内容

概要

問題

解決方法

概要

このドキュメントでは、アプライアンスのUSBポートを使用して、Prime Infrastructure(PI)Gen 1アプライアンスから外部にバックアップを取る方法と、その逆の方法について説明します。

問題

お客様の多くのシナリオでは、File Transfer Protocol/Trivial File Transfer Protocol(FTP/TFTP)の使用がデータセンターで制限されているため、お客様はFTP/TFTPサーバを使用してPIから外部ポイントににバックアップをを移動することが大大難でです。アプライアンスはLinuxベースのサーバであるため、不適切な転送時にバックアップが破損する可能性があるため、他の方法から外部ポイントにバックアップを移動することは非常に困難です。

解決方法

この状況を解決するには、アプライアンスのUSBポートを使用して、バックアップをPrime ServerからUSB Stickに移動する別のソリューションを見つけます。もう1つの利点は、FTP/TFTP/SFTPによるコピーに要する時間を短縮し、大容量データのコピーにも非常に役立つことです。

PI Gen1アプライアンスからUSBへのバックアップ

ステップ1:USBスティックを挿入します。

ステップ2：サポートされているext4ファイルシステムを新しいパーティションに作成します。

-bash-4.1# fdisk -l   n e l t 8e w

-bash-4.1# partprobe

-bash-4.1# mkfs.ext4 /dev/sdb1

-bash-4.1# mkdir /media/usb-drive/

-bash-4.1# mount -t ext4 /dev/sdb1 /media/usb-drive/

-bash-4.1# umount /media/usb-drive

ステップ3：バックアップをdefaultRepoから新しくマウントされたファイル・システムにコピーします。

ステップ4：ファイルのmd5を両方の場所で検証します。

USBからPI Gen1アプライアンスへのバックアップ

ステップ1:PIにログインします。

pi/admin#

ステップ2：シェルに移動します。

pi/admin# shell

Enter shell access password :

Starting bash shell ...

ade #

ade #

ade # sudo su -

-bash-4.1#

ステップ3:PIのすべてのディスクパーティションを表示します。

-bash-4.1# fdisk -l

Disk /dev/sda: 897.0 GB, 896998047744 bytes

255 heads, 63 sectors/track, 109053 cylinders

Units = cylinders of 16065 * 512 = 8225280 bytes

Sector size (logical/physical): 512 bytes / 512 bytes

I/O size (minimum/optimal): 512 bytes / 512 bytes

Disk identifier: 0x000591be

Device Boot      Start         End      Blocks   Id  System

/dev/sda1   *           1          64      512000   83  Linux

Partition 1 does not end on cylinder boundary.

/dev/sda2              64          77      102400   83  Linux

Partition 2 does not end on cylinder boundary.

/dev/sda3              77      109054   875359232   8e  Linux LVM

Disk /dev/mapper/smosvg-rootvol: 4194 MB, 4194304000 bytes

255 heads, 63 sectors/track, 509 cylinders

Units = cylinders of 16065 * 512 = 8225280 bytes

Sector size (logical/physical): 512 bytes / 512 bytes

I/O size (minimum/optimal): 512 bytes / 512 bytes

Disk identifier: 0x00000000

Disk /dev/mapper/smosvg-swapvol: 16.8 GB, 16777216000 bytes

255 heads, 63 sectors/track, 2039 cylinders

Units = cylinders of 16065 * 512 = 8225280 bytes

Sector size (logical/physical): 512 bytes / 512 bytes

I/O size (minimum/optimal): 512 bytes / 512 bytes

Disk identifier: 0x00000000

Disk /dev/mapper/smosvg-tmpvol: 2113 MB, 2113929216 bytes

255 heads, 63 sectors/track, 257 cylinders

Units = cylinders of 16065 * 512 = 8225280 bytes

Sector size (logical/physical): 512 bytes / 512 bytes

I/O size (minimum/optimal): 512 bytes / 512 bytes

Disk identifier: 0x00000000

Disk /dev/mapper/smosvg-usrvol: 7348 MB, 7348420608 bytes

255 heads, 63 sectors/track, 893 cylinders

Units = cylinders of 16065 * 512 = 8225280 bytes

Sector size (logical/physical): 512 bytes / 512 bytes

I/O size (minimum/optimal): 512 bytes / 512 bytes

Disk identifier: 0x00000000

Disk /dev/mapper/smosvg-varvol: 4194 MB, 4194304000 bytes

255 heads, 63 sectors/track, 509 cylinders

Units = cylinders of 16065 * 512 = 8225280 bytes

Sector size (logical/physical): 512 bytes / 512 bytes

I/O size (minimum/optimal): 512 bytes / 512 bytes

Disk identifier: 0x00000000

Disk /dev/mapper/smosvg-optvol: 716.3 GB, 716252905472 bytes

255 heads, 63 sectors/track, 87079 cylinders

Units = cylinders of 16065 * 512 = 8225280 bytes

Sector size (logical/physical): 512 bytes / 512 bytes

I/O size (minimum/optimal): 512 bytes / 512 bytes

Disk identifier: 0x00000000

Disk /dev/mapper/smosvg-home: 134 MB, 134217728 bytes

255 heads, 63 sectors/track, 16 cylinders

Units = cylinders of 16065 * 512 = 8225280 bytes

Sector size (logical/physical): 512 bytes / 512 bytes

I/O size (minimum/optimal): 512 bytes / 512 bytes

Disk identifier: 0x00000000

Disk /dev/mapper/smosvg-recvol: 134 MB, 134217728 bytes

255 heads, 63 sectors/track, 16 cylinders

Units = cylinders of 16065 * 512 = 8225280 bytes

Sector size (logical/physical): 512 bytes / 512 bytes

I/O size (minimum/optimal): 512 bytes / 512 bytes

Disk identifier: 0x00000000

Disk /dev/mapper/smosvg-altrootvol: 134 MB, 134217728 bytes

255 heads, 63 sectors/track, 16 cylinders

Units = cylinders of 16065 * 512 = 8225280 bytes

Sector size (logical/physical): 512 bytes / 512 bytes

I/O size (minimum/optimal): 512 bytes / 512 bytes

Disk identifier: 0x00000000

Disk /dev/mapper/smosvg-localdiskvol: 134.6 GB, 134553272320 bytes

255 heads, 63 sectors/track, 16358 cylinders

Units = cylinders of 16065 * 512 = 8225280 bytes

Sector size (logical/physical): 512 bytes / 512 bytes

I/O size (minimum/optimal): 512 bytes / 512 bytes

Disk identifier: 0x00000000

Disk /dev/mapper/smosvg-storeddatavol: 10.5 GB, 10502537216 bytes

255 heads, 63 sectors/track, 1276 cylinders

Units = cylinders of 16065 * 512 = 8225280 bytes

Sector size (logical/physical): 512 bytes / 512 bytes

I/O size (minimum/optimal): 512 bytes / 512 bytes

Disk identifier: 0x00000000

Disk /dev/sdb: 62.1 GB, 62075699200 bytes

255 heads, 63 sectors/track, 7546 cylinders

Units = cylinders of 16065 * 512 = 8225280 bytes

Sector size (logical/physical): 512 bytes / 512 bytes

I/O size (minimum/optimal): 512 bytes / 512 bytes

Disk identifier: 0xa5fe72c5

Device Boot      Start         End      Blocks   Id  System

/dev/sdb1               1        7546    60613213+  8e  Linux LVM

ステップ4：新しいディレクトリを作成し、マウントします。

-bash-4.1# mkdir /media/usb-drive/

-bash-4.1# mount -t ext4 /dev/sdb1 /media/usb-drive/

-bash-4.1# ls -lv

total 60

-rw-------. 1 root root  8494 Aug 24  2018 anaconda-ks.cfg

drwxr-xr-x. 2 root root  4096 Aug 24  2018 bin

-rw-r--r--. 1 root root 18977 Aug 24  2018 install.log

-rw-r--r--. 1 root root  5646 Aug 24  2018 install.log.syslog

-rw-r--r--. 1 root root     5 Aug 24  2018 iso.ks.cfg

-rw-------. 1 root root   164 Aug 24  2018 ks-post.log

-rw-------. 1 root root   381 Aug 24  2018 ks-post-toinstall.log

-rw-rw-r--. 1 root root   120 Aug 23 17:47 test.log

-bash-4.1# cd /media/usb-drive/

-bash-4.1# pwd

/media/usb-drive

ステップ5：バックアップをコピーする前に、USBからのバックアップのmd5をチェックします。

-bash-4.1# ls -lv

total 21197320

-rw-r--r--. 1 root root 21706033973 Jun 28 14:57 pi-180419-1332__VER3.1.0.0.132_BKSZ204G_CPU16_MEM3G_RAM15G_SWAP15G_APP_CK1589549125.tar.gpg

drwx------. 2 root root       16384 Jun 28 14:29 lost+found

-bash-4.1#

-bash-4.1#

-bash-4.1# md5sum pi-180419-1332__VER3.1.0.0.132_BKSZ204G_CPU16_MEM3G_RAM15G_SWAP15G_APP_CK1589549125.tar.gpg

44daa932e7ca10fafe480302f7a17b6a  pi-180419-1332__VER3.1.0.0.132_BKSZ204G_CPU16_MEM3G_RAM15G_SWAP15G_APP_CK1589549125.tar.gpg

-bash-4.1#

-bash-4.1#

ステップ6:/localdisk/defaultRepoフォルダにバックアップをコピーします。

-bash-4.1# cp pi-180419-1332__VER3.1.0.0.132_BKSZ204G_CPU16_MEM3G_RAM15G_SWAP15G_APP_CK1589549125.tar.gpg /localdisk/defaultRepo/

-bash-4.1#

-bash-4.1#

-bash-4.1# cd /localdisk/defaultRepo/

-bash-4.1# ls -lv

total 21218032

-rw-r--r--. 1 root root 21706033973 Aug 23 18:56 pi-180419-1332__VER3.1.0.0.132_BKSZ204G_CPU16_MEM3G_RAM15G_SWAP15G_APP_CK1589549125.tar.gpg

-bash-4.1#

-bash-4.1#

ステップ7：以前のMD5を使用して、コピーされたバックアップのMD5を確認します。

-bash-4.1# md5sum pi-180419-1332__VER3.1.0.0.132_BKSZ204G_CPU16_MEM3G_RAM15G_SWAP15G_APP_CK1589549125.tar.gpg

44daa932e7ca10fafe480302f7a17b6a  pi-180419-1332__VER3.1.0.0.132_BKSZ204G_CPU16_MEM3G_RAM15G_SWAP15G_APP_CK1589549125.tar.gpg

-bash-4.1#

-bash-4.1#

ステップ8：ディレクトリをアンマウントします。

-bash-4.1# umount /media/usb-drive

-bash-4.1#

-bash-4.1#

-bash-4.1#