Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Prodotti correlati

Convenzioni

Configurazione

Esempio di rete

Configurazioni

Verifica

Su un host Windows 2000 Server

Risoluzione dei problemi

Comandi per la risoluzione dei problemi

Informazioni correlate

Introduzione

In questo documento viene illustrata la configurazione di una chiamata PPP (Point-to-Point Protocol) con modem esterni.

Prerequisiti

Requisiti

È necessario configurare un nome utente e una password per ogni utente al quale si desidera poter accedere in quanto questa configurazione non dispone di un server TACACS+ (Terminal Access Controller System) o RADIUS (Remote Authentication Dial-in User Service). Tutti gli indirizzi IP vengono consegnati al client da un pool.

Per questa configurazione, è necessario disporre dei seguenti elementi:

- I nomi utente e le password che si desidera vengano utilizzati dai client (anche se si desidera aggiungere TACACS+ o RADIUS in un secondo momento, aggiungere alcuni nomi al router per verificare le righe).

- Schema di indirizzamento IP per la creazione del pool e per il routing statico.

Componenti usati

Le informazioni fornite in questo documento si basano sulle versioni software e hardware riportate di seguito.

- Cisco 2511 in un ambiente lab non configurato.

- Cisco IOS® versione 12.2(10b) sul router.

- Quattro numeri di modem asincroni esterni.

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Prodotti correlati

È possibile utilizzare questa configurazione anche con le seguenti versioni hardware e software:

- Router con interfacce asincrone e interfacce seriali in grado di configurare le interfacce asincrone.

- È possibile utilizzare interfacce seriali a 8 o 16 porte WIC-2A/S asincrone.

Convenzioni

Per ulteriori informazioni sulle convenzioni usate, consultare il documento Cisco sulle convenzioni nei suggerimenti tecnici.

Configurazione

In questa sezione vengono presentate le informazioni necessarie per configurare le funzionalità descritte più avanti nel documento.

Nota: per ulteriori informazioni sui comandi menzionati in questo documento, usare lo strumento di ricerca dei comandi (solo utenti registrati).

Esempio di rete

Nel documento viene usata l'impostazione di rete mostrata nel diagramma.

Configurazioni

Questo documento utilizza le configurazioni mostrate di seguito.

Questa configurazione è stata testata con il software Cisco IOS versione 12.2(10b) su un router serie 2511. Gli stessi concetti di configurazione si applicano a una topologia di router simile o ad altre versioni di Cisco IOS a partire dalla versione 11.0(3) o successive.

Cisco 2511

Current configuration:

!

version 12.2

service timestamps debug datetime msec

no service password-encryption

no service udp-small-servers

no service tcp-small-servers

!

hostname router1

!

enable secret <deleted>

!

username jason password foo

username laura password letmein

username russ password opensesame

username syed password bar

username tito password knockknock

!--- Usernames and passwords for clients making incoming calls.

modemcap entry default

!--- Modemcap named "default" is applied to the line 2 and line 3 !--- of Serial interfaces. Refer to the Modem-Router Connection Guide !--- and modemcap entry for more information.

!

interface Ethernet0

ip address 192.168.39.1 255.255.255.0

!

interface Serial0

no ip address

!

interface Serial1

no ip address

!

interface Group-Async1

!--- Async configuration for the external modems.

ip unnumbered ethernet0

encapsulation ppp

async mode interactive

peer default ip address pool dialup

!--- Assigns ip address for incoming calls !--- from the "dialup" pool.

no cdp enable

ppp authentication chap

group-range 1 16

!--- Includes lines 1 through 16 in the group-async1 interface.

!

ip local pool dialup 192.168.39.239 192.168.39.254

!--- Defines the range of ip addresses available !--- to the "dialup" pool.

!

line con 0

login

line 1 16

!--- Line configuration for the external modems.

login local

!--- Authenticate incoming calls locally with username and password !--- configured on the router.

autoselect during-login

autoselect ppp

!--- Launch PPP when PPP packets are received from the client.

modem InOut

!--- Allow incoming and outgoing calls.

transport input all

modem autoconfigure type default

!--- Apply the modemcap "default" (configured previously) to initalize !--- the modem. Refer to the link Modem-Router Connection Guide !--- for more information.

stopbits 1 flowcontrol hardware

line aux 0

line vty 0 4

exec-timeout 20 0

password letmein

login

!

end

Per gli utenti remoti che desiderano connettersi alla propria sede centrale a intervalli casuali per un periodo di tempo più breve, questo tipo di connessioni remote rappresenta una soluzione più economica. Nella configurazione precedente un utente si connette dal desktop tramite un modem e stabilisce una connettività PPP con l'ufficio centrale tramite una rete PSTN.

