内容

概要

前提条件

要件

使用するコンポーネント

背景説明

設定

ネットワーク図

アドレスファミリ コンフィギュレーション モード

アドレスファミリ インターフェイス コンフィギュレーション モード

アドレスファミリ トポロジ コンフィギュレーション モード

比較

アベイラビリティ

名前付き EIGRP への自動変換

確認

トラブルシュート

概要

このドキュメントでは、名前付きEnhanced Interior Gateway Routing Protocol(EIGRP)モード機能について説明し、関連する設定を使用して、従来のモードと名前付きモードの違いを説明します。

前提条件

要件

IPルーティングとEIGRPプロトコルに関する基本的な知識があることが推奨されます。

使用するコンポーネント

このドキュメントの内容は、特定のソフトウェアやハードウェアのバージョンに限定されるものではありません。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

背景説明

EIGRPを設定する従来の方法では、インターフェイスおよびEIGRPコンフィギュレーションモードでさまざまなパラメータを設定する必要があります。EIGRP IPV4とIPv6を設定するには、個別のEIGRPインスタンスを設定する必要があります。従来の EIGRP では、IPv6 EIGRP 実装の Virtual Routing and Forwarding（VRF）はサポートされていません。

名前付きモードのEIGRPでは、EIGRP設定の下に何もかも1箇所で設定され、前述のように制限はありません。

設定

ネットワーク図

この図は、このドキュメントの残りの部分のトポロジ例です。

従来の方法とは異なり、EIGRPインスタンスはルータで設定しても作成も開始もされません。

R1(config)#router eigrp TEST

インスタンスは、アドレスファミリと自律システム番号が設定されると作成されます。次に例を示します。

R1(config-router)#address-family ipv4 unicast autonomous-system 1

この名前付きモードでは、1 つの EIGRP インスタンスだけを作成する必要があります。これはすべてのアドレス ファミリ タイプにも使用できます。また、使用可能なシステム リソースによってのみ限定される複数の VRF もサポートしています。名前付きモードに関して注意すべき点の1つは、アドレスファミリの設定では、IPv4 EIGRPの従来の設定としてIPv4ルーティングが有効になっていないことです。プロセスを開始するには、「no shut」が必要です。

router eigrp [virtual-instance-name | asystem]

[no] shutdown

名前付きEIGRPには、設定の大部分が完了する3つのモードがあります。内容は次のとおりです。

- アドレス ファミリ コンフィギュレーション モード：(config-router-af)#

- アドレス ファミリ インターフェイス コンフィギュレーション モード：(config-router-af-interface)#

- アドレス ファミリ トポロジ コンフィギュレーション モード：(config-router-af-topology)#

アドレスファミリ コンフィギュレーション モード

このモードに入るには、次のコマンドを使用します。

R1(config-router)#address-family ipv4 unicast autonomous-system 1

R1(config-router-af)#?

Address Family configuration commands:

af-interface                    Enter Address Family interface configuration

default                         Set a command to its defaults

eigrp                           EIGRP Address Family specific commands

exit-address-family             Exit Address Family configuration mode

help                            Description of the interactive help system

maximum-prefix                  Maximum number of prefixes acceptable in aggregate

metric                          Modify metrics and parameters for advertisement

neighbor                        Specify an IPv4 neighbor router

network                         Enable routing on an IP network

no                              Negate a command or set its defaults

shutdown                        Shutdown address family

timers                          Adjust peering based timers

topology                        Topology configuration mode

このモードでは、次のパラメータを設定できます。ネットワーク、EIGRPネイバー、およびEIGRPルータID。名前付きEIGRPのその他の2つのコンフィギュレーションモードは、このモードからアクセスします。

従来の設定

Interface GigabitEthernet 0/0

ip bandwidth-percent eigrp 1 75

ipv6 enable

ipv6 eigrp 1

ip bandwidth-percent eigrp 1 75

no shut

!

router eigrp 1

eigrp router-id 10.10.10.1

network 0.0.0.0 0.0.0.0

ipv6 router eigrp 1

eigrp router-id 10.10.10.1

no shut

名前付き設定

router eigrp TEST

!

address-family ipv4 unicast autonomous-system 1

!

network 0.0.0.0

eigrp router-id 10.10.10.1

no shutdown

exit-address-family

!

address-family ipv6 unicast autonomous-system 1

!

eigrp router-id 10.10.10.1

no shutdown

exit-address-family

アドレスファミリ インターフェイス コンフィギュレーション モード

このモードでは、実際のインターフェイス（論理または物理）で以前に設定されたすべてのインターフェイス固有コマンドが取り込まれます。  EIGRP認証、スプリットホライズン、およびサマリーアドレスの設定は、実際のインターフェイスではなく、ここで設定するオプションの一部です。

R1(config-router-af)#af-interface g0/0

R1(config-router-af-interface)#?

