内容

概要

背景説明

前提条件

要件

使用するコンポーネント

リカバリ手順

概要

このドキュメントでは、CGR 1000 のブートフラッシュおよびシステム イメージを回復するためのトラブルシュートの手順を示します。

背景説明

CGR1000 は、保存されたキックスタート イメージ、システム イメージ、設定などのために Cisco セキュア デジタル（SD）カード メモリを使用します。  稀に、SD カードが破損することがあります。その結果、キックスタート イメージやシステム イメージが破損することがあります。これにより、CGR が起動できなくなります。ブートアップに必要なシーケンスの概要を次の図に示します。このドキュメントの手順は、破損した SD カード メモリの状態から CGR を復元することを示しています。

前提条件

1.ローカルPCにインストールされたトリビアルファイル転送プロトコル(TFTP)サーバ

2.キックスタートイメージとシステムイメージを持つようにTFTPサーバをセットアップする

要件

次の項目に関する知識があることが推奨されます。

1.コンソールケーブル

2.カテゴリ5

3.キックスタートイメージとシステムイメージ

使用するコンポーネント

このドキュメントは、CGR 1120 および CGR1240 で実行する CGOS バージョンのみに制限されます。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

リカバリ手順

1. puttyを使用してコンソールケーブルをセットアップします。

2.ローカルPC NICからCGR ETH 2/2にCAT5ケーブルを接続します。これはリカバリ プロセス時に動作する唯一のインターフェイスです。

3.ローカルPCのNICをCGRと同じサブネットに設定します。

たとえば、PC NICは192.0.2.1サブネット255.255.255.0です。

CGR は 192.0.2.2 サブセット 255.255.255.0 にします。

4. Puttyセッションでは、次のように表示されます。

"loader>"

IOFPGA @ 0xd0000000 version=0x30020700, datecode=0xc080d17 CPLD version 0x14

Reset Reason = 0(0)

Scratch pad test passed !!!

BIOS Version: Build # 12 -   Wed 06/27/2012

CGR Loader Version: 1.00.01

Filesystem type is ext2fs, partition type 0x83

Filesystem type is ext2fs, partition type 0x83

GNU GRUB  version 0.97

CGR Loader Version 1.00.01

loader>

5.コマンド「set ip」を使用して、ETH2/2のIPアドレスを設定します。

set ip 192.0.2.2 255.255.255.0

Correct - ip addr is 192.0.2.2, mask is 255.255.255.0

Found Intel IOH GBE [2:0.1] at 0xe020, ROM address 0x0000

Probing...[Intel IOH GBE]

MAC address 78:da:6e:8:ad:e1

External PHY link UP @ 1000/full

Address: 192.0.2.2

Netmask: 255.255.255.0

Server: 0.0.0.0

Gateway: 0.0.0.0

loader>

6.コマンド「set gw」を使用して、ゲートウェイアドレスをローカルPC NICとして設定します。

set gw 192.0.2.1

Correct gateway addr 192.0.2.1

Address: 192.0.2.2

Netmask: 255.255.255.0

Server: 0.0.0.0

Gateway: 192.0.2.1

7.コマンド「boot tftp://」を使用して、ローカルtftpサーバからキックスタートイメージを起動します。

loader> boot tftp://192.0.2.1/cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin

Address: 192.0.2.2

Netmask: 255.255.255.0

Server: 192.0.2.1

Gateway: 192.0.2.1

Filesystem type is tftp, using whole disk

Booting: /cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin console=ttyS0,9600n8nn quie

t loader_ver="1.00.01"....

...............................................................................

................Kickstart image verification Successful

Image verification OK

INIT: Checking all filesystems ....... done.

Warning: switch is starting up with default configuration

Creating boot config file...

/etc/rc.d/rcS.d/S26check-flash: line 528: /mnt/bootloader/boot/grub/menu.lst.local: No such file or directory

cp: cannot stat `/mnt/cfg/0/boot/grub/menu.lst.local': No such file or directory

WARNING: image sync is going to be disabled after a loader netboot

Loading system software

INIT: Sending processes the TERM signal[H[J

INIT: Sending processes the TERM signal

INIT: Sending processes the

KILL signal

8.  イメージが起動すると、このような出力が表示されます。

Router(boot)# ?

Exec commands:

clear     Reset functions

config    Enter configuration mode

copy      Copy from one file to another

delete    Delete a file or directory

dir       Directory listing for files

exit      Exit from the EXEC

find      Find a file below the current directory

format    Format disks

init      Initialize internal disk

load      Load system image

mkdir     Create new directory

move      Move files

no        Disable debugging functions

pwd       View current directory

reload    Reboot this supervisor module

rmdir     Remove existing directory

show      Show running system information

sleep     Sleep for the specified number of seconds

ssh       SSH to another system

tail      Display the last part of a file

telnet    Telnet to another system

9.コマンド「format bootflash:」を使用して、破損したSDカードをフォーマットします。

This command is going to erase the contents of your bootflash:.

