Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Configurazione

Prima della 12.5

Nuove modifiche a partire dalla versione 12.5

Risoluzione dei problemi

Analisi del log per la mobilità delle estensioni

Caso 1: Comportamento di più accessi impostato su Più accessi consentiti

Caso 2: Comportamento di più accessi impostato su Più accessi non consentito

Caso 3: Logout multiplo impostato su Logout automatico

Analisi dei log per EMC

Caso 1: Comportamento di più accessi impostato su Più accessi consentiti

Caso 2: Comportamento di più accessi impostato su Più accessi non consentito

Caso 3: Logout multiplo impostato su Logout automatico

Introduzione

In questo documento vengono descritte le modifiche apportate a uno dei parametri del servizio Multiple Login Behavior per la mobilità delle estensioni tra cluster.

Prerequisiti

Requisiti

Nessun requisito specifico previsto per questo documento.

Componenti usati

Le informazioni fornite in questo documento si basano sulle seguenti versioni software e hardware:

- Versione di Cisco Call Manager: 12.5.0.9800-1078 e 12.5.0.99832-3

- Cisco IP Phone 8861

Protocollo: SIP

Firmware: 12-0-1 SR1-1

- Cisco IP Phone 8851

Protocollo: SIP

Firmware: 12-0-1 SR1-1

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Configurazione

Mobilità di estensione: Consente agli utenti di accedere temporaneamente alla configurazione del proprio Cisco IP Phone (composizione veloce, aspetto della linea) da un altro Cisco IP Phone sullo stesso cluster.

Mobilità di estensione tra cluster: Questa funzionalità consente a un utente di un cluster Cisco Unified Communications Manager (CUCM), in genere denominato cluster principale, di accedere a un Cisco IP Phone di un altro cluster CUCM, denominato cluster locale, come se utilizzasse il telefono IP del sito principale.

Prima della 12.5

Si è verificato un parametro del servizio Comportamento di accesso multiplo all'interno del cluster (Sistema > Parametro servizio, quindi Selezionare il gestore delle chiamate e il servizio di mobilità delle estensioni). Questo parametro viene utilizzato per controllare più account di accesso per la mobilità delle estensioni. Valori validi:

- Consentito

Un utente può accedere a più telefoni contemporaneamente.

- Non consentito

Se un utente è connesso a uno dei telefoni, non potrà accedere a un altro telefono.

- Disconnessione automatica

Se un utente è collegato a un telefono e tenta di accedere a un altro telefono, l'accesso verrà eseguito correttamente sul secondo telefono e verrà disconnesso dal primo telefono.

Per EMCC, tale comportamento non si è verificato. Sono sempre stati consentiti più accessi e l'amministratore non ha potuto controllarli.

Nuove modifiche a partire dalla versione 12.5

EMC offre inoltre la flessibilità necessaria per controllare più accessi. Per ottenere questo risultato, è disponibile un nuovo parametro del servizio denominato Multiple Login Behavior (Sistema > Parametro servizio e quindi Seleziona il gestore delle chiamate e la mobilità delle estensioni come servizio). Ha gli stessi valori di prima:

- Sono consentiti più accessi

- Non sono consentiti più accessi

- Disconnessione automatica

Nota: Le impostazioni di configurazione dei parametri del servizio applicate nel cluster principale vengono applicate e non visitano il cluster.

Scenario di esempio: I parametri relativi al comportamento di più accessi sono impostati su Più accessi non consentiti nel cluster principale e Più accessi consentiti nel cluster visitante.

Se si accede al cluster in visita e quindi si tenta di accedere di nuovo a un altro telefono nel cluster in visita, pertanto in questo caso non è consentito effettuare l'accesso poiché, il parametro è impostato su Più accessi non consentiti nel cluster principale.

Risoluzione dei problemi

Analisi del log per la mobilità delle estensioni

Caso 1: Comportamento di più accessi impostato su Più accessi consentiti

Il parametro del servizio è simile al seguente:

Nei registri del servizio di mobilità delle estensioni è possibile visualizzare il parametro qui:

2019-01-26 10:55:59,109 INFO  [Thread-68           ] ServiceParameters         - -------------Begin Service Parameters ----------------

2019-01-26 10:55:59,109 INFO  [Thread-68           ] ServiceParameters         - Max Duration Enabled                                              = false

2019-01-26 10:55:59,109 INFO  [Thread-68           ] ServiceParameters         - Intra-Cluster Max Login Duration String   = 0

