目次

はじめに

前提条件

要件

使用するコンポーネント

問題

トラブルシューティング

結論

解決策

概要

この資料は troubelshoot にどのように Finesse Agent Desktop で見られるで情報をエージェント ステータス遅延提供したものです。

粗い Rohit によって貢献される Cisco TAC エンジニア。

前提条件

要件

次の項目に関する知識が推奨されます。

- Cisco Unified Contact Center Enterprise（UCCE）

- Cisco Finesse

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアのバージョンに基づくものです。

- Finesse 11.5

- UCCE 11.5

本書の情報は、特定のラボ環境にあるデバイスに基づいて作成されたものです。 このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。 対象のネットワークが実稼働中である場合には、どのような作業についても、その潜在的な影響について確実に理解しておく必要があります。

問題

エージェント レシーブ コール（着信/発信）、準備ができたからの状態の変更時 --> 予約しました --> 話すことは遅れます。

トラブルシューティング

問題のこの型を解決するために、Finesse サーバおよびクライアントからのこれらのログを引っ張ることができます:

- Finesse デスクトップ WebServices ログ

- Finesse クライアント側のログ

Finesse クライアント ログ

エージェントの状態の変更のために受け取った CTI メッセージ:

0051203603: 10.106.81.82: Apr 14 2017 14:01:17.196 -0700: %CCBU_CTIMessageEventExecutor-0-6-DECODED_MESSAGE_FROM_CTI_SERVER: %[cti_message=CTIAgentStateEvent [skillGroupState=7 (BUSY_OTHER), stateDuration=0, skillGroupNumber=29808, skillGroupPriority=0, agentState=8 (RESERVED), eventReasonCode=0, numFltSkillGroups=0, CTIClientSignature=Finesse, agentID=1234, agentExtension=1234, agentInstrument=1234, agentID_Long=null, duration=null, nextAgentState=null, fltSkillGroupNumberList=[], fltSkillGroupIDList=[], fltSkillGroupPriorityList=[], fltSkillGroupStateList=[], MRDId=1, agentMode=1]CTIMessageBean [invokeID=null, cti_sequence_id=865941, msgID=30, timeTracker={"id":"AgentStateEvent","CTI_MSG_RECEIVED":1492203677196,"CTI_MSG_DISPATCH":1492203677196}, msgName=AgentStateEvent, deploymentType=CCE]][cti_response_time=0][dispatch_phase=DnD-CHECKPOINT-3B]: Decoded Message to Finesse from backend cti server

ただし 14 秒の後やっと、Finesse は予約済みの状態にエージェントを置きます:

001345281: 10.106.81.82: Apr 14 2017 14:01:31.936 -0700: %CCBU_CoreImpl-worker187-6-XMPP_PUBLISH_ASYNCHRONOUS: %[NodeId=/finesse/api/User/1234][Payload=&lt;Update&gt;

&lt;data&gt;

&lt;user&gt;

&lt;dialogs&gt;/finesse/api/User/1234/Dialogs&lt;/dialogs&gt;

&lt;extension&gt;1234&lt;/extension&gt;

&lt;firstName&gt;Test&lt;/firstName&gt;

&lt;lastName&gt;Test&lt;/lastName&gt;

&lt;loginId&gt;1234&lt;/loginId&gt;

&lt;loginName&gt;Test&lt;/loginName&gt;

&lt;mediaType&gt;1&lt;/mediaType&gt;

&lt;pendingState&gt;&lt;/pendingState&gt;

&lt;roles&gt;

&lt;role&gt;Agent&lt;/role&gt;

&lt;/roles&gt;

&lt;settings&gt;

&lt;wrapUpOnIncoming&gt;OPTIONAL&lt;/wrapUpOnIncoming&gt;

&lt;/settings&gt;

&lt;state&gt;RESERVED&lt;/state&gt;

&lt;stateChangeTime&gt;2017-04-14T21:01:31.935Z&lt;/stateChangeTime&gt;

&lt;teamId&gt;5056&lt;/teamId&gt;

&lt;teamName&gt;Test&lt;/teamName&gt;

&lt;uri&gt;/finesse/api/User/1234&lt;/uri&gt;

&lt;/user&gt;

&lt;/data&gt;

&lt;event&gt;PUT&lt;/event&gt;

