内容

概要

背景説明

問題

シナリオ1.個別のRD値を持つインラインRRおよびPE

シナリオ2.同じRD値を持つインラインRRとPE

シナリオ3.同じRD値と「cef encap-sharing disable」が設定されたインラインRRとPE

解決方法

概要

このドキュメントでは、Border Gateway Protocol(BGP)VPNv4インラインルートリフレクタ(RR)およびプロバイダーエッジ(PE)として使用されるCisco Network Convergence System(NCS)540の動作について説明します。

背景説明

このドキュメントでは、Cisco IOS® XRソフトウェアリリース7.3.1を使用したラボ環境で確認されたNCS 540の動作に焦点を当てます。このドキュメントで説明する動作は、すべてのNCS5500またはNCS500シリーズ0ベース0の0プラットフォーム0と00の0の0の00の0の0の0の0の0の0の0の0の0のDNX0のDNXNCS0のNCSNCSNCSNCS

問題

NCS540がVirtual Routing and Forwarding(VRF)インスタンスを使用して設定され、リモートPE RRクライアントノードで使用されるものと同じルート識別子(RD)値を使用するシナリオを検討します。インラインRRおよびPEロールとして使用され、リモートPE RRクライアントノードと同じRD値が設定されている場合、最上位のラベルは転送の前にポップされず、出力PEでのパケットのドロップにつながります。

シナリオ1.個別のRD値を持つインラインRRおよびPE

この図は、VRF vrf1に対して他のPEノードで使用されるものとは異なるRD値を持つBGP VPNv4インラインRRおよびPEとして設定されたDevice Under Test(DUT)のシナリオを示しています。

図1 - DUT – 個別のRD値を持つインラインRRおよびPE。

VRF vrf1内の入力PE(IP 10.51.232.21)と出力PE(10.51.232.145)間のIP接続は、pingおよびtracerouteコマンドの出力に示されるように、PEノード間で正常に転送されたパケットで確立されます。

INGRESS_PE#ping vrf vrf1 10.51.232.145 source 10.51.232.21

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.51.232.145, timeout is 2 seconds:

Packet sent with a source address of 10.51.232.21

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/4 ms

INGRESS_PE#traceroute vrf vrf1 10.51.232.145 source 10.51.232.21

Type escape sequence to abort.

Tracing the route to 10.51.232.145

VRF info: (vrf in name/id, vrf out name/id)

1 10.51.5.161 [MPLS: Label 24017 Exp 0] 4 msec 8 msec 0 msec

2 10.9.255.207 [MPLS: Labels 23481/24008 Exp 0] 4 msec 0 msec 0 msec

3 10.9.255.217 0 msec *  4 msec

DUTは、VRFがローカルに設定されたBGP VPNv4インラインRRおよびPEですが、PE RRクライアントノード(65000:104)で使用されるものとは異なるRD値(65000:104)を3)を0)使用00300000000000000000000000000000000000000000000000000000000000000000 出力に示されているように、DUTはすべてのルートをインポートし、それに応じてVPNv4ラベルを交換します。

RP/0/RP0/CPU0:DUT-N540#show bgp vpnv4 unicast

BGP router identifier 10.9.255.8, local AS number 65000

<snip>

Network            Next Hop            Metric LocPrf Weight Path

Route Distinguisher: 65000:104 (default for vrf vrf1)

*>i0.0.0.0/0          10.48.255.30            10    100      0 ?

*>i10.51.232.20/30    10.51.5.5                0    100      0 ?

*>i10.51.232.145/32   10.48.255.30             0    100      0 ?

Route Distinguisher: 65000:104830

*>i0.0.0.0/0          10.48.255.30            10    100      0 ?

*>i10.51.232.20/30    10.51.5.5                0    100      0 ?

*>i10.51.232.145/32   10.48.255.30             0    100      0 ?

