内容

概要

前提条件

前提条件

ハードウェアとソフトウェアのバージョン

表記法

設定

ネットワーク図

設定

確認

OSPFv3 設定の確認

BGP 設定の確認

関連情報

概要

このドキュメントでは、Open Shortest Path First(OSPF)バージョン3(OSPFv3)ルートをIPv6用のマルチプロトコルBGPに再配布する例を示します。OSPFv3は、IPv6ルーティングプレフィックスとサイズの大きいIPv6アドレスをサポートするためにOSPFバージョン2で拡張します。マルチプロトコル BGP は、IPv6 アドレス ファミリや IP マルチキャスト ルートなど、複数のネットワーク層プロトコルのアドレス ファミリに関するルーティング情報を伝送する拡張 BGP です。

前提条件

前提条件

この設定を行う前に、以下の要件を満たしていることを確認してください。

- OSPFv3 の設定例

- IPv6 のマルチプロトコル BGP の設定例

- ルーティング プロトコルの再配布

ハードウェアとソフトウェアのバージョン

このドキュメントの内容は、特定のソフトウェアやハードウェアのバージョンに限定されるものではありません。

このドキュメントの設定は、Cisco IOS® ソフトウェア リリース 12.4 (15)T1 を搭載した Cisco 3700 シリーズ ルータに基づくものです。

表記法

ドキュメント表記の詳細は、『シスコ テクニカル ティップスの表記法』を参照してください。

設定

この例では、ルータ R2 と R3 はシリアル インターフェイスを介して接続され、Multiprotocol BGP で設定されています。ルータR2とR3は、OSPFv3を使用してローカルルータR1およびR4と通信します。ループバックアドレスは、ネットワークを生成するためにルータで作成されます。BGPとOSPFv3の両方を実行するルータR2とR3は、redistributeコマンドを使用して、OSPFv3ルートをBGPに再配布します。すべてのルータは IPv6 アドレスで設定されます。

注： このドキュメントで使用されているコマンドの詳細を調べるには、Command Lookup Tool（登録ユーザ専用）を使用してください。

ネットワーク図

このドキュメントでは、次のネットワーク セットアップを使用します。

設定

このドキュメントでは、次の構成を使用します。

- ルータ R1

- ルータ R2

- ルータ R3

- ルータ R4

ルータ R1

!

version 12.4

!

hostname R1

!

ip cef

!

ipv6 unicast-routing

!--- Enables the forwarding of IPv6 packets.

!

interface Loopback0

no ip address

ipv6 address 2222::1/128

ipv6 ospf 1 area 0

!--- Enables OSPFv3 on the interface and associates !--- the interface loopback0 to area 0.

!

interface FastEthernet0/0

no ip address

duplex auto

speed auto

ipv6 address 1010:1:1:1::1/64

ipv6 ospf 1 area 0

!--- Associates the Interface Fa0/0 to area 0.

!

ipv6 router ospf 1

router-id 1.1.1.1

!--- Router R1 uses 1.1.1.1 as router ID.

log-adjacency-changes

!

end

ルータ R2

!

version 12.4

!

hostname R2

!

ip cef

!

ipv6 unicast-routing

!

interface Loopback0

no ip address

ipv6 address 2010::1/128

ipv6 ospf 1 area 1

!

interface Loopback1

no ip address

ipv6 address 2011::1/128

ipv6 ospf 1 area 1

!

interface Loopback99

no ip address

ipv6 address 5050:55:55:55::55/128

!

interface FastEthernet0/0

no ip address

duplex auto

speed auto

ipv6 address 1010:1:1:1::2/64

ipv6 ospf 1 area 0

!

interface Serial0/0

no ip address

ipv6 address 3030:1:1:1::10/64

clock rate 2000000

!

router bgp 65000

bgp router-id 1.1.1.1

no bgp default ipv4-unicast

!--- Without configuring "no bgp default ipv4-unicast" only !--- IPv4 will be advertised.

bgp log-neighbor-changes

neighbor 3030:1:1:1::11 remote-as 65000

neighbor 3030:1:1:1::11 update-source Serial0/0

!

address-family ipv6

neighbor 3030:1:1:1::11 activate

network 5050:55:55:55::55/128

redistribute connected

redistribute ospf 1 match internal external 1 external 2

!--- This redistributes all OSPF routes into BGP.

no synchronization

exit-address-family

!

ipv6 router ospf 1

router-id 2.2.2.2

log-adjacency-changes

!

end

ルータ R3

!

version 12.4

!

hostname R3

!

ip cef

!

ipv6 unicast-routing

!

interface Loopback0

no ip address

ipv6 address 1111::1/128

ipv6 ospf 1 area 1

!

interface Loopback1

no ip address

ipv6 address 1112::1/128

ipv6 ospf 1 area 1

!

interface Loopback99

no ip address

ipv6 address 6060:66:66:66::66/128

!

