内容

はじめに

前提条件

要件

使用するコンポーネント

背景説明

シナリオ

ネットワーク図

初期設定

シナリオ1：遅延メトリックの変更によるパス選択の操作

シナリオ2：オフセットリストの使用によるパス選択の操作

シナリオ3：集約によるパス選択への影響

シナリオ4：リークマップを使用したパス選択の影響

シナリオ5：プレフィックスのアドミニストレーティブディスタンス(AD)を変更してパス選択に影響を与える

シナリオ6：ルートフィルタリングによるパス選択への影響

関連情報

はじめに

このドキュメントでは、さまざまなEnhanced Interior Gateway Routing Protocol(EIGRP)機能を操作して優先パスを作成するプロセスについて説明します。

前提条件

要件

次の項目に関する知識があることが推奨されます。

- IPルーティングの基礎知識

- EIGRPプロトコルの知識

- Cisco IOS®XEコマンドラインインターフェイス(CLI)の知識

使用するコンポーネント

このドキュメントは、特定のソフトウェアやハードウェアのバージョンに限定されるものではありませんが、次のソフトウェアやハードウェアのバージョンに基づくものです。

- ルータASR 1000

- ルータISR 4000

- Cisco IOS XE 17.9.x

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、クリアな（デフォルト）設定で作業を開始しています。本稼働中のネットワークでは、各コマンドによって起こる可能性がある影響を十分確認してください。

背景説明

EIGRPのパス選択は、プロトコルが宛先へのベストパスを決定するために使用する各種メトリックを操作することによって影響を受ける可能性があります。EIGRPは、異なるメトリックに基づいて宛先へのベストパスを計算します。パス選択プロセスでは、これらのメトリックを評価して、最適なルートを決定します。EIGRPメトリックには、帯域幅、遅延、負荷、信頼性、最大伝送ユニット(MTU)などがあります。これらのメトリックとその重要性を理解することは、ネットワーク管理者が特定の要件やネットワーク条件に基づいてEIGRPパス選択を変更するのに役立ちます。デフォルトでは、異なるメトリック値から、EIGRPは宛先ネットワークへのパスの最小帯域幅と合計遅延のみを使用して、ルーティングメトリックを計算します。さらに、帯域幅と遅延のメトリックは、宛先へのパスに沿ったデバイスからのインターフェイスに設定されたスタティック値から決定されます。つまり、これら2つのパラメータは動的には測定されません。

メトリック操作の他に、ルートフィルタリングを使用してEIGRPのパス選択に影響を与えることもできます。ルートフィルタリングでは、ルータのルーティングテーブルへの出入りを許可または拒否する情報を制御します。ルートのフィルタリングは、ルーティングテーブルの最適化やネットワークトラフィックの管理など、さまざまな理由で実行できます。EIGRPのルートフィルタリングに関連する主な機能には、配布リスト、プレフィックスリスト、ルートマップ、リークマップなどがあります。これらのメカニズムにより、ルーティング情報を制御するための強力で柔軟な方法が提供されます。このルーティング情報を使用して、ネットワーク管理者は、EIGRPルーティングテーブルを特定の条件に合わせて調整し、ネットワーク効率を向上させることができます。

シナリオ

ルーティングプロトコルの動的な状況では、ルーティングの決定をカスタマイズして特定のネットワーク要件に合わせ、トラフィックフローを最適化しなければならないという課題に管理者が直面することがよくあります。これには、ルータがパス選択の決定を行う方法に影響を与えるさまざまな手法と設定の活用が含まれます。次の例では、管理者が戦略的な設定を使用してEIGRPパス選択を操作できるさまざまな代替手段を示します。

1. 遅延メトリックを変更してInfluencePathを選択する

ルータインターフェイスで遅延メトリックを調整すると、管理者はリンク上のこの特定のパラメータに影響を与えることによって、ルーティングの決定に影響を与えることができます。このわずかな操作によって、変更された遅延値に基づいて優先パスを使用するようにトラフィックを誘導できます。

2. offset-listを使用してパス選択に影響を与える

offset-listを使用すると、特定のプレフィクスのメトリックを選択的に変更でき、特定のインターフェイスでのパス選択に影響を与える、的を絞ったアプローチが提供されます。このメカニズムは、EIGRPを通じて学習されたルートへの着信メトリックと発信メトリックを増加させ、特定のパスよりも一部のプレフィックスを選択的に優先させるために使用されます。

3. 集約によるパス選択への影響

集約ルートを導入すると、管理者はプレフィクスの最長一致のプリファレンスに影響を与えることができます。ルート集約は、ルーティング決定の粒度に影響を与え、ルーティングテーブルを最適化し、ネットワーク全体の効率を向上させます。

4. リークマップの使用によるパス選択への影響

集約ルートのアドバタイズメント時にリークマップを利用すると、より具体的なルートを選択的にアナウンスするメカニズムが提供されます。このアプローチにより、集約された情報が戦略的に発表され、ルーティングの柔軟性が維持され、パス選択に影響が及びます。

5. プレフィックスのアドミニストレーティブディスタンス(AD)を変更してパス選択に影響を与える

プレフィクスのアドミニストレーティブディスタンスの変更は、ルーティング情報の送信元を制御する有用な手法です。これは、特定の送信元からのルートをルーティング情報ベース(RIB)から除外する必要があるシナリオで特に役立ちます。

6. ルートフィルタリングによるパス選択への影響

ルートフィルタリングは、ルーティングプロトコルに対する特定のルートのアドバタイズまたは受け入れを制御するために使用される強力な方法です。一般に、特定の基準に基づいてルーティング情報をフィルタリングし、特定のルートがアドバタイズまたは学習されるのを防ぐために使用されます。

配布リストは、EIGRPのプレフィクスのフィルタリングに使用される主要なツールの1つであり、アクセスリスト(ACL)、プレフィックスリスト、またはルートマップと組み合わせて使用できます。

プレフィックスリストを使用すると、特定のネイバーからのプレフィクスのきめ細かいフィルタリングが容易になります。このレベルの制御は、パス設定を変更するためにルーティングアップデートを管理するために不可欠です。

ネットワーク図

EIGRPトポロジ

初期設定

設定を変更する前に、デバイスの初期設定とステータスを確認することが重要です（初期設定は各シナリオで同じです）。ネットワークダイアグラムに基づくと、R1、R2、R3、およびR4はEIGRPネイバーであり（各ルータには2つの隣接関係があります）、R4もIntermediate System-to-Intermediate System(IS-IS)ドメインの一部であり、IS-ISとEIGRPの間で相互再配布を行っています。R1には、EIGRPを介した10.20.x.xおよび10.30.x.xサブネットへの（インターフェイスGi1/0/3およびGi1/0/4を経由する）2つのパスがあり、サブネット10.10.x.xは直接接続されていることに注意してください。

R1

コンフィギュレーション

ステータス

R1#show run | section router eigrp

router eigrp LAB

!

address-family ipv4 unicast autonomous-system 100

!

topology base

exit-af-topology

network 10.10.10.0 0.0.0.255

network 10.10.20.0 0.0.0.255

network 10.10.30.0 0.0.0.255

network 192.168.1.0 0.0.0.3

network 192.168.3.0 0.0.0.3

exit-address-family

R1#show run interface GigabitEthernet1/0/3

Building configuration...

Current configuration : 93 bytes

!

interface GigabitEthernet1/0/3

no switchport

ip address 192.168.3.1 255.255.255.252

end

R1#show run interface GigabitEthernet1/0/4

Building configuration...