<snip>

RP/0/RP0/CPU0:DUT-N540#show bgp vpnv4 unicast rd 65000:104 labels

BGP router identifier 10.9.255.8, local AS number 65000

<snip>

Network            Next Hop        Rcvd Label      Local Label

Route Distinguisher: 21497:104 (default for vrf vrf1)

*>i0.0.0.0/0          10.48.255.30    24008           nolabel

*>i10.51.232.20/30    10.51.5.5       17              nolabel

*>i10.51.232.145/32   10.48.255.30    24008           nolabel

<snip>

RP/0/RP0/CPU0:DUT-N540#show bgp vpnv4 unicast rd 65000:104830 labels

BGP router identifier 10.9.255.8, local AS number 65000

<snip>

Network            Next Hop        Rcvd Label      Local Label

Route Distinguisher: 21497:104830

*>i0.0.0.0/0          10.48.255.30    24008           24018

*>i10.51.232.20/30    10.51.5.5       17              24019

*>i10.51.232.145/32   10.48.255.30    24008           24017

<snip>

個別のRD値を使用するインラインRRおよびPEの現在のシナリオの追加リファレンスとしては、EGRESS_PEノードから受信したプレフィクス10.51.232.145/32の完全な出力を示します。

RP/0/RP0/CPU0:DUT-N540#show bgp vpnv4 unicast rd 65000:104 10.51.232.145

BGP routing table entry for 10.51.232.145/32, Route Distinguisher: 65000:104

Versions:

Process           bRIB/RIB  SendTblVer

Speaker                115         115

Last Modified: Feb  8 11:00:27.032 for 2w6d

Paths: (1 available, best #1)

Not advertised to any peer

Path #1: Received by speaker 0

Not advertised to any peer

Local, (received & used)

10.48.255.30 (metric 20) from 10.48.255.30 (10.48.255.30)

Received Label 24008

Origin incomplete, metric 0, localpref 100, valid, internal, best, group-best, import-candidate, imported

Received Path ID 1, Local Path ID 1, version 115

Extended community: RT:65000:104830 RT:65000:105130

Source AFI: VPNv4 Unicast, Source VRF: default, Source Route Distinguisher: 65000:104830

RP/0/RP0/CPU0:DUT-N540#show bgp vpnv4 unicast rd 65000:104830 10.51.232.145

BGP routing table entry for 10.51.232.145/32, Route Distinguisher: 65000:104830

Versions:

Process           bRIB/RIB  SendTblVer

Speaker                113         113

Local Label: 24017

Last Modified: Feb  8 11:00:22.032 for 2w6d

Paths: (1 available, best #1)

Advertised to peers (in unique update groups):

10.51.5.5

Path #1: Received by speaker 0

Advertised to peers (in unique update groups):

10.51.5.5

Local, (received & used)

10.48.255.30 (metric 20) from 10.48.255.30 (10.48.255.30)

Received Label 24008

Origin incomplete, metric 0, localpref 100, valid, internal, best, group-best, import-candidate, not-in-vrf

Received Path ID 1, Local Path ID 1, version 113

Extended community: RT:65000:104830 RT:65000:10513

INGRESS_PE(10.51.232.21)から送信され、EGRESS PE(10.51.232.145)に送信されるパケットはラベルスイッチングされ、プログラムされたフォワーディングの詳細に従って、{23481 24008}によってスワップされたDUTトップラベル{24017}で0000000000000000000000000000000000000000000000000000000000を0000000000000

RP/0/RP0/CPU0:DUT-N540#show cef vrf vrf1 10.51.232.145/32 detail

10.51.232.145/32, version 96, internal 0x5000001 0x0 (ptr 0x8ce0d034) [1], 0x0 (0x8b941ee0), 0xa08 (0x8cacb5f8)

Updated Feb 25 12:18:36.885

Prefix Len 32, traffic index 0, precedence n/a, priority 3

gateway array (0x8b7b6fd0) reference count 2, flags 0x38, source rib (7), 0 backups

