内容

概要

前提条件

要件

使用するコンポーネント

表記法

設定

ネットワーク図

設定

確認

ルータ R2

関連情報

概要

このドキュメントでは、Cisco ルータのルート選択に反映されるようにルーティング プロトコルのアドミニストレーティブ ディスタンス値を変更する方法について説明します。

アドミニストレーティブ ディスタンスとは、2 つの異なるルーティング プロトコルから同じ宛先に向かう複数のルートが存在する場合、ルータがベスト パスを選択するために使用する機能です。アドミニストレーティブ ディスタンスでは、ルーティング プロトコルの信頼性が定義されます。アドミニストレーティブ ディスタンスの値が小さいほど、プロトコルの信頼性は高くなります。

注：デフォルトの距離を変更すると、ネットワークでルーティングループが発生する可能性があります。アドミニストレーティブ ディスタンスの変更は慎重に行ってください。また、事前に変更の目的を十分に検討してください。

前提条件

要件

このドキュメントに関しては個別の前提条件はありません。

使用するコンポーネント

このドキュメントの設定は、Cisco IOS ソフトウェア リリース 12.4 (15)T 13 の Cisco 3700 シリーズ ルータに基づきます。

表記法

ドキュメント表記の詳細は、『シスコ テクニカル ティップスの表記法』を参照してください。

設定

このセクションでは、このドキュメントで説明する機能を設定するために必要な情報を提供しています。

注： このドキュメントで使用されているコマンドの詳細を調べるには、Command Lookup Tool（登録ユーザ専用）を使用してください。

ネットワーク図

この図では、ルータ R1 と R2 が並列のシリアル回線を介して接続されています。ルータ R1 と R2 は BGP および OSPF を使用して設定されています。OSPFのデフォルトのアドミニストレーティブディスタンスは110で、eBGPのアドミニストレーティブディスタンスは20です。コマンドdistanceを使用して、BGPのAD値を190に変更しました。このコマンドの前に、ルータR2はBGPルートにBGPのBGPBGPがをADBGP値をBGPルートBGPにをに設定BGPをBGPBGPBGPルートBGPをでBGP。BGP の AD 値を変更した後は、OSPF ルートが優先されます。

設定

このドキュメントでは、次の設定を使用します。

- ルータ R1 の設定

- ルータ R2 の設定

R1 の設定

interface Loopback0

ip address 1.1.1.1 255.255.255.255

!

!

interface Loopback10

ip address 10.10.10.10 255.255.255.255

!

!

interface Loopback20

ip address 20.20.20.20 255.255.255.255

!

!

interface Loopback30

ip address 30.30.30.30 255.255.255.255

!

!

interface Serial1/0

ip address 100.100.100.1 255.255.255.0

serial restart-delay 0

clock rate 64000

!

!

interface Serial1/1

ip address 192.168.12.1 255.255.255.0

serial restart-delay 0

clock rate 64000

!

!

router ospf 10

router-id 1.1.1.1

log-adjacency-changes

network 1.1.1.1 0.0.0.0 area 0

network 10.10.10.10 0.0.0.0 area 0

network 20.20.20.20 0.0.0.0 area 0

network 100.100.100.1 0.0.0.0 area 0

!

router bgp 123

no synchronization

bgp router-id 1.1.1.1

bgp log-neighbor-changes

network 10.10.10.10 mask 255.255.255.255

network 20.20.20.20 mask 255.255.255.255

network 30.30.30.30 mask 255.255.255.255

neighbor 2.2.2.2 remote-as 100

neighbor 2.2.2.2 ebgp-multihop 5

neighbor 2.2.2.2 update-source Loopback0

no auto-summary

!

R2 の設定

interface Loopback0

ip address 2.2.2.2 255.255.255.255

!

!

interface Serial1/0

ip address 100.100.100.2 255.255.255.0

serial restart-delay 0

clock rate 64000

!

