内容

概要

前提条件

要件

使用するコンポーネント

背景説明

設定例

ネットワーク図

コンフィギュレーション

確認

概要

このドキュメントでは、Nexus 9000シリーズでボーダーゲートウェイプロトコル(BGP)コンフェデレーションを設定する手順について説明します。

前提条件

要件

次の項目に関する知識があることが推奨されます。

- Nexus スイッチ

- BGP

使用するコンポーネント

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、クリアな（デフォルト）設定で作業を開始しています。本稼働中のネットワークでは、各コマンドによって起こる可能性がある影響を十分確認してください。

背景説明

BGPがルーティングループを回避するために使用するメカニズムは、AS PATHアトリビュートに独自の自律システム番号(ASN)を追加することです。IBGPトポロジの場合、アップデートは同じASNに属しているためAS-PATH属性を変更せず、ルーティングループを引き起こす可能性があります。

BGPは、BGPデバイスがIBGPピア経由でプレフィクスを受信し、そのプレフィクスを別のIBGPネイバーにアドバタイズできないことを示すスプリットホライズンルールを使用します。 このルールにより、すべてのIBGPネイバーとプレフィックスを交換するフルメッシュトポロジが必要になります。 大規模ネットワークでフルメッシュのシナリオを使用する場合、過剰なリソースを使用してピアリングを作成するため、スケーラブルではありません。

iBGPのフルメッシュトポロジに代わる選択肢は次のとおりです。

- ルートリフレクション

- 連盟

このドキュメントでは、BGPコンフェデレーションの使用のみに焦点を当てています。

BGPコンフェデレーションでは、ASNを複数のサブ自律システムに分割してコンフェデレーションにグループ化することで、フルメッシュトポロジの必要性がなくなります。

設定例

BGPコンフェデレーション設定ガイドを確認するには、『Advance BGP Configuration Guide Nexus 9000』を参照してください。

ネットワーク図

注：トポロジでは、Nexus 1、Nexus 2、Nexus 3、およびNexus 4は同じコンフェデレーションASN 64513の一部であり、コンフェデレーションを2つの小さなASN(64512および64514)に分割します

