Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Configurazione

Verifica

Introduzione

Questo documento descrive la configurazione con crittografia protetta Signaling Connection Control Part (SCCP) su VG224 Analog Gateway.

Prerequisiti

Requisiti

Cisco raccomanda la conoscenza dei seguenti argomenti:

- SCCP

- VG224

- Cisco Unified Communications Manager (CUCM)

Componenti usati

Le informazioni di questo documento si basano sulle seguenti versioni software:

- VG224

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Configurazione

Passaggio 1. Copiare il certificato callmanager.pem in VG224 (a cui si fa riferimento come punto di attendibilità SICURO nella configurazione seguente)

Passaggio 2. Creare un certificato autofirmato sul VG224 con l'indirizzo MAC Fast Ethernet0/0 (bind interface) e il nome del soggetto composto solo dalle ultime 10 cifre.

Passaggio 3. Copiare il vg-cert in CUCM come trust del gestore chiamate e riavviare CUCM.

Le informazioni vengono fornite per la configurazione dei certificati richiesti per VG224.

Router(config)#crypto key generate rsa general-keys label vg modulus 1024

Router(config)#crypto pki trustpoint vg

Router(ca-trustpoint)#enrollment selfsigned

serial-number none

fqdn none

ip-address none

subject-name cn=1A:E2:85:7B:E2  <----- Last 10 DIGITS ONLY of the SCCP bind interface. Formatting EXACTLY as shown with colons.

rsakeypair vg

crypto pki enroll vg

Router(config)#crypto pki export vg_cert pem terminal

Suggerimento: Guida di riferimento per i comandi

Nota: L'icona del lucchetto non è visibile quando si effettua una chiamata da un telefono analogico VG224 protetto a un telefono IP protetto a causa della presenza di CSCti08882

Verifica

Queste informazioni servono per verificare la corretta registrazione di VG224

Router#show sccp

SCCP Admin State: UP

Gateway Local Interface: FastEthernet0/0

IPv4 Address: 14.1.97.95

Port Number: 2000

IP Precedence: 5

User Masked Codec list: None

Call Manager: 172.18.172.204, Port Number: 2000

Priority: N/A, Version: 7.0, Identifier: 1

Trustpoint: N/A

Call Manager: 172.18.172.205, Port Number: 2000

Priority: N/A, Version: 7.0, Identifier: 2

Trustpoint: N/A

Call Manager: 172.18.172.206, Port Number: 2000

Priority: N/A, Version: 7.0, Identifier: 3

Trustpoint: N/A

AutoCfg_Virtual_Endpoint Oper State: ACTIVE - Cause Code: NONE

Active Call Manager: 172.18.172.204, Port Number: 2000

TCP Link Status: CONNECTED, Device Name: AN1AE2857BE2FFF

Reported Max Streams: 0, Reported Max OOS Streams: 0

Supported Codec: g711ulaw, Maximum Packetization Period: 20

Alg_Phone Oper State: ACTIVE - Cause Code: NONE

Active Call Manager: 172.18.172.204, Port Number: 2443

TCP Link Status: CONNECTED, Device Name: AN1AE2857BE2400

Security

Signaling Security: ENCRYPTED TLS

Media Security: SRTP

Supported crypto suites :AES_CM_128_HMAC_SHA1_32

Reported Max Streams: 1, Reported Max OOS Streams: 0

Supported Codec: rfc2833 dtmf, Maximum Packetization Period: 30

Supported Codec: g711ulaw, Maximum Packetization Period: 20

Supported Codec: g711alaw, Maximum Packetization Period: 20

Supported Codec: g729r8, Maximum Packetization Period: 220

Supported Codec: g729ar8, Maximum Packetization Period: 220

Supported Codec: g729br8, Maximum Packetization Period: 220

Supported Codec: g729r8, Maximum Packetization Period: 220

Supported Codec: ilbc, Maximum Packetization Period: 120

TLS : ENABLED

Ciò dimostra che il VG224 sicuro usa la configurazione SCCP IOS.

Building configuration...

Current configuration : 5258 bytes

!

version 15.1

no service pad

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname Router

!

boot-start-marker

boot system slot0:vg224-i6k9s-mz.151-4.M3

boot-end-marker

!

!

enable secret 5 $1$f99B$PWPClPrUNzgsUZEO8aBYG.

!

no aaa new-model

crypto pki token default removal timeout 0

!

crypto pki trustpoint SECURE

enrollment terminal

revocation-check crl

!

crypto pki trustpoint vg

enrollment selfsigned

serial-number none

fqdn none

ip-address none

subject-name cn=1A:E2:85:7B:E24       ( instead of this command,  we can use hiddle command "mac-address Fast Ethernet0/0 as well )

revocation-check crl

rsakeypair AN1AE2857BE2400

!

!

crypto pki certificate chain SECURE

certificate ca 588C9B7C2D4B37F03930E8C926D02A18

<truncated>

crypto pki certificate chain vg

certificate self-signed 03

<truncated>

ip source-route

!

ip cef

ip name-server 172.18.108.43

ip name-server 172.18.108.34

!

!

no ipv6 cef

!

stcapp ccm-group 1

stcapp security trustpoint vg

stcapp security mode encrypted

stcapp

!

stcapp feature access-code

!

stcapp feature speed-dial

!

!

!

stcapp supplementary-services

port 2/0

fallback-dn 862224

!

!

!

!

!

!

!

!

!

voice-card 0

!

!

!

!

!

!

!

!

!

!

interface FastEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface FastEthernet0/1

no ip address

duplex auto

speed auto

!

ip forward-protocol nd

!

ip http server

no ip http secure-server

ip route 0.0.0.0 0.0.0.0 14.1.97.1 254

ip route 0.0.0.0 0.0.0.0 14.1.97.1 254

!

!

!

control-plane

!

!

voice-port 2/0

timeouts initial 60

timeouts interdigit 60

timeouts ringing infinity

!

voice-port 2/1

!

<truncated>

!

voice-port 2/23

!

ccm-manager config server 172.18.172.204

ccm-manager config

ccm-manager sccp local FastEthernet0/0

ccm-manager sccp

!

!

mgcp profile default

!

sccp local FastEthernet0/0

sccp ccm 172.18.172.204 identifier 1 version 7.0

sccp ccm 172.18.172.205 identifier 2 version 7.0

sccp ccm 172.18.172.206 identifier 3 version 7.0

sccp

!

sccp ccm group 1

associate ccm 1 priority 1

associate ccm 2 priority 2

associate ccm 3 priority 3

!

dial-peer voice 999200 pots

service stcapp

securiy mode encrypted   =====> Required command

port 2/0

!

dial-peer voice 99920 pots

! service stcapp

securiy mode encrypted   =====> Required command

port 2/1

!

!(configure all ports in same secure mode)

!

line con 0

line aux 0

line vty 0 4

password ww

login

transport input all

!

ntp server 172.18.108.15

end