Do you want to continue? (y/n)  [n] y

Formatting bootflash:

Formatting started at:  Fri Feb 20 23:56:00 UTC 2015

mke2fs 1.35 (28-Feb-2004)

Formatting finished at:  Fri Feb 20 23:56:52 UTC 2015

Formatting completed

10. init systemを実行します(オプションのステップ：このコマンドによって、SD カードはフォーマットされ、内容はすべて消去されます）。

Router(boot)# init system

This command is going to erase your startup-config, licenses as well as the contents of your bootflash:.

Do you want to continue? (y/n)  [n] yInitializing the system

mount: /dev/mmcblk0p4 already mounted or /bootflash busy

mount: according to mtab, /dev/mmcblk0p4 is already mounted on /bootflash

ERROR: cannot mount filesystem

cp: omitting directory `/bootflash/'

Partitioning failed

11.管理インターフェイスを設定します（これは、キックスタートとシステムイメージをブートフラッシュにコピーするために必要です）。

Router(boot)# configure terminal

Router(boot)(config)# interface mgmt0

Router(boot)(config-if)#ip address 192.0.2.2 255.255.255.0

Router(boot)(config-if)#no shut

12.キックスタートとシステムイメージをブートフラッシュにコピーします。

Router(boot)# copy tftp://192.0.2.1/cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin bootflash:

Trying to connect to tftp server......

Connection to server Established. Copying Started.....

TFTP get operation was successful

Copy complete, now saving to disk (please wait)...

Router(boot)# copy tftp://192.0.2.1/cgr1000-uk9.5.2.1.CG4.3.SPA.bin bootflash:

Trying to connect to tftp server......

Connection to server Established. Copying Started.....

TFTP get operation was successful

Copy complete, now saving to disk (please wait)...

13.キックスタートとシステムイメージが「dir」付きのCGRにあることを確認します。

Router(boot)#dir

29167616    Feb 21 00:39:59 2015  cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin

143332283    Feb 21 00:42:06 2015  cgr1000-uk9.5.2.1.CG4.3.SPA.bin

372    Feb 23 17:55:52 2015  fpga.log

1905    Feb 23 18:39:54 2015  mts.log

Usage for bootflash://

691462144 bytes used

8859394048 bytes free

9550856192 bytes total

14. 「load bootflash」コマンドでシステムイメージをブートします。

Router(boot)# load bootflash:cgr1000-uk9.5.2.1.CG4.3.SPA.bin

Loading system software

Uncompressing bootflash:/cgr1000-uk9.5.2.1.CG4.3.SPA.bin..........done. (in 37 seconds)

Loading plugin 0: core_plugin...

INIT: Switching to runlevel: 3

INIT: Sending processes the TERM signal

Router(boot)#

INIT:

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

2015 Feb 21 00:47:56  %$ VDC-1 %$ %COPP-2-COPP_NO_POLICY: Control-plane is unprotected.System is coming up ... Please wait ...

2015 Feb 21 00:47:58  %$ VDC-1 %$ %VDC_MGR-2-VDC_ONLINE: vdc 1 has come online 2015 Feb 21 00:47:58 Router %$ VDC-1 %$ %PLATFORM-2-

INPUT_POWER_SOURCE_TRANSITION: Three Phase and DC Input Status Alert:  L1 Phase ON, L2 Phase OFF, L3 Phase OFF, DC Input Absent

15. CGRがシステムイメージにブートアップしたら、「install all bootflash:<kickstart-image> system bootflash:<system image>」を使用してキックスタートとシステムイメージをインストールする必要があります。

cgr1120# install all kickstart bootflash:cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin system bootflash:cgr1000-uk9.5.2.1.CG4.3.SPA.bin

Verifying image bootflash:/cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin for boot variable "kickstart".

-- SUCCESS

Verifying image bootflash:/cgr1000-uk9.5.2.1.CG4.3.SPA.bin for boot variable "system".

-- SUCCESS

Verifying image type.

-- SUCCESS

Extracting "system" version from image bootflash:/cgr1000-uk9.5.2.1.CG4.3.SPA.bin.

-- SUCCESS

Extracting "kickstart" version from image bootflash:/cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin.

-- SUCCESS

Extracting "bios" version from image bootflash:/cgr1000-uk9.5.2.1.CG4.3.SPA.bin.

-- SUCCESS

Checking for Battery Power Mode.

-- SUCCESS

Checking for Module Power Status.

-- SUCCESS

Checking for WPAN upgrade compatibility.

-- SUCCESS

Performing module support checks.

-- SUCCESS

Notifying services about system upgrade.

-- SUCCESS

Compatibility check is done:

Module  bootable          Impact  Install-type  Reason

------  --------  --------------  ------------  ------

1       yes      disruptive         reset  Hitless upgrade is not supported

Images will be upgraded according to following table:

Module       Image                  Running-Version(pri:alt)           New-Version  Upg-Required

------  ----------  ----------------------------------------  --------------------  ------------

1      system                              5.2(1)CG4(3)          5.2(1)CG4(3)            no

1   kickstart                              5.2(1)CG4(3)          5.2(1)CG4(3)            no

1        bios   v16.1.0(10/15/2013):V12.1.0(06/27/2012)   v16.1.0(10/15/2013)            no

1        fpga                                   2.07.00               2.07.00            no

Switch will be reloaded for disruptive upgrade.

Do you want to continue with the installation (y/n)?  [n] y