内容

概要

前提条件

要件

使用するコンポーネント

設定

ネットワーク図

設定

確認

トラブルシュート

概要

このドキュメントでは、NX-OSオペレーティングシステムを実行するCisco Nexusスイッチファミリのボーダーゲートウェイプロトコル(BGP)でのdampen-igp-metricコマンドの目的について説明します。

前提条件

要件

次の項目に関する知識があることが推奨されます。

- Nexus NX-OS ソフトウェア

- BGPルーティングプロトコル。

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づいています。

- Cisco N9K-C9508

- NXOSバージョン7.0(3)I7(6)

このドキュメントの内容は、特定のソフトウェアやハードウェアのバージョンに限定されるものではありません。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。本稼働中のネットワークでは、各コマンドによって起こる可能性がある影響を十分確認してください。

設定

デフォルトでは、NexusファミリスイッチのBGP設定セクションで、コマンドdampen-igp-metricをデフォルト値の600秒に設定します。

これは、再配布されたルートに関して報告されたInterior Gateway Protocols(IGP)メトリック変更をBGPがどのように処理するかに影響します。BGPは、これらの変更を10分の遅延でバッチ方式で処理するため、これらの変更を抑制します。

このコマンドを使用すると、遅延を調整したり、これらの変更に迅速に対応するために遅延を完全に削除したりできます。

タイマーの期限が切れると、BGP MED(Multi Exit Discriminator)アトリビュートが再配布されたIGPルートの新しいコストで更新されます。

Nexus - Nexus NX-OS

Nexus# configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

Nexus(config)# router bgp 65535

Nexus(config-router)# address-family ipv4 unicast

Nexus(config-router-af)# dampen-igp-metric ?

<20-3600>  Time interval in seconds

*Default value is 600

Nexus(config-router-af)# no dampen-igp-metric

このコマンドは、BGP設定セクションでaddress-family ipv6 unicastおよびVRFインスタンスごとに同様に設定できます。

注：dampen-igp-metricコマンドは、BGPを使用してIGPルートが他のVRFにリークする場合に、ネクストホップ属性などの他のBGP属性を更新するための遅延時間も制御します。

ネットワーク図

このシナリオでは、NexusスイッチがOpen Shortest Path First(OSPF)ルートをルーティングテーブルからBGPテーブルに再配布するように設定されています。

設定

R1:Cisco IOS

configure terminal

!

hostname R1

!

router ospf 1

router-id 10.255.255.1

!

interface Loopback0

ip address 10.255.255.1 255.255.255.255

ip ospf 1 area 0

!

interface GigabitEthernet0/0

ip address 10.1.2.1 255.255.255.0

ip ospf network point-to-point

ip ospf 1 area 0

no shutdown

!

end

Nexus - NX-OS

configure terminal

!

hostname Nexus

!

feature ospf

feature bgp

!

route-map ALL

!

router ospf 1

router-id 10.255.255.2

!

router bgp 65535

router-id 10.255.255.2

address-family ipv4 unicast

redistribute ospf 1 route-map ALL

neighbor 10.2.3.3

remote-as 65535

address-family ipv4 unicast

!

interface Ethernet1/1

ip address 10.1.2.2/24

ip ospf network point-to-point

ip router ospf 1 area 0.0.0.0

no shutdown

!

interface Ethernet1/2

ip address 10.2.3.2/24

no shutdown

R3:Cisco IOS

configure terminal

!

hostname R3

!

router bgp 65535

bgp log-neighbor-changes

neighbor 10.2.3.2 remote-as 65535

!

interface GigabitEthernet0/0

ip address 10.2.3.3 255.255.255.0

no shutdown

!

end

確認

show bgp internal afコマンドを実行します。[IGP Metric Dampening Interval]行が目的の値を示していることを確認します。

デフォルト値は600（秒）です。

Nexus - NX-OS

Nexus# show bgp internal af

. . .

BGP Address Family Information for VRF: default

Import Pending               : No

Import Pending               : never

Import Pending Reset         : never

Table Context Address : 0xcfa08bf4

Address family: IPv4 Unicast

. . .