[3 type 1 flags 0x8441 (0x8cb11e28) ext 0x0 (0x0)]

LW-LDI[type=1, refc=1, ptr=0x8b941ee0, sh-ldi=0x8cb11e28]

gateway array update type-time 1 Feb 25 12:18:36.885

LDI Update time Feb 25 12:18:36.885

LW-LDI-TS Feb 25 12:18:36.885

via 10.48.255.30/32, 7 dependencies, recursive [flags 0x6000]

path-idx 0 NHID 0x0 [0x8d37e3b8 0x0]

recursion-via-/32

next hop VRF - 'default', table - 0xe0000000

next hop 10.48.255.30/32 via 23481/0/21

next hop 10.9.255.207/32 BE100        labels imposed {23481 24008}

Load distribution: 0 (refcount 3)

Hash  OK  Interface                 Address

0     Y   recursive                 23481/0

P-NODEで、INGRESS_PEノードから送信された入力トラフィックと一致するようにNetflowが設定されている場合、フローモニタの出力に示すように、予期されるラベルスタック{23481 24008}が観察されます。

RP/0/RP0/CPU0:P_NODE#show flow monitor MONITOR_MAP_MPLS cache location 0/RP0/CPU0

<snip>

LabelType Prefix/Length      Label1-EXP-S     Label2-EXP-S     Label3-EXP-S   InputInterface  OutputInterface ForwardStatus        FirstSwitched   LastSwitched    ByteCount    PacketCount  Dir SamplerID  IPV4SrcAddr      IPV4DstAddr      IPV4TOS  IPV4Prot L4SrcPort  L4DestPort L4TCPFlags   InputVRFID                        OutputVRFID                       BGPNextHopV4

Unknown 10.48.255.30/32       23481-0-0        24008-0-1           -

BE100           BE1             Fwd                  33 17:49:08:468 33 17:49:11:765 108000       1000         Ing 1          10.51.232.21     10.51.232.145    0        icmp     0          0          0            default                           default                           0.0.0.0

<snip>

シナリオ2.同じRD値を持つインラインRRとPE

この図は、BGP VPNv4インラインRRおよびPEとして設定され、VRF1 - 65000:10430に対して他のPEノードと同じRD値で設定されたDUTの問題シナリオをを示します。

図2 - DUT – 同じRD値を持つインラインRRとPE。

このシナリオでは、pingおよびtracerouteコマンドの出力に示されるように、VRF1内の入力PE(IP 10.51.232.21)と出力PE(10.51.232.145)間のIP接続が失敗します。

INGRESS_PE#ping vrf vrf1 10.51.232.145 source 10.51.232.21

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.51.232.145, timeout is 2 seconds:

Packet sent with a source address of 10.51.232.21

.....

Success rate is 0 percent (0/5)

INGRESS_PE#traceroute vrf vrf1 10.51.232.145 source 10.51.232.21

Type escape sequence to abort.

Tracing the route to 10.51.232.145

VRF info: (vrf in name/id, vrf out name/id)

1 10.51.5.161 [MPLS: Label 24013 Exp 0] 4 msec 4 msec 0 msec

2  *  *  *

<snip>

DUTでは、BGPまたはプログラムされたフォワーディング出力から問題の原因が明確に認識されず、すべて想定どおりに表示されます。

RP/0/RP0/CPU0:DUT-N540#show bgp vpnv4 unicast

BGP router identifier 10.9.255.8, local AS number 65000

<snip>

Network            Next Hop            Metric LocPrf Weight Path

Route Distinguisher: 65000:104830 (default for vrf vrf1)

*>i0.0.0.0/0          10.48.255.30            10    100      0 ?

*>i10.51.232.20/30    10.51.5.5                0    100      0 ?

*>i10.51.232.145/32   10.48.255.30             0    100      0 ?