注:Nexus 1とNexus 3はiBGPネイバーシップを確立します。

注:Nexus 2とNexus 4はiBGPネイバーシップを確立します。

注:Nexus 1とNexus 2はeBGPネイバーシップを確立します。

コンフィギュレーション

注：コンフェデレーション設定により、確立されているすべてのBGPピアがリセットされます。この設定は、メンテナンスウィンドウで行う必要があります。

Nexus 1

Nexus1# show running-config bgp

!Command: show running-config bgp

!Running configuration last done at: Thu Jul 20 21:13:08 2023

!Time: Thu Jul 20 23:28:41 2023

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 64512 --> Local ASN

confederation identifier 64513 --> BGP Confederation identifier

confederation peers 64514 --> ASN that belong to the Confederation

log-neighbor-changes

neighbor 10.0.5.2

remote-as 64515

address-family ipv4 unicast

neighbor 172.16.255.2

remote-as 64514

update-source loopback0

address-family ipv4 unicast

neighbor 172.16.255.3

remote-as 64512

log-neighbor-changes

update-source loopback0

address-family ipv4 unicast

Nexus 2

Nexus2# show running-config bgp

!Command: show running-config bgp

!Running configuration last done at: Thu Jul 20 21:12:54 2023

!Time: Thu Jul 20 23:31:04 2023

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 64514 --> Local ASN

confederation identifier 64513 --> BGP Confederation identifier

confederation peers 64512 --> ASN that belong to the Confederation

log-neighbor-changes

neighbor 172.16.255.1

remote-as 64512

update-source loopback0

address-family ipv4 unicast

neighbor 172.16.255.4

remote-as 64514

update-source loopback0

address-family ipv4 unicast

Nexus 3

Nexus3# show running-config bgp

!Command: show running-config bgp

!Running configuration last done at: Thu Jul 20 21:14:54 2023

!Time: Thu Jul 20 23:31:45 2023

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 64512 --> Local ASN

confederation identifier 64513 --> BGP Confederation identifier

log-neighbor-changes

neighbor 172.16.255.1

remote-as 64512

log-neighbor-changes

update-source loopback0

address-family ipv4 unicast

Nexus 4

Nexus4# show running-config bgp

!Command: show running-config bgp

!Running configuration last done at: Thu Jul 20 15:11:15 2023

!Time: Thu Jul 20 17:32:58 2023

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 64514 --> Local ASN

confederation identifier 64513 --> BGP Confederation identifier

log-neighbor-changes

address-family ipv4 unicast

network 172.30.1.0/24

network 172.30.2.0/24

network 172.30.3.0/24

network 172.30.4.0/24

network 172.30.5.0/24

network 172.30.6.0/24

network 172.30.7.0/24

network 172.30.8.0/24

neighbor 172.16.255.2

remote-as 64514

update-source loopback0

address-family ipv4 unicast

Nexus 5

Nexus5# show running-config bgp

!Command: show running-config bgp

!Running configuration last done at: Thu Jul 20 21:13:32 2023

!Time: Thu Jul 20 23:33:34 2023

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 64515 --> Local ASN

log-neighbor-changes

address-family ipv4 unicast

network 192.168.1.0/24

network 192.168.2.0/24

network 192.168.3.0/24

network 192.168.4.0/24

network 192.168.5.0/24

network 192.168.6.0/24

network 192.168.7.0/24

network 192.168.8.0/24

neighbor 10.0.5.1

remote-as 64513

address-family ipv4 unicast

確認

Nexus 1

手順1:BGPネイバーが確立され、プレフィックスが交換されます。

Nexus1# show ip bgp summary

BGP summary information for VRF default, address family IPv4 Unicast

BGP router identifier 172.16.255.1, local AS number 64512

BGP table version is 28, IPv4 Unicast config peers 3, capable peers 3

16 network entries and 16 paths using 4416 bytes of memory

BGP attribute entries [2/704], BGP AS path entries [2/12]

BGP community entries [0/0], BGP clusterlist entries [0/0]

Neighbor        V    AS    MsgRcvd    MsgSent   TblVer  InQ OutQ Up/Down  State/PfxRcd

10.0.5.2        4 64515        328        321       28    0    0 05:00:34 8

172.16.255.2    4 64514        270        264       28    0    0 04:16:51 8

172.16.255.3    4 64512        318        318       28    0    0 05:12:28 0

ステップ2：コンフェデレーションピアによって学習されたプレフィックスは、ステータスc-confedを調べることで識別されます。

Nexus1# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 28, Local Router ID is 172.16.255.1

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

*>c172.30.1.0/24      172.16.255.4                      100          0 (64514) i

*>c172.30.2.0/24      172.16.255.4                      100          0 (64514) i

*>c172.30.3.0/24      172.16.255.4                      100          0 (64514) i

*>c172.30.4.0/24      172.16.255.4                      100          0 (64514) i

*>c172.30.5.0/24      172.16.255.4                      100          0 (64514) i

*>c172.30.6.0/24      172.16.255.4                      100          0 (64514) i

*>c172.30.7.0/24      172.16.255.4                      100          0 (64514) i

*>c172.30.8.0/24      172.16.255.4                      100          0 (64514) i

*>e192.168.1.0/24     10.0.5.2                                       0 64515 i

*>e192.168.2.0/24     10.0.5.2                                       0 64515 i

*>e192.168.3.0/24     10.0.5.2                                       0 64515 i

*>e192.168.4.0/24     10.0.5.2                                       0 64515 i

*>e192.168.5.0/24     10.0.5.2                                       0 64515 i

*>e192.168.6.0/24     10.0.5.2                                       0 64515 i

*>e192.168.7.0/24     10.0.5.2                                       0 64515 i

*>e192.168.8.0/24     10.0.5.2                                       0 64515 i

Nexus 2

手順1:BGPネイバーが確立され、プレフィックスが交換されます。

Nexus2# show ip bgp summary

BGP summary information for VRF default, address family IPv4 Unicast

BGP router identifier 172.16.255.2, local AS number 64514

BGP table version is 27, IPv4 Unicast config peers 2, capable peers 2

16 network entries and 16 paths using 3904 bytes of memory

BGP attribute entries [2/344], BGP AS path entries [1/12]