&lt;requestId&gt;ad6996dc-db0b-4f45-8e3a-0e975519f4db&lt;/requestId&gt;

&lt;source&gt;/finesse/api/User/1234&lt;/source&gt;

&lt;/Update&gt;]: Publishing XMPP Message Asynchronously

それがエージェントその当時していたことをこの場合見れば、エージェントが 14 秒デスクトップのコール 着信の前にない READY 状態ちょうど 1 分に状態を変更することを試み、Finesse によって遅れたことがわかります。

2017-04-14T14:00:22.128 -07:00: 3ADF8F: finesse.cisco.com: Apr 14 2017 14:00:22.137 -0700: Header : _changeStateCallback(): User changed state to NOT_READY with a reason code of: Break

2017-04-14T14:00:22.129 -07:00: 3ADF8F: finesse.cisco.com: Apr 14 2017 14:00:22.138 -0700: Header : Agent selected or went NOT_READY -- Linda flag cleared.

2017-04-14T14:00:22.130 -07:00: 3ADF8F: finesse.cisco.com: Apr 14 2017 14:00:22.139 -0700: Header : [ClientServices] User: requestId='ad6996dc-db0b-4f45-8e3a-0e975519f4db', Making REST request: method=PUT, url='https://finesse.cisco.com:/finesse/api/User/1234'

2017-04-14T14:00:22.159 -07:00: 3ADF8F: finesse.cisco.com: Apr 14 2017 14:00:22.168 -0700: Header : [ClientServices] User: requestId='ad6996dc-db0b-4f45-8e3a-0e975519f4db', Returned with status=202, content='null'

2017-04-14T14:00:27.129 -07:00: 3ADF8F: finesse.cisco.com: Apr 14 2017 14:00:27.138 -0700: Header : _showOperationError(): Failed to lookup error message in resource bundle(errorBundle=null, error=TypeError: response is undefined).

2017-04-14T14:00:27.130 -07:00: 3ADF8F: finesse.cisco.com: Apr 14 2017 14:00:27.139 -0700: Header : _showOperationError(): Failed to get error message from response(error=TypeError: response is undefined).

2017-04-14T14:00:27.130 -07:00: 3ADF8F: finesse.cisco.com: Apr 14 2017 14:00:27.139 -0700: Header : _showOperationError(): Displayed generic error message.

ここにもう一度試すエージェント。

2017-04-14T14:00:39.093 -07:00: 3ADF8F: finesse.cisco.com: Apr 14 2017 14:00:39.102 -0700: Header : _changeStateCallback(): User changed state to NOT_READY with a reason code of: Training

2017-04-14T14:00:39.093 -07:00: 3ADF8F: finesse.cisco.com: Apr 14 2017 14:00:39.102 -0700: Header : Agent selected or went NOT_READY -- Linda flag cleared.

2017-04-14T14:00:39.095 -07:00: 3ADF8F: finesse.cisco.com: Apr 14 2017 14:00:39.104 -0700: Header : [ClientServices] User: requestId='eb6659c6-06f2-4f02-a244-95839c450b48', Making REST request: method=PUT, url='https://finesse.cisco.com:/finesse/api/User/1234'

2017-04-14T14:00:39.109 -07:00: 3ADF8F: finesse.cisco.com: Apr 14 2017 14:00:39.118 -0700: Header : [ClientServices] User: requestId='eb6659c6-06f2-4f02-a244-95839c450b48', Returned with status=202, content='null'

2017-04-14T14:00:39.120 -07:00: 3ADF8F: finesse.cisco.com: Apr 14 2017 14:00:39.128 -0700: Header : Client: 2017-04-14T21:00:39.115Z, Server: 2017-04-14T21:00:39.123Z, Drift: 8ms, Network Latency (round trip): 8ms

2017-04-14T14:00:44.093 -07:00: 3ADF8F: finesse.cisco.com: Apr 14 2017 14:00:44.101 -0700: Header : _showOperationError(): Failed to lookup error message in resource bundle(errorBundle=null, error=TypeError: response is undefined).

2017-04-14T14:00:44.094 -07:00: 3ADF8F: finesse.cisco.com: Apr 14 2017 14:00:44.102 -0700: Header : _showOperationError(): Failed to get error message from response(error=TypeError: response is undefined).