<snip>

RP/0/RP0/CPU0:DUT-N540#show bgp vpnv4 unicast rd 65000:104830 labels

BGP router identifier 10.9.255.8, local AS number 65000

<snip>

Network            Next Hop        Rcvd Label      Local Label

Route Distinguisher: 21497:104830 (default for vrf vrf1)

*>i0.0.0.0/0          10.48.255.30    24008           24020

*>i10.51.232.20/30    10.51.5.5       17              24016

*>i10.51.232.145/32   10.48.255.30    24008           24013

<snip>

前のセクションと同様に、同じRD値を使用するインラインRRとPEの現在のシナリオの追加参照としては、EGRESS_PEノードから受信したプレフィクス10.51.232.145/32の完全な出力を示します。

RP/0/RP0/CPU0:DUT-N540#show bgp vpnv4 unicast rd 65000:104830 10.51.232.145

BGP routing table entry for 10.51.232.145/32, Route Distinguisher: 65000:104830

Versions:

Process           bRIB/RIB  SendTblVer

Speaker                134         134

Local Label: 24013

Last Modified: Feb 28 18:03:20.032 for 00:04:50

Paths: (1 available, best #1)

Advertised to peers (in unique update groups):

10.51.5.5

Path #1: Received by speaker 0

Advertised to peers (in unique update groups):

10.51.5.5

Local, (received & used)

10.48.255.30 (metric 20) from 10.48.255.30 (10.48.255.30)

Received Label 24008

Origin incomplete, metric 0, localpref 100, valid, internal, best, group-best, import-candidate, imported

Received Path ID 1, Local Path ID 1, version 134

Extended community: RT:65000:104830 RT:65000:105130

Source AFI: VPNv4 Unicast, Source VRF: vrf1, Source Route Distinguisher: 65000:10483

INGRESS_PE(10.51.232.21)から発信され、EGRESS PE(10.51.232.145)に宛てられたパケットはラベルスイッチングされます。DUTでは、これらのパケットのトップラベル{24013}が、プログラムされた転送詳細に従って{23481 24000}によって08}交換8されます。

RP/0/RP0/CPU0:DUT-N540#show cef vrf vrf1 10.51.232.145/32 detail

10.51.232.145/32, version 107, internal 0x1000001 0x0 (ptr 0x8ce0d13c) [1], 0x0 (0x8b946be8), 0xa08 (0x8cacb7d8)

Updated Feb 28 18:03:19.778

Prefix Len 32, traffic index 0, precedence n/a, priority 3

gateway array (0x8b7b71a0) reference count 6, flags 0x78, source rib (7), 0 backups

[3 type 5 flags 0x8441 (0x8cb125d8) ext 0x0 (0x0)]

LW-LDI[type=5, refc=3, ptr=0x8b946be8, sh-ldi=0x8cb125d8]

gateway array update type-time 1 Feb 28 18:03:19.778

LDI Update time Feb 28 18:03:19.778

LW-LDI-TS Feb 28 18:03:19.778

via 10.48.255.30/32, 7 dependencies, recursive [flags 0x6000]

path-idx 0 NHID 0x0 [0x8d37e3b8 0x0]

recursion-via-/32

next hop VRF - 'default', table - 0xe0000000

next hop 10.48.255.30/32 via 23481/0/21

local label 24013

next hop 10.9.255.207/32 BE100        labels imposed {23481 24008}

Load distribution: 0 (refcount 3)

Hash  OK  Interface                 Address

0     Y   recursive                 23481/0

さらに、INGRESS_PEから発信された入力トラフィックと一致するようにNetFlowが設定されたP_NODEでのトリアージにより、DUTによるパケットの転送方法に問題の原因があることが明らかになります。出力で強調表示されているように、ローカルラベル24013は、パケットを転送する前にDUTによってポップされません。したがって、P_NODEは、予想される2ラベルスタック{23481 24008}ではなく、3ラベルスタックMPLSフレーム{23481 24008 24013}を受信します。P_NODEのトップラベル23481が取り除かれ、EGRESS_PEに転送されたパケットはラベルスタック{24008 24013}として伝送され、EGRESS_PEでパケットがドロップされます。

