内容

概要

前提条件

要件

使用するコンポーネント

表記法

背景説明

CISCO-STACK-MIB をサポートするスイッチでのステータス トラップの設定変更

CISCO-C2900-MIB をサポートするスイッチでのステータス トラップの設定変更

関連情報

概要

シスコのスイッチには、ローカルの電源の他に、redundant power supply（RPS; 冗長電源）を使用できるものがあります。この文書では、SNMP を使用して、これらのスイッチの RPS のステータスを監視する方法について説明します。

前提条件

要件

このドキュメントに特有の要件はありません。

使用するコンポーネント

このドキュメントの情報は、次のハードウェアとソフトウェアのバージョンに基づいています。

- CISCO-STACK-MIBをサポートするソフトウェアイメージ：すべてのCatalyst OSバージョンとIOSイメージでサポートされます。

- CISCO-C2900-MIBをサポートするソフトウェアイメージ：Cat2900XL、Cat3500XLファミリ、およびIOSイメージのスイッチのすべてのソフトウェアイメージでサポートされます。

- RPS 300

- RPS 600

注：このドキュメントの内容は、スイッチにのみ適用され、どのルータモデルにも適用されません。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

表記法

ドキュメント表記の詳細は、「シスコ テクニカル ティップスの表記法」を参照してください。

背景説明

現在のところ、RPS デバイスからはステータスの変更を知らせるトラップや syslog メッセージが送られていない場合でも、RPS が装着されているスイッチから次の MIB オブジェクトのいずれかを読み取ることによって、そのステータスを追跡できます。

- CISCO-STACK-MIB をサポートしているスイッチの場合、該当するオブジェクトは chassisPs2Status（1.3.6.1.4.1.9.5.1.2.7）

chassisPs2Status OBJECT-TYPE

SYNTAX        INTEGER {

other(1),       -- none of the following

ok(2),          -- status ok

minorFault(3),  -- minor problem

majorFault(4)   -- major problem

}

MAX-ACCESS    read-only

STATUS        current

DESCRIPTION   "Status of power supply number 2. If the status is

not ok, the value of chassisPs2TestResult gives

more detailed information about the power supply's

failure condition(s)."

::= { chassisGrp 7 }

- CISCO-2900-MIB をサポートしているスイッチの場合、該当するオブジェクトは c2900InfoRedunantPowerSupplyInfo（1.3.6.1.4.1.9.9.87.1.1.9）

c2900InfoRedunantPowerSupplyInfo OBJECT-TYPE

SYNTAX  INTEGER {

absent(1),

connectedFunctional(2),

connectedNotFunctional(3),

functionalPrimaryFailed(4)

}

MAX-ACCESS  read-only

STATUS current

DESCRIPTION

"The switch allows a redundant power supply in addition

to its local power supply. Only one power source can be

supplying power to a unit.

absent(1) :the redundant power supply is not connected

to the switch.

connectedFunctional(2) : the redundant power supply is

connected to the switch and operational.

connectedNotFunctional(3): the redundant power supply

is connected to the switch, but cannot supply

power to the system.

functionalPrimaryFailed(4): the redundant power supply

is installed, powered on, and operational,

but a failure exists in the local power

supply system."

::= { c2900SysInfo 9 }

RMON アラームとイベント グループを使用すると、指定された管理ステーションへ SNMP トラップ形式でアラームを送るように、スイッチを設定できます。

CISCO-STACK-MIB をサポートするスイッチでのステータス トラップの設定変更

CISCO-STACK-MIB をサポートしているスイッチで、RPS のステータスが ok(2) から majorFault(4) に変化した場合に、NMS ステーションへ SNMP トラップとして転送される RMON イベントを取得するには、次のコマンドを設定します。

rmon event 65 trap public description "RPS is not ready" owner yourname

rmon event 66 trap public description "RPS is ready" owner yourname

rmon alarm 222 1.3.6.1.4.1.9.5.1.2.7.0 10

absolute rising-threshold 4 65 falling-threshold 2 66 owner yourname

CISCO-C2900-MIB をサポートするスイッチでのステータス トラップの設定変更

CISCO-C2900-MIB をサポートしているスイッチで、RPS のステータスが connectedFunctional(2) から absent(1) に変化した場合に、NMS ステーションへトラップとして転送される RMON イベントを取得するには、次のコマンドを設定します。

rmon event 67 trap public description "RPS not ready" owner yourname

rmon event 68 trap public description "RPS ready" owner yourname

rmon alarm 444 1.3.6.1.4.1.9.9.87.1.1.9.0 5

absolute rising-threshold 2 68 falling-threshold 1 67 owner yourname

関連情報

- コマンドライン インターフェイス（CLI）からの RMON アラームおよびイベント セッティング設定

- テクニカルサポート - Cisco Systems