Per implementare questa configurazione, è necessario configurare quanto segue:

- Interfaccia asincrona.

- Linee asincrone.

- Pool di indirizzi IP in modalità di configurazione globale.

- Parametri modem - voce modemcap e guida alla connessione modem-router.

- La connessione remota deve essere configurata in un host.

Verifica

Le informazioni contenute in questa sezione permettono di verificare che la configurazione funzioni correttamente.

Alcuni comandi show sono supportati dallo strumento Output Interpreter (solo utenti registrati); lo strumento permette di visualizzare un'analisi dell'output del comando show.

- mostra utenti

- show interface

- mostra riga

- show ip route

router1#show users

Line       User       Host(s)              Idle       Location

*  0 con 0                idle                 00:00:00

1 tty 1     jason      Async interface      00:00:34   PPP: 192.168.39.240

3 tty 3                Modem Autoconfigure  00:00:00

4 tty 4                Modem Autoconfigure  00:00:00

5 tty 5                Modem Autoconfigure  00:00:00

6 tty 6                Modem Autoconfigure  00:00:01

7 tty 7                Modem Autoconfigure  00:00:01

8 tty 8                Modem Autoconfigure  00:00:01

9 tty 9                Modem Autoconfigure  00:00:01

10 tty 10               Modem Autoconfigure  00:00:01

11 tty 11               Modem Autoconfigure  00:00:01

12 tty 12               Modem Autoconfigure  00:00:00

13 tty 13               Modem Autoconfigure  00:00:00

14 tty 14               Modem Autoconfigure  00:00:01

15 tty 15               Modem Autoconfigure  00:00:01

16 tty 16               Modem Autoconfigure  00:00:00

Interface  User  Mode  Idle  Peer  Address

router1#show interface asynchronous 1

Async1 is up, line protocol is up

Hardware is Async Serial

Interface is unnumbered. Using address of Ethernet0 (192.168.39.1)

MTU 1500 bytes, BW 115 Kbit, DLY 100000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set  Keepalive not set

DTR is pulsed for 5 seconds on reset

LCP Open

Open: IPCP

Last input 00:00:28, output 00:00:43, output hang never

Last clearing of "show interface" counters 00:29:49

Input queue: 1/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations  0/1/16 (active/max active/max total )

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 86 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

34 packets input, 3147 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

2 input errors, 2 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

16 packets output, 383 bytes, 0 underruns

0 output errors, 0 collisions, 1 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

router1#show line

Tty Typ     Tx/Rx    A Modem  Roty AccO AccI   Uses   Noise  Overruns   Int

*    0 CTY              -    -      -    -    -      0       0     0/0       -

A    1 TTY 115200/115200- inout     -    -    -      1       1     0/0       -

*    2 TTY  38400/38400 - inout     -    -    -      0       0     0/0       -

*    3 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*    4 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*    5 TTY   1200/1200  - inout     -    -    -      0       0     0/0       -

*    6 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*    7 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*    8 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*    9 TTY   1200/1200  - inout     -    -    -      0       0     0/0       -

*   10 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*   11 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*   12 TTY 115200/115200- inout     -    -    -      0       0     0/0       -

*   13 TTY 115200/115200- inout     -    -    -      0       0     0/0       -

*   14 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*   15 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*   16 TTY    300/300   - inout     -    -    -      0       0     0/0       -

17 AUX   9600/9600  -    -      -    -    -      0       0     0/0       -

18 VTY              -    -      -    -    -      0       0     0/0       -

19 VTY              -    -      -    -    -      0       0     0/0       -

20 VTY              -    -      -    -    -      0       0     0/0       -

21 VTY              -    -      -    -    -      0       0     0/0       -

router1#show line 1

Tty Typ     Tx/Rx    A Modem  Roty AccO AccI   Uses   Noise  Overruns   Int

A    1 TTY 115200/115200- inout     -    -    -      1       1     0/0       -

Line 1, Location: "PPP: 192.168.39.240", Type: ""

Length: 24 lines, Width: 80 columns

Baud rate (TX/RX) is 115200/115200, no parity, 1 stopbits, 8 databits

Status: Ready, Active, No Exit Banner, Async Interface Active

Modem Detected, CTS Raised

Capabilities: Hardware Flowcontrol In, Hardware Flowcontrol Out

Modem Callout, Modem RI is CD, Line usable as async interface

Modem Autoconfigure

Modem state: Ready

Group codes: 0

Line is running PPP for address 192.168.39.240.