Current configuration : 93 bytes

!

interface GigabitEthernet1/0/4

no switchport

ip address 192.168.1.1 255.255.255.252

end

R1#show ip route eigrp

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

& - replicated local route overrides by connected

Gateway of last resort is not set

10.0.0.0/8 is variably subnetted, 12 subnets, 2 masks

D EX     10.20.40.0/24

[170/66560] via 192.168.3.2, 00:31:39, GigabitEthernet1/0/3

[170/66560] via 192.168.1.2, 00:31:39, GigabitEthernet1/0/4

D EX     10.20.50.0/24

[170/66560] via 192.168.3.2, 00:31:39, GigabitEthernet1/0/3

[170/66560] via 192.168.1.2, 00:31:39, GigabitEthernet1/0/4

D EX     10.20.60.0/24

[170/66560] via 192.168.3.2, 00:31:39, GigabitEthernet1/0/3

[170/66560] via 192.168.1.2, 00:31:39, GigabitEthernet1/0/4

D        10.30.70.0/24

[90/16000] via 192.168.3.2, 00:29:39, GigabitEthernet1/0/3

[90/16000] via 192.168.1.2, 00:29:39, GigabitEthernet1/0/4

D        10.30.80.0/24

[90/16000] via 192.168.3.2, 00:29:39, GigabitEthernet1/0/3

[90/16000] via 192.168.1.2, 00:29:39, GigabitEthernet1/0/4

D        10.30.90.0/24

[90/16000] via 192.168.3.2, 00:29:38, GigabitEthernet1/0/3

[90/16000] via 192.168.1.2, 00:29:38, GigabitEthernet1/0/4

172.16.0.0/30 is subnetted, 2 subnets

D        172.16.2.0 [90/15360] via 192.168.1.2, 6d21h, GigabitEthernet1/0/4

D        172.16.4.0 [90/15360] via 192.168.3.2, 6d21h, GigabitEthernet1/0/3

R1#show ip route connected Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2 E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2 ia - IS-IS inter area, * - candidate default, U - per-user static route H - NHRP, G - NHRP registered, g - NHRP registration summary o - ODR, P - periodic downloaded static route, l - LISP a - application route + - replicated route, % - next hop override, p - overrides from PfR & - replicated local route overrides by connected Gateway of last resort is not set 10.0.0.0/8 is variably subnetted, 12 subnets, 2 masks C 10.10.10.0/24 is directly connected, Loopback10 L 10.10.10.10/32 is directly connected, Loopback10 C 10.10.20.0/24 is directly connected, Loopback20 L 10.10.20.20/32 is directly connected, Loopback20 C 10.10.30.0/24 is directly connected, Loopback30 L 10.10.30.30/32 is directly connected, Loopback30 192.168.1.0/24 is variably subnetted, 2 subnets, 2 masks C 192.168.1.0/30 is directly connected, GigabitEthernet1/0/4 L 192.168.1.1/32 is directly connected, GigabitEthernet1/0/4 192.168.3.0/24 is variably subnetted, 2 subnets, 2 masks C 192.168.3.0/30 is directly connected, GigabitEthernet1/0/3 L 192.168.3.1/32 is directly connected, GigabitEthernet1/0/3

R1#show interfaces GigabitEthernet1/0/3 GigabitEthernet1/0/3 is up, line protocol is up (connected) Hardware is Gigabit Ethernet, address is dc77.4c0d.2758 (bia dc77.4c0d.2758) Internet address is 192.168.3.1/30 MTU 1500 bytes, BW 1000000 Kbit/sec, DLY 10 usec, reliability 255/255, txload 1/255, rxload 1/255 Encapsulation ARPA, loopback not set Keepalive set (10 sec) Full-duplex, 1000Mb/s, media type is 10/100/1000BaseTX input flow-control is on, output flow-control is unsupported ARP type: ARPA, ARP Timeout 04:00:00 Last input 00:00:00, output 00:00:01, output hang never Last clearing of "show interface" counters never Input queue: 0/375/0/0 (size/max/drops/flushes); Total output drops: 0 Queueing strategy: fifo Output queue: 0/40 (size/max) 5 minute input rate 0 bits/sec, 0 packets/sec 5 minute output rate 0 bits/sec, 0 packets/sec 133448 packets input, 10412767 bytes, 0 no buffer Received 133325 broadcasts (0 IP multicasts) 0 runts, 0 giants, 0 throttles 0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored 0 watchdog, 133323 multicast, 0 pause input 0 input packets with dribble condition detected 207232 packets output, 18832310 bytes, 0 underruns Output 738 broadcasts (0 IP multicasts) 0 output errors, 0 collisions, 4 interface resets 0 unknown protocol drops 0 babbles, 0 late collision, 0 deferred 0 lost carrier, 0 no carrier, 0 pause output 0 output buffer failures, 0 output buffers swapped out R1#show interfaces GigabitEthernet1/0/4 GigabitEthernet1/0/4 is up, line protocol is up (connected) Hardware is Gigabit Ethernet, address is dc77.4c0d.2776 (bia dc77.4c0d.2776) Internet address is 192.168.1.1/30 MTU 1500 bytes, BW 1000000 Kbit/sec, DLY 10 usec, reliability 255/255, txload 1/255, rxload 1/255 Encapsulation ARPA, loopback not set Keepalive set (10 sec) Full-duplex, 1000Mb/s, media type is 10/100/1000BaseTX input flow-control is on, output flow-control is unsupported ARP type: ARPA, ARP Timeout 04:00:00 Last input 00:00:01, output 00:00:01, output hang never Last clearing of "show interface" counters never Input queue: 0/375/0/0 (size/max/drops/flushes); Total output drops: 0 Queueing strategy: fifo Output queue: 0/40 (size/max) 5 minute input rate 0 bits/sec, 0 packets/sec 5 minute output rate 0 bits/sec, 0 packets/sec 133435 packets input, 10411748 bytes, 0 no buffer Received 133318 broadcasts (0 IP multicasts) 0 runts, 0 giants, 0 throttles 0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored 0 watchdog, 133317 multicast, 0 pause input 0 input packets with dribble condition detected 207061 packets output, 18806457 bytes, 0 underruns Output 714 broadcasts (0 IP multicasts) 0 output errors, 0 collisions, 4 interface resets 0 unknown protocol drops 0 babbles, 0 late collision, 0 deferred 0 lost carrier, 0 no carrier, 0 pause output 0 output buffer failures, 0 output buffers swapped out R1#show ip eigrp neighbors EIGRP-IPv4 VR(LAB) Address-Family Neighbors for AS(100) H Address Interface Hold Uptime SRTT RTO Q Seq (sec) (ms) Cnt Num 1 192.168.1.2 Gi1/0/4 12 1w0d 1 100 0 123 0 192.168.3.2 Gi1/0/3 12 1w0d 1 100 0 123

R2とR3の場合、すべてのプレフィックス10.10.x.x、10.20.x.x、および10.30.x.xはEIGRPを通じて学習されます。

R2

コンフィギュレーション

ステータス

R2#show run | section router eigrp

router eigrp LAB

!

address-family ipv4 unicast autonomous-system 100

!

topology base

exit-af-topology

network 172.16.2.0 0.0.0.3

network 192.168.1.0 0.0.0.3

exit-address-family

R2#show run interface GigabitEthernet 0/0/0

Building configuration...

Current configuration : 96 bytes

!

interface GigabitEthernet0/0/0

ip address 192.168.1.2 255.255.255.252

negotiation auto

end

R2#show run interface GigabitEthernet 0/0/1

Building configuration...

Current configuration : 95 bytes

!

interface GigabitEthernet0/0/1

ip address 172.16.2.1 255.255.255.252

negotiation auto

end

R2#show ip route eigrp

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, H - NHRP, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

Gateway of last resort is not set

10.0.0.0/24 is subnetted, 9 subnets

D        10.10.10.0 [90/10880] via 192.168.1.1, 6d22h, GigabitEthernet0/0/0

D        10.10.20.0 [90/10880] via 192.168.1.1, 6d22h, GigabitEthernet0/0/0

D        10.10.30.0 [90/10880] via 192.168.1.1, 6d22h, GigabitEthernet0/0/0

D EX     10.20.40.0 [170/61440] via 172.16.2.2, 01:32:45, GigabitEthernet0/0/1

D EX     10.20.50.0 [170/61440] via 172.16.2.2, 01:32:45, GigabitEthernet0/0/1

D EX     10.20.60.0 [170/61440] via 172.16.2.2, 01:32:45, GigabitEthernet0/0/1

D        10.30.70.0 [90/10880] via 172.16.2.2, 01:30:45, GigabitEthernet0/0/1

D        10.30.80.0 [90/10880] via 172.16.2.2, 01:30:45, GigabitEthernet0/0/1

D        10.30.90.0 [90/10880] via 172.16.2.2, 01:30:44, GigabitEthernet0/0/1

172.16.0.0/16 is variably subnetted, 3 subnets, 2 masks

D        172.16.4.0/30 [90/15360] via 172.16.2.2, 6d22h, GigabitEthernet0/0/1

192.168.3.0/30 is subnetted, 1 subnets

D        192.168.3.0 [90/15360] via 192.168.1.1, 6d22h, GigabitEthernet0/0/0

R2#show interfaces GigabitEthernet0/0/0

GigabitEthernet0/0/0 is up, line protocol is up

Hardware is BUILT-IN-2T+6X1GE, address is 0062.ec8a.cf02 (bia 0062.ec8a.cf02)

Internet address is 192.168.1.2/30

MTU 1500 bytes, BW 1000000 Kbit/sec, DLY 10 usec, reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive not supported

Full Duplex, 1000Mbps, link type is auto, media type is T

output flow-control is on, input flow-control is on

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:01, output 00:03:30, output hang never

