内容

概要

デフォルトポート

リバースポートサービスの表

概要

このドキュメントでは、Cisco CGR2010プラットフォームがアプリケーションおよびネットワーク内通信に使用するTCPおよびUDPポートについて説明します。

デフォルトポート

Cisco CGR2010では、デフォルトで次のポートが有効になっています(Cisco CGR2010)。

Router#show control-plane host open-ports

Active internet connections (servers and established)

Prot               Local Address             Foreign Address                  Service    State

tcp                        *:23                         *:0                   Telnet   LISTEN

Router#

ルータでSSHが有効になっている場合、ポート22はCGR 2010で開かれています。

Router#show control-plane host open-ports

Active internet connections (servers and established)

Prot               Local Address             Foreign Address                 Service    State

tcp                        *:22                         *:0              SSH-Server   LISTEN

tcp                        *:23                         *:0                  Telnet   LISTEN

Nmapを使用して、ルータで有効になっているポートを確認します。

C:\Program Files (x86)\Nmap>nmap -sS -p1-10000 10.31.126.137

Starting Nmap 7.70 ( https://nmap.org ) at 2018-12-06 20:05 Central Standard Time (Mexico)

Nmap scan report for 10.31.126.137

Host is up (0.0054s latency).

Not shown: 9998 closed ports

PORT STATE SERVICE

22/tcp open ssh

23/tcp open telnet

Nmap done: 1 IP address (1 host up) scanned in 14.23 seconds

C:\Program Files (x86)\Nmap>

スイッチモジュールがCGR2010にインストールされると、ルータはポート2003、4003、6003、および9003を開きます。テーブルを見てください。

C:\Program Files (x86)\Nmap>nmap -sS -p1-10000 10.31.126.137

Starting Nmap 7.70 ( https://nmap.org ) at 2018-12-06 20:22 Central Standard Time (Mexico)

Nmap scan report for 10.31.126.137

Host is up (0.0067s latency).

Not shown: 9994 closed ports

PORT STATE SERVICE

22/tcp open ssh

23/tcp open telnet

2003/tcp open finger

4003/tcp open pxc-splr-ft

6003/tcp open X11:3

9003/tcp open unknown

Nmap done: 1 IP address (1 host up) scanned in 12.54 seconds

C:\Program Files (x86)\Nmap>

リバースポートサービスの表

Service Name

予約済みポート範囲

通常のTelnet

2000-2xxx

Raw TCP

4000-4xxx

Telnetバイナリモード

6000-6xxx

リバースXremote

9000-9xxx

この動作については、次のCDETSで対応しています: https://bst.cloudapps.cisco.com/bugsearch/bug/CSCsh95539