2019-01-26 10:55:59,109 INFO  [Thread-68           ] ServiceParameters         - Inter-cluster Max Login Duration String  = 10:00

2019-01-26 10:55:59,109 INFO  [Thread-68           ] ServiceParameters         - Multi Login Policy                                                       = multiOK

2019-01-26 10:55:59,109 INFO  [Thread-68           ] ServiceParameters         - Max Concurrent Sessions                                         = 15

2019-01-26 10:55:59,109 INFO  [Thread-68           ] ServiceParameters         - Is IP Check Enabled                                                                       = false

2019-01-26 10:55:59,110 INFO  [Thread-68           ] ServiceParameters         - Trusted IP List                                               =

2019-01-26 10:55:59,110 INFO  [Thread-68           ] ServiceParameters         - EM Device Cache Size                                        = 10000

2019-01-26 10:55:59,110 INFO  [Thread-68           ] ServiceParameters         - Allow Proxy                                                   = false

2019-01-26 10:55:59,110 INFO  [Thread-68           ] ServiceParameters         - EMCC Allow Proxy                                                      = true

2019-01-26 10:55:59,110 INFO  [Thread-68           ] ServiceParameters         - -------------- End Service Parameters ----------------

Caso 2: Comportamento di più accessi impostato su Più accessi non consentito

Il parametro del servizio è simile al seguente:

Nei registri del servizio di mobilità delle estensioni è possibile visualizzare questo parametro:

2019-01-24 22:12:15,916 INFO  [Thread-68           ] ServiceParameters         - -------------Begin Service Parameters ----------------

2019-01-24 22:12:15,916 INFO  [Thread-68           ] ServiceParameters         - Max Duration Enabled                                              = false

2019-01-24 22:12:15,916 INFO  [Thread-68           ] ServiceParameters         - Intra-Cluster Max Login Duration String   = 0

2019-01-24 22:12:15,916 INFO  [Thread-68           ] ServiceParameters         - Inter-cluster Max Login Duration String  = 10:00

2019-01-24 22:12:15,916 INFO  [Thread-68           ] ServiceParameters         - Multi Login Policy                                                       = noLogin

2019-01-24 22:12:15,916 INFO  [Thread-68           ] ServiceParameters         - Max Concurrent Sessions                                         = 15

2019-01-24 22:12:15,916 INFO  [Thread-68           ] ServiceParameters         - Is IP Check Enabled                                                                       = false

2019-01-24 22:12:15,916 INFO  [Thread-68           ] ServiceParameters         - Trusted IP List                                               =

2019-01-24 22:12:15,916 INFO  [Thread-68           ] ServiceParameters         - EM Device Cache Size                                        = 10000

2019-01-24 22:12:15,917 INFO  [Thread-68           ] ServiceParameters         - Allow Proxy                                                   = false

2019-01-24 22:12:15,917 INFO  [Thread-68           ] ServiceParameters         - EMCC Allow Proxy                                                      = true

2019-01-24 22:12:15,917 INFO  [Thread-68           ] ServiceParameters         - -------------- End Service Parameters ----------------

L'errore viene stampato nel modo seguente:

2019-01-26 10:54:45,661 ERROR [http-bio-8443-exec-19] EMServiceServlet          - 110: LoginService: Dev: test2- Error# 25-com.cisco.emservice.MyException: Policy Violation: com.cisco.emservice.PolicyValidatorException: Not allowed to log into multiple devices.

2019-01-26 10:54:45,661 INFO  [http-bio-8443-exec-19] EMServiceServlet          - 110:Request succeeded returning<response>

<failure>

<error code="25">Policy Violation: com.cisco.emservice.PolicyValidatorException: Not allowed to log into multiple devices.

</error>

</failure>

</response>

Al telefono, tale errore è presente.

Caso 3: Logout multiplo impostato su Logout automatico

Il parametro del servizio è simile al seguente:

Nei log del servizio di mobilità delle estensioni, è possibile visualizzare questo parametro:

2019-01-26 10:57:30,641 INFO  [Thread-68           ] ServiceParameters         - -------------Begin Service Parameters ----------------

2019-01-26 10:57:30,641 INFO  [Thread-68           ] ServiceParameters         - Max Duration Enabled                                              = false

2019-01-26 10:57:30,641 INFO  [Thread-68           ] ServiceParameters         - Intra-Cluster Max Login Duration String   = 0

2019-01-26 10:57:30,641 INFO  [Thread-68           ] ServiceParameters         - Inter-cluster Max Login Duration String  = 10:00