Last clearing of "show interface" counters never

Input queue: 0/375/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

208297 packets input, 18918243 bytes, 0 no buffer

Received 718 broadcasts (0 IP multicasts)

0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog, 145070 multicast, 0 pause input

134239 packets output, 10474478 bytes, 0 underruns

0 output errors, 0 collisions, 4 interface resets

11577 unknown protocol drops

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier, 0 pause output

0 output buffer failures, 0 output buffers swapped out

R2#show interfaces GigabitEthernet0/0/1

GigabitEthernet0/0/1 is up, line protocol is up

Hardware is BUILT-IN-2T+6X1GE, address is 0062.ec8a.cf03 (bia 0062.ec8a.cf03)

Internet address is 172.16.2.1/30

MTU 1500 bytes, BW 1000000 Kbit/sec, DLY 10 usec, reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive not supported

Full Duplex, 1000Mbps, link type is auto, media type is T

output flow-control is on, input flow-control is on

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:05, output 00:03:35, output hang never

Last clearing of "show interface" counters never

Input queue: 0/375/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

145790 packets input, 15086179 bytes, 0 no buffer

Received 2 broadcasts (0 IP multicasts)

0 runts, 0 giants, 0 throttles

1 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog, 145679 multicast, 0 pause input

134227 packets output, 10473816 bytes, 0 underruns

0 output errors, 0 collisions, 4 interface resets

11575 unknown protocol drops

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier, 0 pause output

0 output buffer failures, 0 output buffers swapped out

R2#show ip eigrp neighbors

EIGRP-IPv4 VR(LAB) Address-Family Neighbors for AS(100)

H   Address                 Interface              Hold Uptime   SRTT   RTO  Q  Seq

(sec)         (ms)       Cnt Num

1   172.16.2.2              Gi0/0/1                  14 6d22h       1   100  0  103

0   192.168.1.1             Gi0/0/0                  12 1w0d        1   100  0  114

R3

コンフィギュレーション

ステータス

R3#show run | section router eigrp

router eigrp LAB

!

address-family ipv4 unicast autonomous-system 100

!

topology base

exit-af-topology

network 172.16.4.0 0.0.0.3

network 192.168.3.0 0.0.0.3

exit-address-family

R3#show run interface GigabitEthernet 0/0/0

Building configuration...

Current configuration : 96 bytes

!

interface GigabitEthernet0/0/0

ip address 192.168.3.2 255.255.255.252

negotiation auto

end

R3#show run interface GigabitEthernet 0/0/2

Building configuration...

Current configuration : 95 bytes

!

interface GigabitEthernet0/0/2

ip address 172.16.4.1 255.255.255.252

negotiation auto

end

R3#show ip route eigrp

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, H - NHRP, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

Gateway of last resort is not set

10.0.0.0/24 is subnetted, 9 subnets

D        10.10.10.0 [90/10880] via 192.168.3.1, 6d22h, GigabitEthernet0/0/0

D        10.10.20.0 [90/10880] via 192.168.3.1, 6d22h, GigabitEthernet0/0/0

D        10.10.30.0 [90/10880] via 192.168.3.1, 6d22h, GigabitEthernet0/0/0

D EX     10.20.40.0 [170/61440] via 172.16.4.2, 01:46:05, GigabitEthernet0/0/2

D EX     10.20.50.0 [170/61440] via 172.16.4.2, 01:46:05, GigabitEthernet0/0/2

D EX     10.20.60.0 [170/61440] via 172.16.4.2, 01:46:05, GigabitEthernet0/0/2

D        10.30.70.0 [90/10880] via 172.16.4.2, 01:44:05, GigabitEthernet0/0/2

D        10.30.80.0 [90/10880] via 172.16.4.2, 01:44:05, GigabitEthernet0/0/2

D        10.30.90.0 [90/10880] via 172.16.4.2, 01:44:04, GigabitEthernet0/0/2

172.16.0.0/16 is variably subnetted, 3 subnets, 2 masks

D        172.16.2.0/30 [90/15360] via 172.16.4.2, 6d22h, GigabitEthernet0/0/2

192.168.1.0/30 is subnetted, 1 subnets

D        192.168.1.0 [90/15360] via 192.168.3.1, 6d22h, GigabitEthernet0/0/0

R3#show interfaces GigabitEthernet0/0/0

GigabitEthernet0/0/0 is up, line protocol is up

Hardware is BUILT-IN-2T+6X1GE, address is 0062.ec8a.a402 (bia 0062.ec8a.a402)

Internet address is 192.168.3.2/30

MTU 1500 bytes, BW 1000000 Kbit/sec, DLY 10 usec, reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive not supported

Full Duplex, 1000Mbps, link type is auto, media type is T

output flow-control is on, input flow-control is on

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:01, output 00:00:01, output hang never

Last clearing of "show interface" counters never

Input queue: 0/375/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

208616 packets input, 18949840 bytes, 0 no buffer

Received 726 broadcasts (0 IP multicasts)

0 runts, 0 giants, 0 throttles

2 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog, 145285 multicast, 0 pause input

134420 packets output, 10488621 bytes, 0 underruns

0 output errors, 0 collisions, 5 interface resets

11597 unknown protocol drops

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier, 0 pause output

0 output buffer failures, 0 output buffers swapped out

10 carrier transitions

R3#show interfaces GigabitEthernet0/0/2

GigabitEthernet0/0/2 is up, line protocol is up

Hardware is BUILT-IN-2T+6X1GE, address is 0062.ec8a.a404 (bia 0062.ec8a.a404)

Internet address is 172.16.4.1/30

MTU 1500 bytes, BW 1000000 Kbit/sec, DLY 10 usec, reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive not supported

Full Duplex, 1000Mbps, link type is auto, media type is T

output flow-control is on, input flow-control is on

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:01, output 00:00:01, output hang never

Last clearing of "show interface" counters never

Input queue: 0/375/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

145895 packets input, 15083732 bytes, 0 no buffer

Received 1 broadcasts (0 IP multicasts)

0 runts, 0 giants, 0 throttles

1 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog, 145785 multicast, 0 pause input

134433 packets output, 10489999 bytes, 0 underruns

0 output errors, 0 collisions, 5 interface resets

11543 unknown protocol drops

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier, 0 pause output

0 output buffer failures, 0 output buffers swapped out

6 carrier transitions

R3#show ip eigrp neighbors

EIGRP-IPv4 VR(LAB) Address-Family Neighbors for AS(100)

H   Address                 Interface              Hold Uptime   SRTT   RTO  Q  Seq

(sec)         (ms)       Cnt Num

1   172.16.4.2              Gi0/0/2                  14 6d22h       1   100  0  102

0   192.168.3.1             Gi0/0/0                  13 1w0d        1   100  0  115

R4

コンフィギュレーション

ステータス

R4#show run | section router eigrp

router eigrp LAB

!

address-family ipv4 unicast autonomous-system 100

!

topology base

redistribute isis level-2 metric 1000000 10 255 1 1500

exit-af-topology

network 10.30.70.0 0.0.0.255

network 10.30.80.0 0.0.0.255

network 10.30.90.0 0.0.0.255

network 172.16.2.0 0.0.0.3

network 172.16.4.0 0.0.0.3

exit-address-family

R4#show run | section ^router isis

router isis

net 49.0001.0000.0000.0004.00

is-type level-2-only

metric-style wide

redistribute eigrp 100

R4#show run interface GigabitEthernet1/0/1

Building configuration...

Current configuration : 95 bytes

!

interface GigabitEthernet1/0/1

ip address 172.16.2.2 255.255.255.252

negotiation auto

end

R4#show run interface GigabitEthernet1/0/2

Building configuration...

Current configuration : 95 bytes

!

interface GigabitEthernet1/0/2

ip address 172.16.4.2 255.255.255.252

negotiation auto

end

R4#show run interface GigabitEthernet0/0/1

Building configuration...

