内容

はじめに

前提条件

要件

使用するコンポーネント

表記法

背景説明

設定

ネットワーク図

コンフィギュレーション

確認

トラブルシュート

関連情報

はじめに

このドキュメントでは、Cisco 6130 デジタル加入者線アクセス マルチプレクサ（DSLAM）に接続し、Cisco 6400 ユニバーサル アクセス コンセントレータ（UAC）で終端する Cisco 827 デジタル加入者線（DSL）ルータの設定例を紹介します。

前提条件

要件

このドキュメントに関する固有の要件はありません。

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づいています。

- IOS®ソフトウェアリリース12.1(1)XBを搭載したCisco 827-4V Customer Premises Equipment（CPE；顧客宅内機器）

- Cisco 6400 UAC-NRP IOSソフトウェアリリース12.1(1)DC1（外部DHCPサーバ）または12.2(2)B（IOS DHCPサーバ）

- Cisco 6400 UAC-NSP IOSソフトウェアリリース12.0(4)DB。

- Cisco 6130 DSLAM-NI2 IOSソフトウェアリリース12.1(1)DA。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、クリアな（デフォルト）設定で作業を開始しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

表記法

ドキュメントの表記法の詳細は、「シスコ テクニカル ティップスの表記法」を参照してください。

背景説明

Cisco 827は、RFC1483ブリッジングおよびIntegrated Routing and Bridging(IRB)で設定されます。Cisco 827により、イーサネットセグメント上のPCは、6400の背後にあるDHCPサーバまたは6400 IOS DHCPサーバからアドレスを取得できます。また、BVIアドレスは、DHCPサーバからアドレスとデフォルトルートを取得するように設定されています。Cisco 6400非同期転送モード(ATM)インターフェイスは、Routed Bridge Encapsulation(RBE)で設定され、外部DHCPサーバまたはNRP上のIOS DHCPサーバで動作するように設定されています。

Cisco 6400の場合、Cisco 6400 Node Route Processor（NRP；ノードルートプロセッサ）のATM RBE機能によって、スタブブリッジ型LANからのブリッジ型RFC1483イーサネットトラフィック上でIPがルーティングされます。ルートブリッジモードに設定されたATMインターフェイスで受信されたブリッジドIPパケットは、IPヘッダーを介してルーティングされます。これらのインターフェイスは、DSLアクセスに一般的に使用されるスタブLANトポロジの特性を利用し、IRBよりも高いパフォーマンスと柔軟性を提供します。

また、IPアドレスが配布されると、DHCPクライアントのホストルートが6400ルーティングテーブルに自動的に追加されます。DHCPアドレスが解放されると、ホストルートはルーティングテーブルから削除されます。

設定

このセクションでは、このドキュメントで説明する機能を設定するために必要な情報を提供しています。

注：この文書で使用されているコマンドの詳細を調べるには、「Command Lookup ツール」を使用してください（登録ユーザのみ）。

ネットワーク図

このドキュメントでは、図1と2に示すネットワーク構成を使用しています。

図1 – シナリオ1

図2：シナリオ2

コンフィギュレーション

このドキュメントでは、次のコンフィギュレーションを使用します。

- Cisco 827

- Cisco 6400 NRP

- 6400のデバッグ（外部DHCPサーバでのRBEの使用）

- 6400のデバッグ（IOS DHCPサーバでのRBEの使用）

Cisco 827

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname R1

!

ip subnet-zero

!

bridge irb

!

interface Ethernet0

no ip address

bridge-group 1

!--- Because the Ethernet0 is bridged to the WAN interface, !--- PCs behind the ethernet0 can be setup as DHCP clients. !--- They get their addresses from the DHCP server behind the 6400, !--- or from the IOS DHCP server on the 6400.

!

interface ATM0

no ip address

no ip directed-broadcast

no ip mroute-cache

no atm ilmi-keepalive

pvc 4/100

encapsulation aal5snap

!

bundle-enable

bridge-group 1

hold-queue 224 in

!

interface BVI1

ip address dhcp client-id Ethernet0

!--- This command tells the BVI interface to get the address !--- from DHCP, and also to get the default route from DHCP.

!

ip classless

!--- Note: The default route will be inserted into !--- the routing table automatically from the DHCP server, and !--- no static routing statement is required.

no ip http server

!

bridge 1 protocol ieee

bridge 1 route ip

!

voice-port 1

timing hookflash-in 0

!

voice-port 2

timing hookflash-in 0

!

voice-port 3

timing hookflash-in 0

!

voice-port 4

timing hookflash-in 0

!

end

Cisco 6400 NRP

Current configuration:

!

version 12.1

no service pad

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname NRP

!

redundancy

main-cpu

no auto-sync standard

no secondary console enable

ip subnet-zero

!

interface Loopback1

ip address 198.1.1.1 255.255.255.0

no ip directed-broadcast

!--- This address and mask must match the intended !--- scope and network configured on the external DHCP server.

