Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Configurazione

Modalità ATM

Modalità EFM

Verifica

Risoluzione dei problemi

Informazioni correlate

Introduzione

In questo documento viene descritta la procedura di configurazione necessaria per implementare una connessione back-to-back Multirate Symmetric High-Speed Digital Subscriber Line (G.SHDSL) tra due moduli EHWIC-4SHDSL-EA.

È necessario configurare un'estremità della connessione in modalità Ufficio centrale (CO) e l'altra estremità in modalità Customer Premises Equipment (CPE) per attivare la connessione SHDSL. Questo tipo di connessione back-to-back SHDSL viene comunemente implementata all'interno di una rete del campus per fornire la connettività tra due edifici senza la necessità di un DSLAM (Digital Subscriber Line Access Multiplexer) tra i due router DSL.

Prerequisiti

Requisiti

Cisco raccomanda la conoscenza dei seguenti argomenti:

- Modulo EHWIC-4SHDSL-EA

- I router Fixed Integrated Service Router (ISR) G2 come C888EA-K9 funzionano sia in modalità CO che CPE con software Cisco IOS® versione 15.2(2)T2 e successive

Componenti usati

Il documento può essere consultato per tutte le versioni software o hardware.

Tuttavia, la configurazione è realizzata con i seguenti dispositivi:

- Due router ISR di seconda generazione (CISCO 2901/K9) caricati con Cisco IOS® 15.4.3M2

- Due moduli EHWIC-4SHDSL-EA installati su entrambi i router ISR G2

- Cavo ANSI/TIA/EIA-568-B con connettori RJ-45 a entrambe le estremità

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Configurazione

In questa configurazione, si utilizzeranno router identici con i moduli EHWIC-4SHDSL-EA installati. Il dispositivo denominato CO_Router dispone del controller SHDSL configurato per funzionare in modalità CO, mentre il dispositivo denominato CPE_Router dispone del controller SHDSL configurato per funzionare in modalità CPE.

Il modulo EHWIC-4SHDSL-EA può essere configurato sia per Ethernet nell'EFM (First Mile) che per ATM (Asynchronous Transfer Mode). Questo documento spiega come impostare la connessione SHDSL di back-to-back sia in modalità EFM che ATM.

Nell'esempio viene mostrato come configurare una connessione SHDSL back-to-back in modalità ATM.

Modalità ATM

Quando si configura la connessione back-to-back SHDSL, è possibile implementare una soluzione IP over ATM (IPoA) o PPP over ATM (PPPoA).

1. Soluzione IPoA

- Router CO:

CO_Router#show running-config

Building configuration...

Current configuration : 1624 bytes

!

!

version 15.4

service config

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CO_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

!

!

no aaa new-model

!

!

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

!

!

cts logging verbose

!

!

license udi pid CISCO2901/K9 sn FGL1622241N

license boot module c2900 technology-package securityk9

license boot module c2900 technology-package datak9

!

redundancy

!

!

!

controller SHDSL 0/1/0

termination co

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

shutdown

duplex auto

speed auto

!

interface ATM0/1/0

ip address 1.1.1.1 255.255.255.0

no atm ilmi-keepalive

pvc 1/10

!

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

control-plane

!

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

!

end

CO_Router#

- Router CPE:

CPE_Router#show running-config

Building configuration...

Current configuration : 1538 bytes

!

version 15.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CPE_Router

!

boot-start-marker

boot-end-marker

!

!

!

no aaa new-model

!

ip cef

!

!

!

no ipv6 cef

!

multilink bundle-name authenticated

!

!

!

voice-card 0

!

!

!

!

license udi pid CISCO2901/K9 sn FGL151625KN

license boot module c2900 technology-package securityk9

license boot module c2900 technology-package uck9

license boot module c2900 technology-package datak9

!

!

!

redundancy

!

controller SHDSL 0/1/0

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

no ip address

shutdown

duplex auto

speed auto

!

interface GigabitEthernet0/1

ip address dhcp

duplex auto

speed auto

!

interface ATM0/1/0

ip address 1.1.1.2 255.255.255.0

no atm ilmi-keepalive

pvc 1/10

!

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

!

control-plane

!

!

gatekeeper

shutdown

!

!

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

end

CPE_Router#

2. Soluzione PPPoA

- Router CO:

CO_Router#show running-config

Building configuration...

Current configuration : 1779 bytes

!

!

version 15.4

service config

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CO_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

!

!

no aaa new-model

!

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

!

!

cts logging verbose

!

!

license udi pid CISCO2901/K9 sn FGL1622241N

license boot module c2900 technology-package securityk9

license boot module c2900 technology-package datak9

!

!

redundancy

!