Current configuration : 112 bytes

!

interface GigabitEthernet0/0/1

ip address 172.16.6.1 255.255.255.252

ip router isis

negotiation auto

end

R4#show ip route eigrp

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, H - NHRP, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

Gateway of last resort is not set

10.0.0.0/8 is variably subnetted, 12 subnets, 2 masks

D        10.10.10.0/24 [90/16000] via 172.16.4.1, 6d23h, GigabitEthernet1/0/2

[90/16000] via 172.16.2.1, 6d23h, GigabitEthernet1/0/1

D        10.10.20.0/24 [90/16000] via 172.16.4.1, 6d23h, GigabitEthernet1/0/2

[90/16000] via 172.16.2.1, 6d23h, GigabitEthernet1/0/1

D        10.10.30.0/24 [90/16000] via 172.16.4.1, 6d23h, GigabitEthernet1/0/2

[90/16000] via 172.16.2.1, 6d23h, GigabitEthernet1/0/1

192.168.1.0/30 is subnetted, 1 subnets

D        192.168.1.0 [90/15360] via 172.16.2.1, 6d23h, GigabitEthernet1/0/1

192.168.3.0/30 is subnetted, 1 subnets

D        192.168.3.0 [90/15360] via 172.16.4.1, 6d23h, GigabitEthernet1/0/2

R4#show ip route isis

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, H - NHRP, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

Gateway of last resort is not set

10.0.0.0/8 is variably subnetted, 12 subnets, 2 masks

i L2     10.20.40.0/24 [115/20] via 172.16.6.2, 02:10:41, GigabitEthernet0/0/1

i L2     10.20.50.0/24 [115/20] via 172.16.6.2, 02:10:41, GigabitEthernet0/0/1

i L2     10.20.60.0/24 [115/20] via 172.16.6.2, 02:10:41, GigabitEthernet0/0/1

R4#show ip route connected

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, H - NHRP, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

Gateway of last resort is not set

10.0.0.0/8 is variably subnetted, 12 subnets, 2 masks

C        10.30.70.0/24 is directly connected, Loopback70

L        10.30.70.70/32 is directly connected, Loopback70

C        10.30.80.0/24 is directly connected, Loopback80

L        10.30.80.80/32 is directly connected, Loopback80

C        10.30.90.0/24 is directly connected, Loopback90

L        10.30.90.90/32 is directly connected, Loopback90

172.16.0.0/16 is variably subnetted, 6 subnets, 2 masks

C        172.16.2.0/30 is directly connected, GigabitEthernet1/0/1

L        172.16.2.2/32 is directly connected, GigabitEthernet1/0/1

C        172.16.4.0/30 is directly connected, GigabitEthernet1/0/2

L        172.16.4.2/32 is directly connected, GigabitEthernet1/0/2

C        172.16.6.0/30 is directly connected, GigabitEthernet0/0/1

L        172.16.6.1/32 is directly connected, GigabitEthernet0/0/1

R4#show interfaces GigabitEthernet1/0/1

GigabitEthernet1/0/1 is up, line protocol is up

Hardware is SM-X-4X1G-1X10G, address is 0027.9064.d041 (bia 0027.9064.d041)

Internet address is 172.16.2.2/30

MTU 1500 bytes, BW 1000000 Kbit/sec, DLY 10 usec, reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive not supported

Full Duplex, 1000Mbps, link type is auto, media type is RJ45

output flow-control is on, input flow-control is on

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:05:38, output 00:00:30, output hang never

Last clearing of "show interface" counters never

Input queue: 0/375/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

134612 packets input, 9965393 bytes, 0 no buffer

Received 5 broadcasts (0 IP multicasts)

0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog, 134482 multicast, 0 pause input

146207 packets output, 14544461 bytes, 0 underruns

0 output errors, 0 collisions, 1 interface resets

0 unknown protocol drops

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier, 0 pause output

0 output buffer failures, 0 output buffers swapped out

R4#show interfaces GigabitEthernet1/0/2

GigabitEthernet1/0/2 is up, line protocol is up

Hardware is SM-X-4X1G-1X10G, address is 0027.9064.d042 (bia 0027.9064.d042)

Internet address is 172.16.4.2/30

MTU 1500 bytes, BW 1000000 Kbit/sec, DLY 10 usec, reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive not supported

Full Duplex, 1000Mbps, link type is auto, media type is RJ45

output flow-control is on, input flow-control is on

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:08:36, output 00:00:01, output hang never

Last clearing of "show interface" counters never

Input queue: 0/375/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

134654 packets input, 9968624 bytes, 0 no buffer

Received 2 broadcasts (0 IP multicasts)

0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog, 134535 multicast, 0 pause input

146139 packets output, 14525699 bytes, 0 underruns

0 output errors, 0 collisions, 1 interface resets

0 unknown protocol drops

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier, 0 pause output

0 output buffer failures, 0 output buffers swapped out

R4#show interfaces GigabitEthernet0/0/1

GigabitEthernet0/0/1 is up, line protocol is up

Hardware is ISR4331-3x1GE, address is 0027.9064.d021 (bia 0027.9064.d021)

Internet address is 172.16.6.1/30

MTU 1500 bytes, BW 1000000 Kbit/sec, DLY 10 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive not supported

Full Duplex, 1000Mbps, link type is auto, media type is RJ45

output flow-control is on, input flow-control is on

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:01, output 00:00:03, output hang never

Last clearing of "show interface" counters never

Input queue: 0/375/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

576123 packets input, 655123623 bytes, 0 no buffer

Received 2 broadcasts (0 IP multicasts)

0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog, 576069 multicast, 0 pause input

154335 packets output, 216885838 bytes, 0 underruns

0 output errors, 0 collisions, 1 interface resets

0 unknown protocol drops

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier, 0 pause output

0 output buffer failures, 0 output buffers swapped out

R4#show ip eigrp neighbors

EIGRP-IPv4 VR(LAB) Address-Family Neighbors for AS(100)

H   Address                 Interface              Hold Uptime   SRTT   RTO  Q  Seq

(sec)         (ms)       Cnt Num

1   172.16.4.1              Gi1/0/2                  14 6d23h       1   100  0  124

0   172.16.2.1              Gi1/0/1                  14 6d23h       1   100  0  124

R4#show isis neighbors

System Id       Type Interface     IP Address      State Holdtime Circuit Id

R5              L2   Gi0/0/1       172.16.6.2      UP    9        R5.01

シナリオ1：遅延メトリックの変更によるパス選択の操作

この例では、R3を通過するパスを優先するようにEIGRPに影響を与えるために遅延値が使用されます。 変更を行う前に、インターフェイスGi1/0/3とGi1/04の両方のインターフェイスの遅延値が同じ10マイクロ秒であるため、EIGRPがインターフェイス間でロードバランシングしていることを確認できます。

R1#show ip route eigrp

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

& - replicated local route overrides by connected

Gateway of last resort is not set

10.0.0.0/8 is variably subnetted, 12 subnets, 2 masks

D EX     10.20.40.0/24

[170/66560] via 192.168.3.2, 5d22h, GigabitEthernet1/0/3

[170/66560] via 192.168.1.2, 5d22h, GigabitEthernet1/0/4

D EX     10.20.50.0/24

[170/66560] via 192.168.3.2, 5d22h, GigabitEthernet1/0/3

[170/66560] via 192.168.1.2, 5d22h, GigabitEthernet1/0/4

D EX     10.20.60.0/24

[170/66560] via 192.168.3.2, 5d22h, GigabitEthernet1/0/3

[170/66560] via 192.168.1.2, 5d22h, GigabitEthernet1/0/4

D        10.30.70.0/24 [90/16000] via 192.168.3.2, 5d22h, GigabitEthernet1/0/3

[90/16000] via 192.168.1.2, 5d22h, GigabitEthernet1/0/4

D        10.30.80.0/24 [90/16000] via 192.168.3.2, 5d22h, GigabitEthernet1/0/3

[90/16000] via 192.168.1.2, 5d22h, GigabitEthernet1/0/4

D        10.30.90.0/24 [90/16000] via 192.168.3.2, 5d22h, GigabitEthernet1/0/3

[90/16000] via 192.168.1.2, 5d22h, GigabitEthernet1/0/4

172.16.0.0/30 is subnetted, 2 subnets

D        172.16.2.0 [90/15360] via 192.168.1.2, 1w5d, GigabitEthernet1/0/4

D        172.16.4.0 [90/15360] via 192.168.3.2, 1w5d, GigabitEthernet1/0/3

R1#show interface GigabitEthernet1/0/3 | i DLY

MTU 1500 bytes, BW 1000000 Kbit/sec, DLY 10 usec,

R1#show interface GigabitEthernet1/0/4 | i DLY

MTU 1500 bytes, BW 1000000 Kbit/sec, DLY 10 usec,

次に、インターフェイスGigabitEthernet1/0/4への遅延を変更して増やします。遅延値を100（数十マイクロ秒）に変更すると、RIBはインターフェイスGi1/0/3のみを経由するパスをインストールします。

EIGRPトポロジテーブルを見ると、インターフェイスGi1/0/4がすべてのプレフィクスのフィージブルサクセサとして引き続き表示されており、遅延合計がより大きいことがわかります。

