内容

概要

前提条件

要件

使用するコンポーネント

表記法

背景説明

設定

ネットワーク図

設定

確認

show コマンドの出力例

Catalyst 2900XL/3500XL スイッチ

Catalyst 6509 スイッチ

トラブルシュート

関連情報

概要

この設定例では、Catalyst OS（CatOS）が稼働する Cisco Catalyst 6500 と Catalyst 3500XL スイッチの間に EtherChannel を設定しています。EtherChannel は、Fast EtherChannel（FEC）、または Gigabit EtherChannel（GEC）とも呼ばれます。 この名前は、EtherChannel を形成するために使用されるインターフェイスまたはポートの速度に依存します。このシナリオでは、次のスイッチのどれを使用しても同じ結果が得られます。

- CatOS が稼働する Catalyst 4500/4000、5500/5000、または 6500/6000 シリーズ スイッチ

- Catalyst Layer 2（L2）固定構成 2900XL または 3500XL シリーズ スイッチ

このドキュメントでは、各スイッチの 2 つの Fast Ethernet ポートが FEC にバンドルされています。この文書で、ファスト イーサチャネル、ギガビット イーサチャネル、ポート チャネル、チャネルおよびポート グループはすべて、イーサチャネルについて説明しています。

前提条件

要件

この設定を行う前に、次の要件が満たされていることを確認します。

- Catalyst 2900XL または 3500XL スイッチで EtherChannel の設定に使用するコマンドに関する知識があること。

コマンドの詳細については、『Catalyst 2900 XLおよびCatalyst 3500 XLソフトウェアコンフィギュレーションガイド、12.0(5)WC5、12.0(5)WC6』の「スイッチポートの設定」セクションを参照してください。

- CatOS が稼働するスイッチで、EtherChannel の設定に使用するコマンドに関する知識があること。

コマンドの詳細については、『Catalyst 6500シリーズソフトウェアコンフィギュレーションガイド8.7』の「EtherChannelの設定」セクションを参照してください。

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づいています。

- Cisco IOS(R) ソフトウェア リリース 12.0(5)WC9 が稼働する Catalyst 3500XL スイッチ（モデル WS-C3524-PWR-XL-EN）

- CatOS ソフトウェア バージョン 8.2.1 が稼働する Catalyst 6500 スイッチ（スーパーバイザ エンジン II を搭載するモデル 6506）

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

表記法

ドキュメント表記の詳細は、『シスコ テクニカル ティップスの表記法』を参照してください。

背景説明

Catalyst 2900XL/3500XLスイッチはポート集約プロトコル(PAgP)をサポートしていないため、EtherChannelを手動で作成する必要があります。CatOSスイッチはPAgPをサポートします。PAgP では、FEC と GEC の自動作成が容易になります。PAgPの詳細については、『Catalyst 6500シリーズソフトウェアコンフィギュレーションガイド8.7』の「EtherChannelの設定」セクションを参照してください。

次のステップの順序で、ポート チャネルを作成します。

注：この順に手順を実行すると、設定プロセス中に発生する可能性があるスパニングツリープロトコル(STP)の問題を回避できます。XL スイッチをチャネルとして設定する前に CatOS スイッチをチャネルとして設定する場合、STP により Catalyst 6500 上で errdisable ステータスのポートをシャットダウンできます。

1. set port disable module/port コマンドを CatOS スイッチで発行します。

このコマンドにより、ポート チャネリングで使用するポートがディセーブル モードに設定されます。

2. XL スイッチで、ポート チャネル（ポート グループ）を作成します。

3. CatOS スイッチで、ポート チャネルを作成します。

注：チャネルモードを「on」に設定してください。 この設定は、ポートの PAgP をディセーブルにして、強制的にポートにチャネルを形成させるために必要です。

4. set port enable module/port コマンドを CatOS スイッチで発行します。

このコマンドにより、以前にディセーブルにされたポートが再度イネーブルにされます。

設定

このセクションでは、このドキュメントで説明する機能を設定するために必要な情報を提供しています。

注： このドキュメントで使用されているコマンドの詳細を調べるには、Command Lookup Tool（登録ユーザ専用）を使用してください。

ネットワーク図

このドキュメントでは、次のネットワーク セットアップを使用します。

設定

このドキュメントでは、次の構成を使用します。

- Catalyst 3524XL

- Catalyst 6506

Catalyst 3524XL

Current configuration:

!

version 12.0

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname cat3500

!

enable password mysecret

!--- This is the privileged mode password for the example.

!

!

!

!

!

ip subnet-zero

!