!

interface Serial1/1

ip address 192.168.12.2 255.255.255.0

serial restart-delay 0

clock rate 64000

!

!

router ospf 10

router-id 2.2.2.2

log-adjacency-changes

network 2.2.2.2 0.0.0.0 area 0

network 100.100.100.2 0.0.0.0 area 0

!

router bgp 100

no synchronization

bgp router-id 2.2.2.2

bgp log-neighbor-changes

neighbor 1.1.1.1 remote-as 123

neighbor 1.1.1.1 ebgp-multihop 5

neighbor 1.1.1.1 update-source Loopback0

distance 190 1.1.1.1 0.0.0.0

Changed the AD value of BGP as 190!

no auto-summary

!

確認

この項で説明するコマンドを使用して、設定を検証します。

アウトプット インタープリタ ツール（登録ユーザ専用）（OIT）は、特定の show コマンドをサポートします。OIT を使用して、show コマンドの出力の分析を表示します。

ルータ R2

ルータ R2 に distance コマンドが適用されていない場合

Show ip route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

I - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, + - replicated route

Gateway of last resort is not set

1.0.0.0/32 is subnetted, 1 subnets

O        1.1.1.1 [110/65] via 100.100.100.1, 00:00:03, Serial1/0

2.0.0.0/32 is subnetted, 1 subnets

C        2.2.2.2 is directly connected, Loopback0

10.0.0.0/32 is subnetted, 1 subnets

B        10.10.10.10 [20/0] via 1.1.1.1, 00:00:03

BGP Router Preffered Over OSPF

20.0.0.0/32 is subnetted, 1 subnets

B        20.20.20.20 [20/0] via 1.1.1.1, 00:00:03

BGP Router Preffered Over OSPF

30.0.0.0/32 is subnetted, 1 subnets

B        30.30.30.30 [20/0] via 1.1.1.1, 00:00:03

100.0.0.0/8 is variably subnetted, 2 subnets, 2 masks

C        100.100.100.0/24 is directly connected, Serial1/0

L        100.100.100.2/32 is directly connected, Serial1/0

192.168.12.0/24 is variably subnetted, 2 subnets, 2 masks

C        192.168.12.0/24 is directly connected, Serial1/1

L        192.168.12.2/32 is directly connected, Serial1/1

ルータ R2 に distance コマンドが適用されている場合

Show ip route

R2#sh ip route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

I - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, + - replicated route

Gateway of last resort is not set

1.0.0.0/32 is subnetted, 1 subnets

O        1.1.1.1 [110/65] via 100.100.100.1, 00:00:03, Serial1/0

2.0.0.0/32 is subnetted, 1 subnets

C        2.2.2.2 is directly connected, Loopback0

10.0.0.0/32 is subnetted, 1 subnets

O        10.10.10.10 [110/65] via 100.100.100.1, 00:00:03, Serial1/0

By increasing the AD of External BGP, OSPF takes precedence

20.0.0.0/32 is subnetted, 1 subnets

O        20.20.20.20 [110/65] via 100.100.100.1, 00:00:03, Serial1/0

By increasing the AD of External BGP, OSPF takes precedence

30.0.0.0/32 is subnetted, 1 subnets

B        30.30.30.30 [190/0] via 1.1.1.1, 00:00:03

100.0.0.0/8 is variably subnetted, 2 subnets, 2 masks

C        100.100.100.0/24 is directly connected, Serial1/0

L        100.100.100.2/32 is directly connected, Serial1/0

192.168.12.0/24 is variably subnetted, 2 subnets, 2 masks

C        192.168.12.0/24 is directly connected, Serial1/1

L        192.168.12.2/32 is directly connected, Serial1/1

関連情報

- シスコ ルータにおけるルート選択

- OSPF に関するサポート ページ

- BGP に関するサポート ページ

- テクニカル サポートとドキュメント – Cisco Systems