ASR1K(10.2.2.2/32)のループバックアドレスをxconnectネイバーとして指定します。

l2vpn

router-id 10.1.1.1

pw-class ASR1K

encapsulation mpls

transport-mode ethernet

!

!

xconnect group PWHE

p2p ASR1K

interface PW-Ether20

neighbor ipv4 10.2.2.2 pw-id 2020

pw-class ASR1K

!

!

!

!

generic-interface-list BE20_ONLY

interface Bundle-Ether20

interface GigabitEthernet0/0/1/18

interface GigabitEthernet0/0/1/19

!

interface PW-Ether20

ipv4 address 192.168.1.1 255.255.255.0

attach generic-interface-list BE20_ONLY

!

次に、サブスクライバ制御ポリシーを設定し、サブスクライバが終了するPWイーサネットインターフェイスに適用します。

dynamic-template

type ipsubscriber WDAAR_PWHE_DT

ipv4 verify unicast source reachable-via rx

ipv4 unnumbered Loopback44

ipv4 unreachables disable

!

!

policy-map type control subscriber IPoE_WDAAR_PWHE

event session-start match-first

class type control subscriber DHCPv4 do-until-failure

5 authorize aaa list WDAAR identifier source-address-mac password cisco

10 activate dynamic-template WDAAR_PWHE_DT

!

!

end-policy-map

interface PW-Ether20.250

ipv4 address 192.168.10.1 255.255.255.252

service-policy type control subscriber IPoE_WDAAR_PWHE

encapsulation dot1q 250

ipsubscriber ipv4 l2-connected

initiator dhcp

!

!

確認

この項では、設定が正しく機能していることを検証するために使用できる情報を提供します。ASR9KでxconnectがUP/UPであることを確認するために使用できるコマンドを次に示します。

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn xconnect

Legend: ST = State, UP = Up, DN = Down, AD = Admin Down, UR = Unresolved,

SB = Standby, SR = Standby Ready, (PP) = Partially Programmed

XConnect                   Segment 1                       Segment 2

Group      Name       ST   Description            ST       Description            ST

------------------------   -----------------------------   -----------------------------

PWHE       ASR1K      UP   PE20                   UP       10.2.2.2         2020   UP

----------------------------------------------------------------------------------------

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn xconnect brief

AToM

Like-to-Like                        UP       DOWN        UNR

PW-Ether                           1          0          0

Total                              1          0          0

Total                                1          0          0

Total: 1 UP, 0 DOWN, 0 UNRESOLVED

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show subscriber session filter ipv4-address 192.168.44.254

Codes: IN - Initialize, CN - Connecting, CD - Connected, AC - Activated,

ID - Idle, DN - Disconnecting, ED - End

Type         Interface                State     IP Address (Vrf)

--------------------------------------------------------------------------------

IP:DHCP      PE20.250.ip1             AC        192.168.44.254 (default)

xconnectがアップ状態になり、ASR9KでIPoEセッションがオンラインになると、アクセスインターフェイスがPW-Etherであることがわかります。

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show subscriber session filter ipv4-address 192.168.44.254 detail

Interface:                PW-Ether20.250.ip1

Circuit ID:               Unknown

Remote ID:                Unknown

Type:                     IP: DHCP-trigger

IPv4 State:               Up, Mon Apr 20 19:32:51 2015

IPv4 Address:             192.168.44.254, VRF: default

Mac Address:              001f.ca3f.7924

Account-Session Id:       00000068

Nas-Port:                 Unknown

User name:                001f.ca3f.7924

Formatted User name:      unknown

Client User name:         unknown

Outer VLAN ID:            250

Subscriber Label:         0x000001db

Created:                  Mon Apr 20 19:32:49 2015

State:                    Activated

Authentication:           unauthenticated

Authorization:            authorized

Access-interface: PW-Ether20.250 Policy Executed:

policy-map type control subscriber IPoE_WDAAR_PWHE

event Session-Start match-first [at Mon Apr 20 19:32:49 2015]

class type control subscriber DHCPv4 do-until-failure [Succeeded]