!

!

interface FastEthernet0/1

port group 1

!--- The port group

command !--- makes this interface a member of channel group 1.

!

interface FastEthernet0/2

port group 1

!--- This interface is also a member of channel group 1.

!

interface VLAN1

ip address 10.10.10.2 255.255.255.0

!--- This is the IP address for management.

no ip directed-broadcast

no ip route-cache

!

!

line con 0

transport input none

stopbits 1

line vty 0 4

password mysecret

!--- This is the Telnet password for the example.

login

line vty 5 15

login

!

end

cat3500#

Catalyst 6506

begin

!

# ***** NON-DEFAULT CONFIGURATION *****

!

!

#time: Sun Feb 1 2004, 14:03:48

!

#version 8.2(1)

!

!--- Output suppressed.

!

#ip

set interface sc0 1 10.10.10.3/255.255.255.0 10.10.10.255

!--- This is the IP address for management.

!

!--- Output suppressed.

!

#port channel

set port channel 2/1-2 15

!--- The set port channel

command !--- creates an EtherChannel on switches that run CatOS. !--- The admin group (15, in this case) is not configured, !--- but is a number that the system assigns randomly.

# default port status is enable

!

!

#module 1 : 2-port 1000BaseX Supervisor

!

#module 2 : 48-port 10/100BaseTX Ethernet

set port channel 2/1-2 mode on

!--- The set port channel

mode on

command disables PAgP. !--- The disablement forces the ports to form a channel with the XL switch !--- that does not support PAgP.

!

#module 3 empty

!

#module 4 empty

!

#module 5 empty

!

#module 6 empty

!

#module 15 : 1-port Multilayer Switch Feature Card

!

#module 16 empty

end

cat6506> (enable)

確認

ここでは、設定が正常に機能しているかどうかを確認します。

アウトプット インタープリタ ツール（登録ユーザ専用）（OIT）は、特定の show コマンドをサポートします。 OIT を使用して、show コマンドの出力の分析を表示します。

- Catalyst 2900XL/3500XLスイッチでポート チャネルをチェックします。

- show port group

- show port group group-number

- Catalyst 2900XL/3500XLスイッチでスパニング ツリー ステータスをチェックします。

- show spanning-tree

- CatOS スイッチでポート チャネルをチェックします。

- show port capabilities module

- show port channel

- show port channel module/port

- show port channel info

- CatOS スイッチでスパニング ツリー ステータスをチェックします。

- show spantree

- show spantree vlan

- show spantree module/port

show コマンドの出力例

Catalyst 2900XL/3500XL スイッチ

- show port group

cat3500# show port group

Group       Interface           Transmit Distribution

-----   ---------------------   ---------------------

1       FastEthernet0/1         source address

1       FastEthernet0/2         source address

cat3500#

- show spanning-tree

cat3500# show spanning-tree

Spanning tree 1 is executing the IEEE compatible Spanning Tree protocol

Bridge Identifier has priority 32768, address 00d0.5868.f180

Configured hello time 2, max age 20, forward delay 15

Current root has priority 32768, address 00d0.020e.2c00

Root port is 1, cost of root path is 12

Topology change flag not set, detected flag not set, changes 10

Times:  hold 1, topology change 35, notification 2

hello 2, max age 20, forward delay 15

Timers: hello 0, topology change 0, notification 0

Interface Fa0/1 (port 1) in Spanning tree 1 is FORWARDING

Port path cost 12, Port priority 128

Designated root has priority 32768, address 00d0.020e.2c00

Designated bridge has priority 32768, address 00d0.020e.2c00

Designated port is 33, path cost 0

Timers: message age 2, forward delay 0, hold 0

BPDU: sent 4, received 633

Interface Fa0/3 (port 15) in Spanning tree 1 is down

Port path cost 100, Port priority 128

Designated root has priority 32768, address 00d0.020e.2c00

Designated bridge has priority 32768, address 00d0.5868.f180

!--- Output suppressed.

