内容

概要

前提条件

要件

使用するコンポーネント

表記法

背景説明

手順

パスワード回復手順の例

関連情報

概要

このドキュメントでは、イネーブル パスワードとイネーブル シークレット パスワードを回復する方法について説明します。

前提条件

要件

このドキュメントに特有の要件はありません。

使用するコンポーネント

このドキュメントの情報は、Cisco 881シリーズルータに基づくものです。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。本稼働中のネットワークでは、各コマンドによって起こる可能性がある影響を十分確認してください。

関連製品

関連製品のパスワードの回復方法については、『パスワード回復手順』を参照してください。

表記法

ドキュメント表記の詳細は、『シスコ テクニカル ティップスの表記法』を参照してください。

背景説明

これらのパスワードは、特権 EXEC モードおよびコンフィギュレーション モードへのアクセスを保護します。イネーブル パスワードは回復可能ですが、イネーブル シークレット パスワードは暗号化されているため、新しいパスワードで置き換える必要があります。イネーブル シークレット パスワードを置き換えるには、このドキュメントで説明されている手順に従ってください。

手順

パスワードを回復するには、次の手順を実行します。

1. ターミナルまたはターミナル エミュレーションを搭載した PC をルータのコンソール ポートに接続します。

次のターミナル設定を使用してください。

- 9600 ボーレート

- パリティなし

- 8 データ ビット

- 1 ストップ ビット

- フロー制御なし

ケーブルの接続方法と、ターミナルをコンソール ポートまたは AUX ポートに接続する方法については、次のドキュメントを参照してください。

- コンソールおよび補助ポートに関するケーブル接続ガイド

- Catalyst スイッチのコンソール ポートに端末を接続する方法

- Catalyst スイッチのコンソール ポートに端末を接続する方法

2. ルータにアクセスできる場合は、プロンプトで show version と入力し、コンフィギュレーション レジスタ設定を記録します。show version コマンドの出力内容については、「パスワード回復手順の例」を参照してください。

注：コンフィギュレーションレジスタは通常0x2102または0x102に設定されています。ログインまたはTACACSパスワードが失われたためにルータにアクセスできなくなった場合は、コンフィギュレーションレジスタが 0x2102に設定されていると考えて間違いありません。

3. 電源スイッチを使用してルータの電源をオフにしてから、ルータの電源をオンに戻します。

4. ルータを ROMmon 状態にするため、電源投入から 60 秒以内にターミナルのキーボードの Break キーを押します。

ブレーク シーケンスが正しく動作しない場合、他のキーの組み合わせについて、『パスワード回復時の標準的なブレーク キー シーケンスの組み合わせ』を参照してください。

5. フラッシュからブートするには、rommon 1>プロンプトでconfreg 0x2142と入力します。

この手順により、パスワードが格納されているスタートアップ コンフィギュレーションをバイパスします。

6. rommon 2> プロンプトで reset と入力します。

ルータがリブートしますが、保存されたコンフィギュレーションは無視されます。

7. セットアップのそれぞれの質問の後に no と入力するか、Ctrl+C キーを押して初期セットアップ手順をスキップします。

8. Router> プロンプトで enable と入力します。

現在イネーブルモードであり、Router# プロンプトが表示される必要があります。

9. configure memory または copy startup-config running-config と入力して、不揮発性 RAM（NVRAM）の内容をメモリにコピーします。

注意:copy running-config startup-config または writeと入力しないでください。  これらのコマンドを使用すると、スタートアップ コンフィギュレーションが消去されます。

10. show running-config と入力します。

show running-config コマンドにより、ルータのコンフィギュレーションが表示されます。このコンフィギュレーションでは、shutdown コマンドがすべてのインターフェイスに設定されています。つまり、すべてのインターフェイスが現在シャットダウンされています。また、パスワード（enable password、enable secret、vty、コンソール パスワード）は暗号化形式か非暗号化形式のいずれかになっています。非暗号化形式のパスワードは再使用できます。暗号化されているパスワードは新しいパスワードに変更する必要があります。

