内容

概要

前提条件

要件

使用するコンポーネント

表記法

設定

ネットワーク図

設定

確認

トラブルシュート

関連情報

概要

このドキュメントでは、Layer 2 Tunneling Protocol Version 3（L2TPv3）のスタティック方式とヘアピニング方式の設定例について説明します。

次の表は、Cisco IOS® ソフトウェア リリースの L2TPv3 のための修正サポートについて説明したものです。

Cisco IOS ソフトウェア リリース

L2TPv3 サポート説明

12.0(21)S

L2TPv3 に対する初期データ プレーン サポートが、Cisco 7200 シリーズ、Cisco 7500 シリーズ、Cisco 10720、および Cisco 12000 シリーズ プラットフォームで導入されました。

12.0(23)S

L2TPv3 コントロール プレーン サポートが、Cisco 7200 シリーズ、Cisco 7500 シリーズ、Cisco 10720、および Cisco 12000 シリーズ プラットフォームで導入されました。

12.3(2)T

この機能が、Cisco IOS ソフトウェア リリース 12.3(2)T に統合されました。

L2TPv3 機能を使用するには、Cisco Express Forwarding（CEF）をイネーブルにする必要があります。Xconnect 設定サブモードは、CEF がイネーブルになるまでブロックされます。Cisco 7500 シリーズなどの分散プラットフォームでは、セッション確立中に CEF をディセーブルにすると、セッションが解除され、CEF が再度イネーブルになるまでダウンしたままになります。CEF をイネーブルにするには、ip cef コマンドまたは ip cef distributed コマンドを使用します。

ループバック インターフェイスの設定では、送信元 IP アドレスを指定することを強く推奨いたします。ループバック インターフェイスを設定しなかった場合は、ルータにより、使用可能な最良のローカル アドレスが選択されます。このアドレスは、コア相対インターフェイス上で設定された任意の IP アドレスにすることができます。この設定では、制御チャネルの確立が妨げられることがあります。ループバック アドレスは、コア ネットワークから到達できる必要があります。

前提条件

要件

この設定を試す前に、次の項目に関して精通していることを確認してください。

- L2TPv3：Layer 2 Tunnel Protocol Version 3

使用するコンポーネント

このドキュメントの内容は、特定のソフトウェアやハードウェアのバージョンに限定されるものではありません。

表記法

ドキュメントの表記法の詳細は、「シスコ テクニカル ティップスの表記法」を参照してください。

設定

このセクションでは、このドキュメントで説明する機能を設定するために必要な情報を提供しています。

注：この文書で使用されているコマンドの詳細を調べるには、「Command Lookup ツール」を使用してください（登録ユーザのみ）。

ネットワーク図

このドキュメントでは、次のネットワーク セットアップを使用します。

注：ルータR2とR3はプロバイダーによって使用されます。ルータ R1、R4、R5 および R6 は、エンド ユーザです。L2TPv3 を使用することによって、ルータ R4 は R5 に直接接続されているように見えます。これは、ルータ R1 とルータ R6 間の接続にも当てはまります。

設定

このドキュメントでは、次の構成を使用します。

- IP クラウドを介したスタティック擬似ワイヤ。この設定の関連部分は、2 つの単方向トンネルが設定された R2 と R3 にあります。

- ヘアピン擬似ワイヤ、または（同じルータ内の 1 つのポートから別のポートへの）ローカルスイッチング。 この設定は R2 上だけで実行され、2 つのループバックを示している 2 つの単方向トンネルの設定により構成されています。このトンネルはどちらもルータ R2 上にあります。

R2

R2# show running-config

Building configuration...

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname R2

!

