内容

概要

ISR-WAASのインストールの前提条件

NIM-SSDとISR-SSDの違い

NIM-SSD

ISR-SSD

ISR-WAASのインストール

ISR-WAASのトラブルシューティング

WAASのインストール障害のシナリオ

ISR-WAASアクティベーション障害のシナリオ

SSD障害シナリオ

概要

このドキュメントでは、Ciscoサービス統合型ルータ(ISR)でのCisco ISR-WAASのインストールガイドについて説明します。 これは、Cisco ISR上での仮想ワイドエリアアプリケーションサービス(vWAAS)の実装です。

ISR-WAASはIOS-XEコンテナ内に導入されます。このコンテキストのコンテナは、Cisco ISR 4000シリーズルータで仮想化アプリケーションを実行するハイパーバイザを指します。

ISR-WAASのインストールの前提条件

各WAASソフトウェアバージョンには、異なるリソース要件(メモリ、CPU、ソリッドステートドライブ(SSD))を設定できます。要件を満たさないと、パフォーマンスの問題やインストール中のエラーが発生する可能性があります。

次のリンクにある設定ガイドを確認してください。

https://www.cisco.com/c/en/us/support/routers/virtual-wide-area-application-services-vwaas/products-installation-and-configuration-guides-list.html

この表は、各ISRモデルのリソース要件とサポートされるISRプラットフォームをまとめたものです。

NIM-SSDとISR-SSDの違い

NIM-SSD

NIM-SSDは、ISRの外部にあり、ホットスワップ可能なNIM-SSDです。

これは、ISRルータの使用可能なネットワークインターフェイスモジュール(NIM)のいずれかにインストールされるモジュールです。

NIM-SSDおよびSSDの製品ID(PID)は、RMAの申請に使用できます。

NIM-SSD(=)NIM Carrier Card for SSD drives

SSD-SATA-200G(=)200 GB, SATA Solid State Disk for NIM-SSD

NIM-SSDまたはNIM-HDDをルータから取り外すには、次の手順を実行します。

ステップ1：次の図に示すように、プラスドライバを使用して両側の非脱落型ネジを緩めます。

ステップ2：次の図に示すように、NIM-SSDまたはNIM-HDDをルートから取り外します。

ISR-SSD

一方、ISR-SSDはルータシャーシ内に設置されており、ルータの電源を切り、カバーを開けてISR-SSDを見つける必要があります。

ISR-SSDはホットスワップ可能ではありません。

ISR 4300シリーズのISR-SSDのPIDを次に示します。このPIDを使用してRMAを申請できます。

SSD-MSATA-200G(=)200 GB, mSATA Solid State Disk

次の図は、フラッシュメモリカードとSSD mSATAストレージデバイスの場所(WS-X6400)を示しています。

ISR-WAASのインストール

ISR-WAASのインストールに関するすべての要件を満たしたら、次に、導入するISR-WAASバージョンのOpen Virtualization Appliance(OVA)ファイルをダウンロードします。ソフトウェアは次のリンクからダウンロードできます。

https://software.cisco.com/download/home/280484571/type/280836712

ソフトウェアをダウンロードしたら、ルータのブートフラッシュにファイルを転送する必要があります（この場合はブートフラッシュにファイルを転送します）。

ルータのCLIで、EZConfigプログラムを使用してISR-WAASを導入するには、次の手順に従ってください。

1. Service WAAS enableコマンドを実行します。

2. 展開するWAASバージョン用に、以前に転送された.ovaイメージを選択します。

3. 導入するWAASプロファイルを選択します。

4. ISR-WAASのIPアドレスを設定します。

5. WAASセントラルマネージャのIPアドレスを設定します。

6. WAASインターセプションを有効にするルータのワイドエリアネットワーク(WAN)インターフェイスを選択します。

7. 完了したら、設定を保存します。これは、正常にインストールされたイメージです。

ISR-WAASのトラブルシューティング

WAASのインストール障害のシナリオ

SSDがない場合はISR-WAASのインストールが失敗するため、まずSSDが存在するかどうかを確認します。

ISR-WAASアクティベーション障害のシナリオ

一部のシナリオでは、ルータを交換してSSDを新しいシャーシに取り付けた後、ISR-WAASのアクティブ化に失敗します。

次のエラーがISRルータで発生する可能性があります（ISRの場合）。

09/16 11:44:08.946 [vman]: [31298]: (note): VM (AUTOWAAS) State Transition: next_state: LIFECYCLE_DEACTIVATE