11. configure terminal と入力します。

hostname(config)# プロンプトが表示されます。

12. enable secret <password> と入力して、enable secret パスワードを変更します。以下に、いくつかの例を示します。

hostname(config)#enable secret cisco

13. 使用するすべてのインターフェイスに対して no shutdown コマンドを発行します。

show ip interface briefコマンドを発行すると、使用するすべてのインターフェイスでup upと表示される必要があります。

14. Type  config-register

.どこから?  configuration_register_setting  は、ステップ2で記録した値か、0x2102のいずれかです。以下に、いくつかの例を示します。

hostname(config)#config-register 0x2102

15. Ctrl+Z か End キーを押して、コンフィギュレーション モードを終了します。

hostname# プロンプトが表示されます。

16. write memory または copy running-config startup-config と入力して、変更を確定します。

パスワード回復手順の例

このセクションでは、パスワード回復手順の例を示します。この例では Cisco 2600 シリーズ ルータを使用しています。Cisco 2600シリーズルータを使用していない場合でも、この出力は製品で体験した内容の例を示しています。

Router>enable

Password:

Password:

Password:

% Bad secrets

Router>show version

Cisco Internetwork Operating System Software

IOS (tm) C2600 Software (C2600-IS-M), Version 12.0(7)T, RELEASE SOFTWARE (fc2)

Copyright (c) 1986-1999 by cisco Systems, Inc.

Compiled Tue 07-Dec-99 02:21 by phanguye

Image text-base: 0x80008088, data-base: 0x80C524F8

ROM: System Bootstrap, Version 11.3(2)XA4, RELEASE SOFTWARE (fc1)

Router uptime is 3 minutes

System returned to ROM by abort at PC 0x802D0B60

System image file is "flash:c2600-is-mz.120-7.T"

cisco 2611 (MPC860) processor (revision 0x202) with 26624K/6144K bytes of memory.

Processor board ID JAB031202NK (3878188963)

M860 processor: part number 0, mask 49

Bridging software.

X.25 software, Version 3.0.0.

Basic Rate ISDN software, Version 1.1.

2 Ethernet/IEEE 802.3 interface(s)

2 Serial(sync/async) network interface(s)

1 ISDN Basic Rate interface(s)

32K bytes of non-volatile configuration memory.

8192K bytes of processor board System flash partition 1 (Read/Write)

8192K bytes of processor board System flash partition 2 (Read/Write)

Configuration register is 0x2102

Router>

!--- The router was just powercycled, and during bootup a

!--- break sequence was sent to the router.

!

*** System received an abort due to Break Key ***

signal= 0x3, code= 0x500, context= 0x813ac158

PC = 0x802d0b60, Vector = 0x500, SP = 0x80006030

rommon 1 > confreg 0x2142

You must reset or power cycle for new config to take effect

rommon 2 > reset

System Bootstrap, Version 11.3(2)XA4, RELEASE SOFTWARE (fc1)

Copyright (c) 1999 by cisco Systems, Inc.

TAC:Home:SW:IOS:Specials for info

C2600 platform with 32768 Kbytes of main memory

program load complete, entry point: 0x80008000, size: 0x6fdb4c

Self decompressing the image : ###############################

##############################################################

##############################################################

##############################################################

############################### [OK]

Restricted Rights Legend

Use, duplication, or disclosure by the Government is

subject to restrictions as set forth in subparagraph

(c) of the Commercial Computer Software - Restricted

Rights clause at FAR sec. 52.227-19 and subparagraph

(c) (1) (ii) of the Rights in Technical Data and Computer

Software clause at DFARS sec. 252.227-7013.

cisco Systems, Inc.

170 West Tasman Drive

San Jose, California 95134-1706

Cisco Internetwork Operating System Software

IOS (tm) C2600 Software (C2600-IS-M), Version 12.0(7)T, RELEASE SOFTWARE (fc2)

Copyright (c) 1986-1999 by cisco Systems, Inc.

