Sommario

Panoramica

Spiegazione

Output di esempio

ASR 5000

ASR 5500

Panoramica

L'implementazione di Link Aggregation (LAG) modifica il comportamento dei comandi "show port npu counter" e "show port usage table". I comandi delle porte sono importanti per la risoluzione dei problemi relativi alle porte e al throughput, quindi è importante essere in grado di interpretare correttamente i risultati, soprattutto perché non sono intuitivi rispetto alle porte non LAG. In conclusione, i contatori dell'npu della porta per il LAG su base individuale non sono disponibili e vengono riportati per l'intero gruppo LAG solo fino almeno a StarOS v18, che è il momento di questa scrittura. Questo potrebbe cambiare nelle versioni future.

Spiegazione

A causa dei limiti di progettazione/architettura, la segnalazione dei contatori della npu delle porte è limitata al conglomerato di tutte le porte in un gruppo di GAL e non a livello di singola porta. Ciò non si applica ai contatori port datalink che continuano a segnalare come previsto.

Poiché l'implementazione del LAG richiede che tutte le porte del LAG siano attive, la "tabella show port usage" indica l'utilizzo di tutte le porte del LAG, sia che siano in distribuzione (attive) o in standby (standby) per entrambe le appliance ASR 5000/5500. Sidenote: Normalmente le porte concordate non presentano traffico, ma in alcuni casi anche le direzioni Rx e/o Tx delle porte concordate effettuano traffico (non è l'argomento di questo articolo, ma è sufficiente indicarlo).

Nel caso di porte non LAG, esiste una differenza tra quanto riportato per ASR 5000 e ASR 5500. ASR 5000 non segnala l'utilizzo delle porte in standby, mentre ASR 5500 segnala l'utilizzo delle porte in standby (anche se queste porte sono inattive dal punto di vista operativo)

Coerentemente con quanto appena detto, il comando "show port table" per il LAG indica tutte le porte come operative attive, a differenza del LAG non attivo, in cui solo la porta attiva di una coppia di porte è operativa.

Per "show port npu counters", sono elencate TUTTE le porte LAG, ma è vero quanto segue:

- ASR 5000:

- i contatori sotto la porta primaria (configurata) sono un conteggio TOTALE su tutte le porte ATTIVE al momento

- i contatori di TUTTE le altre porte (compresa la coppia della porta primaria) non sono pertinenti e non devono essere utilizzati

- ASR 5500:

- i contatori sotto la porta primaria e il relativo standby sono un conteggio TOTALE su tutte le porte attualmente ATTIVE (entrambi segnaleranno un valore simile ma leggermente diverso - utilizzare uno dei due)

- i contatori per TUTTE le altre porte sono 0

Per le porte NON LAG, vengono riportati solo i contatori per le porte attive. Le porte di standby non sono neanche elencate nell'output a livello di NPU (e mai lo sono state).

Output di esempio

L'output qui riportato è a supporto delle spiegazioni precedenti. Si basa sulle seguenti configurazioni hardware:

ASR 5000: Porte LAG 19/20, 23/26, 27/28 e porte non LAG 21/37

ASR 5500: porte LAG 5/ 10, 11, 15, 16; 6/10, 11, 15, 16 e porte non LAG 5/28 e 6/28, 5/29 e 6/29

Promemoria: In questo articolo vengono illustrati i contatori delle porte LAG.

ASR 5000

******** show port utilization *******

Wednesday May 28 12:28:04 UTC 2014

------ Average Port Utilization (in mbps) ------

Port   Type                       Current           5min             15min

Rx      Tx      Rx       Tx       Rx     Tx

----- ------------------------  ------- -------  ------- -------  ------- -------

19/1  10G Ethernet              514     572      503     534      490     517

20/1  10G Ethernet              0       0        0       0        0       0

21/1  1000 Ethernet             0       0        0       0        0       0

23/1  10G Ethernet              460     529      448     516      431     510

26/1  10G Ethernet              0       0        0       0        0       0

27/1  10G Ethernet              674     532      634     519      619     499

28/1  10G Ethernet              0       0        0       0        0       0

******** show port table all *******

Wednesday May 28 12:28:03 UTC 2014

Port  Role Type                      Admin    Oper Link State    Pair  Redundant

----- ---- ------------------------  -------- ---- ---- -------  ----- ---------

19/1  Srvc 10G Ethernet              Enabled  -    Up   -        None  LA+ 19/1

Untagged                  Enabled  Up   -    Active   -     -

Tagged VLAN  2423         Enabled  Up   -    Active   -     -

Tagged VLAN  2424         Enabled  Up   -    Active   -     -

Tagged VLAN  2401         Enabled  Up   -    Active   -     -

Tagged VLAN  2009         Enabled  Up   -    Active   -     -

Tagged VLAN  2010         Enabled  Up   -    Active   -     -

Tagged VLAN  2007         Enabled  Up   -    Active   -     -

Tagged VLAN  2498         Enabled  Up   -    Active   -     -

Tagged VLAN  2499         Enabled  Up   -    Active   -     -

20/1  Srvc 10G Ethernet              Enabled  Up   Up   Active   None  LA~ 19/1

21/1  Srvc 1000 Ethernet             Enabled  -    Up   -        37/1  L2 Link

Untagged                  Enabled  Down -    Active   -     -

Tagged VLAN    30         Enabled  Up   -    Active   -     -

23/1  Srvc 10G Ethernet              Enabled  Up   Up   Active   None  LA+ 19/1

26/1  Srvc 10G Ethernet              Enabled  Up   Up   Active   None  LA~ 19/1

27/1  Srvc 10G Ethernet              Enabled  Up   Up   Active   None  LA+ 19/1

28/1  Srvc 10G Ethernet              Enabled  Up   Up   Active   None  LA~ 19/1

37/1  Srvc 1000 Ethernet             Enabled  -    Up   -        21/1  L2 Link

Untagged                  Enabled  Down -    Standby  -     -

Tagged VLAN    30         Enabled  Down -    Standby  -     -

******** show port npu counters *******

Counters for port 19/1

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

-------------------- ------------- --------------- ------------- ---------------

Unicast              74783944546254086740066587874 69151428800023783215178712378

Counters for port 20/1

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

Counters for port 23/1

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

Counters for port 26/1

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

Counters for port 27/1

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

Counters for port 28/1

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

mentre per NON-LAG, sono elencate solo le porte attive e questi valori SONO rilevanti:

Counters for port 21/1

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

ASR 5500

[local]PGW> show port utilization table

Sunday June 01 03:57:59 UTC 2014

------ Average Port Utilization (in mbps) ------

Port   Type                       Current           5min             15min

Rx      Tx      Rx       Tx       Rx     Tx

----- ------------------------  ------- -------  ------- -------  ------- -------

5/10 10G Ethernet              1919    1973     1982    2066     2025    2094

5/11 10G Ethernet              1911    1751     1976    1828     2023    1883

5/15 10G Ethernet              1910    2064     1975    2064     2004    2130

5/16 10G Ethernet              1933    1943     1987    2012     2014    2019

5/28 10G Ethernet              9       69       9       70       9       71

5/29 10G Ethernet              0       0        0       0        0       0

6/10 10G Ethernet              0       0        0       0        0       0

6/11 10G Ethernet              0       0        0       0        0       0

6/15 10G Ethernet              0       0        0       0        0       0

6/16 10G Ethernet              0       0        0       0        0       0

6/28 10G Ethernet              0       0        0       0        0       0

6/29 10G Ethernet              1       0        1       10       1       11

[local]PGW> show port table all

Sunday June 01 03:58:48 UTC 2014

Port  Role Type                      Admin    Oper Link State    Pair  Redundant

----- ---- ------------------------  -------- ---- ---- -------  ----- ---------

5/10 Srvc 10G Ethernet              Enabled  -    Up   -         6/10 LA+  5/10

Untagged                  Enabled  Up   -    Active   -     -

Tagged VLAN  2011         Enabled  Up   -    Active   -     -

Tagged VLAN  2405         Enabled  Up   -    Active   -     -

Tagged VLAN  2015         Enabled  Up   -    Active   -     -

Tagged VLAN  2427         Enabled  Up   -    Active   -     -

Tagged VLAN  2407         Enabled  Up   -    Active   -     -

Tagged VLAN  2455         Enabled  Up   -    Active   -     -

5/11 Srvc 10G Ethernet              Enabled  Up   Up   Active    6/11 LA+  5/10

5/15 Srvc 10G Ethernet              Enabled  Up   Up   Active    6/15 LA+  5/10

5/16 Srvc 10G Ethernet              Enabled  Up   Up   Active    6/16 LA+  5/10

5/28 Srvc 10G Ethernet              Enabled  -    Up   -         6/28 L2 Link

Untagged                  Enabled  Up   -    Active   -     -

Tagged VLAN  2400         Enabled  Up   -    Active   -     -

5/29 Srvc 10G Ethernet              Enabled  -    Up   -         6/29 L2 Link

Untagged                  Enabled  Down -    Standby  -     -

Tagged VLAN    31         Enabled  Down -    Standby  -     -

6/10 Srvc 10G Ethernet              Enabled  -    Up   -         5/10 LA~  5/10

Untagged                  Enabled  Up   -    Active   -     -

Tagged VLAN  2011         Enabled  Up   -    Active   -     -

Tagged VLAN  2405         Enabled  Up   -    Active   -     -

Tagged VLAN  2015         Enabled  Up   -    Active   -     -

Tagged VLAN  2427         Enabled  Up   -    Active   -     -

Tagged VLAN  2407         Enabled  Up   -    Active   -     -

Tagged VLAN  2455         Enabled  Up   -    Active   -     -

6/11 Srvc 10G Ethernet              Enabled  Up   Up   Active    5/11 LA~  5/10

6/15 Srvc 10G Ethernet              Enabled  Up   Up   Active    5/15 LA~  5/10

6/16 Srvc 10G Ethernet              Enabled  Up   Up   Active    5/16 LA~  5/10

6/28 Srvc 10G Ethernet              Enabled  -    Up   -         5/28 L2 Link

Untagged                  Enabled  Down -    Standby  -     -

Tagged VLAN  2400         Enabled  Down -    Standby  -     -

6/29 Srvc 10G Ethernet              Enabled  -    Up   -         5/29 L2 Link

Untagged                  Enabled  Up   -    Active   -     -

Tagged VLAN    31         Enabled  Up   -    Active   -     -

[local]PGW> show port npu counters

Counters for port 5/10

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

-------------------- ------------- --------------- ------------- ---------------

Unicast               936150697918 636869996072149  9369282682521055230987905964

Counters for port 5/11

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

-------------------- ------------- --------------- ------------- ---------------

Unicast                          0               0             0               0

Counters for port 5/15

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

Counters for port 5/16

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

Counters for port 6/10

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

-------------------- ------------- --------------- ------------- ---------------

Unicast               936156167721 636873912574349  9369336716261055237102737046

Counters for port 6/11

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

Counters for port 6/15

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

Counters for port 6/16

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

Anche in questo caso, solo le porte attive sono elencate con questo comando:

Counters for port 5/28

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

Counters for port 6/29

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes