目次

概要

はじめに

表記法

前提条件

使用するコンポーネント

設定

ネットワーク図

構成

検証

トラブルシューティング

関連情報

概要

この設定例では、ノード ルート プロセッサ（NRP）アダプタを搭載した Cisco 6400 ユニバーサル アクセス コンセントレータ（UAC）を紹介します。ポイントツーポイントおよびマルチポイント NRP の設定例を紹介します。Point-to-Point Protocol over Asynchronous Transfer Mode（PPPoA）（aal5mux ppp）で設定されている 2 つの Cisco 827 デジタル加入者線（DSL）ルータが Cisco 6400 で終端しています。

また、Cisco 6130デジタル加入者線アクセスマルチプレクサ(DSLAM)NI2およびCisco 6400ノードスイッチプロセッサ(NSP)の設定も提供されます。

はじめに

表記法

ドキュメントの表記法の詳細は、「シスコ テクニカル ティップスの表記法」を参照してください。

前提条件

このドキュメントに固有の前提条件はありません。

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づくものです。

- Cisco 827-4V Customer Premises Equipment（CPE）の IOS ソフトウェア リリース 12.1(1)XB

- Cisco 6400 UAC-NRP IOS ソフトウェア リリース 12.0(7)DC

- Cisco 6400 UAC-NSP IOS ソフトウェア リリース 12.0(4)DB

- Cisco 6130 DSLAM-NI2 の IOS ソフトウェア リリース 12.1(1)DA

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されたものです。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、使用前にその潜在的な影響について確実に理解しておく必要があります。

設定

ここでは、このドキュメントで説明する機能の設定に必要な情報を提供します。

注：この文書で使用されているコマンドの詳細を調べるには、「Command Lookup ツール」を使用してください（登録ユーザのみ）。

ネットワーク図

このドキュメントでは次の図に示すネットワーク構成を使用しています。

構成

このドキュメントでは次に示す設定を使用しています。

- Cisco 827ルータ(R1)

- Cisco 827ルータ(R2)

- Cisco 6130-NI2 DSLAM

- Cisco 6400 NSP

- ポイントツーポイントインターフェイスを使用するCisco 6400-NRP

- マルチポイントインターフェイスを使用するCisco 6400 NRP

Cisco 827ルータ(R1)

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname R1

!

ip subnet-zero

!

interface Ethernet0

no ip address

no ip directed-broadcast

!

interface ATM0

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

pvc 3/100

encapsulation aal5mux ppp dialer

dialer pool-member 1

!

bundle-enable

hold-queue 224 in

!

interface Dialer0

ip address 172.18.0.1 255.255.0.0

no ip directed-broadcast

encapsulation ppp

dialer pool 1

dialer-group 1

ppp authentication chap callin

ppp chap hostname <hostname1>

ppp chap password <password1>

!

ip classless

ip route 0.0.0.0 0.0.0.0 Dialer0

no ip http server

!

dialer-list 1 protocol ip permit

!

voice-port 1

timing hookflash-in 0

!

voice-port 2

timing hookflash-in 0

!

voice-port 3

timing hookflash-in 0

!

voice-port 4

timing hookflash-in 0

!

end

Cisco 827ルータ(R2)

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname R2

!

ip subnet-zero

!

interface Ethernet0

no ip address

no ip directed-broadcast

!

interface ATM0

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

PVC 4/100

encapsulation aal5mux ppp dialer

dialer pool-member 1

!

bundle-enable

hold-queue 224 in

!

interface Dialer0

ip address 172.18.0.2 255.255.0.0

no ip directed-broadcast

encapsulation ppp

dialer pool 1

dialer-group 1

ppp authentication chap callin

ppp chap hostname <hostname2>

ppp chap password <password2>

!

ip classless

ip route 0.0.0.0 0.0.0.0 Dialer0

!

dialer-list 1 protocol ip permit

!

voice-port 1

timing hookflash-in 0

!

voice-port 2

timing hookflash-in 0

!

voice-port 3

timing hookflash-in 0

!

voice-port 4

timing hookflash-in 0

!

end

Cisco 6130-NI2 DSLAM

ni2#

Current configuration:

!

version 12.1

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname ni2

!

slot 1 ATUC-1-4DMT

slot 2 ATUC-4FLEXIDMT

slot 13 ATUC-4FLEXIDMT

!

dsl-profile default

dmt training-mode quick

ip subnet-zero

!