RP/0/RP0/CPU0:P_NODE#show flow monitor MONITOR_MAP_MPLS cache location 0/RP0/CPU0

<snip>

LabelType Prefix/Length      Label1-EXP-S     Label2-EXP-S     Label3-EXP-S     InputInterface  OutputInterface ForwardStatus        FirstSwitched   LastSwitched    ByteCount    PacketCount  Dir SamplerID  IPV4SrcAddr      IPV4DstAddr      IPV4TOS  IPV4Prot L4SrcPort  L4DestPort L4TCPFlags   InputVRFID                        OutputVRFID                       BGPNextHopV4

Unknown 10.48.255.30/32       23481-0-0        24008-0-0        24013-0-1       BE100           BE1             Fwd                  33 17:51:40:181 33 17:51:41:521 112000       1000         Ing 1          10.51.232.21     10.51.232.145    0        icmp     0          0          0            default                           default                           0.0.0.0

<snip>

シナリオ3.同じRD値と「cef encap-sharing disable」が設定されたインラインRRとPE

前のシナリオに加えて、cef encap-sharing disableが設定され、各プレフィクスに対して個別のハードウェアリソースが割り当てられます。

RP/0/RP0/CPU0:DUT-N540(config)#cef encap-sharing disable

Warning: The command will clear the forwarding table.Traffic loss is expected during rebuilding.

RP/0/RP0/CPU0:DUT-N540(config)#commit

この図は、同じRDで設定され、cef encap-sharing disabledで設定されたインラインRRおよびPEのシナリオを示しています。

図3 - DUT – 同じRD値と「cef encap-sharing disable」が設定されたインラインRRおよびPE。

VRF vrf1内の入力PE(IP 10.51.232.21)と出力PE(10.51.232.145)間のIP接続は、pingおよびtracerouteコマンドの出力に示されるように、PEノード間でさらに正常に転送されたパケットで復元されます。

INGRESS_PE#ping vrf vrf1 10.51.232.145 source 10.51.232.21 repeat 1000

Type escape sequence to abort.

Sending 1000, 100-byte ICMP Echos to 10.51.232.145, timeout is 2 seconds:

Packet sent with a source address of 10.51.232.21

<snip>

Success rate is 100 percent (1000/1000), round-trip min/avg/max = 1/3/12 ms

INGRESS_PE#traceroute vrf vrf1 10.51.232.145 source 10.51.232.21

Type escape sequence to abort.

Tracing the route to 10.51.232.145

VRF info: (vrf in name/id, vrf out name/id)

1 10.51.5.161 [MPLS: Label 24013 Exp 0] 0 msec 0 msec 0 msec

2 10.9.255.207 [MPLS: Labels 23481/24008 Exp 0] 4 msec 4 msec 0 msec

3 10.9.255.217 0 msec *  0 msec

P_NODEでは、Netflowの出力から、DUTが予期されるラベルスタック{23481 24008}を使用してパケットを転送していることがわかります。P_NODEは最上位のラベル23481を削除し、EGRESS_PEが一致し、カプセル化されたパケットをVRF1内の最終宛先に正常に転送できるラベルスタック{24008}を持つEGRESS_PEノードににににパケットをを転送します。

RP/0/RP0/CPU0:P_NODE#show flow monitor MONITOR_MAP_MPLS cache location 0/RP0/CPU0

Cache summary for Flow Monitor MONITOR_MAP_MPLS:

<snip>

LabelType Prefix/Length      Label1-EXP-S     Label2-EXP-S     Label3-EXP-S     InputInterface  OutputInterface ForwardStatus        FirstSwitched   LastSwitched    ByteCount    PacketCount  Dir SamplerID  IPV4SrcAddr      IPV4DstAddr      IPV4TOS  IPV4Prot L4SrcPort  L4DestPort L4TCPFlags   InputVRFID                        OutputVRFID                       BGPNextHopV4