2017-04-14T14:00:44.094 -07:00: 3ADF8F: finesse.cisco.com: Apr 14 2017 14:00:44.102 -0700: Header : _showOperationError(): Displayed generic error message.

この場合 WebServices デスクトップ ログで:

Finesse はエージェントから準備ができなかった要求を受け取りました。

0051191445: 10.106.81.82: Apr 14 2017 14:00:22.148 -0700: %CCBU_http-apr-8445-exec-13-6-REQUEST_START: %[method_name=PUT][parameter_name={  }][resource_name=/User/1234][usr=1234]: Request start

0051191446: 10.106.81.82: Apr 14 2017 14:00:22.149 -0700: %CCBU_http-apr-8445-exec-13-6-API_REQUEST: %[REQUEST_URL=User/1234][agent_id=1234][requestId=ad6996dc-db0b-4f45-8e3a-0e975519f4db][request_method=user.PUT][request_parameters= state:NOT_READY]: Request from client to webservice api

0051191447: 10.106.81.82: Apr 14 2017 14:00:22.149 -0700: %CCBU_http-apr-8445-exec-13-7-API.REQUEST:  {Thrd=http-apr-8445-exec-13} Received handleRequest for [requestedObjectId=1234], [requestId=ad6996dc-db0b-4f45-8e3a-0e975519f4db]

0051191449: 10.106.81.82: Apr 14 2017 14:00:22.150 -0700: %CCBU_http-apr-8445-exec-13-7-DISPATCHER:  {Thrd=http-apr-8445-exec-13} queueing command SetAgentState for sequencer: [1234]

0051191450: 10.106.81.82: Apr 14 2017 14:00:22.150 -0700: %CCBU_http-apr-8445-exec-13-7-FinesseApiResponseFilter:  {Thrd=http-apr-8445-exec-13} FinesseApiResponseFilter : Added header Access-Control-Allow-Origin: null to the response of the REST API request=https://finesse.cisco.com/finesse/api/User/1234

再度それは第 2 準備ができなかった要求のためのイベントの同じセットです:

0051195056: 10.106.81.82: Apr 14 2017 14:00:39.110 -0700: %CCBU_http-apr-8445-exec-19-6-REQUEST_START: %[method_name=PUT][parameter_name={  }][resource_name=/User/1234][usr=1234]: Request start

0051195060: 10.106.81.82: Apr 14 2017 14:00:39.113 -0700: %CCBU_http-apr-8445-exec-19-7-DISPATCHER:  {Thrd=http-apr-8445-exec-19} queueing command SetAgentState for sequencer: [1234]

0051195061: 10.106.81.82: Apr 14 2017 14:00:39.113 -0700: %CCBU_http-apr-8445-exec-19-7-FinesseApiResponseFilter:  {Thrd=http-apr-8445-exec-19} FinesseApiResponseFilter : Added header Access-Control-Allow-Origin: null to the response of the REST API request=https://finesse.cisco.com/finesse/api/User/1234

0051195060: 10.106.81.82: Apr 14 2017 14:00:39.113 -0700: %CCBU_http-apr-8445-exec-19-7-DISPATCHER:  {Thrd=http-apr-8445-exec-19} queueing command SetAgentState for sequencer: [1234]

0051195061: 10.106.81.82: Apr 14 2017 14:00:39.113 -0700: %CCBU_http-apr-8445-exec-19-7-FinesseApiResponseFilter:  {Thrd=http-apr-8445-exec-19} FinesseApiResponseFilter : Added header Access-Control-Allow-Origin: null to the response of the REST API request=https://finesse.cisco.com/finesse/api/User/1234

1 最小値の後やっと 2 秒、Finesse は要求を処理し始めました:

0051220500: 10.106.81.82: Apr 14 2017 14:01:24.585 -0700: %CCBU_CoreImpl-worker118-6-MESSAGE_TO_CTI_SERVER: %[cti_message=Invoke id :26553 , agentstate : 2, workmode : 0, reason code: 4, forceflag :1, agentcapacity: 0, agentext: 1234, agentid: 1234, supervisorid: null, ssoFlag=false][cti_message_name=SetAgentStateReq]: Message going to the backend cti server