0 output packets queued, 1 input packets.

Async Escape map is 00000000000000000000000000000000

Modem hardware state: CTS DSR DTR RTS, Modem Configured

Special Chars: Escape Hold Stop Start Disconnect Activation

^^x none - - none

Timeouts: Idle EXEC Idle Session Modem Answer Session Dispatch

00:10:00 never none not set

Idle Session Disconnect Warning

never

router1#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is not set

C 192.168.39.0/24 is directly connected, Ethernet0

Su un host Windows 2000 Server

Configurare la connessione remota nell'host Windows 2000. Configurare il nome utente, la password e il numero di telefono e comporre la connessione.

Una volta stabilita la connessione remota, viene allocato un indirizzo IP dal pool di connessioni remote configurato nel router. Per verificarlo, usare il comando ipconfig nell'host. Viene visualizzato come adattatore PPP nell'host.

C:\Documents and Settings\Administrator>ipconfig

Windows 2000 IP Configuration

Ethernet adapter Local Area Connection:

Media State . . . . . . . . . . . : Cable Disconnected

PPP adapter Dial-up Connection:

Connection-specific DNS Suffix . :

IP Address. . . . . . . . . . . . : 192.168.39.240

Subnet Mask . . . . . . . . . . . : 255.255.255.255

Default Gateway . . . . . . . . . : 192.168.39.240

Per verificare la connessione tra l'host server Windows 2000 e il router Cisco 2511, è possibile eseguire il ping tra l'host e la porta Ethernet del router e verificare la connessione stabilita. Qui, 192.168.39.1 è l'indirizzo IP della porta Ethernet del router.

C:\Documents and Settings\Administrator>ping 192.168.39.1

Pinging 192.168.39.1 with 32 bytes of data:

Reply from 192.168.39.1: bytes=32 time=170ms TTL=255

Reply from 192.168.39.1: bytes=32 time=111ms TTL=255

Reply from 192.168.39.1: bytes=32 time=110ms TTL=255

Reply from 192.168.39.1: bytes=32 time=100ms TTL=255

Ping statistics for 192.168.39.1:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 100ms, Maximum = 170ms, Average = 122ms

Risoluzione dei problemi

Le informazioni contenute in questa sezione permettono di risolvere i problemi relativi alla configurazione.

Comandi per la risoluzione dei problemi

Alcuni comandi show sono supportati dallo strumento Output Interpreter (solo utenti registrati); lo strumento permette di visualizzare un'analisi dell'output del comando show.

Nota: prima di usare i comandi di debug, consultare le informazioni importanti sui comandi di debug.

- debug ppp negotiation: per verificare se un client sta passando una negoziazione PPP. In questo caso, viene verificata la presenza di una negoziazione degli indirizzi.

- debug ppp authentication: consente di verificare se un client sta passando l'autenticazione.

- debug ppp error: consente di visualizzare gli errori di protocollo e le statistiche sugli errori associate alla negoziazione e al funzionamento della connessione PPP.

- debug modem: per verificare se il router riceve i segnali corretti dal modem.

- show line [# tty line] - Per cercare lo stato dell'hardware del modem.

Il router Cisco 2511 ha ottenuto le seguenti uscite. Viene visualizzato il collegamento del server Windows 2000 a PSTN di Cisco 2511 e viene stabilita una connessione PPP.

router1#debug ppp negotiation

PPP protocol negotiation debugging is on

router1#debug vtemplate

Virtual Template debugging is on

router1#show debug

PPP:

PPP protocol negotiation debugging is on

Dec 10 18:43:59.079: As1 LCP: I CONFREQ [Closed] id 1 len 50

Dec 10 18:43:59.083: As1 LCP:    ACCM 0x00000000 (0x020600000000)

Dec 10 18:43:59.087: As1 LCP:    MagicNumber 0x59F402A1 (0x050659F402A1)

Dec 10 18:43:59.087: As1 LCP:    PFC (0x0702)

Dec 10 18:43:59.091: As1 LCP:    ACFC (0x0802)

