内容

概要

用途

ASR9K – クラシック

ASR9K:eXR

NCSxxxxプラットフォームおよびホワイトボックス

CRS

Cisco 8xxx

概要

このドキュメントでは、TACケースの問題の発生前後にCisco IOS®-XRルータから収集する一般的なコマンドセットについて説明します。

用途

コマンドリストは、変更を加えることなく、リストに記載されているとおりにルータCLIに貼り付けることができます。対応する機能が実装されていない場合、特定のコマンドがエラーになることがあります。これは予想される結果であり、問題は発生しません。

このリスト全体をルータにコピー/貼り付けることができます。ssh/telnetクライアントのロギングを有効にしてキャプチャを行うだけです。

ASR9K – クラシック

term length 0

show platform

admin show platform

show install active summary

show version

show hw-module fpd location all

show diag

show logging

show install log

show running

admin show running

show configuration failed

show configuration commit changes all

show configuration history

show configuration failed startup

show history

show cli history detail

admin show environment

admin show led

show pfm location all

show processes

show processes cpu

show processes blocked location all

show watchdog memory-state

show context location all

show controllers np counters all

show drops

show redundancy

show redundancy summary

show snmp mib access

show snmp interface

show interfaces description

show ospf neighbor

show bgp sessions

show bgp summary

show rib update-groups

show tcp brief

show l2vpn xconnect

show mpls traffic-eng tunnels

show bfd session

show virtual-service list

ASR9K:eXR

term length 0

show platform

show install active summary

show version

show hw-module fpd

show diag

show logging

show install log

show running

admin show running

show configuration failed

show configuration commit changes all

show configuration history

show configuration failed startup

show history

show cli history detail

admin show environment

admin show led

show pfm location all

show processes

show processes cpu

show processes blocked location all

show watchdog memory-state

show context location all

show controllers np counters all

show drops

show redundancy

show redundancy summary

show snmp mib access

show snmp interface

show interfaces description

show ospf neighbor

show bgp sessions

show bgp summary

show rib update-groups

show tcp brief

show l2vpn xconnect

show mpls traffic-eng tunnels

show bfd session

NCSxxxxプラットフォームおよびホワイトボックス

これは、NCS6K、NCS5K、NCS55xx、NCS540、NCS560などのすべてのNCSプラットフォームに適用されます。

term length 0

show platform

admin show platform

show inventory

show install active summary

show version

show hw-module fpd

show diag

show logging

show install log

show running

admin show running

show configuration failed

show configuration commit changes all

show configuration history

show configuration failed startup

show history

show cli history detail

show environment

admin show environment

show led

admin show led

show alarms brief system active

show asic-errors all detail location 0/RP0/CPU0

show asic-errors all detail location 0/0/CPU0

show processes

show processes cpu

show processes blocked location all

show watchdog memory-state

show context location all

show redundancy

show redundancy summary

show snmp mib access

show snmp interface

show interfaces description

show ospf neighbor

show bgp sessions

show bgp summary

show rib update-groups

show tcp brief

show l2vpn xconnect

show mpls traffic-eng tunnels

show bfd session

CRS

term length 0

show platform

admin show platform

show install active summary

show version

show hw-module fpd location all

show diag

show logging

show install log

show running

admin show running

show configuration failed

show configuration commit changes all

show configuration history

show configuration failed startup

show history

show cli history detail

admin show environment

admin show led

show processes

show processes cpu

show processes blocked location all

show watchdog memory-state

show context location all

show redundancy

show redundancy summary

show snmp mib access

show snmp interface

show interfaces description

show ospf neighbor

show bgp sessions

show bgp summary

show rib update-groups

show tcp brief

show l2vpn xconnect

show mpls traffic-eng tunnels

show bfd session

Cisco 8xxx

term length 0

show platform

show install active summary

show version

show hw-module fpd

show diag

show logging

show install log

show running

show configuration failed

show configuration commit changes all

show configuration history

show configuration failed startup

show history

show cli history detail

show environment

show led

show processes

show processes cpu

show processes blocked location all

show watchdog memory-state

show context location all

show reboot history

show redundancy

show redundancy summary

show snmp mib access

show snmp interface

show interfaces description

show ospf neighbor

show bgp sessions

show bgp summary

show rib update-groups

show tcp brief

show l2vpn xconnect

show mpls traffic-eng tunnels

show bfd session