09/16 11:44:17.613 [vman]: [31298]: (ERR): Loading of machine definition (/vol/harddisk/virtual-instance/AUTOWAAS/ISR4331X.xml) failed

09/16 11:44:17.613 [vman]: [31298]: (ERR): Failed to load machine definition

09/16 11:44:17.613 [vman]: [31298]: (note): Setting failure response (1)

09/16 11:44:17.613 [vman]: [31298]: (ERR): Virtual Service failure log[AUTOWAAS]::Validation::Package validation::Failed to process package-def file::File '/vol/harddisk/virtual-instance/AUTOWAAS/ISR4331X.xml'

09/16 11:44:17.613 [errmsg]: [31298]: (ERR): %VMAN-3-PROCESS_PKG_DEF: Virtual Service[AUTOWAAS]::Validation::Package validation::Failed to process package-def file::File '/vol/harddisk/virtual-instance/AUTOWAAS/ISR4331X.xml'

09/16 11:44:17.613 [vman]: [31298]: (note): VM (AUTOWAAS) State Transition: next_state: LIFECYCLE_WAIT_ACTIVATE

09/16 11:44:17.613 [vman]: [31298]: (note): IF MTU message received:

09/16 11:44:17.613 [vman]: [31298]: (ERR): Invalid bridge ID or the bridge(31) has not been created yet

09/16 11:44:17.614 [vman]: [31298]: (ERR): Failed to set DP IF mtu for DP bridge 31

09/16 11:44:17.614 [vman]: [31298]: (note): vman IF MTU message processed

09/16 11:44:24.725 [vman]: [31298]: (note): Get local RP location rp/0/0

09/16 11:44:27.758 [vman]: [31298]: (note): Get local RP location rp/0/0

09/16 11:44:27.759 [vman]: [31298]: (note): Get local RP location rp/0/0

09/16 11:44:27.772 [vman]: [31298]: (note): Get local RP location rp/0/0

09/16 11:44:27.779 [vman]: [31298]: (note): Get local RP location rp/0/0

09/16 11:44:27.779 [vman]: [31298]: (note): Successfully removed VM init ctx for VM [AUTOWAAS]

09/16 11:44:27.780 [vman]: [31298]: (note): Per-VM message marshalled successfully into persistent DB

09/16 11:44:27.780 [vman]: [31298]: (note): Successfully reset per-VM mac address binding into TDL msg

09/16 11:44:28.063 [vman]: [31298]: (ERR): vman_libvirt_err: code=1

09/16 11:44:28.063 [vman]: [31298]: (ERR): internal error '/usr/sbin/lvremove -f /dev/lvm_raid/vdc.AUTOWAAS' exited with non-zero status 5 and signal 0:   /dev/harddisk1: read failed after 0 of 4096 at 21474770944: Input/output error

/dev/harddisk1: read failed after 0 of 4096 at 21474828288: Input/output error

/dev/harddisk1: read failed after 0 of 4096 at 0: Input/output error

/dev/harddisk1: read failed after 0 of 4096 at 4096: Input/output error

/dev/dm-1: read failed after 0 of 4096 at 4429119488: Input/output error

/dev/dm-1: read failed after 0 of 4096 at 4429176832: Input/output error

/dev/dm-1: read failed after 0 of 4096 at 0: Input/output error

/dev/dm-1: read failed after 0 of 4096 at 4096: Input/output error

/dev/dm-2: read failed after 0 of 4096 at 11072897024: Input/output error

/dev/dm-2: read failed after 0 of 4096 at 11072954368: Input/output error

/dev/dm-2: read failed after 0 of 4096 at 0: Input/output error

/dev/dm-2: read failed after 0 of 4096 at 4096: Input/output error

/dev/dm-3: read failed after 0 of 4096 at 1630

09/16 11:44:28.063 [vman]: [31298]: (ERR): Failed to delete volume vdc.AUTOWAAS in pool virt_strg_pool_vg

