内容

概要

前提条件

要件

使用するコンポーネント

設定

ネットワーク図

確認

トラブルシュート

関連情報

概要

このドキュメントでは、ACIを使用したVMM統合のアクティブ – アクティブ設定に関する問題を特定する方法について説明します。

前提条件

要件

次の項目に関する知識があることが推奨されます。

- リンクアグリゲーションコントロールプロトコル(LACP)

- 仮想マシンモニタ(VMM)

- ネットワークインターフェイス制御(NIC)

- アプリケーションセントリックインフラストラクチャ(ACI)

使用するコンポーネント

このドキュメントの内容は、特定のソフトウェアやハードウェアのバージョンに限定されるものではありません。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、クリアな（デフォルト）設定で作業を開始しています。本稼働中のネットワークでは、各コマンドによって起こる可能性がある影響を十分確認してください。

設定

ネットワークは、2台のサーバで許可されるVM構成にアクティブ – アクティブLACP負荷ベースチーミングNICを設定し、VMM統合の2つの異なるリーフスイッチのACIに接続しています。

ネットワーク図

次の図は、設計を説明するための高レベルのリファレンスです。

vPC 5メンバは、リーフ1のインターフェイスEth 1/1とリーフ2のインターフェイスEth 1/2です。

vPC 6メンバは、リーフ1のインターフェイスEth 1/3とリーフ2のインターフェイスEth 1/4です。

VM IP:10.10.10.1

VM MAC:AA.AA.AA.AA.AA.AA

Connections:

サーバ1 NIC 1 <->リーフ1 Eth 1/1

サーバ1 NIC 2 <->リーフ2 Eth 1/2

サーバ2 NIC 1 <->リーフ1 Eth 1/3

サーバ2 NIC 2 <->リーフ2 Eth 1/4

確認

現在、この設定に使用できる確認手順はありません。

Cisco CLI アナライザ（登録ユーザ専用）は、特定の show コマンドをサポートします。show コマンド出力の分析を表示するには、Cisco CLI アナライザを使用します。

トラブルシュート

このセクションでは、設定のトラブルシューティングに役立つ情報を説明します。

APIC GUIでEndpoint Tracker(EP)トラッカーに移動してサーバのIPを追跡し、attach/detachログを確認してフラップを特定します。

ステップ 1：Cisco APIC GUIへのログイン

ステップ 2：Operations -> EP Trackerの順に移動します。

ステップ 3：End Point Search領域に、IPアドレスを入力します

ステップ 4：Search をクリックする。

フラップが特定されたら、次のステップとして各リーフスイッチでコマンドを実行します。

LEAF1# show endpoint ip 10.10.10.1

Legend:

S - static           s - arp              L - local            O - peer-attached

V - vpc-attached     a - local-aged       p - peer-aged        M - span

B - bounce           H - vtep             R - peer-attached-rl D - bounce-to-proxy

E - shared-service   m - svc-mgr

+-----------------------------------+---------------+-----------------+--------------+-------------+

VLAN/                           Encap           MAC Address       MAC Info/       Interface

Domain                          VLAN            IP Address        IP Info

+-----------------------------------+---------------+-----------------+--------------+-------------+

2                                          vlan-100    aaaa.aaaa.aaaa LV                        po6

common:common-VRF                          vlan-100      10.10.10.1   LV                        po6

LEAF2# show endpoint ip 10.10.10.1

Legend:

S - static           s - arp              L - local            O - peer-attached

V - vpc-attached     a - local-aged       p - peer-aged        M - span

B - bounce           H - vtep             R - peer-attached-rl D - bounce-to-proxy

E - shared-service   m - svc-mgr

+-----------------------------------+---------------+-----------------+--------------+-------------+

VLAN/                           Encap           MAC Address       MAC Info/       Interface

Domain                          VLAN            IP Address        IP Info

+-----------------------------------+---------------+-----------------+--------------+-------------+

1                                          vlan-100    aaaa.aaaa.aaaa LV                        po6

common:common-VRF                          vlan-100      10.10.10.1   LV                        po6

LEAF1# show port-channel summary

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

b - BFD Session Wait

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

5     Po5(SU)     Eth      LACP      Eth1/1(P)

6     Po6(SU)     Eth      LACP      Eth1/3(P)

LEAF2# show port-channel summary

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

b - BFD Session Wait

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

5     Po5(SU)     Eth      LACP      Eth1/2(P)

6     Po6(SU)     Eth      LACP      Eth1/4(P)

LEAF1# show system internal epm endpoint ip 10.10.10.1

MAC : aaaa.aaaa.aaaa ::: Num IPs : 1

IP# 0 : 10.10.10.1 ::: IP# 0 flags :

Output omitted

...

Interface : port-channel6                          <<<<<<<<<<<<<<<< learned on this interface

Output omitted

...

EP Flags : local|vPC|IP|MAC|sclass|timer|mac-ckt|

::::

LEAF1# show system internal epm endpoint mac aaaa.aaaa.aaaa

MAC : aaaa.aaaa.aaaa ::: Num IPs : 1

IP# 0 : 10.10.10.1 ::: IP# 0 flags :  ::: l3-sw-hit: No

Output omitted

...

Interface : port-channel6                         <<<<<<<<<<<<<<<< learned on this interface

Output omitted

...

EP Flags : local|vPC|IP|MAC|sclass|timer|mac-ckt|

::::

LEAF2# show system internal epm endpoint ip 10.10.10.1

MAC : aaaa.aaaa.aaaa ::: Num IPs : 1

IP# 0 : 10.10.10.1 ::: IP# 0 flags :  ::: l3-sw-hit: No

Output omitted

...

Interface : port-channel5                         <<<<<<<<<<<<<<<< learned on this interface

Output omitted

...

EP Flags : local|vPC|IP|MAC|sclass|timer|mac-ckt|

::::

LEAF2# show system internal epm endpoint mac aaaa.aaaa.aaaa

MAC : aaaa.aaaa.aaaa ::: Num IPs : 1

IP# 0 : 10.10.10.1 ::: IP# 0 flags :  ::: l3-sw-hit: No

Output omitted

...

Interface : port-channel6                         <<<<<<<<<<<<<<<< learned on this interface

Output omitted

...

EP Flags : local|vPC|IP|MAC|sclass|timer|mac-ckt|

::::

前述の出力から、VMwareのアクティブ – アクティブ設定により、ACIが両方のポートチャネルで同時に同じ情報を受信していることがわかります。

すべてのVMは論理的に1つのアップリンクとしてアップリンクの各ペアを使用し、トポロジは2つの異なるポートチャネルのペアで設定され、各ペアは同じ情報を使用してACIに到達します。

注：このタイプの設定は、ノード間またはポート間のMAC/IPフラップによって導き出されるリンク使用率に基づいて30秒ごとにMACピニングおよび再ピニングを行う場合と同様に動作するため、シスコではこの種の導入を推奨していません。

同様のトポロジが必要な場合は、LACPやスタティックポートチャネルなどのLink Aggregation Group(LAG)を使用することを推奨します。

Cisco CLI アナライザ（登録ユーザ専用）は、特定の show コマンドをサポートします。show コマンド出力の分析を表示するには、Cisco CLI アナライザを使用します。

debug コマンドを使用する前に、『debug コマンドの重要な情報』を参照してください。

関連情報

- テクニカル サポートとドキュメント - Cisco Systems