Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Configurazione

Esempio di rete

Premesse

Attività principali operative di vPC

Metodologia di aggiornamento

Informazioni correlate

Introduzione

Questo documento descrive la procedura di aggiornamento degli switch Cisco Nexus 9000 in vPC con Cisco NX-OS.

Prerequisiti

Requisiti

Cisco raccomanda la conoscenza dei seguenti argomenti:

- Software Nexus NX-OS.

- Virtual Port Channel (vPC).

- Usare i file system, le directory e i file del dispositivo sugli switch Cisco Nexus.

- Accedere a Software Download.

- Cisco consiglia di pianificare una finestra di manutenzione in quanto questa procedura comporta l'interruzione delle attività.

Componenti usati

Le informazioni fornite in questo documento si basano sulle seguenti versioni software e hardware:

- Cisco Nexus 9000 con Cisco NX-OS.

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Nota: La procedura di aggiornamento per gli switch Cisco Nexus 7000 può essere basata su questo documento, anche se i comandi e gli output possono variare. Per ulteriori informazioni, consultare le guide ufficiali Cisco specifiche per lo switch Cisco Nexus in uso.

Configurazione

Esempio di rete

Esempio di rete

Premesse

- Si supponga di essere l'amministratore di rete di un centro dati in cui sono presenti due N9K-C93180YC-FX-24.

- N9K-1 e N9K-2 hanno NX-OS 9.3(11).

- I server A e B inviano il traffico di produzione.

- L'obiettivo è aggiornare entrambi gli switch Nexus a NX-OS 10.2(5).

Nota: Avviare l'aggiornamento con lo switch primario o con lo switch secondario. Tuttavia, l'avvio con lo switch primario garantisce che entrambi i dispositivi tornino ai ruoli primario e secondario inizialmente configurati. Sebbene sia importante conoscere alcune delle funzioni di Nexus come primario operativo in vPC.

Attività principali operative di vPC

- Rispondere alle richieste ARP anche con FHRP.

- Elabora le BPDU (Bridge Protocol Data Unit).

- Inoltra il traffico multicast PIM.

- Pacchetti del control plane di IGMP.

- Nessuna chiusura delle porte membro vPC quando il collegamento peer non è attivo.

Metodologia di aggiornamento

Passaggio 1. Aprire Cisco Nexus 9000 e 3000 ISE Support Matrix

1. Selezionare la release corrente.

2. Selezionare la release di destinazione.

Cisco Nexus 9000 e 3000 ISE Support Matrix

Nota: Cisco TAC consiglia di utilizzare sempre l'opzione di aggiornamento con interruzione delle attività (ricarica) con il percorso consigliato.

Nota: Il percorso consigliato può mostrare più collegamenti. Per ciascun hop, ripetere i passaggi da 2 a 11 finché entrambi gli switch Cisco Nexus non dispongono della versione NX-OS di destinazione.

Passaggio 2. Scaricare tutti i file Cisco NX-OS indicati nel percorso consigliato a seconda della scheda di linea dello switch Cisco Nexus in uso.

1. Accedi a Download software

2. Passare alla sezione Download e aggiornamento e aprire Download di Access.

3. Fare clic su Sfoglia tutto > Software Cisco IOS e NX-OS > NX-OS - Software NX-OS > Switch > Switch per data center > Selezionare la serie Nexus > Selezionare la scheda linecard > Software di sistema NX-OS > Selezionare la versione NX-OS da scaricare.

4. Spostare il cursore sul nome del file per visualizzare i dettagli, copiare il valore di checksum MD5 e scaricare il file NX-OS.

Download del software

5. Trasferire i file NX-OS in bootflash su entrambi gli switch Cisco Nexus in vPC tramite SCP, SFTP, TFTP o USB. Se è selezionata una delle prime tre opzioni, verificare che sia presente un ping verso il server specificando il VRF previsto. In questo esempio il server SFTP ha l'indirizzo IP 192.168.9.9 raggiungibile tramite la gestione VRF (Virtual Routing Forwarding).
N9K-1(config)# ping 192.168.9.9 vrf management

N9K-1(config)# copy sftp: bootflash:

Enter source filename: nxos64-cs.10.2.5.M.bin

Enter vrf (If no input, current vrf 'default' is considered): management

Enter hostname for the sftp server: 192.168.9.9

Enter username: admin

The authenticity of host ‘192.168.9.9 (192.168.9.9)' can't be established.

