Sommario

Introduzione

Problema

Analisi

Registra tutti i peer inattivi

Controlli SMF

AssegniGrafana

Controlli Nexus

Soluzione

Introduzione

In questo documento viene descritto come risolvere i problemi relativi agli avvisi del registro SMF (Session Management Function) correlati a All Peers are Dead, Setting status code to 0.

Problema

L'impatto della sessione è stato segnalato sul file SMF.

Analisi

Registra tutti i peer inattivi

Il registro indica che tutti i peer in SelectedProfileName:CHF-OFF sono inattivi.

Il log copre tutti gli endpoint configurati su SMF e ogni volta che si rileva che tutti i peer sono inattivi all'interno del profilo, questo determina sempre un impatto sulla sessione.

master-1 b26897bce81a[2516]:

master-1 c77834f772f7[2516]: ************* TRANSACTION: 2475167152 *************

master-1 c77834f772f7[2516]: ************* TRANSACTION: 2475167152 *************

master-1 c77834f772f7[2516]: TRANSACTION SUCCESS:

master-1 c77834f772f7[2516]: TRANSACTION SUCCESS:

master-1 c77834f772f7[2516]: GR Instance ID : 1

master-1 c77834f772f7[2516]: GR Instance ID : 1

master-1 c77834f772f7[2516]: Txn Type : N40ChargingDataReq(3585)

master-1 c77834f772f7[2516]: Txn Type : N40ChargingDataReq(3585)

master-1 c77834f772f7[2516]: Priority : 1

master-1 c77834f772f7[2516]: Priority : 1

master-1 c77834f772f7[2516]: Session Namespace : smf(1)

master-1 c77834f772f7[2516]: Session Namespace : smf(1)

master-1 c77834f772f7[2516]: CDL Slice Name : smf

master-1 c77834f772f7[2516]: CDL Slice Name : smf

master-1 c77834f772f7[2516]: LOG MESSAGES:

master-1 c77834f772f7[2516]: LOG MESSAGES:

master-1 c77834f772f7[2516]: 2023/09/10 15:00:00.007 [ERROR] [nrfClient.Discovery.nrf] All Peers are Dead, Setting status code to 0 (timeout)

master-1 c77834f772f7[2516]: 2023/09/10 15:00:00.007 [ERROR] [nrfClient.Discovery.nrf] All Peers are Dead, Setting status code to 0 (timeout)

master-1 c77834f772f7[2516]: 2023/09/10 15:00:00.007 [ERROR] [nrfClient.Discovery.nrf] Message send failed, response [Type:CHF ServiceName:nchf-convergedcharging SelectedProfileName:"CHF-OFF" FailureProfile:"Fail-H-CHF-OFF" GroupID:"CHF-*" ]

master-1 c77834f772f7[2516]: 2023/09/10 15:00:00.007 [ERROR] [nrfClient.Discovery.nrf] Message send failed, response [Type:CHF ServiceName:nchf-convergedcharging SelectedProfileName:"CHF-OFF" FailureProfile:"Fail-H-CHF-OFF" GroupID:"CHF-*" ]

master-1 c77834f772f7[2516]: ***********************************************

master-1 c77834f772f7[2516]: ***********************************************

In base alla configurazione, SMF tenta di raggiungere il server primario con priorità più alta nel caso in cui sia presente un sistema con codice HTTP 504 (timeout), quindi tenta di raggiungere il server secondario. Se l'operazione non riesce, anche in questo caso il sistema imposta la sessione in modalità Continua.

Nell'esempio, la funzione di caricamento secondaria (CHF) per Offline è 10.10.10.2. SMF ha ricevuto l'errore 504 e l'azione è FailureContinueAction.

master-2 42013075464a[2621]: 2023/09/10 15:00:00.063 rest-ep [ERROR] [RestClient.go:175] [infra.rest_client.core] Error in rest call err Post "http://10.10.10.2:1090/OFFLINE/nchf-convergedcharging/v2/chargingdata": context deadline exceeded

master-2 42013075464a[2621]: 2023/09/10 15:00:00.063 rest-ep [ERROR] [Config.go:1721] [nrfClient.Discovery.nrf] Send to NF rpcName[CHF], method:[DataRequest] EndPoint[http://10.10.10.2:1090/OFFLINE/nchf-convergedcharging/v2] failed

master-2 42013075464a[2621]: ************* TRANSACTION: 2252879781 *************

master-2 42013075464a[2621]: TRANSACTION SUCCESS:

master-2 42013075464a[2621]: GR Instance ID : 1

master-2 42013075464a[2621]: Txn Type : N40ChargingDataReq(3521)

master-2 42013075464a[2621]: Priority : 1

master-2 42013075464a[2621]: Session Namespace : smf(1)

master-2 42013075464a[2621]: CDL Slice Name : smf

master-2 42013075464a[2621]: LOG MESSAGES:

master-2 42013075464a[2621]: 2023/09/10 15:00:00.063 [ERROR] [rest_ep.app.ChargingIntf] {imsi-1234567891011121:21} Received Charging Data Response error with timediff 10001557123 - Request message {{"invocationSequenceNumber":1,"invocationTimeStamp":"2025-11-10T14:29:29Z","nfConsumerIdentification":{"nFIPv4Address":"10.10.10.12","nFName":"dce0c1d7-aa37-4f2c-870b-6f7c1be10af1","nFPLMNID":{"mcc":"123","mnc":"456"},"nodeFunctionality":"SMF"},"notifyUri":"http://10.10.10.12:8195/callbacks/v2/notifyUri/1909959397/chargingNotification","pDUSessionChargingInformation":{"chargingId":1909959397,"pduSessionInformation":{"authorizedQoSInformation":{"5qi":1,"arp":{"preemptCap":"NOT_PREEMPT","preemptVuln":"PREEMPTABLE","priorityLevel":1}},"authorizedSessionAMBR":{"downlink":"2048000 bps","uplink":"2048000 bps"},"chargingCharacteristicsSelectionMode":"VISITING_DEFAULT","dnnId":"data","hPlmnId":{"mcc":"123","mnc":"456"},"networkSlicingInfo":{"sNSSAI":{"sst":1}},"pduAddress":{"iPv6dynamicPrefixFlag":true,"pduIPv6AddresswithPrefix":"x:x:x:x::"},"pduSessionID":21,"pduType":"IPV6","ratType":"WLAN","servingCNPlmnId":{"mcc":"123","mnc":"456"},"sscMode":"SSC_MODE_1","startTime":"2025-11-10T14:29:29Z"},"userInformation":{"roamerInOut":"IN_BOUND","servedGPSI":"msisdn-12345678901"},"userLocationinfo":{"n3gaLocation":{"portNumber":4505,"ueIpv4Addr":"x.x.x.x"}}},"subscriberIdentifier":{"subscriberIdentityType":"SUPI","supi":"imsi-1234567891011121"}}}

master-2 42013075464a[2621]: 2023/09/10 15:00:00.063 [ERROR] [nrfClient.SendMesg.NRF] FHI status 504 timediff 1000332537, Uri: http://10.10.10.2:1090/OFFLINE/nchf-convergedcharging/v2, retryCount = 0 loopMaxRetry = 0, maxRetry = 0

master-2 42013075464a[2621]: 2023/09/10 15:00:00.063 [ERROR] [nrfClient.Discovery.nrf] Message send failed, response [Type:CHF Http2_Status:504 FailAction:FailureContinueAction MsgType:3587 ServiceName:nchf-convergedcharging SelectedProfileName:"CHF-OFF" FailureProfile:"Fail-H-CHF-OFF" GroupID:"CHF-*" ]

master-2 42013075464a[2621]: ***********************************************

Controlli SMF

In SMF, controllare i peer e il tempo di connessione relativo all'endpoint che ha segnalato il problema.

smf# show peers

GR                                                                                POD              CONNECTED              ADDITIONAL

INSTANCE  ENDPOINT        LOCAL ADDRESS         PEER ADDRESS           DIRECTION  INSTANCE   TYPE  TIME           RPC     DETAILS     INTERFACE NAME     VRF

--------------------------------------------------------------------------------------------------------------------------------------------------------------

1         <none>          192.168.1.1        10.10.10.2:1090      Outbound   rest-ep-0  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.2        10.10.10.2:1090      Outbound   rest-ep-1  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.3        10.10.10.1:1090     Outbound   rest-ep-2  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.3        10.10.10.2:1090      Outbound   rest-ep-2  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.4        10.10.10.1:1090     Outbound   rest-ep-3  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.2        10.10.10.1:1090     Outbound   rest-ep-1  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.4        10.10.10.2:1090      Outbound   rest-ep-3  Rest  2 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.1        10.10.10.1:1090     Outbound   rest-ep-0  Rest  4 hours        CHF     <none>      n40                NA

// CHF related profiles

profile network-element chf CHF-OFFLINE

nf-client-profile        CHF-OFF

failure-handling-profile Fail-H-CHF-OFF

discovery local

exit

// Here is configuration for CHF profile where all peers are dead

profile nf-client nf-type chf

chf-profile CHF-OFF

locality LOC1

priority 1

service name type nchf-convergedcharging

responsetimeout 1000

endpoint-profile epprof

capacity   10

api-root   OFFLINE

uri-scheme http

version

uri-version v2

exit

exit

endpoint-name ep1

priority 1

capacity 10

primary ip-address ipv4 10.10.10.1

primary ip-address port 1090

exit

endpoint-name ep2

priority 2

capacity 10

primary ip-address ipv4 10.10.10.2

primary ip-address port 1090

exit

exit

exit

exit

exit

// Failure handling that in case of timeout (HTTP code 504) then try secondary server one time and then proceed with continuing the session

profile nf-client-failure nf-type chf

profile failure-handling Fail-H-CHF-OFF

service name type nchf-convergedcharging

responsetimeout 1000

message type ChfConvergedchargingCreate

status-code httpv2 504

retry  1

action continue

exit

exit

message type ChfConvergedchargingUpdate

status-code httpv2 504

retry  1

action continue

exit

exit

message type ChfConvergedchargingDelete

status-code httpv2 504

retry  1

action continue

exit

exit

exit

Assegni Grafana

È stata osservata la correlazione diretta tra HTTP 504 Timeout e l'ora del problema.

query: sum(increase(smf_restep_http_msg_total{nf_type="chf", namespace=~"$namespace"}[15m])) by (api_name, response_cause, response_status)

Controlli Nexus

Controllare se si sono verificati flap.

Nexus# show logging last 500 | include BFD

Soluzione

La soluzione a questo problema varia in questo caso perché SMF è il client e CHF è il server.

La perdita della connessione non è stata causata da SMF.