R1#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

R1(config)#interface GigabitEthernet1/0/4

R1(config-if)#delay 100

R1(config-if)#end

R1#show ip route eigrp

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

& - replicated local route overrides by connected

Gateway of last resort is not set

10.0.0.0/8 is variably subnetted, 12 subnets, 2 masks

D EX     10.20.40.0/24

[170/66560] via 192.168.3.2, 00:05:52, GigabitEthernet1/0/3

D EX     10.20.50.0/24

[170/66560] via 192.168.3.2, 00:05:52, GigabitEthernet1/0/3

D EX     10.20.60.0/24

[170/66560] via 192.168.3.2, 00:05:52, GigabitEthernet1/0/3

D        10.30.70.0/24

[90/16000] via 192.168.3.2, 00:05:52, GigabitEthernet1/0/3

D        10.30.80.0/24

[90/16000] via 192.168.3.2, 00:05:52, GigabitEthernet1/0/3

D        10.30.90.0/24

[90/16000] via 192.168.3.2, 00:05:52, GigabitEthernet1/0/3

172.16.0.0/30 is subnetted, 2 subnets

D        172.16.2.0 [90/20480] via 192.168.3.2, 00:05:52, GigabitEthernet1/0/3

D        172.16.4.0 [90/15360] via 192.168.3.2, 00:05:52, GigabitEthernet1/0/3

R1#show interface GigabitEthernet1/0/4 | i DLY MTU 1500 bytes, BW 1000000 Kbit/sec, DLY 1000 usec,

R1#show ip eigrp topology EIGRP-IPv4 VR(LAB) Topology Table for AS(100)/ID(192.168.3.1) Codes: P - Passive, A - Active, U - Update, Q - Query, R - Reply, r - reply Status, s - sia Status P 192.168.3.0/30, 1 successors, FD is 1310720 via Connected, GigabitEthernet1/0/3 P 10.30.70.0/24, 1 successors, FD is 2048000 via 192.168.3.2 (2048000/1392640), GigabitEthernet1/0/3 via 192.168.1.2 (66928640/1392640), GigabitEthernet1/0/4 P 10.20.50.0/24, 1 successors, FD is 8519680 via 192.168.3.2 (8519680/7864320), GigabitEthernet1/0/3 via 192.168.1.2 (73400320/7864320), GigabitEthernet1/0/4 P 10.30.80.0/24, 1 successors, FD is 2048000 via 192.168.3.2 (2048000/1392640), GigabitEthernet1/0/3 via 192.168.1.2 (66928640/1392640), GigabitEthernet1/0/4 P 172.16.2.0/30, 1 successors, FD is 2621440 via 192.168.3.2 (2621440/1966080), GigabitEthernet1/0/3 via 192.168.1.2 (66846720/1310720), GigabitEthernet1/0/4 P 10.10.30.0/24, 1 successors, FD is 163840 via Connected, Loopback30 P 10.20.60.0/24, 1 successors, FD is 8519680 via 192.168.3.2 (8519680/7864320), GigabitEthernet1/0/3 via 192.168.1.2 (73400320/7864320), GigabitEthernet1/0/4 P 192.168.1.0/30, 1 successors, FD is 66191360 via Connected, GigabitEthernet1/0/4 via 192.168.3.2 (3276800/2621440), GigabitEthernet1/0/3 P 10.20.40.0/24, 1 successors, FD is 8519680 via 192.168.3.2 (8519680/7864320), GigabitEthernet1/0/3 via 192.168.1.2 (73400320/7864320), GigabitEthernet1/0/4 P 10.10.20.0/24, 1 successors, FD is 163840 via Connected, Loopback20 P 10.30.90.0/24, 1 successors, FD is 2048000 via 192.168.3.2 (2048000/1392640), GigabitEthernet1/0/3 via 192.168.1.2 (66928640/1392640), GigabitEthernet1/0/4 P 172.16.4.0/30, 1 successors, FD is 1966080 via 192.168.3.2 (1966080/1310720), GigabitEthernet1/0/3 P 10.10.10.0/24, 1 successors, FD is 163840 via Connected, Loopback10

R1#show ip eigrp topology 10.20.40.0/24 EIGRP-IPv4 VR(LAB) Topology Entry for AS(100)/ID(192.168.3.1) for 10.20.40.0/24 State is Passive, Query origin flag is 1, 1 Successor(s), FD is 8519680, RIB is 66560 Descriptor Blocks: 192.168.3.2 (GigabitEthernet1/0/3), from 192.168.3.2, Send flag is 0x0 Composite metric is (8519680/7864320), route is External Vector metric: Minimum bandwidth is 1000000 Kbit Total delay is 120000000 picoseconds Reliability is 255/255 Load is 1/255 Minimum MTU is 1500 Hop count is 2 Originating router is 172.16.6.1 External data: AS number of route is 0 External protocol is IS-IS, external metric is 20 Administrator tag is 0 (0x00000000) 192.168.1.2 (GigabitEthernet1/0/4), from 192.168.1.2, Send flag is 0x0 Composite metric is (73400320/7864320), route is External Vector metric: Minimum bandwidth is 1000000 Kbit Total delay is 1110000000 picoseconds Reliability is 255/255 Load is 1/255 Minimum MTU is 1500 Hop count is 2 Originating router is 172.16.6.1 External data: AS number of route is 0 External protocol is IS-IS, external metric is 20 Administrator tag is 0 (0x00000000) R1#traceroute 10.20.40.1 source loopback10 Type escape sequence to abort. Tracing the route to 10.20.40.1 VRF info: (vrf in name/id, vrf out name/id) 1 192.168.3.2 1 msec 0 msec 0 msec 2 172.16.4.2 0 msec 0 msec 1 msec 3 172.16.6.2 1 msec 1 msec *

R1#show ip cef 10.20.40.1 10.20.40.0/24 nexthop 192.168.3.2 GigabitEthernet1/0/3

遅延の修正は、トラフィックフローを制御し、ネットワーク全体の動作を変更するための便利なツールです。遅延は、パス内の各セグメントの遅延に基づいて増加する累積値です。帯域幅が他のプロトコルの計算で使用される可能性があるため、インターフェイス遅延パラメータの変更が推奨される方法であることにも注意してください。ただし、遅延に対する変更が有効なのは、あるパスが受信されたすべてのルートに対して他のパスよりも優先されるシナリオだけです。

注：新しい遅延値を選択する際は、EIGRPがこれらのルートをフィージブルサクセサと見なさないような値まで遅延を大きくしないように注意してください。

シナリオ2：オフセットリストの使用によるパス選択の操作

このシナリオでは、操作する必要がある対象のトラフィックまたはプレフィクスがACLを使用して選択されます。これらのプレフィックスの照合にはACLが使用され、この例では、サブネット10.20.60.0/24および10.30.90.0/24宛てのトラフィックを操作するために次の設定が追加されます。

R1#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

R1(config)#access-list 20 permit 10.20.60.0 0.0.0.255

R1(config)#access-list 30 permit 10.30.90.0 0.0.0.255

!

R1#show access-lists 20

Standard IP access list 20

10 permit 10.20.60.0, wildcard bits 0.0.0.255

R1#show access-lists 30

Standard IP access list 30

10 permit 10.30.90.0, wildcard bits 0.0.0.255

目的は、特定のプレフィクスのメトリックを変更するが、他のすべてのEIGRPトラフィックには影響を与えないことです。この例では、offset-listを使用して、R1のインバウンド方向の選択したプレフィックス(10.20.60.0/24および10.30.90.0/24)のメトリックにオフセットを追加します。

この概念では、（R1から）サブネット10.20.60.0/24に到達する際にインターフェイスGi1/0/4を介したR2経由のパスを優先し、（R1から）サブネット10.30.90.0/24に到達する際にインターフェイスGi1/0/3を介したR3経由のパスを優先します。

設定では、次に示すように、コマンドoffset-list {ACL name|ACL number} {in|out} <offset> <interface>を使用します。

R1#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

R1(config)#router eigrp LAB

R1(config-router)#address-family ipv4 unicast autonomous-system 100

R1(config-router-af)#topology base

R1(config-router-af-topology)#offset-list 20 in 200 GigabitEthernet1/0/3

R1(config-router-af-topology)#end

設定の結果は、RIB、転送情報ベース(FIB)、およびEIGRPトポロジテーブルをチェックすることで確認できます。次の出力では、インターフェイスGi1/0/3に適用されたオフセットがこの特定のプレフィクスのメトリックに影響を与えたことを確認できます。言い換えると、このパスが望ましくない状態になっていることがわかります。

R1#show ip route 10.20.60.0 Routing entry for 10.20.60.0/24 Known via "eigrp 100", distance 170, metric 66560, precedence routine (0), type external Redistributing via eigrp 100 Last update from 192.168.1.2 on GigabitEthernet1/0/4, 00:01:31 ago Routing Descriptor Blocks: * 192.168.1.2, from 192.168.1.2, 00:01:31 ago, via GigabitEthernet1/0/4 Route metric is 66560, traffic share count is 1 Total delay is 120 microseconds, minimum bandwidth is 1000000 Kbit Reliability 255/255, minimum MTU 1500 bytes Loading 1/255, Hops 2