BGP community entries [0/0], BGP clusterlist entries [0/0]

Neighbor        V    AS MsgRcvd MsgSent   TblVer  InQ OutQ Up/Down  State/PfxRcd

172.16.255.1    4 64512     274     265       27    0    0 04:20:26 8

172.16.255.4    4 64514     269     262       27    0    0 04:16:00 8

ステップ2：コンフェデレーションピアによって学習されたプレフィックスは、ステータスc-confedを調べることで識別されます。

Nexus2# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 27, Local Router ID is 172.16.255.2

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

*>i172.30.1.0/24      172.16.255.4                      100          0 i

*>i172.30.2.0/24      172.16.255.4                      100          0 i

*>i172.30.3.0/24      172.16.255.4                      100          0 i

*>i172.30.4.0/24      172.16.255.4                      100          0 i

*>i172.30.5.0/24      172.16.255.4                      100          0 i

*>i172.30.6.0/24      172.16.255.4                      100          0 i

*>i172.30.7.0/24      172.16.255.4                      100          0 i

*>i172.30.8.0/24      172.16.255.4                      100          0 i

*>c192.168.1.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>c192.168.2.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>c192.168.3.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>c192.168.4.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>c192.168.5.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>c192.168.6.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>c192.168.7.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>c192.168.8.0/24     10.0.5.2                          100          0 (64512) 64515 i

Nexus 3

手順1:BGPネイバーが確立され、プレフィックスが交換されます。

Nexus3# show ip bgp summary

BGP summary information for VRF default, address family IPv4 Unicast

BGP router identifier 172.16.255.3, local AS number 64512

BGP table version is 34, IPv4 Unicast config peers 1, capable peers 1

16 network entries and 16 paths using 4416 bytes of memory

BGP attribute entries [2/704], BGP AS path entries [2/12]

BGP community entries [0/0], BGP clusterlist entries [0/0]

Neighbor        V    AS    MsgRcvd    MsgSent   TblVer  InQ OutQ Up/Down  State/

PfxRcd

172.16.255.1    4 64512        332        323       34    0    0 05:17:52 16

ステップ2:Nexus 3の観点から、プレフィックスは通常のiBGPプレフィックスとして学習されます。その観点からは、コンフェデレーションネイバーはなく、唯一のピアはiBGPピアです。

Nexus3# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 34, Local Router ID is 172.16.255.3

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - b

est2

Network            Next Hop            Metric     LocPrf     Weight Path

*>i172.30.1.0/24      172.16.255.4                      100          0 (64514) i

*>i172.30.2.0/24      172.16.255.4                      100          0 (64514) i

*>i172.30.3.0/24      172.16.255.4                      100          0 (64514) i

*>i172.30.4.0/24      172.16.255.4                      100          0 (64514) i

*>i172.30.5.0/24      172.16.255.4                      100          0 (64514) i

*>i172.30.6.0/24      172.16.255.4                      100          0 (64514) i

*>i172.30.7.0/24      172.16.255.4                      100          0 (64514) i

*>i172.30.8.0/24      172.16.255.4                      100          0 (64514) i

*>i192.168.1.0/24     10.0.5.2                          100          0 64515 i

*>i192.168.2.0/24     10.0.5.2                          100          0 64515 i

*>i192.168.3.0/24     10.0.5.2                          100          0 64515 i

*>i192.168.4.0/24     10.0.5.2                          100          0 64515 i

*>i192.168.5.0/24     10.0.5.2                          100          0 64515 i

*>i192.168.6.0/24     10.0.5.2                          100          0 64515 i

*>i192.168.7.0/24     10.0.5.2                          100          0 64515 i

*>i192.168.8.0/24     10.0.5.2                          100          0 64515 i

Nexus 4

手順1:BGPネイバーが確立され、プレフィックスが交換されます。

Nexus4# show ip bgp summary

BGP summary information for VRF default, address family IPv4 Unicast

BGP router identifier 172.16.255.4, local AS number 64514

BGP table version is 18, IPv4 Unicast config peers 1, capable peers 1

16 network entries and 16 paths using 4416 bytes of memory

BGP attribute entries [2/704], BGP AS path entries [1/12]