5 authorize aaa list WDAAR [Succeeded]

10 activate dynamic-template WDAAR_PWHE_DT [Succeeded]

Session Accounting: disabled

Last COA request received: unavailable

次に、PWHEを介したBNGサブスクライバのレイヤ3接続を確認します。

RP/0/RSP0/CPU0:ACDC-ASR9000-1#ping 192.168.44.254

Mon Feb 23 19:37:58.188 UTC

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.44.254, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/2 ms

RP/0/RSP0/CPU0:ACDC-ASR9000-1#

トラブルシュート

このセクションでは、設定のトラブルシューティングとASR9Kでのxconnectステータスの確認に使用できる情報を提供します。

ASR9Kの設定を確認するコマンド

次のコマンドを使用して、ASR9Kの設定が正しいことを確認できます。

- show running-configuration l2vpn

- show running-configuration int PW-Ether<Interface-Number>

- show running-configuration mpls ldp

- show running-configuration generic-interface-list

オン L2VPN XC

Xconnectをチェックします。xconnect（したがってACとPW）はアップ状態である必要があります。次のコマンドを使用して、ステータスを確認できます。

- show l2vpn xconnect summary

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn xconnect summary

Thu May 21 05:40:05.068 UTC

Number of groups: 1

Number of xconnects: 1

Up: 1  Down: 0  Unresolved: 0 Partially-programmed: 0

AC-PW: 1  AC-AC: 0  PW-PW: 0 Monitor-Session-PW: 0

Number of Admin Down segments: 0

Number of MP2MP xconnects: 0

Up 0 Down 0

Advertised: 0 Non-Advertised: 0

Number of CE Connections: 0

Advertised: 0 Non-Advertised: 0

Backup PW:

Configured   : 0

UP           : 0

Down         : 0

Admin Down   : 0

Unresolved   : 0

Standby      : 0

Standby Ready: 0

Backup Interface:

Configured   : 0

UP           : 0

Down         : 0

Admin Down   : 0

Unresolved   : 0

Standby      : 0

show l2vpn xconnect interface <Interface> detail

OR

show l2vpn xconnect detai

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn xconnect interface pw-eth20 detail

Thu May 21 05:40:55.789 UTC

Group PWHE, XC ASR1K, state is up; Interworking none

AC: PW-Ether20, state is up

Type PW-Ether

Interface-list: BE20_ONLY

Replicate status:

BE20: success

Gi0/0/1/18: success

Gi0/0/1/19: success

MTU 1500; interworking none

Internal label: 16001

Statistics:

packets: received 52970, sent 0

bytes: received 3485714, sent 0

PW: neighbor 10.2.2.2, PW ID 2020, state is up ( established )

PW class asr1k, XC ID 0xc0000001

Encapsulation MPLS, protocol LDP

Source address 10.1.1.1

PW type Ethernet, control word disabled, interworking none

PW backup disable delay 0 sec

Sequencing not set

PW Status TLV in use

MPLS         Local                          Remote

------------ ------------------------------ -----------------------------

Label        16002                          17

Group ID     0x920                          unknown

Interface    PW-Ether20                     unknown

MTU          1500                           1500

Control word disabled                       disabled

PW type      Ethernet                       Ethernet

VCCV CV type 0x2                            0x2

(LSP ping verification)        (LSP ping verification)

VCCV CC type 0x6                            0x6

(router alert label)           (router alert label)

(TTL expiry)                   (TTL expiry)

------------ ------------------------------ -----------------------------

Incoming Status (PW Status TLV):

Status code: 0x0 (Up) in Notification message

Outgoing Status (PW Status TLV):

Status code: 0x0 (Up) in Notification message

MIB cpwVcIndex: 3221225473

Create time: 21/05/2015 02:52:43 (02:48:12 ago)

Last time status changed: 21/05/2015 05:21:17 (00:19:38 ago)

Last time PW went down: 21/05/2015 03:10:45 (02:30:10 ago)

