内容

はじめに

前提条件

要件

使用するコンポーネント

背景説明

設定

ネットワーク図

コンフィギュレーション

確認

トラブルシュート

はじめに

このドキュメントでは、vPC Nеxusペアと別のデバイス間のe- Border Gateway Protocol(eBGP)ピアリングを設定および確認する方法について説明します。分かりやすくするために、外部デバイスの設定はCisco CLI NX-OSとして表示されます。

前提条件

要件

次の項目に関する知識があることが推奨されます。

- vPCの動作と設定の基本概念。参考：https://www.cisco.com/c/dam/en/us/td/docs/switches/datacenter/sw/design/vpc_design/vpc_best_practices_design_guide.pdf

- BGPの動作と設定

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づいています。

リーフ1#

C93108TC-FX（日本未発売）

NXOS 9.3(3)

リーフ2#

C93108TC-FX（日本未発売）

NXOS 9.3(3)

外部デバイス

N9K-C9396PX

NXOS：バージョン9.2(3)

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、クリアな（デフォルト）設定で作業を開始しています。本稼働中のネットワークでは、各コマンドによって起こる可能性がある影響を十分確認してください。

背景説明

vPCペアと外部デバイス間のルーティングプロトコル(OSPF、ISIS、RIP、EIGRP、BGP)ピアリング。これは、https://www.cisco.com/c/en/us/support/docs/ip/ip-routing/118997-technote-nexus-00.htmlでサポートされています。この記事では、ルーティングプロトコルとしてのeBGPに関する追加の注意事項と設定例について説明します。

vPC上でルーティングプロトコルピアリングを有効にしようとすると、いくつかの問題が発生します。vPC上のルーティングプロトコルピアリングは、

標準ポートチャネル：

1. 外部デバイスが各MACアドレスのトラフィックの転送に使用するポートチャネルのメンバーは確定的ではありません。外部デバイスがLeaf-1へのリンクを介してLeaf-1のBGPパケットを送信する可能性があります。Leaf-1がそれを受信すると、それをCPUにパントして（自身のIPアドレスではなく）廃棄します。そのため、BGP（ユニキャスト）または他のプロトコル（マルチキャスト）は常にフラッピングします。コマンドpeer-gatewayのヘルプを次に示します。

2. peer-gatewayコマンドを使用しても、そのようなパケットではTTLが減少します。NX-OSの新しいコマンドであるlayer3 peer-routerを使用すると、この機能が無効になります。

3. 2つのvPCメンバー間のiBGPは、すべてのネイバー間のiBGPに関するBGPルールに従う必要があります。vPC側でInside VRFを実行しているため、この2つのメンバだけがiBGPを実行する必要があります。NX-OSネットワークの残りの部分（VXlanまたはその他）へのリンク障害が発生した場合にも必要であり、冗長性を提供します。

設定

ネットワーク図

このピアリングを有効にするには、次の2つの重要なコマンドが必要です。

- ピアゲートウェイ:vPCピアゲートウェイ機能により、vPCスイッチは、vPCピアのルータMACアドレスにアドレス指定されたパケットのアクティブゲートウェイとして機能できます

- レイヤ3ピアルータ:ピア宛てのパケットのTTLに変更はありません。外部デバイスは、レイヤルートプロトコルピアリングの観点からも、vPCドメインを単一の物理エンティティとして認識します。

コンフィギュレーション

Leaf 1:

! Form the vPC domain:

vpc domain 1

peer-switch

role priority 10 peer-keepalive destination 192.0.2.2 source 192.0.2.1 peer-gateway layer3 peer-router ipv6 nd synchronize ip arp synchronize

!

!vPC peer-link interface members

interface Ethernet1/53 - 54

description vPC-Peerlink member

switchport

switchport mode trunk

channel-group 11 mode active

no shutdown

!

! vPC peer-link port-channel

interface port-channel11

description vPC-peerlink

switchport

switchport mode trunk

spanning-tree port type network

no shutdown

vpc peer-link

!

! vPC port-channel member to External Device

interface Ethernet1/52

description ExternalDevice Eth2/13

switchport

switchport mode trunk

switchport trunk allowed vlan 203,205

mtu 9216

channel-group 12 mode active

no shutdown

!

! vPC port-channel to External Device

interface port-channel12

description vPC port-channel to External Device

switchport

switchport mode trunk

switchport trunk allowed vlan 203,205

mtu 9216

vpc 12

!

! Layer 3 interface to the Eternal device:

interface Vlan205

no shutdown

vrf member Customer

! BFD for eBGP

bfd interval 500 min_rx 500 multiplier 3

! Disable bfd echo, as it is not supported over vPC

no bfd echo

no ip redirects

! We use/29 as we need 3 ip address, one per each member of the ! vPC domain and 3rd for the External Device

ip address 198.51.100.1/29 tag 800204

! Disable redirects - this is needed to enable BFD

no ipv6 redirects

!

router bgp 65535

router bgp 65535

router-id 203.0.113.1

log-neighbor-changes

address-family ipv4 unicast

Customer router-id 198.51.100.1 address-family ipv4 unicast neighbor 198.51.100.2 description Leaf-2 remote-as 65535 address-family ipv4 unicast soft-reconfiguration inbound always neighbor 198.51.100.3 description to External Device bfd remote-as 65000 update-source Vlan205 address-family ipv4 unicast soft-reconfiguration inbound always ! Leaf 2:

! Form the vPC domain:

vpc domain 1

peer-switch

role priority 10

peer-keepalive destination 192.0.2.1 source 192.0.2.2

peer-gateway

layer3 peer-router

ipv6 nd synchronize

ip arp synchronize

!