RSA key fingerprint is SHA256:ABCDEFGHIJK.

Are you sure you want to continue connecting (yes/no/[fingerprint])? yes

Warning: Permanently added ‘192.168.9.9' (RSA) to the list of known hosts.

Inbound-ReKey for 192.168.9.9

User Access Verification

Password: cisco

6. Una volta completato il trasferimento dei file, verificare che i file NX-OS siano in bootflash con dir dei comandi.

7. Ottenere il checksum MD5 dal file NX-OS con il comando show file bootflash.

8. Confrontare questo valore con quello copiato da Download software. Entrambi i valori devono corrispondere, altrimenti il file NX-OS è danneggiato o non è valido.

N9K-1(config)# dir | include nxos

1978203648    Mar 31 01:36:06 2023  nxos.9.3.11.bin

1943380992    Mar 17 09:54:16 2023  nxos64-cs.10.2.5.M.bin

Usage for bootflash://

20548902912 bytes used

96040308736 bytes free

116589211648 bytes total

N9K-1(config)# show file bootflash:nxos64-cs.10.2.5.M.bin md5sum

2f60a186cb9c2d55c90086302e51f655

Passaggio 3. Identificare il ruolo operativo in vPC per ciascuno switch Cisco Nexus.

1. Usare il comando show vpc role.

N9K-1(config)# show vpc role

vPC Role status

-----------------------------------------

vPC role                        : primary

Dual Active Detection Status    : 0

vPC system-mac                  : 00:23:04:ee:be:01

vPC system-priority             : 32667

vPC local system-mac            : 44:b6:be:11:17:67

vPC local role-priority         : 32667

vPC local config role-priority  : 32667

vPC peer system-mac             : f8:a7:3a:4e:40:07

vPC peer role-priority          : 32667

vPC peer config role-priority   : 32667

N9K-2(config)# show vpc role

vPC Role status

-----------------------------------------

vPC role                        : secondary

Dual Active Detection Status    : 0

vPC system-mac                  : 00:23:04:ee:be:01

vPC system-priority             : 32667

vPC local system-mac            : f8:a7:3a:4e:40:07

vPC local role-priority         : 32667

vPC local config role-priority  : 32667

vPC peer system-mac             : 44:b6:be:11:17:67

vPC peer role-priority          : 32667

vPC peer config role-priority   : 32667

Passaggio 4. Verificare l'incompatibilità per Cisco NX-OS su entrambi gli switch Cisco Nexus in vPC.

1. Usare il comando show incompatibility-all nxos bootflash.

N9K-1(config)# show incompatibility-all nxos bootflash:nxos64-cs.10.2.5.M.bin

Checking incompatible configuration(s) for vdc 'N9K-1':

-------------------------------------------------------

No incompatible configurations

Checking dynamic incompatibilities:

-----------------------------------

No incompatible configurations

Passaggio 5. Verificare l'impatto per Cisco NX-OS su entrambi gli switch Cisco Nexus in vPC.

1. Usare il comando show install all impact nxos bootflash. In questo modo viene eseguita una diagnosi preliminare per verificare che la versione di Cisco NX-OS sia compatibile e che sia possibile eseguire l'installazione.

N9K-1(config)# show install all impact nxos bootflash:nxos64-cs.10.2.5.M.bin

Installer will perform impact only check. Please wait.

Verifying image bootflash:/nxos64-cs.10.2.5.M.bin for boot variable "nxos".

[####################] 100% -- SUCCESS

Verifying image type.

[####################] 100% -- SUCCESS

Preparing "nxos" version info using image bootflash:/nxos64-cs.10.2.5.M.bin.

[####################] 100% -- SUCCESS

Preparing "bios" version info using image bootflash:/nxos64-cs.10.2.5.M.bin.

[####################] 100% -- SUCCESS

Performing module support checks.

[####################] 100% -- SUCCESS

Notifying services about system upgrade.

