内容

概要

前提条件

要件

使用するコンポーネント

背景説明

設定

ネットワーク図

西 DC

東 DC

MS/MR

サイト 3

動作の順序

確認

トラブルシュート

概要

このドキュメントでは、IPアドレスを変更することなく、Locator Identity Separation Protocol(LISP)対応ネットワークのデータセンター(DC)を通過するIPデバイスの設定と検証について説明します。

前提条件

要件

LISP に関する基本的な知識があることが推奨されます。

使用するコンポーネント

このドキュメントの内容は、特定のソフトウェアやハードウェアのバージョンに限定されるものではありません。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

背景説明

LISP環境では、このデバイスはダイナミックエンドポイント識別子(EID)と呼ばれます。LISPマルチホップモビリティは、サブネット拡張モードをサポートしています。これにより、異なるDCが同じサブネットを持つことができ、その結果、仮想マシン(VM)は別のDCに移行するときに割り当てられたIPアドレスを保持できます。

ファーストホップルータ(FHR)は、ダイナミックEIDの存在を検出し、EID通知メッセージを介してxTR側ゲートウェイに通知します。xTRは、サーバをマッピングし、LISPドメインを通過するトラフィックに対してLISPカプセル化およびカプセル化解除機能を実行するために、ダイナミックEIDを登録します。

異なるDCに導入されたxTRは、Overlay Transport Virtualization(OTV)などのデータセンターインターコネクト(DCI)テクノロジーを介して接続する必要があります。 Nexus では、OTV マルチキャスト モードがサポートされます。

設定

ネットワーク図

このイメージは、このドキュメントの残りの部分のサンプルトポロジとして使用されます。

- xTR:LISPルータは、トラフィックフローの方向に応じてITRまたはETRにすることができます。トラフィックがLISPルータから出ると、そのフローのITRになり、受信側のLISPルータがそのルータのETRになります。

- ITR:入力トンネルルータ

- ETR:出力トンネルルータ

- Map Resolver (MR): Map-Resolverは、EIDからRLOCへのマッピングを解決するときにLISPサイトITRがLISPマップ要求クエリーを送信するLISPインフラストラクチャデバイスです。

- マップサーバ(MS):マップサーバは、LISPサイトETRがEIDプレフィクスで登録されるLISPインフラストラクチャデバイスです。マップサーバは、登録されたEIDプレフィクスの集約をLISPマッピングシステムにアドバタイズします。すべてのLISPサイトは、EIDからRLOCへのマッピングを解決するためにLISPマッピングシステムを使用します。

- EIDアドレス：EIDアドレスは、エンドポイントを識別するIPアドレスとプレフィックスで構成されます。LISP サイト間の EID 到達可能性は EID から RLOC へのマッピングを解決することにより実現されます。

- ルート ロケータ（RLOC）アドレス：RLOCアドレスは、IPネットワーク内のさまざまなルータを識別するIPアドレスとプレフィックスで構成されます。RLOC空間内での到達可能性は、従来のルーティング方式によって実現されます。

- SMR：要請マップ要求。リモートxTRにキャッシュされたマッピングを更新するように指示するために使用されるコントロールプレーンメッセージ。

- ASM：サブネット横断モード。レイヤ 2 拡張が確立されていない場合に、LISP サイト間の EID モビリティを実現します。

- マップ通知：検出に関して同じLISPサイト内の他のxTRを更新するために、EIDを検出したxTRによって使用されるLISPメッセージ。また、マップサーバは、マップレジスタが受信され、処理されたことを確認するために使用します。

- マップ登録：マップサーバにEIDを登録するためにxTRによって使用されるLISPメッセージ。

この記事で説明した例では、トラフィックはVM(172.16.54.200)からSite-3(172.16.20.1)に継続的に流れます。

西 DC

ファーストホップルータ(FHR-1):

!

feature lisp

!

ip lisp etr

!

lisp dynamic-eid VM

database-mapping 172.16.54.0/24 10.1.1.1 priority 10 weight 50

database-mapping 172.16.54.0/24 10.2.2.2 priority 10 weight 50

eid-notify 10.10.10.10 key 3 9125d59c18a9b015

map-notify-group 225.1.1.1

!

interface loopback0

ip address 10.1.1.1/32

ip router ospf 1 area 0.0.0.0

!

interface Vlan2

no shutdown

lisp mobility VM

lisp extended-subnet-mode

ip address 172.16.54.3/24

ip ospf passive-interface

ip router ospf 1 area 0.0.0.0

ip pim sparse-mode

no ip arp gratuitous request

hsrp 1

preempt

priority 120

ip 172.16.54.1

!

