内容

概要

背景説明

問題

解決方法

概要

このドキュメントでは、Cisco ASR5000の同期転送モジュール(STM)/OC3カードのスイッチオーバーを実行するために必要な手順について説明します。

背景説明

ASR5000のSTM1/OC3カードはSTM-1ポートを提供するため、特別な注意を払って処理する必要があります。

「 STM-1 (レベル1)は同期デジタル階層(SDH)ITU-T光ファイバネットワーク伝送規格。ビットレートは155.52 Mbit/sです。

SDHはイーサネットとは異なり、考慮する必要がある特定の仕様があります。

問題

この設定には、Automatic Protection Switching（APS；自動保護スイッチング）モード冗長性（カード21とカード37）が設定されたSTM1/OC3カードのペアがあります。カード37はアクティブで、カード21はスタンバイです。ポート21/1および21/2はダウン状態で、APSが動作しています。37/1および37/2ポートはアップ状態で、APSは保護されています。

card 21

redundancy aps-mode

aps 1+1 uni-directional non-revertive

framing sdh e1

initial-e1-framing crc4

service-type frame-relay

#exit

******** show card table all *******

Slot        Card Type                               Oper State   SPOF Attach

----------- -------------------------------------- ------------- ---- ------

21: LC      4 PORT STM1/OC3 Channelized Card       Standby          -    5

37: LC      4 PORT STM1/OC3 Channelized Card       Active          No    5

[local]gre2mme01# show aps info 37/1

Port :37/1

Role : Protected

Mode : 1+1

Revertive : No

State : Active

Direction : Uni

Wait To Restore(sec) : 0

Redundant Port : 21/1

Lockout : No

[local]gre2mme01# show aps info 21/1

Port :21/1

Role : Working

Mode : 1+1

Revertive : No

State : Standby

Direction : Uni

Wait To Restore(sec) : 0

Redundant Port : 37/1

Lockout : No

[local]mme01# show port table

Thursday March 08 11:20:20 CET 2018

Port  Role Type                      Admin   Oper Link State   Pair Redundant

----- ---- ------------------------ -------- ---- ---- ------- ----- ---------

21/1  Srvc STM1/OC3 Channelized     Enabled     - Down Standby 37/1 APS Workn

21/2  Srvc STM1/OC3 Channelized     Enabled     - Down Standby 37/2 APS Workn

37/1  Srvc STM1/OC3 Channelized     Enabled     - Up   Active 21/1 APS Protd

37/2  Srvc STM1/OC3 Channelized     Enabled     - Up   Active 21/2 APS Protd

カード21とカード37の間でスイッチオーバーを実行すると、「誤った冗長性モード」エラーで障害が発生します。

[local]gre2mme01# card switch from 37 to 21

Friday March 09 00:28:10 CET 2018

Failure: wrong redundancy mode

解決方法

XからYへのカードスイッチのスイッチオーバーは、APSモード冗長性を備えたSTM1/OC3カードではサポートされていません。

代わりに、APS固有のコマンドを使用する必要があります。

aps { clear slot#/port# | exercise slot#/port# | lockout slot#/port# | switch { force | manual } slot#/port# }

switch { force | manual } slot#/port#

Switch to either the working port or the protection port:

force: Forces a switch of ports, even if there is an active alarm state.

manual: Implements a switch of ports if there are no active alarms.

slot#/port# is the CLC2/OLC2 slot number (valid range is 17 - 48) and appropriate port number (CLC2 valid range is 1 - 4; OLC2 valid value is 1)

この場合、問題は次の方法で解決されています。

aps switch manual 37/1

aps switch manual 37/2

注：手動スイッチオーバーが失敗した場合は、ポートのエラーが原因である可能性があります。「show aps port-status <card/slot>」を使用して、ポートステータスを確認します。 スイッチオーバーは、「force」オプションを使用して強制的に行うことができます。

[local]gre2mme01# show aps port-status 21/1

Friday March 09 13:19:49 CET 2018

Port                      : 21/1

Role                      : Working

Lockout                   : No

APS  Signal Failure       : No

APS  Signal Degrade       : No

Switch Over               : No

Far End Failiure          : No

Remote Not Compatible     : No

Current Command           : No Request

Switch Status             : No request

[local]gre2mme01#

[local]gre2mme01# show aps port-status 37/1

Friday March 09 13:20:07 CET 2018

Port                      : 37/1

Role                      : Protected

Lockout                   : No

APS  Signal Failure       : No

APS  Signal Degrade       : No

Switch Over               : No

Far End Failiure          : No

Remote Not Compatible     : No

Current Command           : No Request

Switch Status             : No request

Invalid K1 K2             : No

Rx K1                     : Reqest : 0x 0  (--              Channel - 0)

Rx K2                     : Status : 0x 0  (--              Channel - 0)

Tx K1                     : Reqest : 0x 0  (No Request      Channel - 0)

Tx K2                     : Status : 0x 4  (UNI,1+1         Channel - 0)