[####################] 100% -- SUCCESS

Compatibility check is done:

Module  bootable          Impact  Install-type  Reason

------  --------  --------------  ------------  ------

1       yes      disruptive         reset  default upgrade is not hitless

Images will be upgraded according to following table:

Module       Image                  Running-Version(pri:alt)           New-Version  Upg-Required

------  ----------  ----------------------------------------  --------------------

1        nxos                                   9.3(11)                                10.2(5)           yes

1        bios     v05.47(04/28/2022):v05.43(11/22/2020)    v05.47(04/28/2022)            no

Additional info for this installation:

--------------------------------------

Service "vpc" in vdc 1: Vpc is enabled, Please make sure both Vpc peer switches have same boot mode using 'show boot mode' and proceed

Passaggio 6 (facoltativo). Esportare un backup della configurazione corrente da entrambi gli switch Cisco Nexus in vPC.

N9K-1(config)# copy running-config sftp:running-config-backup

Enter vrf (If no input, current vrf 'default' is considered): default

Enter hostname for the sftp server: 192.168.9.9

Enter username: admin

The authenticity of host '192.168.9.9 (192.168.9.9)' can't be established.

RSA key fingerprint is SHA256:ABDCEFGHI.

Are you sure you want to continue connecting (yes/no/[fingerprint])? yes

Warning: Permanently added '192.168.9.9' (RSA) to the list of known hosts.

Inbound-ReKey for 192.168.9.9:22

User Access Verification

Password:

Connected to 192.168.9.9.

Passaggio 7. Installare NX-OS sullo switch Nexus con ruolo primario vPC.

1. Usare il comando install all nxos bootflash.

N9K-1(config)# install all nxos bootflash:nxos64-cs.10.2.5.M.bin

Installer will perform compatibility check first. Please wait.

Installer is forced disruptive

Verifying image bootflash:/nxos64-cs.10.2.5.M.bin for boot variable "nxos".

[####################] 100% -- SUCCESS

Verifying image type.

[####################] 100% -- SUCCESS

Preparing "nxos" version info using image bootflash:/nxos64-cs.10.2.5.M.bin.

[####################] 100% -- SUCCESS

Preparing "bios" version info using image bootflash:/nxos64-cs.10.2.5.M.bin.

[####################] 100% -- SUCCESS

Performing module support checks.

[####################] 100% -- SUCCESS

Notifying services about system upgrade.

[####################] 100% -- SUCCESS

Compatibility check is done:

Module  bootable          Impact  Install-type  Reason

------  --------  --------------  ------------  ------

1       yes      disruptive         reset  default upgrade is not hitless

Images will be upgraded according to following table:

Module       Image                  Running-Version(pri:alt)           New-Version  Upg-Required

------  ----------  -------------------------------------------------------------

1        nxos                                   9.3(11)                                10.2(5)           yes

1        bios     v05.47(04/28/2022):v05.43(11/22/2020)    v05.47(04/28/2022)            no

Additional info for this installation:

--------------------------------------

Service "vpc" in vdc 1: Vpc is enabled, Please make sure both Vpc peer switches have same boot mode using 'show boot mode' and proceed

Switch will be reloaded for disruptive upgrade.

Do you want to continue with the installation (y/n)?  [n] y

Nota: È necessario leggere il testo senza errori. Dopo questo riavvio, lo switch Cisco Nexus si riavvia e il processo di installazione può richiedere alcuni minuti. la situazione può variare su ciascuno switch Cisco Nexus.

Passaggio 8. Attendere che lo stato sia attivo sullo switch Cisco Nexus.

1. Utilizzare il comando show module.

N9K-1(config)# show module

Mod Ports             Module-Type                      Model           Status

--- ----- ------------------------------------- ------------------------------

1    54   24x10/25G/32G + 6x40/100G Ethernet/FC N9K-C93180YC-FX-24    active *

Mod  Sw                       Hw    Slot

---  ----------------------- ------ ----

1    9.3(11)                  1.0    NA

Mod  MAC-Address(es)                         Serial-Num

---  --------------------------------------  ----------

1    44-b6-aa-aa-aa-aa to 44-b6-be-bb-bb-bb  ABCDEFGHIJK

Mod  Online Diag Status

---  ------------------

1    Pass

* this terminal session

Nota: Si noti che è possibile che vPC keep-alive e/o peer-link non possano essere nello stato UP. Ciò è previsto perché gli switch Cisco Nexus in vPC hanno versioni diverse di Cisco NX-OS, il che non è supportato.