FHR-2:

!

feature lisp

!

ip lisp etr

!

lisp dynamic-eid VM

database-mapping 172.16.54.0/24 10.1.1.1 priority 10 weight 50

database-mapping 172.16.54.0/24 10.2.2.2 priority 10 weight 50

eid-notify 10.10.10.10 key 3 9125d59c18a9b015

map-notify-group 225.1.1.1

!

interface Vlan2

no shutdown

lisp mobility VM

lisp extended-subnet-mode

ip address 172.16.54.2/24

ip ospf passive-interface

ip pim sparse-mode

no ip arp gratuitous request

hsrp 1

preempt

priority 90

ip 172.16.54.1

!

interface loopback0

ip address 10.2.2.2/32

ip router ospf 1 area 0.0.0.0

xTR:

!

feature lisp

!

ip lisp itr-etr

ip lisp database-mapping 172.16.54.0/24 10.10.10.10 priority 10 weight 50

ip lisp itr map-resolver 192.168.1.1

ip lisp etr map-server 192.168.1.1 key 3 9125d59c18a9b015

!

lisp dynamic-eid VM

database-mapping 172.16.54.0/24 10.10.10.10 priority 10 weight 50

eid-notify authentication-key 3 9125d59c18a9b015

!

interface loopback0

ip address 10.10.10.10/32

ip router ospf 1 area 0.0.0.0

!

東 DC

FHR-3:

!

feature lisp

!

ip lisp etr

!

lisp dynamic-eid VM

database-mapping 172.16.54.0/24 10.3.3.3 priority 10 weight 50

database-mapping 172.16.54.0/24 10.4.4.4 priority 10 weight 50

eid-notify 10.11.11.11 key 3 9125d59c18a9b015

map-notify-group 225.1.1.1

!

interface Vlan2

no shutdown

lisp mobility VM

lisp extended-subnet-mode

ip address 172.16.54.4/24

ip ospf passive-interface

ip router ospf 1 area 0.0.0.0

ip pim sparse-mode

no ip arp gratuitous request

hsrp 1

preempt

priority 110

ip 172.16.54.1

!

interface loopback0

ip address 10.3.3.3/32

ip router ospf 1 area 0.0.0.0

FHR-4:

!

feature lisp

!

ip lisp etr

!

lisp dynamic-eid VM

database-mapping 172.16.54.0/24 10.3.3.3 priority 10 weight 50

database-mapping 172.16.54.0/24 10.4.4.4 priority 10 weight 50

eid-notify 10.11.11.11 key 3 9125d59c18a9b015

map-notify-group 225.1.1.1

!

interface Vlan2

no shutdown

lisp mobility VM

lisp extended-subnet-mode

ip pim sparse-mode

ip ospf passive-interface

ip address 172.16.54.5/24

hsrp 1

preempt

priority 90

ip 172.16.54.1

!

interface loopback0

ip address 10.4.4.4/32

ip router ospf 1 area 0.0.0.0

xTR:

!

interface loopback0

ip address 10.11.11.11/32

ip router ospf 1 area 0.0.0.0

!

feature lisp

!

ip lisp itr-etr

ip lisp database-mapping 172.16.54.0/24 10.11.11.11 priority 10 weight 50

ip lisp itr map-resolver 192.168.1.1

ip lisp etr map-server 192.168.1.1 key 3 9125d59c18a9b015

!

lisp dynamic-eid VM

database-mapping 172.16.54.0/24 10.11.11.11 priority 9 weight 50

eid-notify authentication-key 3 9125d59c18a9b015

!