注：この出力では、インターフェイスFa0/2はポートチャネルのFa0/1にバンドルされているため、表示されません。出力の（ポート1）を参照してください。

Catalyst 6509 スイッチ

- show port capabilities module：このコマンドを使用して、モジュールがEtherChannelをサポートしているかどうかを確認します。

cat6506> (enable) show port capabilities 2

Model                    WS-X6348-RJ-45

Port                     2/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  yes

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off)

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(1q4t),tx-(2q2t)

CoS rewrite              yes

ToS rewrite              DSCP

UDLD                     yes

Inline power             auto,off

AuxiliaryVlan            1..1000,1025..4094,untagged,dot1p,none

SPAN                     source,destination

COPS port group          2/1-48

Link debounce timer      yes

Dot1q-all-tagged         yes

--------------------------------------------------------------

Model                    WS-X6348-RJ-45

Port                     2/2

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  yes

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off)

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(1q4t),TX(2q2t)

COs rewrite              yes

ToS rewrite              DSCP

UDLD                     yes

Inline power             auto,off

AuxiliaryVlan            1..1000,1025..4094,untagged,dot1p,none

SPAN                     source,destination

COPS port group          2/1-48

Link debounce timer      yes

Dot1q-all-tagged         yes

--------------------------------------------------------------

!--- Output suppressed.

- show port channel

cat6506> (enable) show port channel

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

2/1  connected  on                      15  1762

2/2  connected  on                      15  1762

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

2/1  cat3500                         FastEthernet0/1           cisco WS-C3524-PWR-XL

2/2  cat3500                         FastEthernet0/2           cisco WS-C3524-PWR-XL

cat6506> (enable)

- show port channel info

cat6506> (enable) show port channel info

Switch Frame Distribution Method: ip both

Port  Status     Channel              Admin Channel Speed Duplex Vlan

mode                 group id

----- ---------- -------------------- ----- ------- ----- ------ ----

2/1  connected  on                      15    1762 a-100 a-full    1

2/2  connected  on                      15    1762 a-100 a-full    1

Port  Channel Oper-group Neighbor   Oper-Distribution PortSecurity/

ifIndex            Oper-group Method            Dynamic port

----- ------- ---------- ---------- ----------------- -------------

2/1  67             241            ip both

2/2  67             241            ip both

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

2/1  cat3500                         FastEthernet0/1           cisco WS-C3524-PWR-XL

2/2  cat3500                         FastEthernet0/2           cisco WS-C3524-PWR-XL

!--- Output suppressed.

- show spantree vlan

cat6506> (enable) show spantree 1

VLAN 1

Spanning tree mode          RAPID-PVST+

Spanning tree type          ieee

Spanning tree enabled

Designated Root             00-04-9b-bf-04-00

Designated Root Priority    32768

Designated Root Cost        0

Designated Root Port        1/0

Root Max Age   20 sec   Hello Time 2  sec   Forward Delay 15 sec

Bridge ID MAC ADDR          00-04-9b-bf-04-00

Bridge ID Priority          32768

Bridge Max Age 20 sec   Hello Time 2  sec   Forward Delay 15 sec

Port                     State         Role Cost      Prio Type

------------------------ ------------- ---- --------- ---- --------------------

1/1                     not-connected  -           4   32

1/2                     not-connected  -           4   32

2/1-2                    forwarding    DESG        12   32 P2P, PEER(STP)

2/3                     not-connected  -         100   32

2/4                     not-connected  -         100   32

2/5                     not-connected  -         100   32

2/6                     not-connected  -         100   32

!--- Output suppressed.

- show spantree module/port

cat6506> (enable) show spantree 2/1

Edge Port:          No, (Configured) Default

Link Type:         P2P, (Configured) Auto

Port Guard:    Default

Port                     Vlan State         Role Cost      Prio Type

------------------------ ---- ------------- ---- --------- ---- -----------------

2/1-2                    1    forwarding    DESG        12   32 P2P, PEER(STP)

cat6506> (enable)

cat6506> (enable) show spantree 2/2

Edge Port:          No, (Configured) Default

Link Type:         P2P, (Configured) Auto

Port Guard:    Default

Port                     Vlan State         Role Cost      Prio Type

------------------------ ---- ------------- ---- --------- ---- -----------------

2/1-2                    1    forwarding    DESG        12   32 P2P, PEER(STP)

cat6506> (enable)

注：ポートが1つのチャネルにグループ化され、ポート2/1および2/2に対するshow spantree module/portコマンドの出力は同じ結果を表示します。

トラブルシュート

現在、この設定に関する特定のトラブルシューティング情報はありません。

関連情報

- Catalyst 2900XL/3500XL、Catalyst 2940、2950/2955、および 2970 スイッチ間での EtherChannel と 802.1Q トランキングの設定

- Cisco IOS ソフトウェアが稼働する Catalyst スイッチと 2900XL/3500XL/2950 シリーズスイッチ間でのレイヤ 2 EtherChannel とトランキングの設定

- LAN 製品に関するサポート ページ

- LAN スイッチングに関するサポート ページ

- テクニカル サポートとドキュメント – Cisco Systems