Address Family Interfaces configuration commands:

authentication             authentication subcommands

bandwidth-percent          Set percentage of bandwidth percentage limit

bfd                        Enable Bidirectional Forwarding Detection

dampening-change           Percent interface metric must change to cause update

dampening-interval         Time in seconds to check interface metrics

default                    Set a command to its defaults

exit-af-interface          Exit from Address Family Interface configuration

hello-interval             Configures hello interval

hold-time                  Configures hold time

next-hop-self              Configures EIGRP next-hop-self

no                         Negate a command or set its defaults

passive-interface          Suppress address updates on an interface

shutdown                   Disable Address-Family on interface

split-horizon              Perform split horizon

summary-address            Perform address summarization

注：af-interface defaultコマンドを使用すると、すべてのインターフェイスに設定を一度に適用できます。

アドレスファミリ トポロジ コンフィギュレーション モード

このモードでは、EIGRPトポロジテーブルで動作するいくつかの設定オプションが提供されます。このモードでは、再配布、距離、オフセットリスト、バリアンスなどを設定できます。このモードは、アドレスファミリコンフィギュレーションモードから開始できます。

R1(config-router-af)#topology base

R1(config-router-af-topology)#?

Address Family Topology configuration commands:

auto-summary         Enable automatic network number summarization

default              Set a command to its defaults

default-information  Control distribution of default information

default-metric       Set metric of redistributed routes

distance             Define an administrative distance

distribute-list      Filter entries in eigrp updates

eigrp                EIGRP specific commands

exit-af-topology     Exit from Address Family Topology configuration

maximum-paths        Forward packets over multiple paths

metric               Modify metrics and parameters for advertisement

no                   Negate a command or set its defaults

offset-list          Add or subtract offset from EIGRP metrics

redistribute         Redistribute IPv4 routes from another routing proto

summary-metric       Specify summary to apply metric/filtering

timers               Adjust topology specific timers

traffic-share        How to compute traffic share over alternate paths

variance             Control load balancing variance

比較

ここで説明した2つの設定モードの比較を示します。

アベイラビリティ

EIGRP名前付き設定は、次のCisco IOS®リリースから使用できます。

- 15.0(1)M

- 12.2(33)SRE

- 12.2(33)XNE

- Cisco IOS XE Release 2.5

名前付き EIGRP への自動変換

設定を従来の方法から新しい方法に自動的に変換する方法があります。EIGRPプロセス内で、コマンド

eigrp upgrade-cli <EIGRP Virtual-Instance Name>を入力する必要があります。これにより、確立されたEIGRPピアリングに影響を与えることなく、設定が名前付きモードに自動的に変換されます。

Traditional Configuration

router eigrp 1

network 10.10.10.1 0.0.0.0

!

interface Ethernet0/0

ip address 10.10.10.1 255.255.255.0

ip hello-interval eigrp 1 100

Configuration

R1(config)#router eigrp 1

R1(config-router)#eigrp upgrade-cli TEST

Configuration will be converted from router eigrp 1 to router eigrp TEST.

Are you sure you want to proceed? ? [yes/no]: yes

*Oct 10 14:14:40.684: EIGRP: Conversion of router eigrp 1 to router eigrp TEST -

Completed.

Converted Named Configuration

router eigrp TEST

!

address-family ipv4 unicast autonomous-system 1

!

af-interface Ethernet0/0

hello-interval 100

exit-af-interface

!

topology base

exit-af-topology

network 10.10.10.1 0.0.0.0

exit-address-family

確認

現在、この設定に使用できる確認手順はありません。

トラブルシュート

現在、この設定に関する特定のトラブルシューティング情報はありません。