0051223431: 10.128.224.141: Apr 14 2017 14:01:24.766 -0700: %CCBU_CoreImpl-worker118-7-DISPATCHER:  {Thrd=CoreImpl-worker118} completed command SetAgentState for sequencer: [1234]

0051227244: 10.106.81.82: Apr 14 2017 14:01:27.078 -0700: %CCBU_CoreImpl-worker130-6-MESSAGE_TO_CTI_SERVER: %[cti_message=Invoke id :26563 , agentstate : 2, workmode : 0, reason code: 4, forceflag :1, agentcapacity: 0, agentext: 1234, agentid: 1234, supervisorid: null, ssoFlag=false][cti_message_name=SetAgentStateReq]: Message going to the backend cti server

0051229958: 10.128.224.141: Apr 14 2017 14:01:27.274 -0700: %CCBU_CoreImpl-worker130-7-DISPATCHER:  {Thrd=CoreImpl-worker130} completed command SetAgentState for sequencer: [1234]

この場合デスクトップ WebServices への発掘が更に記録 すれば、システムイベントが示す systemEventId=10 と頻繁に受け取られることがわかります（SYS_INSTRUMENT_ OUT_OF_SERVICE -エンタープライズ エージェント デバイス ターゲットはサービスから取除かれました。 SystemEventArg1 は周辺装置の PeripheralID が含まれ、SystemEventText はサービスから取除かれた AgentInstrument が含まれています。）

0051220500: 10.106.81.82: Apr 14 2017 14:01:24.585 -0700: %CCBU_CoreImpl-worker118-6-MESSAGE_TO_CTI_SERVER: %[cti_message=Invoke id :26553 , agentstate : 2, workmode : 0, reason code: 4, forceflag :1, agentcapacity: 0, agentext: 1234, agentid: 1234, supervisorid: null, ssoFlag=false][cti_message_name=SetAgentStateReq]: Message going to the backend cti server

0051223431: 10.128.224.141: Apr 14 2017 14:01:24.766 -0700: %CCBU_CoreImpl-worker118-7-DISPATCHER:  {Thrd=CoreImpl-worker118} completed command SetAgentState for sequencer: [1234]

0051227244: 10.106.81.82: Apr 14 2017 14:01:27.078 -0700: %CCBU_CoreImpl-worker130-6-MESSAGE_TO_CTI_SERVER: %[cti_message=Invoke id :26563 , agentstate : 2, workmode : 0, reason code: 4, forceflag :1, agentcapacity: 0, agentext: 1234, agentid: 1234, supervisorid: null, ssoFlag=false][cti_message_name=SetAgentStateReq]: Message going to the backend cti server

0051229958: 10.128.224.141: Apr 14 2017 14:01:27.274 -0700: %CCBU_CoreImpl-worker130-7-DISPATCHER:  {Thrd=CoreImpl-worker130} completed command SetAgentState for sequencer: [1234]

Finesse でシステムイベントは他のイベントが実行キューにない場合重要なイベントであり、処理される。  他の保留中のイベントはすべてこの条件がバックアップされた原因であり、イベント処理の一般の遅さという結果に終ります。

また Finesse はランダムに約 1 分の CLEAR_CONNECTION コマンドの遅延を見ています、時間を計っている（CF_REQUEST_TIMEOUT_REJECTION）。 これは Finesse が SystemEvent を得ている同じ拡張のためです。

起こった何が例の 1 のための Finesse で特定の例はここにあります:

Web サービスを受け取り、要求を ICM CTI サーバに送信 しましたそれをうまく解決して下さい

0051049979: 10.106.81.82: Apr 14 2017 13:56:20.806 -0700: %CCBU_CoreImpl-worker146-6-MESSAGE_TO_CTI_SERVER: %[cti_message=Invoke id :26488 , callId: 54473438, extension: 8888, peripheralId: 5000, connectionDeviceIdType : 0, connectionDeviceId: 8888][cti_message_name=ClearConnectionReq]: Message going to the backend cti server

0051061608: 10.106.81.82: Apr 14 2017 13:57:21.758 -0700: %CCBU_CTIMessageEventExecutor-0-6-DECODED_MESSAGE_FROM_CTI_SERVER: %[cti_message=CTIControlFailureConf [failureCode=78, peripheralErrorCode=0, text=null]CTIMessageBean [invokeID=26488, cti_sequence_id=863946, msgID=35, timeTracker={"id":"ControlFailureConf","CTI_MSG_NOTIFIED":1492203441758,"CTI_MSG_RECEIVED":1492203441758}, msgName=ControlFailureConf, deploymentType=CCE]][cti_response_time=0][dispatch_phase=DnD-CHECKPOINT-3A]: Decoded Message to Finesse from backend cti server