Unknown 10.48.255.30/32       23481-0-0        24008-0-1           -          BE100           BE1             Fwd                  33 18:03:14:211 33 18:03:17:505 108000       1000         Ing 1          10.51.232.21     10.51.232.145    0        icmp     0          0          0            default                           default                           0.0.0.0

<snip>

cef encap-sharing disable設定では、追加のハードウェアリソースがすべてのプレフィクスに割り当てられ、同じRD値を持つインラインRRのこの特定のシナリオでパケットを正しく転送するために必要な転送情報がDUTで設定されます。プログラム転送の詳細に関する区別を強調する目的では、show cef vrf vrf1 10.51.232.145/32 hardware egress location 0/RP0/CPU0の2つの出力を参照し、cef encap-sharing disableが設定されている場合に含まれる追加情報をしてください。

同じRD値を持つインラインRRとPEのシナリオで見られる通り、「cef encap-sharing disable」（デフォルト）が設定されていない場合（デフォルト）:

!

! --- without 'cef encap-sharing disable' (default)

! --- note highlighted (bold) sections

!

RP/0/RP0/CPU0:DUT-N540#show cef vrf vrf1 10.51.232.145/32 hardware egress location 0/RP0/CPU0

10.51.232.145/32, version 107, internal 0x1000001 0x0 (ptr 0x8ce0d13c) [1], 0x0 (0x8b946be8), 0xa08 (0x8cacb7d8)

Updated Feb 28 18:03:19.778

Prefix Len 32, traffic index 0, precedence n/a, priority 3

gateway array (0x8b7b71a0) reference count 6, flags 0x78, source rib (7), 0 backups

[3 type 5 flags 0x8441 (0x8cb125d8) ext 0x0 (0x0)]

LW-LDI[type=5, refc=3, ptr=0x8b946be8, sh-ldi=0x8cb125d8]

gateway array update type-time 1 Feb 28 18:03:19.778

LDI Update time Feb 28 18:03:19.778

LW-LDI-TS Feb 28 18:03:19.778

via 10.48.255.30/32, 7 dependencies, recursive [flags 0x6000]

path-idx 0 NHID 0x0 [0x8d37e3b8 0x0]

recursion-via-/32

next hop VRF - 'default', table - 0xe0000000

next hop 10.48.255.30/32 via 23481/0/21

local label 24013

next hop 10.9.255.207/32 BE100        labels imposed {23481 24008}

Show-data Print at RPLC

LEAF - HAL pd context :

sub-type : IPV4, ecd_marked:0, has_collapsed_ldi:0

collapse_bwalk_required:0, ecdv2_marked:0,

HW Walk:

LEAF:

PI:0x8ce0d13c PD:0x8ce0d1dc rev:892768 type: IPV4 (0)

LEAF location: LEM

FEC key: 0x57f40001104

LWLDI:

PI:0x8b946be8 PD:0x8b946c28 rev:892767 p-rev:892766  ldi type:IMP_EOS0_EOS1

FEC key: 0x57f40001104 fec index: 0x0(0) num paths:1, bkup paths: 0

REC-SHLDI HAL PD context :

ecd_marked:0, collapse_bwalk_required:0, load_shared_lb:0

RSHLDI:

PI:0x8cb125d8 PD:0x8cb126a8 rev:892766 dpa-rev:41494702 flag:0x1

FEC key: 0x57f40001104 fec index: 0x2000ffcc(65484) num paths: 1

p-rev:854950

Path:0 fec index: 0x2000ffcc(65484) DSP fec index: 0x2000ffca(65482)

MPLS EEI push label: 24008

LEAF - HAL pd context :

sub-type : MPLS, ecd_marked:0, has_collapsed_ldi:0

collapse_bwalk_required:0, ecdv2_marked:0,

HW Walk:

LEAF:

PI:0x8d37e3b8 PD:0x8d37e458 rev:854953 type: MPLS (2)

LEAF location: LEM

FEC key: 0

LWLDI:

PI:0x8b945288 PD:0x8b9452c8 rev:854950 p-rev:854949  ldi type:IMP_EOS0_EOS1

FEC key: 0x51140001104 fec index: 0x0(0) num paths:1, bkup paths: 0

IMP LDI:

IMP pattern:3

PI:0x8b945288 PD:0x8b9452c8 rev:854950 p-rev:854949

FEC key: 0x51240001104 fec index: 0x2000ffca(65482) num paths:1

Path:0  fec index: 0x2000ffca(65482) DSP:0xc000001

MPLS encap key: 0xf1b0000040014822 MPLS encap id: 0x40014822 Remote: 0

SHLDI:

PI:0x8cb10718 PD:0x8cb107e8 rev:854949 dpa-rev:39755988 flag:0x0

FEC key: 0x51140001104 fec index: 0x2000ffcb(65483) num paths: 1 bkup paths: 0

p-rev:72522

Path:0 fec index: 0x2000ffcb(65483) DSP:0xc000001 Dest fec index: 0x0(0)

TX-NHINFO:

PI: 0x8d11fad0 PD: 0x8d11fb50 rev:72522 dpa-rev:3303803 Encap hdl: 0x8cd16098

Encap id: 0x40010003 Remote: 0 L3 int: 1579 flags: 0x407

npu_mask: 0x1 DMAC: 5c:5a:c7:ff:78:84

Load distribution: 0 (refcount 3)

Hash  OK  Interface                 Address

0     Y   recursive                 23481/0

同じRD値とcef encap-sharing disableが設定されたインラインRRとPEのシナリオに見られるようにします。

!

! --- with 'cef encap-sharing disable'

! --- note highlighted (bold) sections for the extra and additional forwarding information included

!

RP/0/RP0/CPU0:DUT-N540#show cef vrf vrf1 10.51.232.145/32 hardware egress location 0/RP0/CPU0

10.51.232.145/32, version 127, internal 0x1000001 0x0 (ptr 0x8ce0ffa4) [1], 0x0 (0x8b948630), 0xa08 (0x8cacb5f8)

Updated Feb 28 18:26:25.775

Prefix Len 32, traffic index 0, precedence n/a, priority 3

gateway array (0x8b7b5f80) reference count 3, flags 0x78, source rib (7), 0 backups

[2 type 5 flags 0x8441 (0x8cb14c48) ext 0x0 (0x0)]

LW-LDI[type=5, refc=3, ptr=0x8b948630, sh-ldi=0x8cb14c48]

gateway array update type-time 1 Feb 28 18:26:25.775

LDI Update time Feb 28 18:26:25.775

LW-LDI-TS Feb 28 18:26:25.779

via 10.48.255.30/32, 11 dependencies, recursive [flags 0x6000]

path-idx 0 NHID 0x0 [0x8d37e3b8 0x0]

recursion-via-/32

next hop VRF - 'default', table - 0xe0000000

next hop 10.48.255.30/32 via 23481/0/21

local label 24013

next hop 10.9.255.207/32 BE100        labels imposed {23481 24008}

Show-data Print at RPLC

LEAF - HAL pd context :

sub-type : IPV4, ecd_marked:0, has_collapsed_ldi:0

collapse_bwalk_required:0, ecdv2_marked:0,

HW Walk:

LEAF:

PI:0x8ce0ffa4 PD:0x8ce10044 rev:893768 type: IPV4 (0)

LEAF location: LEM

FEC key: 0x5ae40001104

LWLDI:

LSP pattern:3

PI:0x8b948630 PD:0x8b948670 rev:893767 p-rev:893766  ldi type:IMP_EOS0_EOS1

FEC key: 0x5af40001104 fec index: 0x2000ffbf(65471) num paths:1, bkup paths: 0

Path:0  fec index: 0x2000ffbf(65471) DSP fec index:0x20000001(1)