MS/MR

!

router lisp

locator-table default

site 1

authentication-key cisco

eid-prefix 172.16.54.0/24 accept-more-specifics

exit

!

site 2

authentication-key cisco

eid-prefix 172.16.20.0/24 accept-more-specifics

exit

!

ipv4 map-server

ipv4 map-resolver

サイト 3

!

router lisp

database-mapping 172.16.20.0/24 10.20.20.20 priority 10 weight 50

ipv4 itr map-resolver 192.168.1.1

ipv4 itr

ipv4 etr map-server 192.168.1.1 key cisco

ipv4 etr

exit

!

interface Loopback1

ip address 10.20.20.20 255.255.255.255

!

interface Loopback2

ip address 172.16.20.1 255.255.255.0

!

動作の順序

ステップ1:VMが起動されます。

VMの電源がオンになり、リモートサイト(Site-3)へのトラフィックの送信が開始されました。FHR-1はこのストリームを受信し、ダイナミックEIDを作成します。

N7K-358-West-FHR1# show lisp dynamic-eid summary

LISP Dynamic EID Summary for VRF "default"

* = Dyn-EID learned by site-based Map-Notify

! = Dyn-EID learned by routing protocol

^ = Dyn-EID learned by EID-Notify

Dyn-EID Name   Dynamic-EID      Interface     Uptime    Last      Pending

Packet    Ping Count

VM             172.16.54.200    Vlan2         06:50:21  00:12:12  0

N7K-358-West-FHR1# show lisp dynamic-eid detail

LISP Dynamic EID Information for VRF "default"

Dynamic-EID name: VM

Database-mapping [0] EID-prefix: 172.16.54.0/24, LSBs: 0x00000003

Locator: 10.1.1.1, priority: 10, weight: 50

Uptime: 06:51:34, state: up, local

Locator: 10.2.2.2, priority: 10, weight: 50

Uptime: 06:50:10, state: up

Registering more-specific dynamic-EIDs

Registering routes: disabled

Map-Server(s): none configured, use global Map-Server

Site-based multicast Map-Notify group: 225.1.1.1

Extended Subnet Mode configured on 1 interfaces

Number of roaming dynamic-EIDs discovered: 3

Last dynamic-EID discovered: 172.16.54.1, 00:00:04 ago

Roaming dynamic-EIDs:

172.16.54.200, Vlan2, uptime: 06:50:31, last activity: 00:12:22

Discovered by: packet reception

ステップ2:FHRはLISPルートをインストールします。

ステップ1に示すように、FHRはVMからパケットを受信するとダイナミックEIDエントリを作成します。次に、ルーティング情報ベース(RIB)にa/32ルートをインストールします。

N7K-358-FHR1-West-DC# show ip route 172.16.54.200

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

172.16.54.200/32, ubest/mbest: 1/0, attached

*via 172.16.54.200, Vlan2, [240/0], 06:58:08, lisp, dyn-eid

via 172.16.54.200, Vlan2, [250/0], 06:58:45, am

ステップ3:FHRは、このダイナミックEIDについて他のすべてのFHRに通知します。

このFHRは、ローカルサイトとリモートサイトのすべてのFHRを含む、他のすべてのFHRにマップ通知メッセージを送信します。この例では、FHR-1は172.16.54.200に関するMap-NotifyをローカルDCのFHR-2および東DCのFHR-3およびFHR-4に送信します。

ただし、ローカルサイトFHRだけが、次に示すように、そのEIDのルートをRIBにインストールできます。

N7K-358-FHR2-West-DC# show lisp dynamic-eid detail

LISP Dynamic EID Information for VRF "default"

Dynamic-EID name: VM

Database-mapping [0] EID-prefix: 172.16.54.0/24, LSBs: 0x00000003

Locator: 10.1.1.1, priority: 10, weight: 50

Uptime: 00:01:04, state: up

Locator: 10.2.2.2, priority: 10, weight: 50

Uptime: 00:01:53, state: up, local

Registering more-specific dynamic-EIDs

Registering routes: disabled

Map-Server(s): none configured, use global Map-Server

Site-based multicast Map-Notify group: 225.1.1.1

Extended Subnet Mode configured on 1 interfaces

Number of roaming dynamic-EIDs discovered: 1

Last dynamic-EID discovered: 172.16.54.200, 00:01:04 ago

Roaming dynamic-EIDs:

172.16.54.200, Vlan2, uptime: 00:01:04, last activity: 00:00:42

Discovered by: site-based Map-Notify

Secure-handoff pending for sources: none

N7K-358-FHR2-West-DC#sh ip route 172.16.54.200

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

172.16.54.200/32, ubest/mbest: 1/0, attached

*via 172.16.54.200, Vlan2, [240/0], 00:00:08, lisp, dyn-eid

via 172.16.54.200, Vlan2, [250/0], 00:01:53, am

ステップ4:FHRはこのEIDをローカルxTRに更新します。

FHRの両方のサイトがEIDを認識すると、ローカルサイトのxTRに対して、EID-Notifyメッセージを使用するこのEIDを通知します。

East DC xTRルータもこのプレフィックスに対してnull 0ルートをインストールしますが、West DC xTRはこのプレフィックスをRIBに追加します。

N7K-FA8-East_xTR#show ip route 172.16.54.200

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

172.16.54.200/32, ubest/mbest: 1/0, attached

*via 172.16.54.200, Null0, [241/0], 00:00:32, lisp, dyn-eid

N7K-358-West_xTR#show lisp dynamic-eid detail

LISP Dynamic EID Information for VRF "default"

Dynamic-EID name: VM

Database-mapping [0] EID-prefix: 172.16.54.0/24, LSBs: 0x00000001

Locator: 10.10.10.10, priority: 10, weight: 50

Uptime: 00:02:37, state: up, local

Registering more-specific dynamic-EIDs

Registering routes: disabled

Map-Server(s): none configured, use global Map-Server

Site-based multicast Map-Notify group: none configured

Number of roaming dynamic-EIDs discovered: 1

Last dynamic-EID discovered: 172.16.54.1, 00:00:06 ago

Roaming dynamic-EIDs:

172.16.54.200, (null), uptime: 00:00:28, last activity: 00:00:06

Discovered by: EID-Notify

EID-Notify Locators:

10.1.1.1

10.2.2.2

N7K-358-West_xTR#sh ip route 172.16.54.200

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

172.16.54.0/24, ubest/mbest: 1/0

via 10.10.13.3, Eth3/2, [110/44], 00:01:00, ospf-1, intra

ローカルxTRはEIDをMR/MSに登録します。

East DC xTRもMR/MSにMap-Registerメッセージを送信し、この新しく検出されたEIDをMR/MSに登録します。これはサイト 3 ルータについてもあてはまります。

MS_MR#show lisp site 172.16.54.200/32

LISP Site Registration Information

Site name: 1

Allowed configured locators: any

Requested EID-prefix:

EID-prefix: 172.16.54.200/32

First registered:     07:11:28

Routing table tag:    0

Origin:               Dynamic, more specific of 172.16.54.0/24

Merge active:         No

Proxy reply:          No

TTL:                  00:03:00

State:                complete

Registration errors:

Authentication failures:   0

Allowed locators mismatch: 0

ETR 10.10.90.1, last registered 00:00:07, no proxy-reply, map-notify

TTL 00:03:00, no merge, hash-function sha1, nonce 0x00000000-0x00000000

state complete, no security-capability

xTR-ID N/A

site-ID N/A

Locator      Local  State      Pri/Wgt  Scope

10.10.10.10  yes    up          10/50   IPv4 none

MS_MR#sh lisp site 172.16.20.0/24

LISP Site Registration Information

Site name: 2

Allowed configured locators: any

Requested EID-prefix:

EID-prefix: 172.16.20.0/24

First registered: 06:30:48

Routing table tag: 0

Origin: Configuration, accepting more specifics

Merge active: No

Proxy reply: No

TTL: 1d00h

State: complete

Registration errors:

Authentication failures: 0

Allowed locators mismatch: 0

ETR 10.10.67.7, last registered 00:00:23, no proxy-reply, map-notify

TTL 1d00h, no merge, hash-function sha1, nonce 0xEE339164-0xC3199AF1

state complete, no security-capability

xTR-ID 0x7C6C7CF6-0x2AE64A0C-0xDCBC62DA-0x79762795

site-ID unspecified

Locator Local State Pri/Wgt Scope

10.20.20.20 yes up 10/50 IPv4 none

ステップ5：サイト1とサイト3の両方のxTRでトラフィックフローを確認します。

N7K-358-West_xTR# show ip lisp map-cache

LISP IP Mapping Cache for VRF "default" (iid 0), 3 entries

* = Locator data counters are cumulative across all EID-prefixes

0.0.0.0/1, uptime: 00:13:28, expires: 00:01:31, via map-reply

Negative cache entry, action: forward-native

128.0.0.0/3, uptime: 00:13:28, expires: 00:01:31, via map-reply

Negative cache entry, action: forward-native

172.16.20.0/24, uptime: 00:00:26, expires: 23:59:33, via map-reply, auth

Locator      Uptime    State       Priority/  Data      Control       MTU

Weight     in/out    in/out

10.20.20.20  00:00:26  up          10/50      0/0*      0/0          1500

サイト3 LISPマップキャッシュエントリ：

Site-3#show ip lisp map-cache

LISP IPv4 Mapping Cache for EID-table default (IID 0), 2 entries

0.0.0.0/0, uptime: 01:53:04, expires: never, via static send map-request

Negative cache entry, action: send-map-request

172.16.54.200/32, uptime: 01:50:02, expires: 22:09:57, via map-reply, complete

Locator      Uptime    State      Pri/Wgt

10.10.10.10  01:50:02  up          10/50

ステップ6:VMが西DCから東DCに移動します。

これらの手順は、DC間でVMを移行する前に実行されます。これで、VMはIPアドレスを変更することなく、西DCから東DCに移動します。VMが西DCから東DCに移動するとすぐに、東DCのFHR-3はVMからパケットを受信し、そのIPアドレスをダイナミックEIDテーブルに追加します。次に、West DCを含むすべてのFHRにmap-notify要求を送信し、West DCがmap-notify要求を受信すると、West DCにVMが存在したときに作成されたdynamic-EIDテーブルからVMエントリを削除します。

East DCのFHR-3のDynamic-EIDのステータスを次に示します。

N7K-FA8-East_FHR3# sh lisp dynamic-eid detail

LISP Dynamic EID Information for VRF "default"

Dynamic-EID name: VM

Database-mapping [0] EID-prefix: 172.16.54.0/24, LSBs: 0x00000003

Locator: 10.3.3.3, priority: 10, weight: 50

Uptime: 02:04:48, state: up, local

Locator: 10.4.4.4, priority: 10, weight: 50

Uptime: 02:03:27, state: up

Registering more-specific dynamic-EIDs

Registering routes: disabled

Map-Server(s): none configured, use global Map-Server

Site-based multicast Map-Notify group: 225.1.1.1

Extended Subnet Mode configured on 1 interfaces

Number of roaming dynamic-EIDs discovered: 1

Last dynamic-EID discovered: 172.16.54.1, 00:00:14 ago

Roaming dynamic-EIDs:

172.16.54.200, Vlan2, uptime: 00:04:28, last activity: 00:03:11

Discovered by: packet reception

N7K-FA8-East_FHR3# sh ip route 172.16.54.200

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

172.16.54.200/32, ubest/mbest: 1/0, attached

*via 172.16.54.200, Vlan2, [240/0], 00:05:00, lisp, dyn-eid

via 172.16.54.200, Vlan2, [250/0], 00:05:10, am

したがって、West FHRにはVMのダイナミックEID(172.16.54.200:

N7K-358-West-FHR1(config)# sh lisp dynamic-eid summary

LISP Dynamic EID Summary for VRF "default"