R1#show ip cef 10.20.60.0 10.20.60.0/24 nexthop 192.168.1.2 GigabitEthernet1/0/4  R1#show ip eigrp topology 10.20.60.0/24 EIGRP-IPv4 VR(LAB) Topology Entry for AS(100)/ID(192.168.3.1) for 10.20.60.0/24 State is Passive, Query origin flag is 1, 1 Successor(s), FD is 8519680, RIB is 66560 Descriptor Blocks: 192.168.1.2 (GigabitEthernet1/0/4), from 192.168.1.2, Send flag is 0x0 Composite metric is (8519680/7864320), route is External Vector metric: Minimum bandwidth is 1000000 Kbit Total delay is 120000000 picoseconds Reliability is 255/255 Load is 1/255 Minimum MTU is 1500 Hop count is 2 Originating router is 172.16.6.1 External data: AS number of route is 0 External protocol is IS-IS, external metric is 20 Administrator tag is 0 (0x00000000) 192.168.3.2 (GigabitEthernet1/0/3), from 192.168.3.2, Send flag is 0x0 Composite metric is (8519880/7864520), route is External Vector metric: Minimum bandwidth is 1000000 Kbit Total delay is 120003052 picoseconds <--- Reliability is 255/255 Load is 1/255 Minimum MTU is 1500 Hop count is 2 Originating router is 172.16.6.1 External data: AS number of route is 0 External protocol is IS-IS, external metric is 20 Administrator tag is 0 (0x00000000)

同様のプロセスがプレフィクス10.30.90.0/24に対して実行され、offset-listが追加されて、インターフェイスGi1/0/3を介したR3パスが優先されます（ただし、Gi1/0/4にオフセットが適用されます）。同様に、RIB、FIB、およびEIGRPトポロジを確認すると、選択したプレフィックスの優先パスがR3経由であることがわかります。

R1#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

R1(config)#router eigrp LAB

R1(config-router)#address-family ipv4 unicast autonomous-system 100

R1(config-router-af)#topology base

R1(config-router-af-topology)#offset-list 30 in 300 gigabitEthernet 1/0/4

R1(config-router-af-topology)#end

R1#show ip route 10.30.90.0

Routing entry for 10.30.90.0/24

Known via "eigrp 100", distance 90, metric 16000, precedence routine (0), type internal

Redistributing via eigrp 100

Last update from 192.168.3.2 on GigabitEthernet1/0/3, 00:00:25 ago

Routing Descriptor Blocks:

* 192.168.3.2, from 192.168.3.2, 00:00:25 ago, via GigabitEthernet1/0/3

Route metric is 16000, traffic share count is 1

Total delay is 21 microseconds, minimum bandwidth is 1000000 Kbit

Reliability 255/255, minimum MTU 1500 bytes

Loading 1/255, Hops 2

R1#show ip cef 10.30.90.0 10.30.90.0/24 nexthop 192.168.3.2 GigabitEthernet1/0/3

R1#show ip eigrp topology 10.30.90.0/24 EIGRP-IPv4 VR(LAB) Topology Entry for AS(100)/ID(192.168.3.1) for 10.30.90.0/24 State is Passive, Query origin flag is 1, 1 Successor(s), FD is 2048000, RIB is 16000 Descriptor Blocks: 192.168.3.2 (GigabitEthernet1/0/3), from 192.168.3.2, Send flag is 0x0 Composite metric is (2048000/1392640), route is Internal Vector metric: Minimum bandwidth is 1000000 Kbit Total delay is 21250000 picoseconds Reliability is 255/255 Load is 1/255 Minimum MTU is 1500 Hop count is 2 Originating router is 172.16.6.1 192.168.1.2 (GigabitEthernet1/0/4), from 192.168.1.2, Send flag is 0x0 Composite metric is (2048300/1392940), route is Internal Vector metric: Minimum bandwidth is 1000000 Kbit Total delay is 21254578 picoseconds <--- Reliability is 255/255 Load is 1/255 Minimum MTU is 1500 Hop count is 2 Originating router is 172.16.6.1

show ip route eigrpコマンドを調べると、設定が成功して、特定のプレフィックスのみが影響を受け、他のすべてのルートは影響を受けていないことがわかります。また、tracerouteを実行して、トラフィックが目的のパスを使用していることを確認します。

R1#show ip route eigrp

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

& - replicated local route overrides by connected

Gateway of last resort is not set

10.0.0.0/8 is variably subnetted, 12 subnets, 2 masks

D EX     10.20.40.0/24

[170/66560] via 192.168.3.2, 00:22:32, GigabitEthernet1/0/3

[170/66560] via 192.168.1.2, 00:22:32, GigabitEthernet1/0/4

D EX     10.20.50.0/24

[170/66560] via 192.168.3.2, 00:22:32, GigabitEthernet1/0/3

[170/66560] via 192.168.1.2, 00:22:32, GigabitEthernet1/0/4

D EX 10.20.60.0/24 [170/66560] via 192.168.1.2, 00:16:54, GigabitEthernet1/0/4

D        10.30.70.0/24

[90/16000] via 192.168.3.2, 00:22:32, GigabitEthernet1/0/3

[90/16000] via 192.168.1.2, 00:22:32, GigabitEthernet1/0/4

D        10.30.80.0/24

[90/16000] via 192.168.3.2, 00:22:32, GigabitEthernet1/0/3

[90/16000] via 192.168.1.2, 00:22:32, GigabitEthernet1/0/4

D 10.30.90.0/24 [90/16000] via 192.168.3.2, 00:04:56, GigabitEthernet1/0/3

172.16.0.0/30 is subnetted, 2 subnets

D        172.16.2.0 [90/15360] via 192.168.1.2, 00:22:32, GigabitEthernet1/0/4

D        172.16.4.0 [90/15360] via 192.168.3.2, 00:22:32, GigabitEthernet1/0/3

R1#traceroute 10.20.60.1 source loop10

Type escape sequence to abort.

Tracing the route to 10.20.60.1

VRF info: (vrf in name/id, vrf out name/id)

1 192.168.1.2 1 msec 1 msec 0 msec <--- R2

2 172.16.2.2 1 msec 1 msec 0 msec

3 172.16.6.2 1 msec 1 msec *

R1#traceroute 10.30.90.1 source loop10

Type escape sequence to abort.

Tracing the route to 10.30.90.1

VRF info: (vrf in name/id, vrf out name/id)

1 192.168.3.2 0 msec 1 msec 0 msec <--- R3

2 172.16.4.2 1 msec 1 msec *

シナリオ3：集約によるパス選択への影響

このシナリオでは、一方のパスをもう一方のパスよりも優先させるために、ルート集約が使用されます。EIGRPには、インターフェイスごとに集約ルートを設定する柔軟性があります。この例では、集約ルートはR4で設定され、10.30.x.xプレフィックスと10.20.x.xプレフィックスの別のプレフィックスを集約します。つまり、R4はインターフェイスGigabitEthernet1/0/1を介した集約ルート10.30.0.0/16と、インターフェイスGigabitEthernet1/0/2を介した集約ルート10.20.0.0/16をアナウンスします。この設定では、トラフィックは最長一致プリファレンスの影響を受けます。これにより、送信元がR1で宛先が10.30.x.xのサブネットであるトラフィックではR3を経由するパスが選択され、宛先がサブネット10.20.x.xのトラフィックではR2を経由するパスが選択されます。設定を次に示します。

R4#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

R4(config)#router eigrp LAB

R4(config-router)#address-family ipv4 unicast autonomous-system 100

R4(config-router-af)#af-interface gigabitEthernet 1/0/1

R4(config-router-af-interface)#summary-address 10.30.0.0/16

R4(config-router-af-interface)#exit

R4(config-router-af)#af-interface gigabitEthernet 1/0/2

R4(config-router-af-interface)#summary-address 10.20.0.0/16

R4(config-router-af-interface)#end

R4#

ここで、R1からのルーティングテーブルを確認すると、インターフェイスGigabitEthernet1/0/3（R3に接続）を介して学習された10.20.0.0/16の集約ルートと、GigabitEthernet1/0/4（R2に接続）を介して学習された10.30.0.0/16の集約ルートがあることが確認できます。この設定の結果、宛先が10.20.60.1のトラフィックはR2経由でルーティングされ、宛先が10.30.90.1のトラフィックはR3経由でルーティングされます。その理由は、R1が他のインターフェイスから学習されている最長の一致プレフィックスを優先し、FIBおよびtraceroute出力で確認できるためです。