MPLS encap key: 0xf1b000004001482f MPLS encap id: 0x4001482f Remote: 0

IMP LDI:

IMP pattern:3

PI:0x8b948630 PD:0x8b948670 rev:893767 p-rev:893766

FEC key: 0x5ae40001104 fec index: 0x2000ffc0(65472) num paths:1

Path:0  fec index: 0x2000ffc0(65472) DSP fec index: 0x20000001(1)

MPLS encap key: 0xf1b000004001482e MPLS encap id: 0x4001482e Remote: 0

REC-SHLDI HAL PD context :

ecd_marked:0, collapse_bwalk_required:0, load_shared_lb:0

RSHLDI:

PI:0x8cb14c48 PD:0x8cb14d18 rev:893766 dpa-rev:41503635 flag:0x1

FEC key: 0x5ac40001104 fec index: 0x2000ffe0(65504) num paths: 1

p-rev:893704

Indirection ECMP FEC key: 0x5ad20001104 fec index: 0x20000001(1)

Path:0 fec index: 0x2000ffe0(65504) DSP fec index: 0x2000ffca(65482)

LEAF - HAL pd context :

sub-type : MPLS, ecd_marked:0, has_collapsed_ldi:0

collapse_bwalk_required:0, ecdv2_marked:0,

HW Walk:

LEAF:

PI:0x8d37e3b8 PD:0x8d37e458 rev:893707 type: MPLS (2)

LEAF location: LEM

FEC key: 0

LWLDI:

PI:0x8b9451a0 PD:0x8b9451e0 rev:893704 p-rev:893703  ldi type:IMP_EOS0_EOS1

FEC key: 0x59f40001104 fec index: 0x0(0) num paths:1, bkup paths: 0

IMP LDI:

IMP pattern:3

PI:0x8b9451a0 PD:0x8b9451e0 rev:893704 p-rev:893703

FEC key: 0x5a040001104 fec index: 0x2000ffca(65482) num paths:1

Path:0  fec index: 0x2000ffca(65482) DSP:0xc000001

MPLS encap key: 0xf1b0000040014822 MPLS encap id: 0x40014822 Remote: 0

SHLDI:

PI:0x8cb112a0 PD:0x8cb11370 rev:893703 dpa-rev:41503599 flag:0x0

FEC key: 0x59f40001104 fec index: 0x2000ffcb(65483) num paths: 1 bkup paths: 0

p-rev:72522

Path:0 fec index: 0x2000ffcb(65483) DSP:0xc000001 Dest fec index: 0x0(0)

TX-NHINFO:

PI: 0x8d11fad0 PD: 0x8d11fb50 rev:72522 dpa-rev:3303803 Encap hdl: 0x8cd16098

Encap id: 0x40010003 Remote: 0 L3 int: 1579 flags: 0x407

npu_mask: 0x1 DMAC: 5c:5a:c7:ff:78:84

Load distribution: 0 (refcount 2)

Hash  OK  Interface                 Address

0     Y   recursive                 23481/0

解決方法

このドキュメントで説明されているように、同じRD値を持つインラインRRでポップされない最上位ラベルの不適切なラベルアクションの解決策は、cef encap-sharing disableを設定することです。この特定のシナリオでは、この設定は必須です。

設定をコミットする前に、使用可能なリソースの使用状況を評価して、コマンドをコミットした後にリソースの状態を予測する必要があります。実際のリソース消費を確認および確認するには、次のコマンドを使用できます。

show controllers npu resources all location all

show controllers fia diagshell 0 "diag alloc all" location all

注：Cisco Bug ID CSCvw20873 - L3VPN LSPパス（ラベルスワップ）の最適化により、cef encap-sharing disableが設定された状態で消費および割り当てられたリソースの最適化が導入されます。