Statistics:

packets: received 52970, sent 0

bytes: received 3485714, sent 0

インターフェイスリストの確認

PWHEが使用するインターフェイスリストを表示します。このリストが存在し、適切なインターフェイスが存在している必要があります。

- show generic-interface-list name <名前>

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show generic-interface-list name BE20_ONLY

Thu May 21 05:43:26.649 UTC

generic-interface-list: BE20_ONLY (ID: 1, interfaces: 3)

Bundle-Ether20 - items pending 0, downloaded to FIB

GigabitEthernet0/0/1/18 - items pending 0, downloaded to FIB

GigabitEthernet0/0/1/19 - items pending 0, downloaded to FIB

Number of items: 1

List is downloaded to FIB

インターフェイスリストで使用されるPWHEの確認

次のプライベート出力は、どのメンバーインターフェイスが「アクティブ」、つまり、どのインターフェイスがFIBにダウンロードされたかを示しています。

- show l2vpn generic-interface-list name <名前>

- show l2vpn generic-interface-list private

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn generic-interface-list name BE20_ONLY detail

Thu May 21 05:39:04.983 UTC

Generic-interface-list: BE20_ONLY (ID: 1, interfaces: 3)

Bundle-Ether20 - items pending 0

GigabitEthernet0/0/1/18 - items pending 0

GigabitEthernet0/0/1/19 - items pending 0

Number of items: 1

PW-Ether: 20

MAに正しい情報を持つPWHEがあることを確認します。

インターフェイスリスト情報、CW、VCタイプなどは、MAで適切に設定する必要があります。

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn ma pwhe interface PW-Ether 20 private

Thu May 21 05:36:28.170 UTC

Interface: PW-Ether20   Interface State: Up, Admin state: Up

Interface handle 0x920

MTU:  1514

BW:   10000 Kbit

Interface MAC addresses (1 address):

10f3.1172.02c5

IDB is not in Replicate Linked List

IDB is not in Create Linked List

IDB is not in Attr Linked List

Opaque flags: 0xe

Flags: 0x3c

Valid  : IFH, MTU, MAC, BW

MA trace history [Num events: 32]

---------------------------------------------------

Time                Event                     Value      Sticky Many

====                =====                     ========== ====== ====

05/21/2015 02:56:05 Remove retry list         0x3        No     No

05/21/2015 02:56:05 IDB Set flag              0x3c       No     No

05/21/2015 03:08:26 IDB Set State             0x1        No     No

05/21/2015 03:08:26 IM publish attr           0x45       No     No

05/21/2015 03:08:26 IM update init-data       0x1e       No     No

05/21/2015 03:08:26 IDB Set flag              0x3c       No     No

05/21/2015 03:08:26 Remove retry list         0x3        No     No

05/21/2015 03:08:26 IDB Set flag              0x3c       No     No

05/21/2015 03:09:54 IDB Set State             0          No     No

05/21/2015 03:09:54 IM publish attr           0x45       No     No

05/21/2015 03:09:54 IM publish attr           0x52       No     No

05/21/2015 03:09:54 IM update init-data       0x1e       No     No

05/21/2015 03:09:54 IDB Set flag              0x3c       No     No

05/21/2015 03:09:54 Remove retry list         0x3        No     No

05/21/2015 03:09:54 IDB Set flag              0x3c       No     No

05/21/2015 03:09:54 Remove retry list         0x3        No     No

05/21/2015 03:09:54 IDB Set flag              0x3c       No     No

05/21/2015 03:10:45 IDB Set State             0x1        No     No

05/21/2015 03:10:45 IM publish attr           0x45       No     No

05/21/2015 03:10:45 IM update init-data       0x1e       No     No

05/21/2015 03:10:45 IDB Set flag              0x3c       No     No

05/21/2015 03:10:45 Remove retry list         0x3        No     No

05/21/2015 03:10:45 IDB Set flag              0x3c       No     No

05/21/2015 05:21:17 IDB Set State             0          No     No

05/21/2015 05:21:17 IM publish attr           0x45       No     No

05/21/2015 05:21:17 IM publish attr           0x52       No     No

05/21/2015 05:21:17 IM update init-data       0x1e       No     No

05/21/2015 05:21:17 IDB Set flag              0x3c       No     No

05/21/2015 05:21:17 Remove retry list         0x3        No     No

05/21/2015 05:21:17 IDB Set flag              0x3c       No     No

05/21/2015 05:21:17 Remove retry list         0x3        No     No

05/21/2015 05:21:17 IDB Set flag              0x3c       No     No

CLIENT MA trace history [Num events: 27]

