目次

はじめに

前提条件

要件

使用するコンポーネント

設定

確認

関連情報

概要

この資料に CGR2010 および Cisco イーサネット スイッチ モジュール（ESM）で router on a stick を設定する方法を記述されています。

前提条件

要件

次の項目に関する知識が推奨されます。

- ルーティングとスイッチング基本

- CGR2010 および ESM アーキテクチャ。

- CGR2010 はスイッチ モジュールを実行するために Cisco IOS Release 15.1(4)M または それ 以上を実行する必要があります。

使用するコンポーネント

この資料に記載されている情報は Cisco IOS Release 15.1(4)M とのこのハードウェア/ソフトウェア バージョン CGR2010 に基づいています

この資料の出力は特定のラボ環境のデバイスから奪取 されました。 このドキュメントで使用するすべてのデバイスは、クリアな（デフォルト）設定で作業を開始しています。 対象のネットワークが実稼働中である場合には、どのような作業についても、その潜在的な影響について確実に理解しておく必要があります。

設定

ESM モジュール:

!- - Default configuration - -!

interface Port-channel48

description Internal backplane interface. Use caution while changing the configuration

switchport mode trunk

end

interface Vlan33

ip address 192.168.33.33 255.255.255.0

interface Vlan44

ip address 192.168.44.44 255.255.255.0

interface Vlan55

ip address 192.168.55.55 255.255.255.0

ESM モジュールを終了して下さい。 キーの組み合わせを押して下さい: 次に ctrl + シフト + 6 および x。

ESM セッションを終えるために discconect を書いて下さい。

CGR2010 設定:

interface GigabitEthernet0/0/0.33

encapsulation dot1Q 33

ip address 192.168.33.1 255.255.255.0

end

interface GigabitEthernet0/0/0.44

encapsulation dot1Q 44

ip address 192.168.44.1 255.255.255.0

end

interface GigabitEthernet0/0/0.55

encapsulation dot1Q 55

ip address 192.168.55.1 255.255.255.0

end

確認

ESM から CGR2010 仮想インターフェイスにいくつかの ping を行って下さい:

すべての SVI 出典から 192.168.55.1 に ping して下さい。

Switch#ping 192.168.55.1 source vlan 33

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.55.1, timeout is 2 seconds:

Packet sent with a source address of 192.168.33.33

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/2/9 ms

Switch#ping 192.168.55.1 source vlan 44

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.55.1, timeout is 2 seconds:

Packet sent with a source address of 192.168.44.44

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/2/9 ms

Switch#ping 192.168.55.1 source vlan 55

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.55.1, timeout is 2 seconds:

Packet sent with a source address of 192.168.55.55

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/3/8 ms

すべての SVI 出典から 192.168.33.1 に ping して下さい。

Switch#ping 192.168.33.1 source vlan 33

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.33.1, timeout is 2 seconds:

Packet sent with a source address of 192.168.33.33

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/203/1007 ms

Switch#ping 192.168.33.1 source vlan 44

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.33.1, timeout is 2 seconds:

Packet sent with a source address of 192.168.44.44

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/2/8 ms

Switch#ping 192.168.33.1 source vlan 55

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.33.1, timeout is 2 seconds:

Packet sent with a source address of 192.168.55.55

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/2/8 ms

関連情報

CGR2010 必要条件

ESM Port-Channel48