ATM address 47.0091.8100.0000.0075.2b3f.4d01.0075.2b3f.4d01.00

ATM router pnni

no aesa embedded-number left-justified

node 1 level 56 lowest

redistribute ATM-static

!

interface ATM0/0

no ip address

ATM cac service-category abr deny

ATM maxvp-number 0

ATM maxvc-number 4096

ATM maxvci-bits 12

!

interface Ethernet0/0

no ip route-cache

!

interface ATM0/1

no ip address

ATM ilmi-keepalive

!

interface ATM0/2

no ip address

no ATM ilmi-keepalive

!

interface ATM1/1

no ip address

no ATM ilmi-keepalive

!

interface ATM1/2

no ip address

no ATM ilmi-keepalive

!

interface ATM1/3

no ip address

no ATM ilmi-keepalive

ATM PVC 3 100  interface  ATM0/1 3 100

!

interface ATM1/4

no ip address

no ATM ilmi-keepalive

ATM PVC 4 100  interface  ATM0/1 4 100

!

ip classless

!

end

Cisco 6400 NSP

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname NSP

!

ip subnet-zero

!

atm address 47.0091.8100.0000.0030.8027.7501.0030.8027.7501.00

atm router pnni

no aesa embedded-number left-justified

node 1 level 56 lowest

redistribute atm-static

!

interface ATM0/0/0

no ip address

no ip directed-broadcast

atm maxvp-number 0

!

interface Ethernet0/0/0

no ip directed-broadcast

!

interface ATM1/0/0

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

!

interface ATM2/0/0

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

!

interface ATM8/0/0

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

!

interface ATM8/0/1

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

atm pvc 3 100  interface  ATM1/0/0 3 100

atm pvc 4 100  interface  ATM1/0/0 4 100

!

ip classless

!

end

ポイントツーポイントインターフェイスを使用するCisco 6400-NRP

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname NRP

!

username <username1> password <password1>

username <username2> password <password2>

!

redundancy

main-cpu

no auto-sync standard

no secondary console enable

ip subnet-zero

!

interface Loopback0

ip address 172.18.0.3 255.255.0.0

no ip directed-broadcast

!

interface ATM0/0/0

no ip address

no ip directed-broadcast

no ip route-cache

no atm ilmi-keepalive

!

interface ATM0/0/0.3 point-to-point

no ip directed-broadcast

pvc 3/100

encapsulation aal5mux ppp Virtual-Template1

!

!

interface ATM0/0/0.4 point-to-point

no ip directed-broadcast

pvc 4/100

encapsulation aal5mux ppp Virtual-Template1

!

interface Ethernet0/0/1

no ip address

no ip directed-broadcast

!

interface Ethernet0/0/0

no ip directed-broadcast

!

interface FastEthernet0/0/0

no ip address

no ip directed-broadcast

full-duplex

!

interface Virtual-Template1

ip unnumbered Loopback0

no ip directed-broadcast

no peer default ip address

ppp authentication chap

!

ip classless

end

マルチポイントインターフェイスを使用するCisco 6400 NRP

NRP#

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname NRP

!

username <username1> password <password1>

username <username2> password <password2>

!

redundancy

main-cpu

no auto-sync standard

no secondary console enable

ip subnet-zero

!

interface Loopback0

ip address 172.18.0.3 255.255.0.0

no ip directed-broadcast

!

interface ATM0/0/0

no ip address

no ip directed-broadcast

no ip route-cache

no atm ilmi-keepalive

!

interface ATM0/0/0.9 multipoint

no ip directed-broadcast

pvc 3/100

encapsulation aal5mux ppp Virtual-Template1

!

pvc 4/100

encapsulation aal5mux ppp Virtual-Template1

!

interface Ethernet0/0/1

no ip address

no ip directed-broadcast

!

interface Ethernet0/0/0

no ip directed-broadcast

!

interface FastEthernet0/0/0

no ip address

no ip directed-broadcast

full-duplex

!

interface Virtual-Template1

ip unnumbered Loopback0

no ip directed-broadcast

no peer default ip address

ppp authentication chap

!

ip classless

!

end

検証

現在、この設定に使用できる検証手順はありません。

トラブルシューティング

現在のところ、この設定に関する特定のトラブルシューティング情報はありません。

関連情報

- Cisco 827ルータの設定

- Cisco 6400 ソフトウェア設定ガイド

- Cisco DSL テクノロジーのサポート情報

- 製品サポート：シスコ

- テクニカル サポート - Cisco Systems