内容

はじめに

前提条件

要件

使用するコンポーネント

背景説明

設定

ネットワーク図

コンフィギュレーション

デバッグについて

確認

トラブルシュート

関連情報

はじめに

このドキュメントでは、2 つの BGP ピア間の TCP 接続に対して Message Digest5（MD5）認証を設定する方法を説明します。

前提条件

要件

このドキュメントに関する固有の要件はありません。

使用するコンポーネント

このドキュメントの内容は、特定のソフトウェアやハードウェアのバージョンに限定されるものではありません。

このドキュメントの情報は、Cisco IOS®バージョン12.4(15)T14が稼働する3600シリーズルータでのコマンド出力に基づくものです。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、クリアな（デフォルト）設定で作業を開始しています。本稼働中のネットワークでは、各コマンドによって起こる可能性がある影響を十分確認してください。

背景説明

2つのBGPピア間でMD5認証を設定できます。これは、ピア間のTCP接続で送信された各セグメントが検証されることを意味します。MD5認証は、両方のBGPピアで同じパスワードを使用して設定する必要があります。そうしないと、ピア間の接続を確立できません。MD5認証を設定すると、Cisco IOSソフトウェアによって、TCP接続で送信される各セグメントのMD5ダイジェストの生成とチェックが行われます。

設定

このセクションでは、このドキュメントで説明する機能を設定するための情報を提供します。

注：この項で使用されているコマンドの詳細を取得するには、Cisco CLI Analyzer（登録ユーザ専用）を使用してください。シスコの内部ツールおよび情報にアクセスできるのは、登録ユーザのみです。

ネットワーク図

このドキュメントでは、次のネットワーク セットアップを使用します。

コンフィギュレーション

このドキュメントでは、次のコンフィギュレーションを使用します。

ルータ 0 の設定

R0#

!

interface Loopback70

ip address 10.70.70.70 255.255.255.255

!

interface Serial1/0

ip address 10.10.10.1 255.255.255.0

serial restart-delay 0

!

router bgp 400

no synchronization

bgp log-neighbor-changes

neighbor 10.80.80.80 remote-as 400

!--- iBGP Configuration using Loopback Address

neighbor 10.80.80.80 password cisco

!--- Invoke MD5 authentication on a TCP connection to a BGP peer

neighbor 10.80.80.80 update-source Loopback70

no auto-summary

!

ip route 10.80.80.80 255.255.255.255 10.10.10.2

!--- This static route ensures that the remote peer address used for peering is reachable.

ルータ 1 の設定

R1#

!

interface Loopback80

ip address 10.80.80.80 255.255.255.255

!

interface Serial1/0

ip address 10.10.10.2 255.255.255.0

serial restart-delay 0

!

router bgp 400

no synchronization

bgp log-neighbor-changes

neighbor 10.70.70.70 remote-as 400

!--- iBGP Configuration using Loopback Address

neighbor 10.70.70.70 password cisco

!--- Invoke MD5 authentication on a TCP connection to a BGP peer

neighbor 10.70.70.70 update-source Loopback80

no auto-summary

!

ip route 10.70.70.70 255.255.255.255 10.10.10.1

!--- This static route ensures that the remote peer address used for peering is reachable.

デバッグについて

R0#clear ip bgp *

*Mar  1 01:02:17.523: %BGP-5-ADJCHANGE: neighbor 10.80.80.80 Down User reset

R0#debug ip bgp

BGP debugging is on for address family: IPv4 Unicast

*Mar  1 01:03:58.159: BGP: 10.80.80.80 open failed: Connection timed out;

remote host not responding, open active delayed 1782ms (2000ms max, 28%

jitter)

*Mar  1 01:03:58.415: %SYS-5-CONFIG_I: Configured from console by console

*Mar  1 01:03:59.943: BGP: 10.80.80.80 open active, local address 10.70.70.70

*Mar  1 01:04:00.039: %TCP-6-BADAUTH: No MD5 digest from 10.80.80.80(179) to

10.70.70.70(64444)

*Mar  1 01:04:00.807: %TCP-6-BADAUTH: No MD5 digest from 10.80.80.80(33358)

to 10.70.70.70(179)

*Mar  1 01:04:01.991: %TCP-6-BADAUTH: No MD5 digest from 10.80.80.80(179) to

10.70.70.70(64444)

*Mar  1 01:04:01.995: %TCP-6-BADAUTH: No MD5 digest from 10.80.80.80(179) to

10.70.70.70(64444)

*Mar  1 01:04:05.995: %TCP-6-BADAUTH: No MD5 digest from 10.80.80.80(179) to

10.70.70.70(64444)

*Mar  1 01:04:06.015: %TCP-6-BADAUTH: No MD5 digest from 10.80.80.80(179) to

10.70.70.70(64444)