!vPC peer-link interface members

interface Ethernet1/53 - 54

description vPC-Peerlink member

switchport

switchport mode trunk

channel-group 11 mode active

no shutdown

!

! vPC peer-link port-channel

interface port-channel11

description vPC-peerlink

switchport

switchport mode trunk

spanning-tree port type network

no shutdown

vpc peer-link

!

! vPC port-channel member to External Device

interface Ethernet1/52

description ExternalDevice Eth2/13

switchport

switchport mode trunk

switchport trunk allowed vlan 203,205

mtu 9216

channel-group 12 mode active

no shutdown

!

! vPC port-channel to External Device

interface port-channel12

description vPC port-channel to External Device

switchport

switchport mode trunk

switchport trunk allowed vlan 203,205

mtu 9216

vpc 12

!

! Layer 3 interface to the Eternal device:

interface Vlan205

no shutdown

vrf member Customer

! BFD for eBGP

bfd interval 500 min_rx 500 multiplier 3

! Disable bfd echo, as it is not supported over vPC

no bfd echo

no ip redirects

! We use/29 as we need 3 ip address, one per each member of the ! vPC domain and 3rd for the External Device

ip address 198.51.100.2/29 tag 800204

! Disable redirects - this is needed to enable BFD

no ipv6 redirects

!

router bgp 65535

router bgp 65535

router-id 203.0.113.2

log-neighbor-changes

address-family ipv4 unicast

vrf Customer

router-id 198.51.100.2

address-family ipv4 unicast

neighbor 198.51.100.1

description Leaf-2

remote-as 65535

address-family ipv4 unicast

soft-reconfiguration inbound always

neighbor 198.51.100.3

description to External Device

bfd

remote-as 65000

update-source Vlan205

address-family ipv4 unicast

soft-reconfiguration inbound always

!

External Device (NX-OS style CLI):

interface Ethernet2/13 - 14

switchport

switchport mode trunk

switchport trunk allowed vlan 203,205

mtu 9216

channel-group 12 mode active

no shutdown

!

interface port-channel12

switchport

switchport mode trunk

switchport trunk allowed vlan 203,205

mtu 9216

no shutdown

!

interface Vlan205

no shutdown

mtu 9216

! See notes in Leaf-1 and Leaf 2 for BFD

bfd interval 500 min_rx 500 multiplier 3

no bfd echo

no ip redirects

ip address 198.51.100.3/29

no ipv6 redirects

!

router bgp 65000

log-neighbor-changes

address-family ipv4 unicast

neighbor 198.51.100.1 remote-as 65535

description to Leaf-1

update-source Vlan205

bfd

neighbor 198.51.100.2 remote-as 65535

description to Leaf-2

update-source Vlan205

bfd

end

!

確認

show bgp ipv4 unicast neighborsの出力を次に示します。次のことを確認します。

1. BGPネイバーシップが確立され、安定している

2. BFDが外部ネイバー間で有効になっている

Leaf 1/2: show bgp ipv4 unicast neighbors vrf Customer BGP neighbor is 203.0.113.2, remote AS 65535, ibgp link, Peer index 4 BGP version 4, remote router ID 203.0.113.2 Neighbor previous state = OpenConfirm BGP state = Established, up for 6d22h Neighbor vrf: Customer Peer is directly attached, interface Vlan205 Last read 00:00:14, hold time = 180, keepalive interval is 60 seconds Last written 00:00:03, keepalive timer expiry due 00:00:56 Received 10012 messages, 0 notifications, 0 bytes in queue ... BGP neighbor is 203.0.113.2.3, remote AS 65000, ebgp link, Peer index 3 BGP version 4, remote router ID 203.0.113.2 Neighbor previous state = OpenConfirm BGP state = Established, up for 1d00h Neighbor vrf: Customer Using Vlan205 as update source for this peer Peer is directly attached, interface Vlan205 BFD live-detection is configured and enabled, state is Up Last read 00:00:22, hold time = 180, keepalive interval is 60 seconds Last written 00:00:56, keepalive timer expiry due 00:00:03 ! External Device: show bgp ipv4 unicast neighbors BGP neighbor is 203.0.113.1, remote AS 65535, ebgp link, Peer index 3 Inherits peer configuration from peer-template Cust_BGP_Peer BGP version 4, remote router ID 203.0.113.1 BGP state = Established, up for 1d00h Peer is directly attached, interface Vlan205 Enable logging neighbor events BFD live-detection is configured and enabled, state is Up Last read 0.660288, hold time = 180, keepalive interval is 60 seconds Last written 00:00:26, keepalive timer expiry due 00:00:33 Received 10122 messages, 1 notifications, 0 bytes in queue Sent 10086 messages, 1 notifications, 0(0) bytes in queue Connections established 14, dropped 13 Last reset by us 1d00h, due to bfd session down Last reset by peer 6d22h, due to other configuration change ....

トラブルシュート

次のコマンドは動作の確認に役立ちます。

show vpc show vpc consistency-parameters global show vpc consistency-parameters interface

show bgp ipv4 unicast neighbors show bgp ipv4 unicast summary