2019-01-26 10:57:30,641 INFO  [Thread-68           ] ServiceParameters         - Multi Login Policy                                                       = autoLogout

2019-01-26 10:57:30,641 INFO  [Thread-68           ] ServiceParameters         - Max Concurrent Sessions                                         = 15

2019-01-26 10:57:30,641 INFO  [Thread-68           ] ServiceParameters         - Is IP Check Enabled                                                                       = false

2019-01-26 10:57:30,641 INFO  [Thread-68           ] ServiceParameters         - Trusted IP List                                               =

2019-01-26 10:57:30,641 INFO  [Thread-68           ] ServiceParameters         - EM Device Cache Size                                        = 10000

2019-01-26 10:57:30,641 INFO  [Thread-68           ] ServiceParameters         - Allow Proxy                                                   = false

2019-01-26 10:57:30,641 INFO  [Thread-68           ] ServiceParameters         - EMCC Allow Proxy                                                      = true

2019-01-26 10:57:30,641 INFO  [Thread-68           ] ServiceParameters         - -------------- End Service Parameters ----------------

Analisi dei log per EMC

Caso 1: Comportamento di più accessi impostato su Più accessi consentiti

Cluster home

Nei log del servizio EM:

Richiesta di accesso per la prima volta dal telefono (SEPF8A5C59E1126)

2019-01-26 13:45:36,635 DEBUG [http-bio-8443-exec-1] EmccSaxHandler - EMURI = http%3A%2F%2F10.106.125.174%3A8080%2Femapp%2FEMAppServlet%3Fdevice%3DSEPF8A5C59E1126%26doLogout%3Dtrue

2019-01-26 13:45:36,637 DEBUG [http-bio-8443-exec-1] EMServiceServlet - 101: Parse Complete

2019-01-26 13:45:36,637 INFO [http-bio-8443-exec-1] EMServiceServlet - 101: Setting remoteIPAddr to connection IP=10.106.125.174

2019-01-26 13:45:36,637 INFO [http-bio-8443-exec-1] EMServiceServlet - 101 : 137 : atbabu: processEmccRequest: Received EMCC Home Cluster Login Request for :rak

2019-01-26 13:45:36,637 INFO [http-bio-8443-exec-1] EMServiceServlet - 101 : 137 : DeviceSecurityMode: 1 HomeCluster SecurityMode: 0

2019-01-26 13:45:36,637 INFO [http-bio-8443-exec-1] EMServiceServlet - 101: authenticate pin for rak

2019-01-26 13:45:36,650 INFO [http-bio-8443-exec-1] EMServiceServlet - 101 : 137 : atbabu: EmccHomeLogin : Performing Home Device Login for :rak

2019-01-26 13:45:36,650 INFO [http-bio-8443-exec-1] EmccData - 101: getRemoteClusterInfo: Pkid for cluster atbabu is d23ef9ea-8392-dbbf-61db-1d9e1d505243

2019-01-26 13:45:36,650 DEBUG [http-bio-8443-exec-1] EmccData - 101: getRemoteClusterInfo: Hostname = 10.106.125.174

2019-01-26 13:45:36,650 INFO [http-bio-8443-exec-1] Authenticator - 101:Authenticator.userExists: UserID: rak- Calling cmdb.isLocalUser(osUserID)...

2019-01-26 13:45:36,650 DEBUG [http-bio-8443-exec-1] CMDatabase - Userid being passed to the query is rak

2019-01-26 13:45:36,651 DEBUG [http-bio-8443-exec-1] CMDatabase - CMDatabase.isLocalUser() : SELECT islocaluser FROM EndUser WHERE my_lower(userid)= my_lower(?) : parameter ( 'rak' )

2019-01-26 13:45:36,655 DEBUG [http-bio-8443-exec-1] CMDatabase - PKID for the ROW is

2019-01-26 13:45:36,655 DEBUG [http-bio-8443-exec-1] CMDatabase - CMDatabase.isLocalUser() : isLocaluser : true

2019-01-26 13:45:36,656 DEBUG [http-bio-8443-exec-1] CMDatabase - is Local user value :true

2019-01-26 13:45:36,656 INFO [http-bio-8443-exec-1] Authenticator - 101:Authenticator.userExists: UserID: rak- cmdb.isLocalUser(osUserID) returned

2019-01-26 13:45:36,656 DEBUG [http-bio-8443-exec-1] EMServiceServlet - 101: 137: atbabu: performHomeDeviceLogin for deviceName: SEPF8A5C59E1126