!

clock timezone EST 10

ip subnet-zero

ip cef

no ip domain-lookup

l2tp-class R2signal

hello 10

password 0 cisco

cookie size 8

!

pseudowire-class wireR5R4

encapsulation l2tpv3

protocol l2tpv3 R2signal

ip local interface Loopback0

ip dfbit set

!

pseudowire-class wireR6R1

encapsulation l2tpv3

protocol l2tpv3 R2signal

ip local interface Loopback1

ip dfbit set

!

pseudowire-class wireR1R6

encapsulation l2tpv3

protocol l2tpv3 R2signal

ip local interface Loopback2

ip dfbit set

!

interface Loopback0

description Used by wireR5R4 for Static Connection

ip address 2.2.2.2 255.255.255.255

no ip directed-broadcast

!

interface Loopback1

description Used by wireR6R1 for Hair Pinning Connection

ip address 2.2.2.6 255.255.255.255

no ip directed-broadcast

!

interface Loopback2

description Used by wireR1R6 for Hair Pinning Connection

ip address 2.2.2.1 255.255.255.255

no ip directed-broadcast

!

interface Ethernet0/0

description Connection to R1

no ip address

no ip directed-broadcast

xconnect 2.2.2.6 16 encapsulation l2tpv3 pw-class wireR1R6

!

interface Ethernet1/0

description Connection to Pretend Cloud.

ip address 20.20.20.2 255.255.255.0

no ip directed-broadcast

no cdp enable

!

interface Ethernet2/0

description Connection to R5

no ip address

no ip directed-broadcast

no cdp enable

xconnect 3.3.3.3 12 encapsulation l2tpv3 pw-class wireR5R4

!

interface Ethernet3/0

description Connection to R6

no ip address

no ip directed-broadcast

xconnect 2.2.2.1 16 encapsulation l2tpv3 pw-class wireR6R1

!

ip classless

ip route 3.3.3.3 255.255.255.255 20.20.20.3

!--- The other end of wireR5R4 loopback (3.3.3.3) must be

!--- reachable from this router. Hair Pinning loopbacks

!--- are reachable—there is no need for additional routes.

!

!

line con 0

exec-timeout 0 0

privilege level 15

line aux 0

line vty 0 4

login

!

end

R3

R3# show running-config

Building configuration...

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname R3

!

!

clock timezone EST 10

ip subnet-zero

ip cef

!

l2tp-class R3signal

hello 10

password 0 cisco

cookie size 8

!

pseudowire-class wireR4R5

encapsulation l2tpv3

protocol l2tpv3 R3signal

ip local interface Loopback0

ip dfbit set

!

interface Loopback0

description Use by wireR4R5 for static connection

ip address 3.3.3.3 255.255.255.255

no ip directed-broadcast

!

interface Ethernet0/0

ip address 20.20.20.3 255.255.255.0

no ip directed-broadcast

!

interface Ethernet1/0

no ip address

no ip directed-broadcast

no cdp enable

xconnect 2.2.2.2 12 encapsulation l2tpv3 pw-class wireR4R5

!

ip classless

ip route 2.2.2.2 255.255.255.255 Ethernet0/0

!--- The other end of wireR4R5 loopback (3.3.3.3) must be

!--- reachable from this router.

!

line con 0

exec-timeout 0 0

privilege level 15

line aux 0

line vty 0 4

login

!

end

カスタマー R1R6 トンネル（擬似ワイヤ）エンド ルータの設定：

R1

R1# show running-config

Building configuration...

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname R1

!

!

clock timezone EST 10

ip subnet-zero

no ip domain-lookup

!

interface Ethernet0/0

ip address 10.10.10.1 255.255.255.0

no ip directed-broadcast

!

ip classless

!

line con 0

exec-timeout 0 0

privilege level 15

line aux 0

line vty 0 4

login

!

end

R6

R6# show running-config

Building configuration...

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname R6

!

!

clock timezone EST 10

ip subnet-zero

no ip domain-lookup

!

interface Ethernet0/0

ip address 10.10.10.6 255.255.255.0

no ip directed-broadcast

!

ip classless

!

line con 0

exec-timeout 0 0

privilege level 15

line aux 0

line vty 0 4

login

!

end

カスタマー R4R5 トンネル（擬似ワイヤ）エンド ルータの設定：

R4

R4# show running-config

Building configuration...