---------------------------------------------------

Time                Event                     Value      Sticky Many

====                =====                     ========== ====== ====

05/21/2015 02:54:01 IM Notify Up              0x50049e10 No     No

05/21/2015 02:54:01 FSM state change          0x200      No     No

05/21/2015 02:54:01 FSM state change          0x2030d    No     No

05/21/2015 02:54:02 Double restart detected   0x5        No     No

05/21/2015 02:55:00 I/f created/added         0x4000540  No     No

05/21/2015 02:55:00 I/f created/added         0x4000580  No     No

05/21/2015 02:55:00 I/f created/added         0x4000540  No     No

05/21/2015 02:55:00 I/f created/added         0x4000580  No     No

05/21/2015 02:55:00 Intf list change          0x3000300  No     No

05/21/2015 02:55:00 Intf add error            0x4000540  No     No

05/21/2015 02:55:00 Intf add error            0x4000580  No     No

05/21/2015 02:55:00 FSM state change          0x30505    No     No

05/21/2015 02:55:01 Replicate result          0x13fe     No     No

05/21/2015 02:55:01 FSM state change          0x5060b    No     No

05/21/2015 02:55:01 I/f up                    0x4000580  No     No

05/21/2015 02:55:01 I/f up                    0x4000580  No     No

05/21/2015 02:55:02 I/f up                    0x4000540  No     No

05/21/2015 02:55:02 I/f up                    0x4000540  No     No

05/21/2015 02:56:05 Added to peer             0x6060606  No     No

05/21/2015 02:56:05 FSM state change          0x60704    No     No

05/21/2015 02:56:05 Fill VIMI attr            0x20002    No     No

05/21/2015 03:08:26 FSM state change          0x70605    No     No

05/21/2015 03:09:54 FSM state change          0x60704    No     No

05/21/2015 03:09:54 Fill VIMI attr            0x20002    No     No

05/21/2015 03:10:45 FSM state change          0x70605    No     No

05/21/2015 05:21:17 FSM state change          0x60704    No     No

05/21/2015 05:21:17 Fill VIMI attr            0x20002    No     No

PW-HE IDB client data

---------------------

IDB handle 0x5016db2c

Dot1q vlan: 0x81000000

Label: 16001

Remote VC label: 17

Remote PE: 10.2.2.2

Use flow-label on tx: N

L2-overhead: 0

VC-type: 5

CW: N

FSM state: 'Up'(7)

Fwding is up: Y, got route update: Y

Use OWNED_RESOURCE fwding: N

OWNED_RESOURCE fwding is up: N

OWNED_RESOURCE data&colon; 0

Replication error msg has been printed: N

VIF MA reg_handle: 50049e10

PIC array:

(nil)

Replicate retry count: 0

Configured i/f list name: 'BE20_ONLY'

From L2VPN i/f list name: 'BE20_ONLY', i/f list id: 1

L3 i/f:'Bundle-Ether20', idx=0, repl_status 1, fwding up:N, active:Y

L3 i/f:'GigabitEthernet0/0/1/18', idx=1, repl_status 1, fwding up:Y, active:Y

L3 i/f:'GigabitEthernet0/0/1/19', idx=2, repl_status 1, fwding up:Y, active:Y

List intf: 0x5016e154, PLs size:4, num in use:2

I/f:'Gi0/0/1/18', ifh:0x4000540, bundle: 0xb20, ifl idx:1, in-use:Y, misconfig:Y, in peer route:Y, VIMI active:Y