BGP community entries [0/0], BGP clusterlist entries [0/0]

Neighbor        V    AS    MsgRcvd    MsgSent   TblVer  InQ OutQ Up/Down  State/PfxRcd

172.16.255.2    4 64514        268        267       18    0    0 04:21:40 8

ステップ2:Nexus 4の観点から、プレフィックスは通常のiBGPプレフィックスとして学習されます。その観点からは、コンフェデレーションネイバーはなく、唯一のピアはiBGPピアです。

Nexus4# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 18, Local Router ID is 172.16.255.4

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

*>l172.30.1.0/24      0.0.0.0                           100      32768 i

*>l172.30.2.0/24      0.0.0.0                           100      32768 i

*>l172.30.3.0/24      0.0.0.0                           100      32768 i

*>l172.30.4.0/24      0.0.0.0                           100      32768 i

*>l172.30.5.0/24      0.0.0.0                           100      32768 i

*>l172.30.6.0/24      0.0.0.0                           100      32768 i

*>l172.30.7.0/24      0.0.0.0                           100      32768 i

*>l172.30.8.0/24      0.0.0.0                           100      32768 i

*>i192.168.1.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>i192.168.2.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>i192.168.3.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>i192.168.4.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>i192.168.5.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>i192.168.6.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>i192.168.7.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>i192.168.8.0/24     10.0.5.2                          100          0 (64512) 64515 i

Nexus 5

手順1:BGPネイバーが確立され、プレフィックスが交換されます。この場合、唯一のネイバーはNexus 3で、これはeBGPネイバーです。

Nexus5# show ip bgp summary

BGP summary information for VRF default, address family IPv4 Unicast

BGP router identifier 172.16.255.5, local AS number 64515

BGP table version is 18, IPv4 Unicast config peers 1, capable peers 1

16 network entries and 16 paths using 3904 bytes of memory

BGP attribute entries [2/344], BGP AS path entries [1/6]

BGP community entries [0/0], BGP clusterlist entries [0/0]

Neighbor        V    AS MsgRcvd MsgSent   TblVer  InQ OutQ Up/Down  State/PfxRcd

10.0.5.1        4 64513     317     317       18    0    0 05:11:26 8

ステップ2:Nexus 5の観点から、Nexus 3から受信したプレフィックスは、コンフェデレーションASNのAS PATHを使用して受信されますが、通常のeBGPプレフィックスとして受信されます。

Nexus5# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 18, Local Router ID is 172.16.255.5

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - b

est2

Network            Next Hop            Metric     LocPrf     Weight Path

*>e172.30.1.0/24      10.0.5.1                                       0 64513 i

*>e172.30.2.0/24      10.0.5.1                                       0 64513 i

*>e172.30.3.0/24      10.0.5.1                                       0 64513 i

*>e172.30.4.0/24      10.0.5.1                                       0 64513 i

*>e172.30.5.0/24      10.0.5.1                                       0 64513 i

*>e172.30.6.0/24      10.0.5.1                                       0 64513 i

*>e172.30.7.0/24      10.0.5.1                                       0 64513 i

*>e172.30.8.0/24      10.0.5.1                                       0 64513 i

*>l192.168.1.0/24     0.0.0.0                           100      32768 i

*>l192.168.2.0/24     0.0.0.0                           100      32768 i

*>l192.168.3.0/24     0.0.0.0                           100      32768 i

*>l192.168.4.0/24     0.0.0.0                           100      32768 i

*>l192.168.5.0/24     0.0.0.0                           100      32768 i

*>l192.168.6.0/24     0.0.0.0                           100      32768 i

*>l192.168.7.0/24     0.0.0.0                           100      32768 i

*>l192.168.8.0/24     0.0.0.0                           100      32768 i

注:Nexus 5は、Nexus 1とNexus 4の間で使用されるコンフェデレーションを認識しません。その観点から、これらは通常のeBGPプレフィックスです。