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname R4

!

!

ip subnet-zero

!

interface Ethernet0/0

ip address 30.30.30.4 255.255.255.0

no ip directed-broadcast

!

router ospf 1

log-adjacency-changes

network 30.30.30.0 0.0.0.255 area 0

!

ip classless

!

line con 0

exec-timeout 0 0

privilege level 15

line aux 0

line vty 0 4

login

!

end

R5

R5# show running-config

Building configuration...

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname R5

!

!

ip subnet-zero

!

interface Ethernet0/0

ip address 30.30.30.5 255.255.255.0

no ip directed-broadcast

!

router ospf 1

log-adjacency-changes

network 30.30.30.0 0.0.0.255 area 0

!

ip classless

!

line con 0

exec-timeout 0 0

privilege level 15

line aux 0

line vty 0 4

login

!

end

確認

ここでは、設定が正しく機能していることを確認するために使用する情報を示します。

R4# show ip ospf neighbor

Neighbor ID  Pri  State     Dead Time   Address     Interface

30.30.30.5    1   FULL/DR   00:00:39    30.30.30.5  Ethernet0/0

R5# show ip ospf neighbor

Neighbor ID  Pri  State     Dead Time   Address     Interface

30.30.30.4    1   FULL/BDR  00:00:38    30.30.30.4  Ethernet0/0

R1# show cdp neighbors

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater

Device ID   Local Intrfce  Holdtme Capability Platform  Port ID

R6           Eth 0/0       158        R       7206VXR   Eth 0/0

一部の show コマンドはアウトプット インタープリタ ツールによってサポートされています（登録ユーザ専用）。このツールを使用することによって、show コマンド出力の分析結果を表示できます。

- show l2tun tunnel all:L2TPv3セッションの現在の状態を表示し、ローカルおよびリモートのL2TPホスト名、集約パケット数、L2TP制御チャネルなど、現在設定されているセッションの情報を表示するには、show l2tun tunnel allコマンドをEXECモードでします。

R2# show l2tun tunnel all

Tunnel Information Total tunnels 3 sessions 3

Tunnel id 54217 is up, remote id is 44186, 1 active sessions

Tunnel state is established, time since change 00:12:07

Tunnel transport is IP (115)

Remote tunnel name is R2

Internet Address 2.2.2.6, port 0

Local tunnel name is R2

Internet Address 2.2.2.1, port 0

Tunnel domain is

VPDN group for tunnel is -

L2TP class for tunnel is R2signal

88 packets sent, 87 received

10086 bytes sent, 11092 received

Control Ns 76, Nr 74

Local RWS 1024 (default), Remote RWS 1024 (max)

Tunnel PMTU checking disabled

Retransmission time 1, max 1 seconds

Unsent queuesize 0, max 0

Resend queuesize 0, max 2

Total resends 0, ZLB ACKs sent 72

Current nosession queue check 0 of 5

Retransmit time distribution: 0 0 0 0 0 0 0 0 0

Sessions disconnected due to lack of resources 0

Tunnel id 44186 is up, remote id is 54217, 1 active sessions

Tunnel state is established, time since change 00:12:08

Tunnel transport is IP (115)

Remote tunnel name is R2

Internet Address 2.2.2.1, port 0

Local tunnel name is R2

Internet Address 2.2.2.6, port 0

Tunnel domain is

VPDN group for tunnel is -

L2TP class for tunnel is R2signal

87 packets sent, 88 received

11092 bytes sent, 10086 received

Control Ns 74, Nr 76

Local RWS 1024 (default), Remote RWS 1024 (max)