2019-01-26 13:45:36,656 INFO [http-bio-8443-exec-1] EMServiceServlet - 101: computeLoginDuration: Device: SEPF8A5C59E1126 EMCC Request: true EM API Request: false Duration Requested through EM API: -1

2019-01-26 13:45:36,658 INFO [http-bio-8443-exec-1] CMDatabase - CMDatabase.getEndUserEmMaxLoginTime() : SELECT EmMaxLoginTime FROM EndUser WHERE userid=? : parameters ( 'rak')

2019-01-26 13:45:36,659 INFO [http-bio-8443-exec-1] EMServiceServlet - Effective Login Duration :36000 seconds

2019-01-26 13:45:36,659 DEBUG [http-bio-8443-exec-1] DBRequestor - 101 : 137 : atbabu: performHomeDeviceLogin: Exceuting Stored Procedure:

Richiesta per lo stesso utente dal secondo telefono

2019-01-26 13:45:56,442 DEBUG [http-bio-8443-exec-8] EmccSaxHandler - EMURI = http%3A%2F%2F10.106.125.174%3A8080%2Femapp%2FEMAppServlet%3Fdevice%3DSEPB000B4BA01F1%26doLogout%3Dtrue

2019-01-26 13:45:56,442 DEBUG [http-bio-8443-exec-8] EMServiceServlet - 103: Parse Complete

2019-01-26 13:45:56,445 INFO [http-bio-8443-exec-8] EMServiceServlet - 103: Setting remoteIPAddr to connection IP=10.106.125.174

2019-01-26 13:45:56,445 INFO [http-bio-8443-exec-8] EMServiceServlet - 103 : 139 : atbabu: processEmccRequest: Received EMCC Home Cluster Login Request for :rak

2019-01-26 13:45:56,445 INFO [http-bio-8443-exec-8] EMServiceServlet - 103 : 139 : DeviceSecurityMode: 1 HomeCluster SecurityMode: 0

2019-01-26 13:45:56,445 INFO [http-bio-8443-exec-8] EMServiceServlet - 103: authenticate pin for rak

2019-01-26 13:45:56,469 INFO [http-bio-8443-exec-8] EMServiceServlet - 103 : 139 : atbabu: EmccHomeLogin : Performing Home Device Login for :rak

2019-01-26 13:45:56,469 INFO [http-bio-8443-exec-8] EmccData - 103: getRemoteClusterInfo: Pkid for cluster atbabu is d23ef9ea-8392-dbbf-61db-1d9e1d505243

2019-01-26 13:45:56,470 DEBUG [http-bio-8443-exec-8] EmccData - 103: getRemoteClusterInfo: Hostname = 10.106.125.174

2019-01-26 13:45:56,470 INFO [http-bio-8443-exec-8] Authenticator - 103:Authenticator.userExists: UserID: rak- Calling cmdb.isLocalUser(osUserID)...

2019-01-26 13:45:56,470 DEBUG [http-bio-8443-exec-8] CMDatabase - Userid being passed to the query is rak

2019-01-26 13:45:56,470 DEBUG [http-bio-8443-exec-8] CMDatabase - CMDatabase.isLocalUser() : SELECT islocaluser FROM EndUser WHERE my_lower(userid)= my_lower(?) : parameter ( 'rak' )

2019-01-26 13:45:56,476 DEBUG [http-bio-8443-exec-8] CMDatabase - PKID for the ROW is

2019-01-26 13:45:56,477 DEBUG [http-bio-8443-exec-8] CMDatabase - CMDatabase.isLocalUser() : isLocaluser : true

2019-01-26 13:45:56,478 DEBUG [http-bio-8443-exec-8] CMDatabase - is Local user value :true

2019-01-26 13:45:56,478 INFO [http-bio-8443-exec-8] Authenticator - 103:Authenticator.userExists: UserID: rak- cmdb.isLocalUser(osUserID) returned

2019-01-26 13:45:56,478 DEBUG [http-bio-8443-exec-8] EMServiceServlet - 103: 139: atbabu: performHomeDeviceLogin for deviceName: SEPB000B4BA01F1

2019-01-26 13:45:56,478 INFO [http-bio-8443-exec-8] EMServiceServlet - 103: computeLoginDuration: Device: SEPB000B4BA01F1 EMCC Request: true EM API Request: false Duration Requested through EM API: -1