R1#show ip route eigrp

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

& - replicated local route overrides by connected

Gateway of last resort is not set

10.0.0.0/8 is variably subnetted, 14 subnets, 3 masks

D 10.20.0.0/16 [90/66560] via 192.168.3.2, 00:00:16, GigabitEthernet1/0/3

D EX     10.20.40.0/24

[170/66560] via 192.168.1.2, 00:00:16, GigabitEthernet1/0/4

D EX     10.20.50.0/24

[170/66560] via 192.168.1.2, 00:00:16, GigabitEthernet1/0/4

D EX     10.20.60.0/24

[170/66560] via 192.168.1.2, 00:00:16, GigabitEthernet1/0/4

D 10.30.0.0/16 [90/16000] via 192.168.1.2, 00:00:44, GigabitEthernet1/0/4

D        10.30.70.0/24

[90/16000] via 192.168.3.2, 00:00:44, GigabitEthernet1/0/3

D        10.30.80.0/24

[90/16000] via 192.168.3.2, 00:00:44, GigabitEthernet1/0/3

D        10.30.90.0/24

[90/16000] via 192.168.3.2, 00:00:44, GigabitEthernet1/0/3

172.16.0.0/30 is subnetted, 2 subnets

D        172.16.2.0 [90/15360] via 192.168.1.2, 02:42:44, GigabitEthernet1/0/4

D        172.16.4.0 [90/15360] via 192.168.3.2, 02:42:44, GigabitEthernet1/0/3

R1#show ip route 10.20.0.0

Routing entry for 10.20.0.0/16

Known via "eigrp 100", distance 90, metric 66560, precedence routine (0), type internal

Redistributing via eigrp 100

Last update from 192.168.3.2 on GigabitEthernet1/0/3, 00:12:07 ago

Routing Descriptor Blocks:

* 192.168.3.2, from 192.168.3.2, 00:12:07 ago, via GigabitEthernet1/0/3

Route metric is 66560, traffic share count is 1

Total delay is 120 microseconds, minimum bandwidth is 1000000 Kbit

Reliability 255/255, minimum MTU 1500 bytes

Loading 1/255, Hops 2

R1#show ip route 10.30.0.0

Routing entry for 10.30.0.0/16

Known via "eigrp 100", distance 90, metric 16000, precedence routine (0), type internal

Redistributing via eigrp 100

Last update from 192.168.1.2 on GigabitEthernet1/0/4, 00:12:50 ago

Routing Descriptor Blocks:

* 192.168.1.2, from 192.168.1.2, 00:12:50 ago, via GigabitEthernet1/0/4

Route metric is 16000, traffic share count is 1

Total delay is 21 microseconds, minimum bandwidth is 1000000 Kbit

Reliability 255/255, minimum MTU 1500 bytes

Loading 1/255, Hops 2

R1#show ip cef exact-route 10.10.10.1 10.20.60.1 10.10.10.1 -> 10.20.60.1 =>IP adj out of GigabitEthernet1/0/4, addr 192.168.1.2

R1#traceroute 10.20.60.1 source loop10 Type escape sequence to abort. Tracing the route to 10.20.60.1 VRF info: (vrf in name/id, vrf out name/id) 1 192.168.1.2 1 msec 1 msec 0 msec <--- R2 2 172.16.2.2 1 msec 1 msec 0 msec 3 172.16.6.2 1 msec 1 msec *    R1#show ip cef exact-route 10.10.10.1 10.30.90.1 10.10.10.1 -> 10.30.90.1 =>IP adj out of GigabitEthernet1/0/3, addr 192.168.3.2 R1#traceroute 10.30.90.1 source loop10 Type escape sequence to abort. Tracing the route to 10.30.90.1 VRF info: (vrf in name/id, vrf out name/id) 1 192.168.3.2 1 msec 0 msec 1 msec <--- R3 2 172.16.4.2 0 msec 1 msec *

シナリオ4：リークマップを使用したパス選択の影響

集約ルートのアドバタイズメント時にリークマップを使用すると、より特定のルートを選択的にアナウンスし、最長一致を利用して目的のパスを優先するという柔軟なメカニズムが提供されます。

この例では、サマリールート10.0.0.0/8がR4から両方のインターフェイス（Gi1/0/1とGi1/0/2）でアドバタイズされています。次に、設定について説明します。

R4#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

R4(config)#router eigrp LAB

R4(config-router)#address-family ipv4 unicast autonomous-system 100

R4(config-router-af)#af-interface GigabitEthernet1/0/1

R4(config-router-af-interface)#summary-address 10.0.0.0 255.0.0.0

R4(config-router-af-interface)#exit

R4(config-router-af)#af-interface GigabitEthernet1/0/2

R4(config-router-af-interface)#summary-address 10.0.0.0 255.0.0.0

R4(config-router-af-interface)#end

前の設定は、次に示すようにR1のルーティングテーブルに反映されますが、これは引き続きR1からの2つのパス間でトラフィックのロードバランシングを行います。

R1#show ip route eigrp

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

& - replicated local route overrides by connected

Gateway of last resort is not set

10.0.0.0/8 is variably subnetted, 7 subnets, 3 masks

D 10.0.0.0/8 [90/16000] via 192.168.3.2, 00:04:16, GigabitEthernet1/0/3 [90/16000] via 192.168.1.2, 00:04:16, GigabitEthernet1/0/4

172.16.0.0/30 is subnetted, 2 subnets

D        172.16.2.0 [90/15360] via 192.168.1.2, 03:50:08, GigabitEthernet1/0/4

D        172.16.4.0 [90/15360] via 192.168.3.2, 03:50:08, GigabitEthernet1/0/3

ただし、R1からサブネット10.20.60.0/24および10.30.70.0/24へのトラフィックは、GigabitEthernet1/0/4（R2に接続）よりも優先される必要があります。この結果を実現するには、より具体的なプレフィクスをリークするが集約は維持するように、R4にリークマップを設定します。

R4#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

R4(config)#ip prefix-list LEAKED-PREFIXES permit 10.20.60.0/24

R4(config)#ip prefix-list LEAKED-PREFIXES permit 10.30.70.0/24

R4(config)#route-map LEAKED-PREFIXES R4(config-route-map)#match ip address prefix-list LEAKED-PREFIXES R4(config-route-map)#exit

R4(config)#router eigrp LAB

R4(config-router)#address-family ipv4 unicast autonomous-system 100

R4(config-router-af)#af-interface GigabitEthernet1/0/1

R4(config-router-af-interface)#summary-address 10.0.0.0 255.0.0.0 leak-map LEAKED-PREFIXES

R4(config-router-af-interface)#end

前の設定を適用すると、R1には、次に示すように、インターフェイスGigabitEthernet1/0/4を通じて学習された10.20.60.0/24および10.30.70.0/24のより具体的なエントリが表示されます。

R1#show ip route eigrp

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

& - replicated local route overrides by connected

Gateway of last resort is not set

10.0.0.0/8 is variably subnetted, 9 subnets, 3 masks

D        10.0.0.0/8 [90/16000] via 192.168.3.2, 01:26:41, GigabitEthernet1/0/3

[90/16000] via 192.168.1.2, 01:26:41, GigabitEthernet1/0/4

D EX 10.20.60.0/24 [170/66560] via 192.168.1.2, 00:01:29, GigabitEthernet1/0/4 D 10.30.70.0/24 [90/16000] via 192.168.1.2, 00:01:29, GigabitEthernet1/0/4

172.16.0.0/30 is subnetted, 2 subnets

D        172.16.2.0 [90/15360] via 192.168.1.2, 05:12:33, GigabitEthernet1/0/4

D        172.16.4.0 [90/15360] via 192.168.3.2, 05:12:33, GigabitEthernet1/0/3

R1#show ip cef exact-route 10.10.10.1 10.20.60.1

10.10.10.1 -> 10.20.60.1 =>IP adj out of GigabitEthernet1/0/4, addr 192.168.1.2

R1#show ip cef exact-route 10.10.10.1 10.30.70.1

10.10.10.1 -> 10.30.70.1 =>IP adj out of GigabitEthernet1/0/4, addr 192.168.1.2

シナリオ5：プレフィックスのアドミニストレーティブディスタンス(AD)を変更してパス選択に影響を与える

この例の目的は、プレフィクス10.30.90.0/24のADを変更することであり、したがって、そのAD宛てのトラフィックはR3経由でルーティングできます。

注：このアプローチはEIGRPに影響を与えるもう1つのリソースですが、これはOffset-Listを使用するよりも推奨されません。同じデバイスで複数のルーティングプロトコルを使用している場合は、この方法が影響を与える可能性があるため注意が必要です。

