Sommario

Introduzione

Procedura per la raccolta dei registri di RCM

Introduzione

In questo documento viene descritta la procedura generale per la raccolta di log di Gestione configurazione ridondanza (RCM).

Procedura per la raccolta dei registri di RCM

Questi sono i componenti di RCM:

- Controller

- Gestione checkpoint

- BFDMGR

- OPScenter

- Configmgr

In base allo scenario di problema, è essenziale individuare gli elementi problematici che possono fungere da base per l'acquisizione dei log.

La procedura è la stessa per tutti i componenti qui descritti.

- Se è necessario esaminare i log recenti, ad esempio quelli delle ultime 1-2 ore, è sufficiente raccogliere i log pod per quel componente specifico.

kubectl get svc  -o wide -A -n rcm

With this command, you get all the pods with their IPs and name.

kubectl logs <pod name> -n rcm

Just mention the pod name for which logs are required.

- Se è necessario esaminare i registri più vecchi di 2 ore, il sistema RCM memorizza tutti i registri generati per un massimo di 4 giorni. È possibile recuperarli utilizzando la procedura descritta di seguito.

1. Passare al percorso della directory: /var/log/containers e utilizzare il  grep  per cercare i log dei componenti necessari.

In this scenario, let's take the controller as an example. If you require logs for configmgr/checkpointmgr, you need to use the 'grep' command, while the rest of the procedure remains unchanged.

root@h10-126-83-128:/var/log/containers# ls -la | grep controller

lrwxrwxrwx  1 root root     107 Mar 29 07:07 rcm-controller-6547b466ff-zsrcd_rcm_rcm-controller-4c149c1e962992a241dd5201aadb07237f52947740724c1df2a01b1b6bfbc671.log -> /var/log/pods/rcm_rcm-controller-6547b466ff-zsrcd_ff74e5fc-9a07-4073-8956-90cd978ac98e/rcm-controller/0.log

2. Individuare la directory del controller.

From Step 1., you can see the controller directory as mentioned here:

/var/log/pods/rcm_rcm-controller-6547b466ff-zsrcd_ff74e5fc-9a07-4073-8956-90cd978ac98e/rcm-controller/0.log

Get into this path

root@h10-126-83-128:/var/log/containers# ls -la /var/log/pods/rcm_rcm-controller-6547b466ff-zsrcd_ff74e5fc-9a07-4073-8956-90cd978ac98e/rcm-controller/

total 12

drwxr-xr-x 2 root root 4096 Mar 29 07:07 .

drwxr-xr-x 3 root root 4096 Mar 29 07:07 ..

lrwxrwxrwx 1 root root  165 Mar 29 07:07 0.log -> /var/lib/docker/containers/4c149c1e962992a241dd5201aadb07237f52947740724c1df2a01b1b6bfbc671/4c149c1e962992a241dd5201aadb07237f52947740724c1df2a01b1b6bfbc671-json.log

3. Ottenere tutte le .log  file (tar/zipped).

In Step 2, once you have obtained the path where log files are stored, navigate to that path and collect the .log/.gz files as needed.

root@h10-126-83-128:/var/log/containers# ls -la /var/lib/docker/containers/4c149c1e962992a241dd5201aadb07237f52947740724c1df2a01b1b6bfbc671/

total 6448

drwx------  4 root root    4096 Mar 29 07:07 .

drwx------ 69 root root   12288 Mar 29 07:07 ..

-rw-r-----  1 root root 6548746 Mar 29 10:08 4c149c1e962992a241dd5201aadb07237f52947740724c1df2a01b1b6bfbc671-json.log

drwx------  2 root root    4096 Mar 29 07:07 checkpoints

-rw-------  1 root root   23306 Mar 29 07:07 config.v2.json

-rw-r--r--  1 root root    2469 Mar 29 07:07 hostconfig.json

drwx------  2 root root    4096 Mar 29 07:07 mounts

root@h10-126-83-128:/var/log/containers#