2019-01-26 13:45:56,482 INFO [http-bio-8443-exec-8] CMDatabase - CMDatabase.getEndUserEmMaxLoginTime() : SELECT EmMaxLoginTime FROM EndUser WHERE userid=? : parameters ( 'rak')

2019-01-26 13:45:56,485 INFO [http-bio-8443-exec-8] EMServiceServlet - Effective Login Duration :36000 seconds

2019-01-26 13:45:56,485 DEBUG [http-bio-8443-exec-8] DBRequestor - 103 : 139 : atbabu: performHomeDeviceLogin: Exceuting Stored Procedure:

Visita al cluster

Richiesta di accesso per la prima volta dal telefono (SEPF8A5C59E1126)

2019-01-26 13:45:46,786 DEBUG [mjunnur ] EmccCommunicator - 137: postMsg - Url = https://10.106.106.200:8443/emservice/EMServiceServlet m_iHttpsTimeout = 120000

2019-01-26 13:45:47,055 DEBUG [mjunnur ] EmccCommunicator - 137: Retrieved actual user from remote cluster : 'rak'

2019-01-26 13:45:47,056 DEBUG [mjunnur ] EmccCommunicator - 137: performCheckUser: Num of DP is : 1

2019-01-26 13:45:47,056 DEBUG [mjunnur ] CheckUserThread - 137: PerformCheckUser: Home Cluster for UserId: rak is :https://10.106.106.200:8443/emservice/EMServiceServlet

2019-01-26 13:45:47,056 DEBUG [http-bio-8443-exec-7] EmccData - 137: cacheUserToCluster for user: rak

2019-01-26 13:45:47,057 INFO [http-bio-8443-exec-7] EMServiceServlet - 137: EmccLoginRequest: Home Cluster URL for User:rak is : https://10.106.106.200:8443/emservice/EMServiceServlet

2019-01-26 13:45:47,057 INFO [http-bio-8443-exec-7] EMServiceServlet - 137: EmccLoginRequest: Device Profile for this user is: Prerna-EM

2019-01-26 13:45:47,057 DEBUG [http-bio-8443-exec-7] EMServiceServlet - 137:getEmccLoginInfo - SEPF8A5C59E1126

2019-01-26 13:45:47,057 DEBUG [http-bio-8443-exec-7] DBRequestor - 137: getEmccLoginInfo: Query = execute function getEmccLoginInfo('SEPF8A5C59E1126')

2019-01-26 13:45:47,131 DEBUG [http-bio-8443-exec-7] DBRequestor - 137: <VEMAPP>

Richiesta per lo stesso utente dal secondo telefono

2019-01-26 13:46:06,784 DEBUG [mjunnur ] EmccCommunicator - 139: postMsg - Url = https://10.106.106.200:8443/emservice/EMServiceServlet m_iHttpsTimeout = 120000

2019-01-26 13:46:06,901 DEBUG [mjunnur ] EmccCommunicator - 139: Retrieved actual user from remote cluster : 'rak'

2019-01-26 13:46:06,902 DEBUG [mjunnur ] EmccCommunicator - 139: performCheckUser: Num of DP is : 1

2019-01-26 13:46:06,902 DEBUG [mjunnur ] CheckUserThread - 139: PerformCheckUser: Home Cluster for UserId: rak is :https://10.106.106.200:8443/emservice/EMServiceServlet

2019-01-26 13:46:06,902 DEBUG [http-bio-8443-exec-20] EmccData - 139: cacheUserToCluster for user: rak

2019-01-26 13:46:06,903 INFO [http-bio-8443-exec-20] EMServiceServlet - 139: EmccLoginRequest: Home Cluster URL for User:rak is : https://10.106.106.200:8443/emservice/EMServiceServlet

2019-01-26 13:46:06,903 INFO [http-bio-8443-exec-20] EMServiceServlet - 139: EmccLoginRequest: Device Profile for this user is: Prerna-EM

2019-01-26 13:46:06,903 DEBUG [http-bio-8443-exec-20] EMServiceServlet - 139:getEmccLoginInfo - SEPB000B4BA01F1

2019-01-26 13:46:06,903 DEBUG [http-bio-8443-exec-20] DBRequestor - 139: getEmccLoginInfo: Query = execute function getEmccLoginInfo('SEPB000B4BA01F1')

2019-01-26 13:46:06,909 DEBUG [http-bio-8443-exec-20] DBRequestor - 139: <VEMAPP>