Tunnel PMTU checking disabled

Retransmission time 1, max 1 seconds

Unsent queuesize 0, max 0

Resend queuesize 0, max 1

Total resends 0, ZLB ACKs sent 74

Current nosession queue check 0 of 5

Retransmit time distribution: 0 0 0 0 0 0 0 0 0

Sessions disconnected due to lack of resources 0

Tunnel id 24124 is up, remote id is 48735, 1 active sessions

Tunnel state is established, time since change 00:11:00

Tunnel transport is IP (115)

Remote tunnel name is R3

Internet Address 3.3.3.3, port 0

Local tunnel name is R2

Internet Address 2.2.2.2, port 0

Tunnel domain is

VPDN group for tunnel is -

L2TP class for tunnel is R2signal

155 packets sent, 158 received

15230 bytes sent, 17586 received

Control Ns 69, Nr 67

Local RWS 1024 (default), Remote RWS 1024 (max)

Tunnel PMTU checking disabled

Retransmission time 1, max 1 seconds

Unsent queuesize 0, max 0

Resend queuesize 0, max 2

Total resends 1, ZLB ACKs sent 65

Current nosession queue check 0 of 5

Retransmit time distribution: 0 0 1 0 0 0 0 0 0

Sessions disconnected due to lack of resources 0

R3# show l2tun tunnel all

Tunnel Information Total tunnels 1 sessions 1

Tunnel id 48735 is up, remote id is 24124, 1 active sessions

Tunnel state is established, time since change 00:12:36

Tunnel transport is IP (115)

Remote tunnel name is R2

Internet Address 2.2.2.2, port 0

Local tunnel name is R3

Internet Address 3.3.3.3, port 0

Tunnel domain is

VPDN group for tunnel is -

L2TP class for tunnel is R3signal

180 packets sent, 176 received

19766 bytes sent, 17316 received

Control Ns 77, Nr 79

Local RWS 1024 (default), Remote RWS 1024 (max)

Tunnel PMTU checking disabled

Retransmission time 1, max 1 seconds

Unsent queuesize 0, max 0

Resend queuesize 0, max 1

Total resends 1, ZLB ACKs sent 78

Current nosession queue check 0 of 5

Retransmit time distribution: 0 0 1 0 0 0 0 0 0

Sessions disconnected due to lack of resources 0

- show l2tun session all：レイヤ2セッションの現在の状態とL2TPv3制御チャネルに関するプロトコル情報を表示するには、show l2tun session allコマンドをEXECモードで使用します。

R2# show l2tun session all

Session Information Total tunnels 3 sessions 3

Session id 19996 is up, tunnel id 54217

Call serial number is 1492400000

Remote tunnel name is R2

Internet address is 2.2.2.6

Session is L2TP signalled

Session state is established, time since change 00:15:37

112 Packets sent, 111 received

12309 Bytes sent, 13312 received

Receive packets dropped:

out-of-order: 0

total: 0

Send packets dropped:

exceeded session MTU: 0

total: 0

Session vcid is 16

Session Layer 2 circuit, type is Ethernet, name is Ethernet0/0

Circuit state is UP

Remote session id is 19999, remote tunnel id 44186

DF bit on, ToS reflect disabled, ToS value 0, TTL value 255

Session cookie information:

local cookie, size 8 bytes, value 6E 47 8C 4A BA BF 7E A4

remote cookie, size 8 bytes, value 7F 9F 65 C4 C7 5B 57 FF

FS cached header information:

encap size = 32 bytes

00000000 00000000 00000000 00000000

00000000 00000000 00000000 00000000

Sequencing is off

Session id 19999 is up, tunnel id 44186

Call serial number is 1492400000

Remote tunnel name is R2

Internet address is 2.2.2.1

Session is L2TP signalled

Session state is established, time since change 00:15:38

111 Packets sent, 112 received

13312 Bytes sent, 12309 received

Receive packets dropped:

out-of-order: 0

total: 0

Send packets dropped:

exceeded session MTU: 0

total: 0

Session vcid is 16

Session Layer 2 circuit, type is Ethernet, name is Ethernet3/0

Circuit state is UP

Remote session id is 19996, remote tunnel id 54217

DF bit on, ToS reflect disabled, ToS value 0, TTL value 255

Session cookie information:

local cookie, size 8 bytes, value 7F 9F 65 C4 C7 5B 57 FF

remote cookie, size 8 bytes, value 6E 47 8C 4A BA BF 7E A4

FS cached header information:

encap size = 32 bytes

00000000 00000000 00000000 00000000

00000000 00000000 00000000 00000000

Sequencing is off

Session id 20005 is up, tunnel id 24124

Call serial number is 1492400002

Remote tunnel name is R3

Internet address is 3.3.3.3

Session is L2TP signalled

Session state is established, time since change 00:14:29

200 Packets sent, 204 received

19650 Bytes sent, 22100 received

Receive packets dropped:

out-of-order: 0

total: 0

Send packets dropped:

exceeded session MTU: 0

total: 0

Session vcid is 12

Session Layer 2 circuit, type is Ethernet, name is Ethernet2/0

Circuit state is UP

Remote session id is 17834, remote tunnel id 48735

DF bit on, ToS reflect disabled, ToS value 0, TTL value 255

Session cookie information:

local cookie, size 8 bytes, value 22 09 F1 E9 BC 8C 00 94

remote cookie, size 8 bytes, value 39 DD CB 00 9C 4B 1C 8C

FS cached header information:

encap size = 32 bytes

00000000 00000000 00000000 00000000

00000000 00000000 00000000 00000000

Sequencing is off

R3# show l2tun session all

Session Information Total tunnels 1 sessions 1

Session id 17834 is up, tunnel id 48735

Call serial number is 1492400002

Remote tunnel name is R2

Internet address is 2.2.2.2

Session is L2TP signalled

Session state is established, time since change 00:23:53

327 Packets sent, 322 received

33758 Bytes sent, 31248 received

Receive packets dropped:

out-of-order: 0

total: 0

Send packets dropped:

exceeded session MTU: 0

total: 0

Session vcid is 12

Session Layer 2 circuit, type is Ethernet, name is Ethernet1/0

Circuit state is UP

Remote session id is 20005, remote tunnel id 24124

DF bit on, ToS reflect disabled, ToS value 0, TTL value 255

Session cookie information:

local cookie, size 8 bytes, value 39 DD CB 00 9C 4B 1C 8C

remote cookie, size 8 bytes, value 22 09 F1 E9 BC 8C 00 94

FS cached header information:

encap size = 32 bytes

00000000 00000000 00000000 00000000

00000000 00000000 00000000 00000000

Sequencing is off

トラブルシュート

ここでは、設定のトラブルシューティングに使用できる情報を示します。

これらの L2TPv3 機能関連の不具合の詳細については、Bug Toolkit（登録ユーザのみ）をご使用ください。

- CSCdz01467(登録ユーザ専用):Resolved(R) L2TPv3:トンネル パケット カウンタによる不正確なカウントの表示

- CSCeb56061(登録ユーザ専用)：解決済み(R) L2TPv3:L2TPv3oETH によるゾンビ トンネルの生成

- CSCeb35497(登録ユーザ専用)：解決済み(R) L2TPv3シーケンス：Tx Seqnum が 16777215 の後、1 にラップしない

- CSCdz48481(登録ユーザ専用)：解決済み(R) L2TPv3ヘアピニング設定はサポートされなくなりました。

- CSCec00463(登録ユーザ専用):Resolved(R) L2TPv3:Gig イーサネット ポート モードの decap 障害

- CSCec44356(登録ユーザ専用):Resolved(R) C10720:L2TPv3 ヘアピンでの 802.1P 不適合

関連情報

- IP ルーティング プロトコルに関するサポート ページ

- IP ルーティングに関するサポート ページ

- テクニカルサポート - Cisco Systems