!

interface ATM0/0/0

no ip address

no ip directed-broadcast

no ip mroute-cache

no ATM ilmi-keepalive

!

interface ATM0/0/0.4 point-to-point

!--- The interface ATM0/0/0.4 point-to-point uses IP !--- unnumbered Loopback1 for its IP address requirements.

ip unnumbered Loopback1

ip helper-address <dhcp server ip address>

atm route-bridged ip

PVC 4/100

encapsulation aal5snap

!

interface Ethernet0/0/1

no ip address

no ip directed-broadcast

!

interface Ethernet0/0/0

no ip directed-broadcast

!

interface FastEthernet0/0/0

no ip address

no ip directed-broadcast

full-duplex

!

ip classless

!--- Note: For every DHCP client that is relayed an address, !--- a host route will be automatically inserted in the routing !--- table, and no host route statement for a DHCP client is required.

end

6400のデバッグ（外部DHCPサーバでのRBEの使用）

debug ip dhcp server events

Looks for existing binding. . .

00:10:56:  find_or_create(): Look for existing binding for:

00:10:56:  find_or_create(): dhcp->chaddr = 616EF9BC

00:10:56:  find_or_create(): dhcp->hlen = 6

00:10:56:  find_or_create(): dhcp->htype = 1

00:10:56:  find_or_create: address = 124.124.124.1

00:10:56:  find_or_create(): Creating new binding with data

00:10:56:  find_or_create(): dhcp->chaddr = 616EF9BC

00:10:56:  find_or_create(): dhcp->hlen = 6

00:10:56:  find_or_create(): dhcp->htype = 1

00:10:56:  find_or_create: address = 124.124.124.1

!--- Forwards DHCP DISCOVER packet from the client to the !--- external DHCP server.

00:10:56: DHCPD: Received DHCPDISCOVER on UNNUM-IF

00:10:56: DHCPD: Forwarding reply on un-numbered intf

!--- Forwards the DHCP OFFER packet from the external DHCP server !--- to the client.

00:10:56: DHCPD: Unnum: Received DHCPOFFER

00:10:56:  DHCPD: Server Address = 200.200.200.2

00:10:56:  DHCPD: Giaddr Address = 124.124.124.1

00:10:56:  find_or_create(): Look for existing binding for:

00:10:56:  find_or_create(): dhcp->chaddr = 616EF9BC

00:10:56:  find_or_create(): dhcp->hlen = 6

00:10:56:  find_or_create(): dhcp->htype = 1

00:10:56:  find_or_create: address = 124.124.124.1

!--- Forwards the DHCP REQUEST packet from the client to the external !--- DHCP server.

00:10:56: DHCPD: Received DHCPREQUEST on UNNUM-IF

00:10:56:  DHCPD: request_on_unnumif ():Real Server = 200.200.200.2

00:10:56: DHCPD: Forwarding reply on un-numbered intf

!--- Forwards the DHCP ACK packet from the DHCP server to the client.

00:10:56: DHCPD: Unnum: Received DHCPACK

00:10:56:  DHCPD: lease time = 86400

!--- Adds a dynamic host route to the client into the routing table.

00:10:56: DHCPD: dhcpd_lookup_route: host = 124.124.124.2

00:10:56: DHCPD: dhcpd_lookup_route: index = 126

00:10:56:  DHCPD: Adding new route to host 124.124.124.2

00:10:56: DHCPD: dhcpd_lookup_route: host = 124.124.124.2

00:10:56: DHCPD: dhcpd_lookup_route: index = 126

00:10:56: DHCPD: dhcpd_create_and_hash_route: host = 124.124.124.2

00:10:56: DHCPD: dhcpd_create_and_hash_route index = 126

00:10:56: DHCPD: dhcpd_add_route: lease = 86400

00:10:56:  DHCPD: Server ID saved in Binding = 200.200.200.2

00:10:56:  DHCPD: Server ID saved in Route block = 200.200.200.2

00:10:56:  DHCPD: Giaddr Address = 124.124.124.1

6400のデバッグ（IOS DHCPサーバでのRBEの使用）

debug ip dhcp server events

Assigns an address to the client from the IOS DHCP server.

23:19:09: DHCPD: assigned IP address 124.124.124.3 to

client 0063.6973.636f.2d30.3030.302e.3063.3036.2e32.3339.342d.4256.31.

23:19:10:  DHCPD: lease time = 86400

Adds a dynamic host route to the client into the routing table.

23:19:10: DHCPD: dhcpd_lookup_route: host = 124.124.124.3

23:19:10: DHCPD: dhcpd_lookup_route: index = 127

23:19:10:  DHCPD: Adding new route to host 124.124.124.3

23:19:10: DHCPD: dhcpd_lookup_route: host = 124.124.124.3

23:19:10: DHCPD: dhcpd_lookup_route: index = 127

23:19:10: DHCPD: dhcpd_create_and_hash_route: host = 124.124.124.3

23:19:10: DHCPD: dhcpd_create_and_hash_route index = 127

23:19:10: DHCPD: dhcpd_add_route: lease = 86400

確認

現在、この設定に使用できる確認手順はありません。

トラブルシュート

現在、この設定に関する特定のトラブルシューティング情報はありません。

関連情報

- RFC1483 ブリッジングを使用して RBE モードのCisco 6400 終端装置とする Cisco 827 ルータ設定

- DSL製品のサポートページ