Accesso riuscito

2019-01-26 13:46:07,143 INFO [http-bio-8443-exec-20] EMServiceServlet - 139: EmccLoginRequest: Performing Visiting Device Login for :rak

2019-01-26 13:46:07,144 INFO [http-bio-8443-exec-20] EMServiceServlet - 139:performVisitingDeviceLogin - SEPB000B4BA01F1

2019-01-26 13:46:07,144 DEBUG [http-bio-8443-exec-20] DBRequestor - 139: performVisitingDeviceLogin: Query:

execute function visitingDeviceLogin('SEPB000B4BA01F1', 'mjunnur', 'http://10.106.125.174:8080/emapp/EMAppServlet?device=SEPB000B4BA01F1&doLogout=true', 'rak', '10.106.106.200', 'null', '10.106.106.200', 'null')

2019-01-26 13:46:07,166 DEBUG [http-bio-8443-exec-20] DBRequestor - 139: t

2019-01-26 13:46:07,167 DEBUG [http-bio-8443-exec-20] EMServiceServlet - 139: EmccLoginRequest: Result:

<?xml version="1.0"?>

<response>

<success/>

</response>

Caso 2: Comportamento di più accessi impostato su Più accessi non consentito

Cluster home

Richiesta per il primo utente

2019-01-26 14:34:43,093 INFO [http-bio-8443-exec-16] EMServiceServlet - 109 : 142 : atbabu: processEmccRequest: Received EMCC Home Cluster Login Request for :rak

2019-01-26 14:34:43,093 INFO [http-bio-8443-exec-16] EMServiceServlet - 109 : 142 : DeviceSecurityMode: 1 HomeCluster SecurityMode: 0

2019-01-26 14:34:43,093 INFO [http-bio-8443-exec-16] EMServiceServlet - 109: authenticate pin for rak

2019-01-26 14:34:43,112 INFO [http-bio-8443-exec-16] EMServiceServlet - 109 : 142 : atbabu: EmccHomeLogin : Performing Home Device Login for :rak

2019-01-26 14:34:43,112 INFO [http-bio-8443-exec-16] EmccData - 109: getRemoteClusterInfo: Pkid for cluster atbabu is d23ef9ea-8392-dbbf-61db-1d9e1d505243

2019-01-26 14:34:43,112 DEBUG [http-bio-8443-exec-16] EmccData - 109: getRemoteClusterInfo: Hostname = 10.106.125.174

2019-01-26 14:34:43,112 INFO [http-bio-8443-exec-16] Authenticator - 109:Authenticator.userExists: UserID: rak- Calling cmdb.isLocalUser(osUserID)...

2019-01-26 14:34:43,112 DEBUG [http-bio-8443-exec-16] CMDatabase - Userid being passed to the query is rak

2019-01-26 14:34:43,113 DEBUG [http-bio-8443-exec-16] CMDatabase - CMDatabase.isLocalUser() : SELECT islocaluser FROM EndUser WHERE my_lower(userid)= my_lower(?) : parameter ( 'rak' )

2019-01-26 14:34:43,119 DEBUG [http-bio-8443-exec-16] CMDatabase - PKID for the ROW is

2019-01-26 14:34:43,119 DEBUG [http-bio-8443-exec-16] CMDatabase - CMDatabase.isLocalUser() : isLocaluser : true

2019-01-26 14:34:43,119 DEBUG [http-bio-8443-exec-16] CMDatabase - is Local user value :true

2019-01-26 14:34:43,120 INFO [http-bio-8443-exec-16] Authenticator - 109:Authenticator.userExists: UserID: rak- cmdb.isLocalUser(osUserID) returned

2019-01-26 14:34:43,120 DEBUG [http-bio-8443-exec-16] CMDatabase - Userid being passed to the query is rak

2019-01-26 14:34:43,122 INFO [http-bio-8443-exec-16] CMDatabase - CMDatabase:getLoggedInDeviceNames: query=SELECT decode(d.tkclass,249,emcd.devicename,d.name) name FROM Device d left outer join emccdynamic emcd on d.pkid = emcd.fkdevice INNER JOIN extensionmobilitydynamic emd ON d.pkid=emd.fkdevice AND emd.fkenduser= ? AND emd.logintime is NOT NULL AND D.tkDeviceProfile=0 : parameter ( '952a2d32-14e5-fd43-d192-742c4a50d5ab' )

2019-01-26 14:34:43,129 DEBUG [http-bio-8443-exec-16] EMServiceServlet - 109: 142: atbabu: performHomeDeviceLogin for deviceName: SEPF8A5C59E1126

La seconda volta che lo stesso utente non è consentito.