*Mar  1 01:04:14.023: %TCP-6-BADAUTH: No MD5 digest from 10.80.80.80(179) to

70. 70.70.70(64444)

*Mar  1 01:04:14.023: %TCP-6-BADAUTH: No MD5 digest from 10.80.80.80(179) to

10.70.70.70(64444)

*Mar  1 01:04:29.947: BGP: 10.80.80.80 open failed: Connection timed out;

remote host not responding, open active delayed 3932ms (4000ms max, 28%

jitter)

*Mar  1 01:04:33.879: BGP: 10.80.80.80 open active, local address 10.70.70.70

*Mar  1 01:04:33.983: BGP: 10.80.80.80 went from Active to OpenSent

*Mar  1 01:04:33.983: BGP: 10.80.80.80 sending OPEN, version 4, my as: 400,

hold time 180 seconds

*Mar  1 01:04:33.987: BGP: 10.80.80.80 send message type 1, length (incl.

header ) 45

*Mar  1 01:04:34.091: BGP: 10.80.80.80 rcv message type 1, length (excl.

header) 26

*Mar  1 01:04:34.091: BGP: 10.80.80.80 rcv OPEN, version 4, holdtime 180 seconds

*Mar  1 01:04:34.091: BGP: 10.80.80.80 rcv OPEN w/ OPTION parameter len: 16

*Mar  1 01:04:34.095: BGP: 10.80.80.80 rcvd OPEN w/ optional parameter type 2

(Capability) len 6

*Mar  1 01:04:34.095: BGP: 10.80.80.80 OPEN has CAPABILITY code: 1, length 4

*Mar  1 01:04:34.095: BGP: 10.80.80.80 OPEN has MP_EXT CAP for afi/safi: 1/1

*Mar  1 01:04:34.095: BGP: 10.80.80.80 rcvd OPEN w/ optional parameter type 2

(Capability) len 2

*Mar  1 01:04:34.095: BGP: 10.80.80.80 OPEN has CAPABILITY code: 128, length 0

*Mar  1 01:04:34.099: BGP: 10.80.80.80 OPEN has ROUTE-REFRESH capability(old)

for all address-families

*Mar  1 01:04:34.099: BGP: 10.80.80.80 rcvd OPEN w/ optional parameter type 2

(Capability) len 2

*Mar  1 01:04:34.099: BGP: 10.80.80.80 OPEN has CAPABILITY code: 2, length 0

*Mar  1 01:04:34.099: BGP: 10.80.80.80 OPEN has ROUTE-REFRESH capability(new)

for all address-families

BGP: 10.80.80.80 rcvd OPEN w/ remote AS 400

*Mar  1 01:04:34.103: BGP: 10.80.80.80 went from OpenSent to OpenConfirm

*Mar  1 01:04:34.103: BGP: 10.80.80.80 went from OpenConfirm to Established

*Mar  1 01:04:34.103: %BGP-5-ADJCHANGE: neighbor 10.80.80.80 Up

ネイバーに対してパスワードを設定しているルータと設定していないルータとの間で BGP セッションを確立しようとすると、次のようなメッセージがコンソールに表示されます。

%TCP-6-BADAUTH: No MD5 digest from [peer's IP address]:11003 to [local

router's IP address]:179

同様に、2 つのルータにそれぞれ異なるパスワードが設定されていると、次のようなメッセージが表示されます。

%TCP-6-BADAUTH: Invalid MD5 digest from [peer's IP address]:11004 to [local

router's IP address]:179

確認

このセクションでは、設定が正常に動作していることを確認します。

- show ip bgp neighbors | include BGPの略。

R0#show ip bgp neighbors| include BGP

BGP neighbor is 10.80.80.80, remote AS 400, internal link

BGP version 4, remote router ID 10.80.80.80

BGP state = Established, up for 00:08:26

BGP table version 1, neighbor version 1/0

- show ip bgp summary（隠しコマンド）

R0#show ip bgp summary

BGP router identifier 10.70.70.70, local AS number 400

BGP table version is 1, main routing table version 1

Neighbor        V    AS MsgRcvd MsgSent   TblVer  InQ OutQ Up/Down  State/PfxRcd

10.80.80.80     4   400      75      75        1    0    0 00:08:52        0

- show ip bgp summary（隠しコマンド）

R1#show ip bgp summary

BGP router identifier 10.80.80.80, local AS number 400

BGP table version is 1, main routing table version 1

Neighbor        V    AS MsgRcvd MsgSent   TblVer  InQ OutQ Up/Down  State/PfxRcd

10.70.70.70     4   400      76      76        1    0    0 00:09:27        0

トラブルシュート

現在、この設定に関するトラブルシューティング情報はありません。

関連情報

- Cisco IOS IPルーティング：BGPコマンドリファレンス

- IP ルーティングに関するサポート ページ

- シスコのテクニカルサポートとダウンロード