!

controller SHDSL 0/1/0

termination co

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

shutdown

duplex auto

speed auto

!

interface ATM0/1/0

no ip address

no atm ilmi-keepalive

pvc 1/10

encapsulation aal5snap

protocol ppp dialer

dialer pool-member 1

!

!

interface Dialer1

ip address 1.1.1.1 255.255.255.0

encapsulation ppp

dialer pool 1

dialer-group 1

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

!

!

control-plane

!

!

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

end

CO_Router#

- Router CPE:

CPE_Router#show running-config

Building configuration...

Current configuration : 1693 bytes

!

version 15.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CPE_Router

!

boot-start-marker

boot-end-marker

!

!

!

no aaa new-model

!

ip cef

!

!

no ipv6 cef

!

multilink bundle-name authenticated

!

!

!

license udi pid CISCO2901/K9 sn FGL151625KN

license boot module c2900 technology-package securityk9

license boot module c2900 technology-package uck9

license boot module c2900 technology-package datak9

!

!

!

redundancy

!

!

controller SHDSL 0/1/0

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

no ip address

shutdown

duplex auto

speed auto

!

interface GigabitEthernet0/1

ip address dhcp

duplex auto

speed auto

!

interface ATM0/1/0

no ip address

no atm ilmi-keepalive

pvc 1/10

encapsulation aal5snap

protocol ppp dialer

dialer pool-member 1

!

!

interface Dialer1

ip address 1.1.1.2 255.255.255.0

encapsulation ppp

dialer pool 1

dialer-group 1

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

control-plane

!

gatekeeper

shutdown

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

end

CPE_Router#

3. Soluzione PPPoE over ATM

- Router CO:

CO_Router#show running-configuration

Building configuration...

Current configuration : 2299 bytes

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CO_Router

!

boot-start-marker

boot-end-marker

!

no aaa new-model

!

username cisco password 0 cisco

!

redundancy

!

!

controller SHDSL 0/1/0

termination co

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

!

bba-group pppoe global

virtual-template 1

!

!

interface Loopback0

ip address 10.1.1.1 255.255.255.255

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

no ip address

shutdown

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

shutdown

duplex auto

speed auto

!

!

interface ATM0/1/0

no ip address

no atm ilmi-keepalive

!

interface ATM0/1/0.1 point-to-point

pvc 1/100

protocol pppoe group global

!

!

interface Virtual-Template1

ip unnumbered Loopback0

ip mtu 1492

peer default ip address pool PPPOE

!

!

ip local pool PPPOE 10.1.1.2 10.1.1.254

!

line con 0

line aux 0

line vty 0 4

login

transport input all

end

CO_Router#

Verification:

CO_Router#show caller ip

Line           User       IP Address      Local Number    Remote Number   <->

Vi1.1          -          10.1.1.2        -               -               in

CO_Router#

- Router CPE:

CPE_Router#show running-config

Building configuration...

Current configuration : 2554 bytes

!

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CPE_Router

!

boot-start-marker

boot-end-marker

!

!

!

no aaa new-model

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

controller SHDSL 0/1/0

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

duplex auto

speed auto

!

interface GigabitEthernet0/2

ip address dhcp

duplex auto

speed auto

!

interface ATM0/1/0

no ip address

no atm ilmi-keepalive

!

interface ATM0/1/0.1 point-to-point

pvc 1/100

pppoe-client dial-pool-number 1

!

!

interface Dialer1

ip address negotiated

encapsulation ppp

dialer pool 1

ppp chap hostname cisco

ppp chap password 0 cisco

!

!

!

control-plane

!

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

!

end

CPE_Router#

Verification:

CPE_Router#show ip interface brief

Interface                  IP-Address      OK? Method Status                Protocol

Embedded-Service-Engine0/0 unassigned      YES NVRAM  administratively down down

ATM0/1/0                   unassigned      YES unset  up                    up

ATM0/1/0.1                 unassigned      YES unset  up                    up

Dialer1                    10.1.1.2        YES IPCP   up                    up

Virtual-Access1            unassigned      YES unset  up                    up

CPE_Router#

Modalità EFM

È possibile implementare una soluzione IPoE o PPPoE quando si configura una connessione SHDSL back-to-back.

1. Soluzione IPoE

- Router CO:

CO_Router#show running-config

Building configuration...

Current configuration : 2194 bytes

!

! Last configuration change at 14:56:53 UTC Thu Mar 10 2016

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CO_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

!

ip cef

no ipv6 cef

multilink bundle-name authenticated

!

!

cts logging verbose

!

!

redundancy

!

!

controller SHDSL 0/3/0

termination co

mode efm

dsl-group 0 pairs  0, 1, 2, 3 efm-bond

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

no ip address

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

duplex auto

speed auto

!