* = Dyn-EID learned by site-based Map-Notify

! = Dyn-EID learned by routing protocol

^ = Dyn-EID learned by EID-Notify

Dyn-EID Name   Dynamic-EID      Interface     Uptime    Last      Pending

Packet    Ping Count

VM             172.16.54.2      Vlan2         00:33:30  00:00:07  0

ステップ7：西DCのxTRはnull 0エントリをルーティングテーブルに追加します。

N7K-358-West_xTR# sh ip route 172.16.54.200

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

172.16.54.200/32, ubest/mbest: 1/0, attached

*via 172.16.54.200, Null0, [241/0], 00:00:05, lisp, dyn-eid

ステップ8:East xTRはEID通知を介してFHR-3によって更新され、East xTRは移行されたVMのプレフィックスを持つマップレジスタをMSに送信します。

N7K-FA8-East_xTR(config)# show lisp dynamic-eid Detail

LISP Dynamic EID Information for VRF "default"

Dynamic-EID name: VM

Database-mapping [0] EID-prefix: 172.16.54.0/24, LSBs: 0x00000001

Locator: 10.11.11.11, priority: 9, weight: 50

Uptime: 02:19:51, state: up, local

Registering more-specific dynamic-EIDs

Registering routes: disabled

Map-Server(s): none configured, use global Map-Server

Site-based multicast Map-Notify group: none configured

Number of roaming dynamic-EIDs discovered: 1

Last dynamic-EID discovered: 172.16.54.1, 00:00:58 ago

Roaming dynamic-EIDs:

172.16.54.200, (null), uptime: 00:17:50, last activity: 00:00:25

Discovered by: EID-Notify

EID-Notify Locators:

10.3.3.3

10.4.4.4

MS_MR#sh lisp site 172.16.54.200

LISP Site Registration Information

Site name: 1

Allowed configured locators: any

Requested EID-prefix:

EID-prefix: 172.16.54.200/32

First registered:     02:02:24

Routing table tag:    0

Origin:               Dynamic, more specific of 172.16.54.0/24

Merge active:         No

Proxy reply:          No

TTL:                  00:03:00

State:                complete

Registration errors:

Authentication failures:   0

Allowed locators mismatch: 0

ETR 10.11.17.1, last registered 00:00:32, no proxy-reply, map-notify

TTL 00:03:00, no merge, hash-function sha1, nonce 0x00000000-0x00000000

state complete, no security-capability

xTR-ID N/A

site-ID N/A

Locator      Local  State      Pri/Wgt  Scope

10.11.11.11  yes    up           9/50   IPv4 none

ステップ9：両方のxTRがマップキャッシュエントリを更新できます。

VMの移行前、Site-3では、VMのIPのRLOCはWest xTR(10.10.10.10)でした。 West xTRがSite-3からトラフィックを受信するとすぐに、VMのEast DCへの移行後、次のようにEast xTR(10.11.11.11)の新しいRLOCアドレスを更新するために、Site-3ルータにSMRメッセージを送信します。

Site-3#sh ip lisp map-cache

LISP IPv4 Mapping Cache for EID-table default (IID 0), 2 entries

0.0.0.0/0, uptime: 02:03:23, expires: never, via static send map-request

Negative cache entry, action: send-map-request

172.16.54.200/32, uptime: 02:00:22, expires: 23:57:56, via map-reply, complete

Locator      Uptime    State      Pri/Wgt

10.11.11.11  00:02:03  up           9/50

N7K-FA8-East_xTR(config)# show ip lisp map-cache

LISP IP Mapping Cache for VRF "default" (iid 0), 1 entries

* = Locator data counters are cumulative across all EID-prefixes

172.16.20.0/24, uptime: 00:25:24, expires: 23:34:35, via map-reply, auth

Locator      Uptime    State       Priority/  Data      Control       MTU

Weight     in/out    in/out

10.20.20.20  00:25:24  up          10/50      0/0*      0/0          1500

確認

ここでは、設定が正常に機能しているかどうかを確認します。

検証については、手順5.の「Order of Operation」セクションで説明します。

トラブルシュート

ここでは、設定のトラブルシューティングに使用できる情報を示します。

これらのデバッグは、制御環境のLISPのトラブルシューティングに使用できます。

debug ip lisp mapping control

debug lisp mapping register

debug lisp smr

debug lisp ha

debug lisp loc-reach-algorithm receive-probe

debug lisp loc-reach-algorithm send-probe

debug ip mroute map_notify_addr 32 detail

debug ip lisp mapping data