IGP Metric Dampening Interval  : 600

ルーティングテーブルのOSPFルートがコストを更新する場合、この新しい値をBGP MEDパスアトリビュートに反映するための遅延が存在します。

Nexus - NX-OS

Nexus# show ip route 10.255.255.1

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

10.255.255.1/32, ubest/mbest: 1/0

*via 10.1.2.1, Eth1/1, [110/41], 01:58:41, ospf-1, intra

Nexus#

* There is an update in the Cost of the OSPF route 10.255.255.1/32

Nexus# show ip route 10.255.255.1

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

10.255.255.1/32, ubest/mbest: 1/0

*via 10.1.2.1, Eth1/1, [110/190], 00:00:02, ospf-1, intra

Nexus#

Nexus# show bgp ipv4 unicast

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 4, Local Router ID is 10.255.255.2

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup

Network            Next Hop            Metric     LocPrf     Weight Path

*>r10.255.255.1/32    0.0.0.0                 41        100      32768 ?

Nexus#

* After 600 seconds.

Nexus# show bgp ipv4 unicast

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 5, Local Router ID is 10.255.255.2

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup

Network            Next Hop            Metric     LocPrf     Weight Path

*>r10.255.255.1/32    0.0.0.0                190        100      32768 ?

BGPアドレスファミリ設定セクションでno dampen-igp-metricコマンドを実行し、ルーティングテーブルのOSPFコストの変更時にBGPテーブルのMED属性を即座に更新します。

Nexus - NX-OS

Nexus# configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

Nexus(config)# router bgp 65535

Nexus(config-router)#   address-family ipv4 unicast

Nexus(config-router-af)# no dampen-igp-metric

* There is an update in the Cost of the OSPF route 10.255.255.1/32

Nexus# show ip route 10.255.255.1

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

10.255.255.1/32, ubest/mbest: 1/0

*via 10.1.2.1, Eth1/1, [110/190], 00:00:02, ospf-1, intra

Nexus# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 7, Local Router ID is 10.255.255.2

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup

Network            Next Hop            Metric     LocPrf     Weight Path

*>r10.255.255.1/32    0.0.0.0                190        100      32768 ?

トラブルシュート

NX-OSでdampen-igp-metricコマンドの機能を確認するには、次のデバッグをオンにします。

- debug-filter bgp prefix <PREFIX/MASK>

- debug logfile <FILE_NAME>

- debug bgp dampening brib

Nexus - NX-OS

Nexus# debug-filter bgp prefix 10.255.255.1/32

Nexus# debug logfile bgpdebug.log

Nexus# debug bgp dampening brib

Nexus#

Nexus# show debug logfile bgpdebug.log

2019 Jul 23 21:13:27.676328 bgp: [25368] (default) BRIB: [IPv4 Unicast] Setting the update pending flag for 10.255.255.1/32

Nexus# show debug logfile bgpdebug.log

2019 Jul 23 21:13:27.676328 bgp: [25368] (default) BRIB: [IPv4 Unicast] Setting the update pending flag for 10.255.255.1/32

2019 Jul 23 21:20:47.641987 bgp: [25368] (default) BRIB: [IPv4 Unicast] Clearing the update pending flag for 10.255.255.1/32

2019 Jul 23 21:20:47.642013 bgp: [25368] (default) BRIB: [IPv4 Unicast] Originating prefix 10.255.255.1/32, route type redist

2019 Jul 23 21:20:47.642075 bgp: [25368] (default) BRIB: [IPv4 Unicast] Installing prefix 10.255.255.1/32 (redist) via 0.0.0.0 (0x0/0x0) into BRIB with extcomm Extcommunity: OSPF RT:0.0.0.0:0:0

2019 Jul 23 21:20:47.642395 bgp: [25368] (default) BRIB: [IPv4 Unicast] Path to 10.255.255.1/32 via 0.0.0.0 already exists, dflags=0x80002

2019 Jul 23 21:20:47.642415 bgp: [25368] (default) BRIB: [IPv4 Unicast] (10.255.255.1/32 (local)): bgp_brib_add: handling nexthop, path->flags2: 0x1

2019 Jul 23 21:20:47.642447 bgp: [25368] (default) BRIB: [IPv4 Unicast] (10.255.255.1/32 (local)): returning from bgp_brib_add, reeval=0new_path: 0, change: 1, undelete: 0, history: 0, force: 0, (pflags=0x2408) rnh_flag_change 0

2019 Jul 23 21:20:47.642475 bgp: [25368] (default) BRIB: [IPv4 Unicast] Cleanup for dest 10.255.255.1/32 exits since it's on newlist

Nexus#

完了したら、次のコマンドを使用してデバッグを無効にします。

- undebug all

- no debug-filter all

- clear debug logfile <FILE_NAME>