2019-01-26 14:38:05,841 ERROR [http-bio-8443-exec-12] EMServiceServlet - 111: Not allowed to log into multiple devices.

2019-01-26 14:38:05,841 INFO [http-bio-8443-exec-12] EMServiceServlet - 111: EmccRequest Processing Time: 38

2019-01-26 14:38:05,842 ERROR [http-bio-8443-exec-12] EMServiceServlet - 111: Error processing EMCC request :com.cisco.emservice.PolicyValidatorException: Not allowed to log into multiple devices.

2019-01-26 14:38:05,842 DEBUG [http-bio-8443-exec-12] EMServiceServlet - 111: EMCC: Decrement Counter

2019-01-26 14:38:05,842 INFO [http-bio-8443-exec-12] Counters - 111: Counters -->111,31,4,18,0,0,0,15,3,0,33,0,71,3,0

Visita al cluster

2019-01-26 14:34:53,341 DEBUG [mjunnur ] EmccCommunicator - 142: postMsg - Url = https://10.106.106.200:8443/emservice/EMServiceServlet m_iHttpsTimeout = 120000

2019-01-26 14:34:53,558 DEBUG [mjunnur ] EmccCommunicator - 142: Retrieved actual user from remote cluster : 'rak'

2019-01-26 14:34:53,558 DEBUG [mjunnur ] EmccCommunicator - 142: performCheckUser: Num of DP is : 1

2019-01-26 14:34:53,558 DEBUG [mjunnur ] CheckUserThread - 142: PerformCheckUser: Home Cluster for UserId: rak is :https://10.106.106.200:8443/emservice/EMServiceServlet

2019-01-26 14:34:53,559 DEBUG [http-bio-8443-exec-16] EmccData - 142: cacheUserToCluster for user: rak

2019-01-26 14:34:53,560 INFO [http-bio-8443-exec-16] EMServiceServlet - 142: EmccLoginRequest: Home Cluster URL for User:rak is : https://10.106.106.200:8443/emservice/EMServiceServlet

2019-01-26 14:34:53,560 INFO [http-bio-8443-exec-16] EMServiceServlet - 142: EmccLoginRequest: Device Profile for this user is: Prerna-EM

2019-01-26 14:34:53,560 DEBUG [http-bio-8443-exec-16] EMServiceServlet - 142:getEmccLoginInfo - SEPF8A5C59E1126

2019-01-26 14:34:53,560 DEBUG [http-bio-8443-exec-16] DBRequestor - 142: getEmccLoginInfo: Query = execute function getEmccLoginInfo('SEPF8A5C59E1126')

2019-01-26 14:34:53,576 DEBUG [http-bio-8443-exec-16] DBRequestor - 142: <VEMAPP>

Accesso riuscito.

2019-01-26 14:34:53,822 DEBUG [http-bio-8443-exec-16] EMServiceServlet - 142: EmccLoginRequest: Result:

<?xml version="1.0"?>

<response>

<success/>

</response>

Richiesta di accesso dal secondo telefono.

2019-01-26 14:38:16,081 DEBUG [mjunnur ] EmccCommunicator - 145: postMsg - Url = https://10.106.106.200:8443/emservice/EMServiceServlet m_iHttpsTimeout = 120000

2019-01-26 14:38:16,287 DEBUG [mjunnur ] EmccCommunicator - 145: Retrieved actual user from remote cluster : 'rak'

2019-01-26 14:38:16,288 DEBUG [mjunnur ] EmccCommunicator - 145: performCheckUser: Num of DP is : 1

2019-01-26 14:38:16,288 DEBUG [mjunnur ] CheckUserThread - 145: PerformCheckUser: Home Cluster for UserId: rak is :https://10.106.106.200:8443/emservice/EMServiceServlet

2019-01-26 14:38:16,290 DEBUG [http-bio-8443-exec-2] EmccData - 145: cacheUserToCluster for user: rak

2019-01-26 14:38:16,291 INFO [http-bio-8443-exec-2] EMServiceServlet - 145: EmccLoginRequest: Home Cluster URL for User:rak is : https://10.106.106.200:8443/emservice/EMServiceServlet

2019-01-26 14:38:16,291 INFO [http-bio-8443-exec-2] EMServiceServlet - 145: EmccLoginRequest: Device Profile for this user is: Prerna-EM

2019-01-26 14:38:16,291 DEBUG [http-bio-8443-exec-2] EMServiceServlet - 145:getEmccLoginInfo - SEPB000B4BA01F1

2019-01-26 14:38:16,292 DEBUG [http-bio-8443-exec-2] DBRequestor - 145: getEmccLoginInfo: Query = execute function getEmccLoginInfo('SEPB000B4BA01F1')

2019-01-26 14:38:16,328 DEBUG [http-bio-8443-exec-2] DBRequestor - 145: <VEMAPP>

Accesso non consentito al secondo utente.