Repl:Y pending:N failed:N not supp:N, unrepl pending:N failed:N, up:Y us:3

I/f:'Gi0/0/1/19', ifh:0x4000580, bundle: 0xb20, ifl idx:2, in-use:Y, misconfig:Y, in peer route:Y, VIMI active:Y

Repl:Y pending:N failed:N not supp:N, unrepl pending:N failed:N, up:Y us:3

I/f:'', ifh:0x0, bundle: 0x0, ifl idx:0, in-use:N, misconfig:N, in peer route:N, VIMI active:N

Repl:N pending:N failed:N not supp:N, unrepl pending:N failed:N, up:N us:0

I/f:'', ifh:0x0, bundle: 0x0, ifl idx:0, in-use:N, misconfig:N, in peer route:N, VIMI active:N

Repl:N pending:N failed:N not supp:N, unrepl pending:N failed:N, up:N us:0

---------------------------------------------------

PWHEサマリー情報の確認

出力のカウンタが正しいことを確認します。

- show l2vpn pwhe summary

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn pwhe summary

Thu May 21 05:35:59.381 UTC

Number of PW-HE interfaces: 1

Up: 1  Down: 0  Admindown: 0

PW-Ether: 1

Up: 1  Down: 0  Admindown: 0

PW-IW: 0

Up: 0  Down: 0  Admindown: 0

ラベルの確認

ラベルテーブルのラベルをチェックします。最初にこのコマンドを使用して、xconnect情報から内部ラベルを取得する必要があります。

- show l2vpn xconnect detail

次に、出力でinternal Labelを探し、次に次のshowコマンドを実行して、ASR9Kでのラベルとインターフェイスの関連付けを確認します。

- show mpls label table label <internal_label> detail

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn xconnect detail

Thu May 21 05:27:11.762 UTC

Group PWHE, XC ASR1K, state is up; Interworking none

AC: PW-Ether20, state is up

Type PW-Ether

Interface-list: BE20_ONLY

Replicate status:

BE20: success

Gi0/0/1/18: success

Gi0/0/1/19: success

MTU 1500; interworking none

Internal label: 16001

Statistics:

packets: received 27293, sent 0

bytes: received 1996176, sent 0

PW: neighbor 10.2.2.2, PW ID 2020, state is up ( established )

PW class asr1k, XC ID 0xc0000001

Encapsulation MPLS, protocol LDP

Source address 10.1.1.1

PW type Ethernet, control word disabled, interworking none

PW backup disable delay 0 sec

Sequencing not set

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show mpls label table label 16001 detail

Thu May 21 05:27:55.760 UTC

Table Label   Owner                        State  Rewrite

----- ------- ---------------------------- ------ -------

0     16001   L2VPN:Active                 InUse  Yes

(PW-HE, vers:0, intf=PE20)

トラフィックドロップ/セッションが起動しない

セッションが起動しない場合は、NPでパケットがドロップされているかどうかを確認します。これらのコマンドを使用して、ASR9KのNPでのパケット廃棄を確認できます。

- clear counters

- show l2vpn xconnect detail | include packet

- clear controllers np counters all

- show controller np counters all

BNG関連のshowコマンド

ASR9KのBNG関連情報を確認するには、次のコマンドを使用します。

- show subscriber session all summary

- show subscriber manager disconnect-history unique summary

- show subscriber manager statistics debug total

- show subscriber manager statistics summary total

- show subscriber manager trace event/error

有効にするデバッグ

ASR9Kでセッションが起動せず、NPでドロップされたパケットが見つからない場合は、ASR9Kでこれらのデバッグを有効にして、ASR9Kでセッションが起動しない理由を確認できます。

- debug l2vpn ea pwhe platform verbose

- debug l2vpn forwarding platform common all

- debug pm api location

- debug pm error location

- debug uidb api errors location <location>

エスカレーション

それでも問題が解決しない場合は、Cisco TACに連絡して、ASR9KからShow techを収集してください。

- show tech-support subscriber

- show tech-support l2vpn