PG CTI サーバは要求を受け取りました

13:56:20:784 cg1A-ctisvr Trace: *** ClearConnectionRequest DefaultCallInstrument - callID:54473438.+9999(d) ... inst:"8888"

13:56:20:784 cg1A-ctisvr Trace: CSTAClearConnection:  InvokeID=0x2114a2fb Call(CID=54473438,Dev=8888,Type=Static)

13:56:20:784 cg1A-ctisvr Trace: PRIVATE_DATA: CompoundRequestType=Unknown CSTA Event Type SubjectDevice=8888

原因で、コールは JTAPI 例外がどんなに普通接続が解除されなくても。

13:56:20:846 PG1A-jgw1 Trace: MsgClearConnection: CID: 54473438 ConnDevID: 8888/0 CompReqType: -1 InvID: 8285054.

13:56:35:862 PG1A-jgw1 Trace: Call to connection[54473438,8888].disconnect() encountered exception.  com.cisco.jtapi.PlatformExceptionImpl: Could not meet post conditions of disconnect().

最終的にコールは ICM 側でクリアされます。

14:08:05:647 PG1A-opc Trace: CSTA_CONNECTION_CLEARED (PID=5000):  DroppedConn=(CID=54473438,Dev=8888,Type=Static) ReleasingDev=(DEV)8888 localConnInfo(-1)=CS_NONE cause=-1

14:08:05:647 PG1A-opc Trace: CSTAConnectionClearedEvent_PD:: CorrData=102785 UniqueID=00000000003F32DE0309F16000000000

14:08:05:647 PG1A-opc Trace: Call:SetCallState (PID=5000) - CallID=54473438 CallObj=(0x6c33110) NewState=NONE OldState=CONNECTED.

14:08:05:647 PG1A-opc Trace: Cleared(PID=5000): CallObj=(0x6c33110)  SrcConn(CID=54473438,Dev=+13003001858,DevType=Dynamic) DestConn(CID=54473438,Dev=8888,DevType=Static)

14:08:05:647 PG1A-opc Trace: AgentStateUpdate (OPC Time=04/14 21:08:05) - Updating 2 Agent Records on Peripheral 5000

14:08:05:647 PG1A-opc Trace:  - PID=5000 AGSTID=7295 Periph#=8888 Ext=8888 SG#=29808 Dur=0 State=AS_NOT_READY CurrentLine=0 Reason=8 NetworkTID=0 NumLines=0 AgentObj=0x52f50f8

14:08:05:647 PG1A-opc Trace: SetAgentState: ASTID=7295 Periph#=8888 MRDomainID=1 SGSTID=5000 SG#=29808(0x7470) OldState=AS_BUSY_OTHER NewState=AS_NOT_READY Duration=0 CurLine=0 ReasonCode=8 AgentObj=0x52f50f8

14:08:05:647 PG1A-opc Trace:  - PID=5000 AGSTID=7295 Periph#=8888 Ext=8888 SG#=3957053 Dur=0 State=AS_NOT_READY CurrentLine=0 Reason=8 NetworkTID=0 NumLines=0 AgentObj=0x52f50f8

結論

すべてのエージェントの状態 イベントがなぜ遅れるか原因は Finesse が CTI サーバに「ClearConnectionReq」を送信 するとき、CTI サーバが PG Peripheral Interface Manager （PIM）/PG JTapi Gateway （JGW）によって CUCM に要求を送信 する Periheral ゲートウェイ（PG） Open Peripheral Controller （OPC）サービスに要求を送信 するということであるといえます。 CTI サーバは（結局失敗した）からの応答を CUCM、Finesse それ故に遅延エージェントの状態 要求に応答するために優先順位を奪取 する SystemEvents を得始めます待ち。

解決策

この問題の解決は Finesse 11.5(1) ES4 で修正されるこれらの問題によってトラッキングされます

ICM （pg.cucm）のための CSCve12017

Finesse のための CSCve11977