interface FastEthernet0/0

no ip address

duplex auto

speed auto

ipv6 address 2020:1:1:1::2/64

ipv6 ospf 1 area 0

!

interface Serial0/0

no ip address

ipv6 address 3030:1:1:1::11/64

clock rate 2000000

!

router bgp 65000

bgp router-id 2.2.2.2

no bgp default ipv4-unicast

bgp log-neighbor-changes

neighbor 3030:1:1:1::10 remote-as 65000

neighbor 3030:1:1:1::10 update-source Serial0/0

!

address-family ipv6

neighbor 3030:1:1:1::10 activate

network 6060:66:66:66::66/128

redistribute connected

redistribute ospf 1 match internal external 1 external 2

no synchronization

exit-address-family

!

ipv6 router ospf 1

router-id 3.3.3.3

log-adjacency-changes

!

end

ルータ R4

!

version 12.4

!

hostname R4

!

ip cef

!

ipv6 unicast-routing

!

interface Loopback0

no ip address

ipv6 address 3333::1/128

ipv6 ospf 1 area 0

!

interface FastEthernet0/0

no ip address

duplex auto

speed auto

ipv6 address 2020:1:1:1::1/64

ipv6 ospf 1 area 0

!

ipv6 router ospf 1

router-id 5.5.5.5

log-adjacency-changes

!

end

確認

ここでは、設定が正常に機能しているかどうかを確認します。

アウトプット インタープリタ ツール（登録ユーザ専用）（OIT）は、特定の show コマンドをサポートします。OIT を使用して、show コマンドの出力の分析を表示します。

次の show コマンドを使用して、設定を確認します。

- show ipv6 route ospf

- show ipv6 route bgp

OSPFv3 設定の確認

OSPFv3が正しく設定されていることを確認するには、ルータR1とR4でshow ipv6 route ospfコマンドを使用します。

show ipv6 route ospf

ルータ R1 内

R1#show ipv6 route ospf

IPv6 Routing Table - 6 entries

Codes: C - Connected, L - Local, S - Static, R - RIP, B - BGP

U - Per-user Static route, M - MIPv6

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

O - OSPF intra, OI - OSPF inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

D - EIGRP, EX - EIGRP external

OI  2010::1/128 [110/10]

via FE80::C001:16FF:FEDC:0, FastEthernet0/0

OI  2011::1/128 [110/10]

via FE80::C001:16FF:FEDC:0, FastEthernet0/0

ルータ R4 内

R4#show ipv6 route ospf

IPv6 Routing Table - 6 entries

Codes: C - Connected, L - Local, S - Static, R - RIP, B - BGP

U - Per-user Static route, M - MIPv6

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

O - OSPF intra, OI - OSPF inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

D - EIGRP, EX - EIGRP external

OI  1111::1/128 [110/10]

via FE80::C002:16FF:FEDC:0, FastEthernet0/0

OI  1112::1/128 [110/10]

via FE80::C002:16FF:FEDC:0, FastEthernet0/0

BGP 設定の確認

OSPFv3 ルートが BGP に再配送されているかどうかを確認するには、ルータ R2 および R3 で show ipv6 route bgp コマンドを使用します。

show ipv6 route bgp

ルータ R2 内
R2#show ipv6 route bgp

IPv6 Routing Table - 14 entries

Codes: C - Connected, L - Local, S - Static, R - RIP, B - BGP

U - Per-user Static route, M - MIPv6

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

O - OSPF intra, OI - OSPF inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

D - EIGRP, EX - EIGRP external

B   1111::1/128 [200/0]

via 3030:1:1:1::11

B   1112::1/128 [200/0]

via 3030:1:1:1::11

B   2020:1:1:1::/64 [200/0]

via 3030:1:1:1::11

B   3333::1/128 [200/10]

via 3030:1:1:1::11

!--- The above routes are OSPFv3 routes !--- that are redistributed in to BGP.

B   6060:66:66:66::66/128 [200/0]

via 3030:1:1:1::11

ルータ R3 内

R3#show ipv6 route bgp

IPv6 Routing Table - 14 entries

Codes: C - Connected, L - Local, S - Static, R - RIP, B - BGP

U - Per-user Static route, M - MIPv6

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

O - OSPF intra, OI - OSPF inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

D - EIGRP, EX - EIGRP external

B   1010:1:1:1::/64 [200/0]

via 3030:1:1:1::10

B   2010::1/128 [200/0]

via 3030:1:1:1::10

B   2011::1/128 [200/0]

via 3030:1:1:1::10

B   2222::1/128 [200/10]

via 3030:1:1:1::10

!--- The above routes are OSPFv3 routes !--- that are redistributed in to BGP.

B   5050:55:55:55::55/128 [200/0]

via 3030:1:1:1::10

関連情報

- IPv6 に関するサポート ページ

- OSPF に関するサポート ページ

- BGP に関するサポート ページ

- テクニカル サポートとドキュメント – Cisco Systems