!

interface Ethernet0/3/0

ip address 1.1.1.1 255.255.255.252

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

!

control-plane

!

gatekeeper

shutdown

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

scheduler allocate 20000 1000

!

end

CO_Router#

- Router CPE:

CPE_Router#show running-config

Building configuration...

Current configuration : 1646 bytes

!

! Last configuration change at 14:50:55 UTC Thu Mar 10 2016

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CPE_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

!

no aaa new-model

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

cts logging verbose

!

redundancy

!

controller SHDSL 0/3/0

mode efm

dsl-group 0 pairs  0, 1, 2, 3 efm-bond

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

duplex auto

speed auto

!

interface Ethernet0/3/0

ip address 1.1.1.2 255.255.255.252

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

control-plane

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

scheduler allocate 20000 1000

!

end

CPE_Router#

2. Soluzione PPPoE

- Router CO:

CO_Router#show running-config

Building configuration...

Current configuration : 1851 bytes

!

! Last configuration change at 15:00:06 UTC Thu Mar 10 2016

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CO_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

cts logging verbose

!

controller SHDSL 0/3/0

mode efm

dsl-group 0 pairs  0, 1, 2, 3 efm-bond

!

bba-group pppoe global

virtual-template 1

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

duplex auto

speed auto

!

interface Ethernet0/3/0

ip address 1.1.1.2 255.255.255.252

pppoe enable group global

!

interface Virtual-Template1

mtu 1492

ip unnumbered Ethernet0/3/0

peer default ip address pool PPPOE

!

!

ip local pool PPPOE 1.1.1.1

!

no ip http server

no ip http secure-server

!

control-plane

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

scheduler allocate 20000 1000

!

end

CO_Router#

- Router CPE:

CPE_Router#show running-config

Building configuration...

Current configuration : 2310 bytes

!

! Last configuration change at 15:10:04 UTC Thu Mar 10 2016

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CPE_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

!

ip cef

no ipv6 cef

multilink bundle-name authenticated

!

!

!

!

!

!

cts logging verbose

!

!

voice-card 0

!

!

!

!

!

redundancy

!

controller SHDSL 0/3/0

termination co

mode efm

dsl-group 0 pairs  0, 1, 2, 3 efm-bond

!

!

!

!

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

no ip address

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

duplex auto

speed auto

!

!

interface Ethernet0/3/0

no ip address

pppoe enable group global

pppoe-client dial-pool-number 1

!

interface Dialer1

ip address negotiated

encapsulation ppp

dialer pool 1

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

!

!

!

!

control-plane

!

!

!

!

gatekeeper

shutdown

!

!

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

scheduler allocate 20000 1000

!

end

CPE_Router#

Verifica

Fare riferimento a questa sezione per verificare che la configurazione funzioni correttamente.

1. Per verificare che il router sia in modalità CO, eseguire il comando show. La linea di terminazione CO nell'output (in grassetto nell'esempio) indica che il router è in modalità CO. La modalità predefinita è CPE. Alcuni output non vengono visualizzati qui, per brevità.

CO# show controllers shdSL 0/1/0

Controller SHDSL 0/1/0 is UP

Hardware is EHWIC-4SHDSL-EA, rev 0 on slot 0, hwic slot 1

Capabilities: EFM: 2-wire, EFM-Bond, Annex A, B, F & G

ATM: 2-wire, Mpair, IMA, Annex A, B, F & G

- Terminazione CO:

cdb=0x3CF085F0, plugin=0x21C33C1C, ds=0x21C33C68 base=0x10200000

FPGA Version is A14

NPU Source: System

NPU Firmware version: SHDSL_EA_FW_20130116053038

Vendor: Infineon, Chipset: SOCRATES-4e

PHY Source: System

IDC Firmware version: 1.7.5.0

DFE Firmware version: 1.1-1.7.5__002

Firmware reload mode: Auto

<Output abbreviated due to space constraints>

2. Per la modalità EFM, eseguire il comando show controllers ethernet per la verifica.

3. Per la modalità ATM, eseguire il comando show controllers atm per la verifica.

Risoluzione dei problemi

Al momento non sono disponibili informazioni specifiche per la risoluzione dei problemi di questa configurazione.

Informazioni correlate

- Per informazioni dettagliate sulla risoluzione dei problemi relativi alle connessioni SHDSL, consultare il documento sulla configurazione di Cisco G.SHDSL EFM/ATM EHWIC nei router Cisco

- Per la risoluzione dei problemi relativi a PPP, consultare il diagramma di flusso per la risoluzione dei problemi PPP

- Documentazione e supporto tecnico – Cisco Systems