Compiled Tue 07-Dec-99 02:21 by phanguye

Image text-base: 0x80008088, data-base: 0x80C524F8

cisco 2611 (MPC860) processor (revision 0x202) with 26624K/6144K bytes of memory.

Processor board ID JAB031202NK (3878188963)

M860 processor: part number 0, mask 49

Bridging software.

X.25 software, Version 3.0.0.

Basic Rate ISDN software, Version 1.1.

2 Ethernet/IEEE 802.3 interface(s)

2 Serial(sync/async) network interface(s)

1 ISDN Basic Rate interface(s)

32K bytes of non-volatile configuration memory.

8192K bytes of processor board System flash partition 1 (Read/Write)

8192K bytes of processor board System flash partition 2 (Read/Write)

--- System Configuration Dialog ---

Would you like to enter the initial configuration dialog? [yes/no]: n

Press RETURN to get started!

00:00:19: %LINK-3-UPDOWN: Interface BRI0/0, changed state to up

00:00:19: %LINK-3-UPDOWN: Interface Ethernet0/0, changed state to up

00:00:19: %LINK-3-UPDOWN: Interface Ethernet0/1, changed state to up

00:00:19: %LINK-3-UPDOWN: Interface Serial0/0, changed state to down

00:00:19: %LINK-3-UPDOWN: Interface Serial0/1, changed state to down

00:00:20: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0/0,

changed state to down

00:00:20: %LINEPROTO-5-UPDOWN: Line protocol on Interface Ethernet0/0,

changed state to up

Router>

00:00:20: %LINEPROTO-5-UPDOWN: Line protocol on Interface Ethernet0/1,

changed state to up

00:00:20: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial0/0,

changed state to down

00:00:20: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial0/1,

changed state to down

00:00:50: %SYS-5-RESTART: System restarted --

Cisco Internetwork Operating System Software

IOS (tm) C2600 Software (C2600-IS-M), Version 12.0(7)T, RELEASE SOFTWARE (fc2)

Copyright (c) 1986-1999 by cisco Systems, Inc.

Compiled Tue 07-Dec-99 02:21 by phanguye

00:00:50: %LINK-5-CHANGED: Interface BRI0/0,

changed state to administratively down

00:00:52: %LINK-5-CHANGED: Interface Ethernet0/0,

changed state to administratively down

00:00:52: %LINK-5-CHANGED: Interface Serial0/0,

changed state to administratively down

00:00:52: %LINK-5-CHANGED: Interface Ethernet0/1,

changed state to administratively down

00:00:52: %LINK-5-CHANGED: Interface Serial0/1,

changed state to administratively down

00:00:53: %LINEPROTO-5-UPDOWN: Line protocol on Interface Ethernet0/0,

changed state to down

00:00:53: %LINEPROTO-5-UPDOWN: Line protocol on Interface Ethernet0/1,

changed state to down

Router>

Router>enable

Router#copy startup-config running-config

Destination filename [running-config]?

1324 bytes copied in 2.35 secs (662 bytes/sec)