09/16 11:44:28.241 [vman]: [31298]: (ERR): vman_libvirt_err: code=1

09/16 11:44:28.241 [vman]: [31298]: (ERR): internal error '/usr/sbin/lvremove -f /dev/lvm_raid/vdb.AUTOWAAS' exited with non-zero status 5 and signal 0:   /dev/harddisk1: read failed after 0 of 4096 at 0: Input/output error

/dev/dm-1: read failed after 0 of 4096 at 0: Input/output error

/dev/dm-2: read failed after 0 of 4096 at 0: Input/output error

/dev/dm-3: read failed after 0 of 4096 at 0: Input/output error

/dev/harddisk1: read failed after 0 of 4096 at 21474770944: Input/output error

/dev/harddisk1: read failed after 0 of 4096 at 21474828288: Input/output error

/dev/harddisk1: read failed after 0 of 4096 at 4096: Input/output error

/dev/dm-1: read failed after 0 of 4096 at 4429119488: Input/output error

/dev/dm-1: read failed after 0 of 4096 at 4429176832: Input/output error

/dev/dm-1: read failed after 0 of 4096 at 4096: Input/output error

/dev/dm-2: read failed after 0 of 4096 at 11072897024: Input/output error

/dev/dm-2: read failed after 0 of 4096 at 11072954368: Input/output error

/dev/dm-2: read failed after 0 of 4096 at 4096: I

09/16 11:44:28.241 [vman]: [31298]: (ERR): Failed to delete volume vdb.AUTOWAAS in pool virt_strg_pool_vg

09/16 11:44:28.418 [vman]: [31298]: (ERR): vman_libvirt_err: code=1

09/16 11:44:28.418 [vman]: [31298]: (ERR): internal error '/usr/sbin/lvremove -f /dev/lvm_raid/vda.AUTOWAAS' exited with non-zero status 5 and signal 0:   /dev/harddisk1: read failed after 0 of 4096 at 0: Input/output error

/dev/dm-1: read failed after 0 of 4096 at 0: Input/output error

/dev/dm-2: read failed after 0 of 4096 at 0: Input/output error

/dev/dm-3: read failed after 0 of 4096 at 0: Input/output error

/dev/harddisk1: read failed after 0 of 4096 at 21474770944: Input/output error

/dev/harddisk1: read failed after 0 of 4096 at 21474828288: Input/output error

/dev/harddisk1: read failed after 0 of 4096 at 4096: Input/output error

/dev/dm-1: read failed after 0 of 4096 at 4429119488: Input/output error

/dev/dm-1: read failed after 0 of 4096 at 4429176832: Input/output error

/dev/dm-1: read failed after 0 of 4096 at 4096: Input/output error

/dev/dm-2: read failed after 0 of 4096 at 11072897024: Input/output error

/dev/dm-2: read failed after 0 of 4096 at 11072954368: Input/output error

/dev/dm-2: read failed after 0 of 4096 at 4096: I

09/16 11:44:28.418 [vman]: [31298]: (ERR): Failed to delete volume vda.AUTOWAAS in pool virt_strg_pool_vg

09/16 11:44:28.420 [vman]: [31298]: (note): Found orphaned volume(vda.AUTOWAAS) in pool(virt_strg_pool_vg). Deleting...

ハードディスクが破損している可能性があり、次の操作を行うことができます。

# show platform hardware subslot <ssd subslot> module device filesystem

# request platform hardware filesystem harddisk: destroy

# hw-module subslot 0/5 reload

SSD障害シナリオ

場合によっては、SSDに障害が発生し、ハードディスクやファイルシステムに関するコマンドを実行しているときに、これらのエラーが表示されます。

“request platform hardware filesystem harddisk: destroy”

%This operation can take some time, please be patient

%Harddisk not present. Destroy filesystem aborted.

これを解決するには、次の手順を実行します。

ステップ1:SSDを取り付け直します。

ステップ2：ルータをリブートします。

ステップ3：これらのステップが失敗した場合は、SSDのRMAを行ってください。