Dec 10 18:43:59.091: As1 LCP:    Callback 6  (0x0D0306)

Dec 10 18:43:59.095: As1 LCP:    MRRU 1614 (0x1104064E)

Dec 10 18:43:59.099: As1 LCP:    EndpointDisc 1 Local

Dec 10 18:43:59.099: As1 LCP:     (0x131701714C44F0EC8F45BABDC596D14B)

Dec 10 18:43:59.103: As1 LCP:     (0x79DB5300000000)

Dec 10 18:43:59.107: As1 LCP: Lower layer not up, Fast Starting

Dec 10 18:43:59.107: As1 PPP: Treating connection as a dedicated line

Dec 10 18:43:59.111: As1 PPP: Phase is ESTABLISHING,

Active Open [0 sess, 0 load]

Dec 10 18:43:59.115: As1 LCP: O CONFREQ [Closed] id 3 len 25

Dec 10 18:43:59.119: As1 LCP:    ACCM 0x000A0000 (0x0206000A0000)

Dec 10 18:43:59.123: As1 LCP:    AuthProto CHAP (0x0305C22305)

Dec 10 18:43:59.127: As1 LCP:    MagicNumber 0x002AF05C (0x0506002AF05C)

Dec 10 18:43:59.127: As1 LCP:    PFC (0x0702)

Dec 10 18:43:59.131: As1 LCP:    ACFC (0x0802)

Dec 10 18:43:59.135: As1 LCP: O CONFREJ [REQsent] id 1 len 11

Dec 10 18:43:59.139: As1 LCP:    Callback 6  (0x0D0306)

Dec 10 18:43:59.139: As1 LCP:    MRRU 1614 (0x1104064E)

Dec 10 18:43:59.155: %LINK-3-UPDOWN: Interface Async1,

changed state to up

Dec 10 18:43:59.263: As1 LCP: I CONFACK [REQsent] id 3 len 25

Dec 10 18:43:59.267: As1 LCP:    ACCM 0x000A0000 (0x0206000A0000)

Dec 10 18:43:59.267: As1 LCP:    AuthProto CHAP (0x0305C22305)

Dec 10 18:43:59.271: As1 LCP:    MagicNumber 0x002AF05C (0x0506002AF05C)

Dec 10 18:43:59.275: As1 LCP:    PFC (0x0702)

Dec 10 18:43:59.275: As1 LCP:    ACFC (0x0802)

Dec 10 18:43:59.279: As1 LCP: I CONFREQ [ACKrcvd] id 2 len 43

Dec 10 18:43:59.283: As1 LCP:    ACCM 0x00000000 (0x020600000000)

Dec 10 18:43:59.287: As1 LCP:    MagicNumber 0x59F402A1 (0x050659F402A1)

Dec 10 18:43:59.287: As1 LCP:    PFC (0x0702)

Dec 10 18:43:59.291: As1 LCP:    ACFC (0x0802)

Dec 10 18:43:59.291: As1 LCP:    EndpointDisc 1 Local

Dec 10 18:43:59.295: As1 LCP:     (0x131701714C44F0EC8F45BABDC596D14B)

Dec 10 18:43:59.299: As1 LCP:     (0x79DB5300000000)

Dec 10 18:43:59.303: As1 LCP: O CONFACK [ACKrcvd] id 2 len 43

Dec 10 18:43:59.307: As1 LCP:    ACCM 0x00000000 (0x020600000000)

Dec 10 18:43:59.311: As1 LCP:    MagicNumber 0x59F402A1 (0x050659F402A1)

Dec 10 18:43:59.311: As1 LCP:    PFC (0x0702)

Dec 10 18:43:59.315: As1 LCP:    ACFC (0x0802)

Dec 10 18:43:59.315: As1 LCP:    EndpointDisc 1 Local

Dec 10 18:43:59.319: As1 LCP:     (0x131701714C44F0EC8F45BABDC596D14B)

Dec 10 18:43:59.323: As1 LCP:     (0x79DB5300000000)

Dec 10 18:43:59.327: As1 LCP: State is Open

Dec 10 18:43:59.327: As1 PPP: Phase is AUTHENTICATING,

by this end [0 sess, 1 load]

Dec 10 18:43:59.331: As1 CHAP: O CHALLENGE id 2 len 25 from "router1"

