内容

概要

前提条件

要件

使用するコンポーネント

問題

解決方法

概要

このドキュメントでは、Google Cloud Platformを使用してVanila Centos7イメージを展開するときに表示されるエラーメッセージについて説明します。

前提条件

要件

次の項目に関する知識があることが推奨されます。

- Googleクラウドプラットフォーム

- 仮想マシン環境

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアのバージョンに基づいています。

- CloudCenter バージョン 4.8.0

- Centos 7イメージ

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

問題

このエラーメッセージは、CloudCenterとGoogleプラットフォームを使用したVanila Centos7イメージの展開で発生します。ClusterLifecycleActionの開始後すぐにインスタンスを展開すると、次のエラーメッセージが表示されて失敗します。

2017-08-30 17:36:36,638 INFO  impl.AbstractLifecycle [threadPoolExecutor-1]  - DeploymentJobName=CentOS_7 DeploymentJobID=50 ClusterLifecycleImpl[50,CentOS_7,STARTING,0] state from WAITING_TO_START -> STARTING

2017-08-30 17:36:39,847 ERROR event.LifecycleEventProcessor [threadPoolExecutor-1]  - Exception occurred while resolving Action-event.

com.osmosix.commons.exception.CloudProviderException: java.lang.IllegalArgumentException: Parameter project must conform to the pattern (?:(?:[-a-z0-9]{1,63}\.)*(?:[a-z](?:[-a-z0-9]{0,61}[a-z0-9])?):)?(?:[0-9]{1,19}|(?:[a-z0-9](?:[-a-z0-9]{0,61}[a-z0-9])?))

at com.osmosix.commons.cloudProvider.gc.GoogleComputeCloudProviderV1.createVolumes(GoogleComputeCloudProviderV1.java:1244)

at com.osmosix.gateway.impl.GatewayServiceImpl.createVolumes(GatewayServiceImpl.java:2666)

at com.osmosix.gateway.lifecycle.action.orchestration.node.LifecycleCreateVolumesAction.createVolumes(LifecycleCreateVolumesAction.java:161)

at com.osmosix.gateway.lifecycle.action.orchestration.node.LifecycleCreateVolumesAction.execute(LifecycleCreateVolumesAction.java:80)

at com.osmosix.gateway.lifecycle.action.workflow.SequentialWorkflowAction.execute(SequentialWorkflowAction.java:42)

at com.osmosix.gateway.lifecycle.event.LifecycleEventProcessor.resolveAndExecuteAction(LifecycleEventProcessor.java:32)

at com.osmosix.gateway.lifecycle.event.LifecycleAgentListener.onApplicationEvent(LifecycleAgentListener.java:16)

at com.osmosix.gateway.lifecycle.event.LifecycleAgentListener.onApplicationEvent(LifecycleAgentListener.java:7)

解決方法

この問題は既知の問題であり、CloudCenterバージョン4.8.1で対処されています。

CloudCenter JIRA REF:CORE-15235