Passaggio 9. Installare Cisco NX-OSon vPC peer Cisco Nexus switch.

N9K-2(config)# install all nxos bootflash:nxos64-cs.10.2.5.M.bin

Installer will perform compatibility check first. Please wait.

Installer is forced disruptive

Verifying image bootflash:/nxos64-cs.10.2.5.M.bin for boot variable "nxos".

[####################] 100% -- SUCCESS

Verifying image type.

[####################] 100% -- SUCCESS

Preparing "nxos" version info using image bootflash:/nxos64-cs.10.2.5.M.bin.

[####################] 100% -- SUCCESS

Preparing "bios" version info using image bootflash:/nxos64-cs.10.2.5.M.bin.

[####################] 100% -- SUCCESS

Performing module support checks.

[####################] 100% -- SUCCESS

Notifying services about system upgrade.

[####################] 100% -- SUCCESS

Compatibility check is done:

Module  bootable          Impact  Install-type  Reason

------  --------  --------------  ------------  ------

1       yes      disruptive         reset  default upgrade is not hitless

Images will be upgraded according to following table:

Module       Image                  Running-Version(pri:alt)           New-Version  Upg-Required

------  ----------  -------------------------------------------------------------

1        nxos                                   9.3(11)                              10.2(5)           yes

1        bios     v05.47(04/28/2022):v05.42(06/14/2020)    v05.47(04/28/2022)            no

Additional info for this installation:

--------------------------------------

Service "vpc" in vdc 1: Vpc is enabled, Please make sure both Vpc peer switches have same boot mode using 'show boot mode' and proceed

Switch will be reloaded for disruptive upgrade.

Do you want to continue with the installation (y/n)?  [n] y

Passaggio 10. Attendere che lo stato sia attivo sullo switch Cisco Nexus.

1. Utilizzare il comando show module.

N9K-2(config)# show module

Mod Ports             Module-Type                      Model           Status

--- ----- ------------------------------------- --------------------- ---------

1    54   24x10/25G/32G + 6x40/100G Ethernet/FC N9K-C93180YC-FX-24    active *

Mod  Sw                       Hw    Slot

---  ----------------------- ------ ----

1    9.3(11)                  1.0    NA

Mod  MAC-Address(es)                         Serial-Num

---  --------------------------------------  ----------

1    f8-a7-3a-nn-nn-nn to f8-a7-3a-n1-n1-n1  98765432109

Mod  Online Diag Status

---  ------------------

1    Pass

* this terminal session

Passaggio 11. Verificare che i canali delle porte keep-alive, peer-link e vPC siano nello stato UP.

1. Usare il comando show vpc.

N9K-1(config)# show vpc

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 1

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 2

Peer Gateway                      : Enabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Disabled

Delay-restore status              : Timer is off.(timeout = 30s)

Delay-restore SVI status          : Timer is off.(timeout = 10s)

Operational Layer3 Peer-router    : Enabled

Virtual-peerlink mode             : Disabled

vPC Peer-link status

-----------------------------------------------------------------

id    Port   Status Active vlans

--    ----   ------ -------------------------------------------------

1     Po1    up     1

vPC status

-----------------------------------------------------------------

Id    Port          Status Consistency Reason                Active vlans

--    ------------  ------ ----------- ------  ---------------

50    Po50          up     success     success               1

60    Po60          up     success     success               1

N9K-2(config)# show vpc

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 1

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary

Number of vPCs configured         : 2

Peer Gateway                      : Enabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Disabled

Delay-restore status              : Timer is off.(timeout = 30s)

Delay-restore SVI status          : Timer is off.(timeout = 10s)

Operational Layer3 Peer-router    : Enabled

Virtual-peerlink mode             : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id    Port   Status Active vlans

--    ----   ------ -------------------------------------------------

1     Po1    up     1

vPC status

----------------------------------------------------------------------------

Id    Port          Status Consistency Reason                Active vlans

--    ------------  ------ ----------- ------                ---------------

50    Po50          up     success     success               1

60    Po60          up     success     success               1

Informazioni correlate

- Supporto tecnico Cisco e download