注：この方法は内部EIGRPルートにのみ影響し、設定は外部EIGRPルートのADを変更しません。

R1は、R2(192.168.1.2)とR3(192.168.3.2)を通じて、同じメトリックでルート10.30.90.0/24を学習していることに注目してください。

R1#show ip route eigrp

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

& - replicated local route overrides by connected

Gateway of last resort is not set

10.0.0.0/8 is variably subnetted, 12 subnets, 2 masks

D EX     10.20.40.0/24

[170/66560] via 192.168.3.2, 00:00:26, GigabitEthernet1/0/3

[170/66560] via 192.168.1.2, 00:00:26, GigabitEthernet1/0/4

D EX     10.20.50.0/24

[170/66560] via 192.168.3.2, 00:00:26, GigabitEthernet1/0/3

[170/66560] via 192.168.1.2, 00:00:26, GigabitEthernet1/0/4

D EX     10.20.60.0/24

[170/66560] via 192.168.3.2, 00:00:26, GigabitEthernet1/0/3

[170/66560] via 192.168.1.2, 00:00:26, GigabitEthernet1/0/4

D        10.30.70.0/24

[90/16000] via 192.168.3.2, 00:00:26, GigabitEthernet1/0/3

[90/16000] via 192.168.1.2, 00:00:26, GigabitEthernet1/0/4

D        10.30.80.0/24

[90/16000] via 192.168.3.2, 00:00:26, GigabitEthernet1/0/3

[90/16000] via 192.168.1.2, 00:00:26, GigabitEthernet1/0/4

D 10.30.90.0/24 [90/16000] via 192.168.3.2, 00:00:26, GigabitEthernet1/0/3 [90/16000] via 192.168.1.2, 00:00:26, GigabitEthernet1/0/4

172.16.0.0/30 is subnetted, 2 subnets

D        172.16.2.0 [90/15360] via 192.168.1.2, 00:00:26, GigabitEthernet1/0/4

D        172.16.4.0 [90/15360] via 192.168.3.2, 00:00:26, GigabitEthernet1/0/3

変更を行うには、目的のサブネットと一致するようにACLを設定する必要があります。その後、コマンドdistance <route AD> <IP Source address> <Wildcard bits> <ACL>を使用してアドバタイジングネイバーを指定することで、プレフィクスのADを変更できます。

この例では、R3からのアドバタイズメントを優先するために、より低いAD値が使用され(85)、R3 EIGRPネイバーのIPアドレス(192.168.3.2)がワイルドカード0.0.0.0で追加された後、プレフィクスと一致するACLが追加されます。

R1#configure terminal Enter configuration commands, one per line. End with CNTL/Z. R1(config)#access-list 30 permit 10.30.90.0 0.0.0.255 R1(config)#router eigrp LAB R1(config-router)#address-family ipv4 unicast autonomous-system 100 R1(config-router-af)#topology base R1(config-router-af-topology)#distance 85 192.168.3.2 0.0.0.0 30 R1(config-router-af-topology)#end

結果は、10.30.90.0/24のルーティングエントリのADが85に変更され、優先されるEIGRPネイバーがR3(192.168.3.2)であるR1からのRIBおよびFIB出力で確認できます。

R1#show ip route eigrp

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

& - replicated local route overrides by connected

Gateway of last resort is not set

10.0.0.0/8 is variably subnetted, 12 subnets, 2 masks

D EX     10.20.40.0/24

[170/66560] via 192.168.3.2, 00:00:14, GigabitEthernet1/0/3

[170/66560] via 192.168.1.2, 00:00:14, GigabitEthernet1/0/4

D EX     10.20.50.0/24

[170/66560] via 192.168.3.2, 00:00:14, GigabitEthernet1/0/3

[170/66560] via 192.168.1.2, 00:00:14, GigabitEthernet1/0/4

D EX     10.20.60.0/24

[170/66560] via 192.168.3.2, 00:00:14, GigabitEthernet1/0/3

[170/66560] via 192.168.1.2, 00:00:14, GigabitEthernet1/0/4

D        10.30.70.0/24

[90/16000] via 192.168.3.2, 00:00:14, GigabitEthernet1/0/3

[90/16000] via 192.168.1.2, 00:00:14, GigabitEthernet1/0/4

D        10.30.80.0/24

[90/16000] via 192.168.3.2, 00:00:14, GigabitEthernet1/0/3

[90/16000] via 192.168.1.2, 00:00:14, GigabitEthernet1/0/4

D 10.30.90.0/24 [85/16000] via 192.168.3.2, 00:00:14, GigabitEthernet1/0/3

172.16.0.0/30 is subnetted, 2 subnets

D        172.16.2.0 [90/15360] via 192.168.1.2, 00:00:14, GigabitEthernet1/0/4

D        172.16.4.0 [90/15360] via 192.168.3.2, 00:00:14, GigabitEthernet1/0/3

R1#show ip route 10.30.90.0

Routing entry for 10.30.90.0/24

Known via "eigrp 100", distance 85, metric 16000, precedence routine (0), type internal

Redistributing via eigrp 100

Last update from 192.168.3.2 on GigabitEthernet1/0/3, 00:00:31 ago

Routing Descriptor Blocks:

* 192.168.3.2, from 192.168.3.2, 00:00:31 ago, via GigabitEthernet1/0/3

Route metric is 16000, traffic share count is 1

Total delay is 21 microseconds, minimum bandwidth is 1000000 Kbit

Reliability 255/255, minimum MTU 1500 bytes

Loading 1/255, Hops 2

R1#show ip cef 10.30.90.0

10.30.90.0/24

nexthop 192.168.3.2 GigabitEthernet1/0/3

シナリオ6：ルートフィルタリングによるパス選択への影響

この例では、R1に着信する一部のルートまたはプレフィックスをフィルタリングすることで、パス選択に選択的に影響を与えることを意図しています。

宛先が次のサブネット10.30.70.0/24、10.30.80.0/24、および10.20.40.0/24のいずれかである場合、R1はR2パスを優先する必要があります。宛先がサブネット10.30.90.0/24、10.20.50.0/24および10.20.60.0/24の場合、R1はR3パスを優先する必要があります。

これを実現するには、次に示すように、プレフィックスリストを使用して目的のルートを照合し、EIGRPプロセスの下で配布リストを設定して、インバウンド方向でルートフィルタを適用します。

R1#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

R1(config)#ip prefix-list R2-Preferred permit 10.30.70.0/24

R1(config)#ip prefix-list R2-Preferred permit 10.30.80.0/24

R1(config)#ip prefix-list R2-Preferred permit 10.20.40.0/24

R1(config)#

R1(config)#ip prefix-list R3-Preferred permit 10.30.90.0/24

R1(config)#ip prefix-list R3-Preferred permit 10.20.50.0/24

R1(config)#ip prefix-list R3-Preferred permit 10.20.60.0/24

R1(config)#router eigrp LAB

R1(config-router)#address-family ipv4 unicast autonomous-system 100

R1(config-router-af)#topology base

R1(config-router-af-topology)#distribute-list prefix R2-Preferred in GigabitEthernet1/0/4

R1(config-router-af-topology)#distribute-list prefix R3-Preferred in GigabitEthernet1/0/3

R1(config-router-af-topology)#end

注:ip prefix-listを使用して目的のルートを照合するためにdistribute-listを適用するときは、「prefix」オプションが必要であることに注意してください

注：オフセットリストの使用などの方法の主な違いの1つは、配布リストによって、許可されていないプレフィックスがRIBとEIGRPトポロジテーブルに挿入されないことです。

その結果、R1のルーティングテーブルは目的のパス選択を示します。

R1#show ip route eigrp

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

& - replicated local route overrides by connected

Gateway of last resort is not set

10.0.0.0/8 is variably subnetted, 12 subnets, 2 masks

D EX     10.20.40.0/24

[170/66560] via 192.168.1.2, 00:00:12, GigabitEthernet1/0/4 <--- R2

D EX     10.20.50.0/24

[170/66560] via 192.168.3.2, 00:00:24, GigabitEthernet1/0/3 <--- R3

D EX     10.20.60.0/24

[170/66560] via 192.168.3.2, 00:00:24, GigabitEthernet1/0/3

D        10.30.70.0/24

[90/16000] via 192.168.1.2, 00:00:12, GigabitEthernet1/0/4

D        10.30.80.0/24

[90/16000] via 192.168.1.2, 00:00:12, GigabitEthernet1/0/4

D        10.30.90.0/24

[90/16000] via 192.168.3.2, 00:00:24, GigabitEthernet1/0/3

関連情報

- Enhanced Interior Gateway Routing Protocol の理解および使用

- EIGRPの概要

- IPルーティング設定ガイド、Cisco IOS XE 17.x