2019-01-26 14:38:16,449 DEBUG [http-bio-8443-exec-2] EmccCommunicator - 145: parseHomeLoginResponse

2019-01-26 14:38:16,452 ERROR [http-bio-8443-exec-2] EmccCommunicator - 145: handleEmccErrorResponse - 25: Not allowed to log into multiple devices.

2019-01-26 14:38:16,452 ERROR [http-bio-8443-exec-2] EMServiceServlet - 145: Not allowed to log into multiple devices.

2019-01-26 14:38:16,452 INFO [http-bio-8443-exec-2] EMServiceServlet - 145: EmccRequest Processing Time: 438

2019-01-26 14:38:16,453 ERROR [http-bio-8443-exec-2] EMServiceServlet - 145: Error processing EMCC request :com.cisco.emservice.MyException: Not allowed to log into multiple devices.

2019-01-26 14:38:16,453 DEBUG [http-bio-8443-exec-2] EMServiceServlet - 145: EMCC: Decrement Counter

2019-01-26 14:38:16,453 INFO [http-bio-8443-exec-2] Counters - 145: Counters -->145,96,29,10,0,0,0,33,34,0,0,0,32,0,21

Caso 3: Logout multiplo impostato su Logout automatico

Cluster home

2019-01-26 15:24:47,080 INFO [Thread-6861 ] EmccVisitingLogoutThread - 117EmccLogoutThread: Logout Request sent to visitng cluster :

https://10.106.125.176:8443/emservice/EMServiceServlet

2019-01-26 15:24:47,080 DEBUG [Thread-6861 ] EmccCommunicator - 117: performDoLogout

2019-01-26 15:24:47,080 DEBUG [Thread-6861 ] EmccCommunicator - 117: formVisitingLogoutXml :

<emcc><visitingLogout><requestNum>117</requestNum><deviceName>SEPF8A5C59E1126</deviceName><clusterId>mjunnur</clusterId></visitingLogout></emcc>

2019-01-26 15:24:47,080 DEBUG [Thread-6861 ] EmccCommunicator - 117: postMsg - Url = https://10.106.125.176:8443/emservice/EMServiceServlet m_iHttpsTimeout = 0

2019-01-26 15:24:47,139 DEBUG [http-bio-8443-exec-12] DBRequestor - 117: t

2019-01-26 15:24:47,140 INFO [http-bio-8443-exec-12] LogoutScheduler - 117: LogoutScheduler.removeLogout(): Dev: SEPF8A5C59E1126- removed logout

2019-01-26 15:24:47,140 INFO [http-bio-8443-exec-12] DBRequestor - 117: DBRequestor.logoutDevName: Dev: SEPF8A5C59E1126- deviceLogout returned

2019-01-26 15:24:47,141 DEBUG [http-bio-8443-exec-12] EMServiceServlet - 117: 151: atbabu: performHomeDeviceLogin for deviceName: SEPB000B4BA01F1

2019-01-26 15:24:47,141 INFO [http-bio-8443-exec-12] EMServiceServlet - 117: computeLoginDuration: Device: SEPB000B4BA01F1 EMCC Request: true EM API Request: false Duration Requested through EM API: -1

2019-01-26 15:24:47,143 INFO [http-bio-8443-exec-12] CMDatabase - CMDatabase.getEndUserEmMaxLoginTime() : SELECT EmMaxLoginTime FROM EndUser WHERE userid=? : parameters ( 'rak')

2019-01-26 15:24:47,152 INFO [http-bio-8443-exec-12] EMServiceServlet - Effective Login Duration :36000 seconds

Per la configurazione di EM, fare riferimento a questo collegamento:

http://www.learncisco.net/courses/cucm-basics/mobility-features/extension-mobility-configuration.html

Per la configurazione completa di EMC, fare riferimento al seguente collegamento:

https://www.cisco.com/c/en/us/support/docs/unified-communications/unified-communications-manager-callmanager/200599-Enable-UC-servers-for-Extension-Mobility.html