Router#

00:01:24: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0/0:1,

changed state to down

00:01:24: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0/0:2,

changed state to down

Router#configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

Router(config)#enable secret < password >

Router(config)#^Z

00:01:54: %SYS-5-CONFIG_I: Configured from console by console

Router#show ip interface brief

Interface   IP-Address        OK?  Method     Status                   Protocol

Ethernet0/0 10.200.40.37      YES  TFTP       administratively down    down

Serial0/0   unassigned        YES  TFTP       administratively down    down

BRI0/0      192.168.121.157   YES  unset      administratively down    down

BRI0/0:1    unassigned        YES  unset      administratively down    down

BRI0/0:2    unassigned        YES  unset      administratively down    down

Ethernet0/1 unassigned        YES  TFTP       administratively down    down

Serial0/1   unassigned        YES  TFTP       administratively down    down

Loopback0   192.168.121.157   YES  TFTP       up                       up

Router#configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

Router(config)#interface Ethernet0/0

Router(config-if)#no shutdown

Router(config-if)#

00:02:14: %LINK-3-UPDOWN: Interface Ethernet0/0, changed state to up

00:02:15: %LINEPROTO-5-UPDOWN: Line protocol on Interface Ethernet0/0,

changed state to up

Router(config-if)#interface BRI0/0

Router(config-if)#no shutdown

Router(config-if)#

00:02:26: %LINK-3-UPDOWN: Interface BRI0/0:1, changed state to down

00:02:26: %LINK-3-UPDOWN: Interface BRI0/0:2, changed state to down

00:02:26: %LINK-3-UPDOWN: Interface BRI0/0, changed state to up

00:02:115964116991: %ISDN-6-LAYER2UP: Layer 2 for Interface BR0/0,

TEI 68 changed to up

Router(config-if)#^Z

Router#

00:02:35: %SYS-5-CONFIG_I: Configured from console by console

Router#copy running-config startup-config

Destination filename [startup-config]?

Building configuration...

[OK]

Router#show version

Cisco Internetwork Operating System Software

IOS (tm) C2600 Software (C2600-IS-M), Version 12.0(7)T, RELEASE SOFTWARE (fc2)

Copyright (c) 1986-1999 by cisco Systems, Inc.

Compiled Tue 07-Dec-99 02:21 by phanguye

Image text-base: 0x80008088, data-base: 0x80C524F8

ROM: System Bootstrap, Version 11.3(2)XA4, RELEASE SOFTWARE (fc1)

Router uptime is 3 minutes

System returned to ROM by abort at PC 0x802D0B60

System image file is "flash:c2600-is-mz.120-7.T"

cisco 2611 (MPC860) processor (revision 0x202)

with 26624K/6144K bytes of memory.

Processor board ID JAB031202NK (3878188963)

M860 processor: part number 0, mask 49

Bridging software.

X.25 software, Version 3.0.0.

Basic Rate ISDN software, Version 1.1.

2 Ethernet/IEEE 802.3 interface(s)

2 Serial(sync/async) network interface(s)

1 ISDN Basic Rate interface(s)

32K bytes of non-volatile configuration memory.

8192K bytes of processor board System flash partition 1 (Read/Write)

8192K bytes of processor board System flash partition 2 (Read/Write)

Configuration register is 0x2142

Router#configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

Router(config)#config-register 0x2102

Router(config)#^Z

00:03:20: %SYS-5-CONFIG_I: Configured from console by console

Router#show version

Cisco Internetwork Operating System Software

IOS (tm) C2600 Software (C2600-IS-M), Version 12.0(7)T, RELEASE SOFTWARE (fc2)

Copyright (c) 1986-1999 by cisco Systems, Inc.

Compiled Tue 07-Dec-99 02:21 by phanguye

Image text-base: 0x80008088, data-base: 0x80C524F8

ROM: System Bootstrap, Version 11.3(2)XA4, RELEASE SOFTWARE (fc1)

Router uptime is 3 minutes

System returned to ROM by abort at PC 0x802D0B60

System image file is "flash:c2600-is-mz.120-7.T"

cisco 2611 (MPC860) processor (revision 0x202)

with 26624K/6144K bytes of memory.

Processor board ID JAB031202NK (3878188963)

M860 processor: part number 0, mask 49

Bridging software.

X.25 software, Version 3.0.0.

Basic Rate ISDN software, Version 1.1.

2 Ethernet/IEEE 802.3 interface(s)

2 Serial(sync/async) network interface(s)

1 ISDN Basic Rate interface(s)

32K bytes of non-volatile configuration memory.

8192K bytes of processor board System flash partition 1 (Read/Write)

8192K bytes of processor board System flash partition 2 (Read/Write)

Configuration register is 0x2142 (will be 0x2102 at next reload)

Router#

関連情報

- コンソールおよび補助ポートに関するケーブル接続ガイド

- すべての製品のサポートとダウンロード

- Catalyst スイッチのコンソール ポートに端末を接続する方法

- Catalystスイッチのコンソールポートへの端末接続について

- パスワード復旧中の標準的なブレーク キー シーケンスの組み合わせ

- シスコテクニカルサポートおよびダウンロード