Dec 10 18:43:59.459: As1 LCP: I IDENTIFY [Open] id 3 len 18 magic

0x59F402A1 MSRASV5.00

Dec 10 18:43:59.463: As1 LCP: I IDENTIFY [Open] id 4 len 28 magic

0x59F402A1

MSRAS-1-LAB-WIN2K-PC

Dec 10 18:43:59.467: As1 CHAP: I RESPONSE id 2 len 26 from "jason"

Dec 10 18:43:59.479: As1 CHAP: O SUCCESS id 2 len 4

Dec 10 18:43:59.483: As1 PPP: Phase is UP [0 sess, 1 load]

Dec 10 18:43:59.487: As1 IPCP: O CONFREQ [Closed] id 1 len 10

Dec 10 18:43:59.491: As1 IPCP:    Address 192.168.39.1

(0x0306C0A82701)

Dec 10 18:43:59.567: As1 CCP: I CONFREQ [Not negotiated] id 5 len 10

Dec 10 18:43:59.571: As1 CCP:    MS-PPC supported bits 0x00000001

(0x120600000001)

Dec 10 18:43:59.575: As1 LCP: O PROTREJ [Open] id 4 len 16 protocol CCP

(0x80FD0105000A120600000001)

Dec 10 18:43:59.599: As1 IPCP: I CONFREQ [REQsent] id 6 len 40

Dec 10 18:43:59.603: As1 IPCP:    CompressType VJ 15 slots CompressSlotID

(0x0206002D0F01)

Dec 10 18:43:59.607: As1 IPCP:    Address 0.0.0.0 (0x030600000000)

Dec 10 18:43:59.611: As1 IPCP:    PrimaryDNS 0.0.0.0 (0x810600000000)

Dec 10 18:43:59.615: As1 IPCP:    PrimaryWINS 0.0.0.0 (0x820600000000)

Dec 10 18:43:59.615: As1 IPCP:    SecondaryDNS 0.0.0.0 (0x830600000000)

Dec 10 18:43:59.619: As1 IPCP:    SecondaryWINS 0.0.0.0 (0x840600000000)

Dec 10 18:43:59.623: As1 IPCP: O CONFREJ [REQsent] id 6 len 34

Dec 10 18:43:59.627: As1 IPCP:    CompressType VJ 15 slots CompressSlotID

(0x0206002D0F01)

Dec 10 18:43:59.631: As1 IPCP:    PrimaryDNS 0.0.0.0 (0x810600000000)

Dec 10 18:43:59.635: As1 IPCP:    PrimaryWINS 0.0.0.0 (0x820600000000)

Dec 10 18:43:59.639: As1 IPCP:    SecondaryDNS 0.0.0.0 (0x830600000000)

Dec 10 18:43:59.643: As1 IPCP:    SecondaryWINS 0.0.0.0 (0x840600000000)

Dec 10 18:43:59.647: As1 IPCP: I CONFACK [REQsent] id 1 len 10

Dec 10 18:43:59.651: As1 IPCP:    Address 192.168.39.1 (0x0306C0A82701)

Dec 10 18:43:59.735: As1 IPCP: I CONFREQ [ACKrcvd] id 7 len 10

Dec 10 18:43:59.739: As1 IPCP:    Address 0.0.0.0 (0x030600000000)

Dec 10 18:43:59.743: As1 IPCP: O CONFNAK [ACKrcvd] id 7 len 10

Dec 10 18:43:59.747: As1 IPCP:    Address 192.168.39.240

(0x0306C0A827F0)

Dec 10 18:43:59.835: As1 IPCP: I CONFREQ [ACKrcvd] id 8 len 10

Dec 10 18:43:59.839: As1 IPCP:    Address 192.168.39.240 (0x0306C0A827F0)

Dec 10 18:43:59.843: As1 IPCP: O CONFACK [ACKrcvd] id 8 len 10

Dec 10 18:43:59.847: As1 IPCP:    Address 192.168.39.240 (0x0306C0A827F0)

Dec 10 18:43:59.851: As1 IPCP: State is Open

Dec 10 18:43:59.863: As1 IPCP: Install route to 192.168.39.240

Dec 10 18:44:00.483: %LINEPROTO-5-UPDOWN:

Line protocol on Interface Async1, changed state to up

Informazioni correlate

- Pagina di supporto per Access-Dial Technology

- voce modemcap

- Guida alla connessione modem-router

- Supporto tecnico – Cisco Systems